Contenu

Introduction

Conditions préalables

Conditions requises

Components Used

Conventions

Informations générales

Configuration

Diagramme du réseau

Configurations

Vérification

Dépannage

Dépannage des commandes

Informations connexes

Introduction

Ce document fournit un exemple de configuration pour l'interface BRI (Basic Rate Interface) RNIS et illustre le comportement du routeur Cisco en ce qui concerne le processus de négociation de l'identificateur de terminal (TEI).

Conditions préalables

Conditions requises

Aucune spécification déterminée n'est requise pour ce document.

Components Used

Les informations contenues dans ce document sont basées sur les versions de matériel et de logiciel suivantes :

- Cisco IOS ? Version du logiciel 12.2(6).

- Toutes les plates-formes matérielles.

Remarque : La commande isdn tei-negotiation keep a été introduite dans le logiciel Cisco IOS Versions 12.2(6) et 12.2(6)T.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Pour plus d'informations sur les conventions des documents, référez-vous aux Conventions utilisées pour les conseils techniques de Cisco.

Informations générales

Dans certains pays européens (comme la Belgique et les Pays-Bas), la pratique habituelle est que la compagnie de téléphone (Telco) déconnecte la couche 1 RNIS lorsque la ligne BRI n’est pas active depuis un certain temps, pour des raisons d’économie d’énergie. Ces alternatives sont possibles :

- Les TEI qui ont déjà été attribués peuvent être préservés après que la couche 1 cesse de clignoter.

- Le logiciel Cisco IOS peut être configuré pour négocier à nouveau le TEI chaque fois que la couche 1 tombe en panne.

Configuration

Cette section vous fournit des informations pour configurer les fonctionnalités décrites dans ce document.

Remarque : Pour en savoir plus sur les commandes utilisées dans le présent document, utilisez l’outil de recherche de commandes (clients inscrits seulement).

Diagramme du réseau

Ce document utilise la configuration réseau suivante :

Dans cet exemple, nous utilisons deux routeurs Cisco 2500 avec des lignes BRI.

Configurations

Ce document utilise les configurations suivantes :

- kevin

- krimson

kevin

kevin#show running-config

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

hostname kevin

!

username krimson password

!

isdn switch-type basic-net3

!

interface BRI0

no ip address

encapsulation ppp

dialer rotary-group 1

dialer-group 1

isdn switch-type basic-net3

isdn tei-negotiation preserve

no cdp enable

ppp authentication chap

!

interface Dialer1

ip address 10.9.8.2 255.255.255.0

encapsulation ppp

dialer in-band

dialer map ip 10.9.8.1 name krimson 027208196

dialer-group 1

no cdp enable

ppp authentication chap

!

dialer-list 1 protocol ip permit

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

exec-timeout 0 0

password

login

!

end

krimson

krimson#show running-config

!

version 12.2

!

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname krimson

!

username kevin password

!

isdn switch-type basic-net3

!

interface BRI0

no ip address

encapsulation ppp

no ip route-cache

no ip mroute-cache

no keepalive

dialer rotary-group 1

isdn switch-type basic-net3

no fair-queue

no cdp enable

ppp authentication chap

!

interface Dialer1

ip address 10.9.8.1 255.255.255.0

encapsulation ppp

no ip route-cache

no ip mroute-cache

load-interval 30

no keepalive

dialer in-band

dialer map ip 10.9.8.2 name kevin 027202094

dialer-group 1

no fair-queue

no cdp enable

ppp authentication chap

!

dialer-list 1 protocol ip permit

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

exec-timeout 0 0

password

login

!

end

Vérification

Cette section présente des informations que vous pouvez utiliser pour vous assurer que votre configuration fonctionne correctement.

Certaines commandes show sont prises en charge par l'Output Interpreter Tool (clients enregistrés uniquement), qui vous permet de voir une analyse de la sortie de la commande show.

- show isdn status ? ? affiche l’état de toutes les interfaces RNIS.

kevin#show isdn status

Global ISDN Switchtype = basic-net3

ISDN BRI0 interface

dsl 0, interface ISDN Switchtype = basic-net3

Layer 1 Status:

DEACTIVATED

Layer 2 Status:

Layer 2 NOT Activated

!--- TEI is removed

Layer 3 Status:

0 Active Layer 3 Call(s)

Active dsl 0 CCBs = 0

The Free Channel Mask:  0x3

Number of L2 Discards = 0, L2 Session ID = 10

Total Allocated ISDN CCBs = 0

Dépannage

Cette section fournit des informations que vous pouvez utiliser pour dépanner votre configuration.

Dépannage des commandes

Remarque : avant d'émettre des commandes debug, reportez-vous à Informations importantes sur les commandes de débogage.

- debug isdn q921 ???affiche les procédures d’accès de couche liaison de données (couche 2) qui se déroulent au niveau du routeur sur le canal D (LAPD) de son interface RNIS.

- debug isdn q931 ???affiche des informations sur la configuration et le retrait des connexions réseau RNIS (couche 3) entre le routeur local (côté utilisateur) et le réseau.

- debug isdn events ? ? affiche les événements RNIS qui se produisent du côté utilisateur (sur le routeur) de l’interface RNIS.

- debug bri ???affiche les informations de débogage sur l’activité de routage RNIS BRI.

Voici la sortie de débogage sur kevin :

kevin#

*Mar  1 03:04:14.235: BRI: write_sid: scp = 0, wrote = 92

*Mar  1 03:04:14.235: BRI: write_sid: scp = 80, wrote = 93

*Mar  1 03:04:14.239: BRI0: DEACTIVATED, state F1, event LSD

*Mar  1 03:04:14.243: BRI: write_sid: scp = 0, wrote = 1B

*Mar  1 03:04:14.243: BRI: write_sid: scp = 0, wrote = 20

*Mar  1 03:04:14.243: BRI: write_sid: scp = 0, wrote = 92

*Mar  1 03:04:14.247: BRI: write_sid: scp = A0, wrote = 93

*Mar  1 03:04:14.247: BRI0: DEACTIVATED, state F3, event AP

*Mar  1 03:04:14.251: BRI: write_sid: scp = 0, wrote = 3

*Mar  1 03:04:14.255: ISDN BR0: Recvd MPH_IIC_IND from L1

*Mar  1 03:04:14.263: BRI: write_sid: scp = 0, wrote = 92

*Mar  1 03:04:14.263: BRI: write_sid: scp = E0, wrote = 93

*Mar  1 03:04:14.267: BRI0: PENDING, state F7, event AI

*Mar  1 03:04:14.267: BRI: Received activation indication.

*Mar  1 03:04:14.271: Flush all frames in the queue if any

*Mar  1 03:04:14.275: ISDN BR0: L1 is IF_ACTIVE

*Mar  1 03:04:14.275: ISDN BR0 EVENT: isdn_sw_cstate: State = 4, Old State = 4

*Mar  1 03:04:14.279: ISDN BR0: Incoming call id = 0x0030, dsl 0

*Mar  1 03:04:14.319: ISDN BR0: TX -> IDREQ ri=65279 ai=127

*Mar  1 03:04:14.323: BRI: write_sid: scp = 0, wrote = E

*Mar  1 03:04:14.355: ISDN BR0: RX <- IDASSN ri=65279 ai=66

*Mar  1 03:04:14.375: ISDN BR0: TX -> SABMEp c/r=0 sapi=0 tei=66

*Mar  1 03:04:14.379: BRI: write_sid: scp = 0, wrote = E

*Mar  1 03:04:14.399: ISDN BR0: RX <- UI c/r=1 sapi=0 tei=127

i=0x08011C05A1040288901801896C0A218332373230383139367009A13237323032303934

*Mar  1 03:04:14.435: SETUP pd = 8  callref = 0x1C

*Mar  1 03:04:14.443:   Sending Complete

*Mar  1 03:04:14.443:   Bearer Capability i = 0x8890

*Mar  1 03:04:14.451:   Channel ID i = 0x89

*Mar  1 03:04:14.455:   Calling Party Number i = 0x21, 0x83,

'27208196', Plan:ISDN, Type:National

*Mar  1 03:04:14.475:   Called Party Number i = 0xA1, '27202094',

Plan:ISDN, Type:National

*Mar  1 03:04:14.495: ISDN BR0: RX <- UAf c/r=0 sapi=0 tei=66

*Mar  1 03:04:14.503: %ISDN-6-LAYER2UP: Layer 2 for Interface BR0, TEI 66

changed to up

*Mar  1 03:04:14.515: CCBRI_Go Fr L3 pkt (Len=35) :

*Mar  1 03:04:14.515: 5 1 9C 90 A1 4 2 88 90 18 1 89 6C A 21 83 32 37 32 30

38 31 39 36 70 9 A1 32 37 32 30 32 30 39 34

*Mar  1 03:04:14.527:

*Mar  1 03:04:14.531: ISDN BR0: Incoming call id = 0x0031, dsl 0

*Mar  1 03:04:14.535: ISDN BR0: LIF_EVENT: ces/callid 1/0x31

HOST_INCOMING_CALL

*Mar  1 03:04:14.543: ISDN BR0: HOST_INCOMING_CALL: (non-POTS) DATA

*Mar  1 03:04:14.543: ISDN BR0: HOST_INCOMING_CALL: (1) call_type = DATA

*Mar  1 03:04:14.547: ISDN BR0: HOST_INCOMING_CALL: voice_answer_data =

FALSE call type is DATA

*Mar  1 03:04:14.551: ISDN BR0: Event: Received a DATA call from 27208196

on B1 at 64 Kb/s

*Mar  1 03:04:14.551: ISDN BR0: Event: Accepting the call id 0x31

*Mar  1 03:04:14.555: ISDN BR0: RM returned call_type 0 resource type 0

response 1

*Mar  1 03:04:14.559: CCBRI_Go Fr Host InPkgInfo (Len=9) :

*Mar  1 03:04:14.563: 7 0 1 0 31 3 18 1 89

*Mar  1 03:04:14.567:

*Mar  1 03:04:14.575: ISDN BR0: isdn_send_connect(): msg 4, call id 0x31,

ces 1 bchan 0, call type DATA

*Mar  1 03:04:14.579: BRI: enable channel B1

*Mar  1 03:04:14.579: %LINK-3-UPDOWN: Interface BRI0:1, changed state to up

*Mar  1 03:04:14.591: ISDN: get_isdn_service_state(): idb 0x230B74 bchan 2

is_isdn 1 Not a Pri

*Mar  1 03:04:14.595: CCBRI_Go Fr Host InPkgInfo (Len=6) :

*Mar  1 03:04:14.599: 4 0 1 0 31 0

*Mar  1 03:04:14.603:

*Mar  1 03:04:14.615: ISDN BR0: TX -> INFOc sapi=0 tei=66 ns=0 nr=0

i=0x08019C02180189

*Mar  1 03:04:14.627: CALL_PROC pd = 8  callref = 0x9C

*Mar  1 03:04:14.631: Channel ID i = 0x89

*Mar  1 03:04:14.639: BRI: write_sid: scp = 0, wrote = E

*Mar  1 03:04:14.663: ISDN BR0: RX <- RRr sapi=0 tei=66 nr=1

*Mar  1 03:04:14.675: ISDN BR0: TX -> INFOc sapi=0 tei=66 ns=1 nr=0

i=0x08019C07

*Mar  1 03:04:14.679: CONNECT pd = 8  callref = 0x9C

*Mar  1 03:04:14.687: BRI: write_sid: scp = 0, wrote = E

*Mar  1 03:04:14.711: ISDN BR0: RX <- RRr sapi=0 tei=66 nr=2

*Mar  1 03:04:15.567: ISDN BR0: RX <- INFOc sapi=0 tei=66 ns=0 nr=2

i=0x08011C0F

*Mar  1 03:04:15.575: CONNECT_ACK pd = 8  callref = 0x1C

*Mar  1 03:04:15.595: ISDN BR0: TX -> RRr sapi=0 tei=66 nr=1

*Mar  1 03:04:15.595: BRI: write_sid: scp = 0, wrote = E

*Mar  1 03:04:15.619: CCBRI_Go Fr L3 pkt (Len=4) :

*Mar  1 03:04:15.619: F 1 9C 92

*Mar  1 03:04:15.623:

*Mar  1 03:04:15.627: ISDN BR0: LIF_EVENT: ces/callid 1/0x31 HOST_CONNECT

*Mar  1 03:04:15.631: BRI: enable channel B1

*Mar  1 03:04:15.631: ISDN BR0: Event: Connected to 27208196 on B1 at 64 Kb/s

*Mar  1 03:04:16.223: BR0:1 DDR: dialer protocol up

*Mar  1 03:04:17.187: %LINEPROTO-5-UPDOWN: Line protocol on Interface

BRI0:1, changed state to up

*Mar  1 03:04:20.591: %ISDN-6-CONNECT: Interface BRI0:1 is now connected to

027208196 krimson

*Mar  1 03:04:25.591: ISDN BR0: TX -> RRp sapi=0 tei=66 nr=1

*Mar  1 03:04:25.595: BRI: write_sid: scp = 0, wrote = E

*Mar  1 03:04:25.615: ISDN BR0: RX <- RRf sapi=0 tei=66 nr=2

kevin#show isdn status

Global ISDN Switchtype = basic-net3

ISDN BRI0 interface

dsl 0, interface ISDN Switchtype = basic-net3

Layer 1 Status:

ACTIVE

Layer 2 Status:

TEI = 66, Ces = 1, SAPI = 0, State = MULTIPLE_FRAME_ESTABLISHED

I_Queue_Len 0, UI_Queue_Len 0

Layer 3 Status:

1 Active Layer 3 Call(s)

CCB:callid=31, sapi=0, ces=1, B-chan=1, calltype=DATA

Active dsl 0 CCBs = 1

The Free Channel Mask:  0x80000002

Number of L2 Discards = 0, L2 Session ID = 10

Total Allocated ISDN CCBs = 1

kevin#

*Mar  1 03:04:35.623: ISDN BR0: TX -> RRp sapi=0 tei=66 nr=1

*Mar  1 03:04:35.627: BRI: write_sid: scp = 0, wrote = E

*Mar  1 03:04:35.647: ISDN BR0: RX <- RRf sapi=0 tei=66 nr=2

*Mar  1 03:04:45.655: ISDN BR0: TX -> RRp sapi=0 tei=66 nr=1

*Mar  1 03:04:45.659: BRI: write_sid: scp = 0, wrote = E

*Mar  1 03:04:45.679: ISDN BR0: RX <- RRf sapi=0 tei=66 nr=2

*Mar  1 03:04:55.683: ISDN BR0: RX <- RRp sapi=0 tei=66 nr=2

*Mar  1 03:04:55.691: ISDN BR0: TX -> RRf sapi=0 tei=66 nr=1

*Mar  1 03:04:55.695: BRI: write_sid: scp = 0, wrote = E

*Mar  1 03:05:05.691: ISDN BR0: TX -> RRp sapi=0 tei=66 nr=1

*Mar  1 03:05:05.695: BRI: write_sid: scp = 0, wrote = E

*Mar  1 03:05:05.715: ISDN BR0: RX <- RRf sapi=0 tei=66 nr=2

*Mar  1 03:05:15.724: ISDN BR0: TX -> RRp sapi=0 tei=66 nr=1

*Mar  1 03:05:15.728: BRI: write_sid: scp = 0, wrote = E

*Mar  1 03:05:15.748: ISDN BR0: RX <- RRf sapi=0 tei=66 nr=2

*Mar  1 03:05:25.756: ISDN BR0: TX -> RRp sapi=0 tei=66 nr=1

*Mar  1 03:05:25.760: BRI: write_sid: scp = 0, wrote = E

*Mar  1 03:05:25.780: ISDN BR0: RX <- RRf sapi=0 tei=66 nr=2

*Mar  1 03:05:35.788: ISDN BR0: TX -> RRp sapi=0 tei=66 nr=1

*Mar  1 03:05:35.792: BRI: write_sid: scp = 0, wrote = E

*Mar  1 03:05:35.812: ISDN BR0: RX <- RRf sapi=0 tei=66 nr=2

*Mar  1 03:05:45.820: ISDN BR0: TX -> RRp sapi=0 tei=66 nr=1

*Mar  1 03:05:45.824: BRI: write_sid: scp = 0, wrote = E

*Mar  1 03:05:45.844: ISDN BR0: RX <- RRf sapi=0 tei=66 nr=2

*Mar  1 03:05:55.852: ISDN BR0: TX -> RRp sapi=0 tei=66 nr=1

*Mar  1 03:05:55.856: BRI: write_sid: scp = 0, wrote = E

*Mar  1 03:05:55.880: ISDN BR0: RX <- RRf sapi=0 tei=66 nr=2

*Mar  1 03:06:05.888: ISDN BR0: TX -> RRp sapi=0 tei=66 nr=1

*Mar  1 03:06:05.892: BRI: write_sid: scp = 0, wrote = E

*Mar  1 03:06:05.912: ISDN BR0: RX <- RRf sapi=0 tei=66 nr=2

*Mar  1 03:06:15.920: ISDN BR0: TX -> RRp sapi=0 tei=66 nr=1

*Mar  1 03:06:15.924: BRI: write_sid: scp = 0, wrote = E

*Mar  1 03:06:15.944: ISDN BR0: RX <- RRf sapi=0 tei=66 nr=2

*Mar  1 03:06:17.024: BR0:1 DDR: idle timeout

*Mar  1 03:06:17.028: BR0:1 DDR: disconnecting call

*Mar  1 03:06:17.028: ISDN BR0: Event: Hangup call to call id 0x31

*Mar  1 03:06:17.032: BRI: disable channel B1

*Mar  1 03:06:17.032: ISDN BR0: process_disconnect(): call id 0x31, call

type is DATA, b_idb 0x230B74, ces 1, cause Normal call clearing(0x10)

*Mar  1 03:06:17.040: %ISDN-6-DISCONNECT: Interface BRI0:1  disconnected

from 27208196 krimson, call lasted 122 seconds

*Mar  1 03:06:17.048: ISDN: get_isdn_service_state(): idb 0x230B74 bchan 2

is_isdn 1 Not a Pri

*Mar  1 03:06:17.052: CCBRI_Go Fr Host InPkgInfo (Len=13) :

*Mar  1 03:06:17.052: 5 0 1 0 31 3 8 1 90 8 2 80 90

*Mar  1 03:06:17.056:

*Mar  1 03:06:17.072: ISDN BR0: TX -> INFOc sapi=0 tei=66 ns=2 nr=1

i=0x08019C4508028090

*Mar  1 03:06:17.084:     DISCONNECT pd = 8  callref = 0x9C

*Mar  1 03:06:17.088:         Cause i = 0x8090 - Normal call clearing

*Mar  1 03:06:17.096: BRI: write_sid: scp = 0, wrote = E

*Mar  1 03:06:17.124: ISDN BR0: RX <- RRr sapi=0 tei=66 nr=3

*Mar  1 03:06:17.556: ISDN BR0: RX <- INFOc sapi=0 tei=66 ns=1 nr=3

i=0x08011C4D

*Mar  1 03:06:17.564:     RELEASE pd = 8  callref = 0x1C

*Mar  1 03:06:17.580: CCBRI_Go Fr L3 pkt (Len=4) :

*Mar  1 03:06:17.584: 4D 1 9C 97

*Mar  1 03:06:17.584:

*Mar  1 03:06:17.592: ISDN BR0: LIF_EVENT: ces/callid 1/0x31

HOST_DISCONNECT_ACK

*Mar  1 03:06:17.596: ISDN: get_isdn_service_state(): idb 0x230B74 bchan 2

is_isdn 1 Not a Pri

*Mar  1 03:06:17.600: ISDN BR0: HOST_DISCONNECT_ACK: call type is DATA

*Mar  1 03:06:17.604: BRI: disable channel B1

*Mar  1 03:06:17.604: %LINK-3-UPDOWN: Interface BRI0:1, changed state to

down

*Mar  1 03:06:17.612: BR0:1 DDR: disconnecting call

*Mar  1 03:06:17.616: ISDN BR0: LIF_EVENT: ces/callid 1/0x31

HOST_DISCONNECT_ACK

*Mar  1 03:06:17.620: ISDN: get_isdn_service_state(): idb 0x230B74 bchan 2

is_isdn 1 Not a Pri

*Mar  1 03:06:17.624: ISDN BR0: HOST_DISCONNECT_ACK: call type is DATA

*Mar  1 03:06:17.628: BRI: disable channel B1

*Mar  1 03:06:17.636: ISDN BR0: TX -> RRr sapi=0 tei=66 nr=2

*Mar  1 03:06:17.640: BRI: write_sid: scp = 0, wrote = E

*Mar  1 03:06:17.644: ISDN BR0: TX -> INFOc sapi=0 tei=66 ns=3 nr=2

i=0x08019C5A

*Mar  1 03:06:17.652: RELEASE_COMP pd = 8  callref = 0x9C

*Mar  1 03:06:17.660: BRI: write_sid: scp = 0, wrote = E

*Mar  1 03:06:17.684: ISDN BR0: RX <- RRr sapi=0 tei=66 nr=4

*Mar  1 03:06:18.940: %LINEPROTO-5-UPDOWN: Line protocol on Interface

BRI0:1, changed state to down

*Mar  1 03:06:27.693: ISDN BR0: TX -> RRp sapi=0 tei=66 nr=2

*Mar  1 03:06:27.697: BRI: write_sid: scp = 0, wrote = E

*Mar  1 03:06:27.717: ISDN BR0: RX <- RRf sapi=0 tei=66 nr=4

*Mar  1 03:06:32.781: ISDN BR0: RX <- DISCp c/r=1 sapi=0 tei=66

*Mar  1 03:06:32.785: %ISDN-6-LAYER2DOWN: Layer 2 for Interface BR0, TEI 66

changed to down

*Mar  1 03:06:32.793: ISDN BR0: TX -> UAf c/r=1 sapi=0 tei=66

*Mar  1 03:06:32.797: BRI: write_sid: scp = 0, wrote = E

kevin#show isdn status

Global ISDN Switchtype = basic-net3

ISDN BRI0 interface

dsl 0, interface ISDN Switchtype = basic-net3

Layer 1 Status:

ACTIVE

Layer 2 Status:

TEI = 66, Ces = 1, SAPI = 0, State = TEI_ASSIGNED

!--- ISDN Layer 2 is disconnected

I_Queue_Len 0, UI_Queue_Len 0

Layer 3 Status:

0 Active Layer 3 Call(s)

Active dsl 0 CCBs = 0

The Free Channel Mask:  0x3

Number of L2 Discards = 0, L2 Session ID = 10

Total Allocated ISDN CCBs = 0

kevin#

*Mar  1 03:06:42.881: BRI: write_sid: scp = 0, wrote = 92

*Mar  1 03:06:42.885: BRI: write_sid: scp = 90, wrote = 93

*Mar  1 03:06:42.885: BRI0: ACTIVATED, state F2, event DI

*Mar  1 03:06:42.889: BRI: T4 timer started DEACT timer expired

*Mar  1 03:06:43.493: BRI: write_sid: scp = 0, wrote = 92

*Mar  1 03:06:43.493: BRI: write_sid: scp = 90, wrote = 93

*Mar  1 03:06:43.497: BRI: write_sid: scp = 0, wrote = 1

*Mar  1 03:06:43.497: BRI: write_sid: scp = 0, wrote = 0

*Mar  1 03:06:43.501: ISDN BR0 EVENT: isdn_sw_cstate: State = 0, Old State = 4

*Mar  1 03:06:43.505: BRI: disable channel B1

*Mar  1 03:06:43.505: BRI: disable channel B2

*Mar  1 03:06:43.509: ISDN BR0: Physical layer is IF_DOWN

!--- ISDN Layer 1 deactivated due to no calls on BRI

*Mar  1 03:06:43.509: ISDN BR0: Shutting down ME

*Mar  1 03:06:43.513: ISDN BR0: Shutting down ISDN Layer 3

kevin#show isdn status

Global ISDN Switchtype = basic-net3

ISDN BRI0 interface

dsl 0, interface ISDN Switchtype = basic-net3

Layer 1 Status:

DEACTIVATED

Layer 2 Status:

TEI = 66, Ces = 1, SAPI = 0, State = TEI_ASSIGNED

!--- TEI is preserved due to used configuration

I_Queue_Len 0, UI_Queue_Len 0

Layer 3 Status:

0 Active Layer 3 Call(s)

Active dsl 0 CCBs = 0

The Free Channel Mask:  0x3

Number of L2 Discards = 0, L2 Session ID = 11

Total Allocated ISDN CCBs = 0

Informations connexes

- Accès aux pages d'assistance technologique

- Support technique - Cisco Systems