目錄

簡介

必要條件

需求

採用元件

慣例

設定

網路圖表

組態

驗證

疑難排解

疑難排解指令

疑難排解程序

相關資訊

簡介

本檔案將提供Cisco 1800整合式服務路由器(ISR)上無線LAN(WLAN)的組態範例。

必要條件

需求

本文件沒有特定需求。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- Cisco IOS®軟體版本12.3或更高版本上帶有高級IP服務功能集的1800 ISR

注意：您可以將相同的配置應用到任何ISR。此組態並非特定於1800系列。

- 具有下列無線網絡卡的PC:

- 802.11a

- 802.11b

- 802.11b/g a/b/g

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

設定

本節提供用於設定本文件中所述功能的資訊。

註：使用Command Lookup Tool(僅限註冊客戶)查詢有關本文檔中使用的命令的更多資訊。

網路圖表

本檔案會使用以下網路設定：

到路由器的無線連線

組態

逐步說明

請完成以下步驟：

1. 設定DHCP作用域和排除的地址。

注意：排除的地址是可選的。

有關Cisco IOS軟體中DHCP伺服器的詳細說明，請參閱Cisco IOS DHCP伺服器。

2. 啟用整合路由和橋接，並設定網橋組。

3. 為介面Bridge-Group Virtual Interface 1(BVI1)分配IP地址。

4. 設定無線。

1. 將介面Dot11Radio0或Dot11Radio1分配給網橋組1。

2. 為無線電介面分配一個服務集識別符號(SSID)，然後定義開放式身份驗證。

組態

本檔案會使用以下設定：

1800系列ISR無線和DHCP配置

1800-ISR#show running-config

Building configuration...

.

.

!

hostname 1800-ISR

!

!--- Output suppressed.

!

ip subnet-zero

!

!

ip dhcp excluded-address 192.168.2.1 192.168.2.100

!--- This sets up DHCP and excluded addresses. Excluded addresses are optional.

!

ip dhcp pool 1800-ISR

network 192.168.2.0 255.255.255.0

!

!

bridge irb

!--- Turn on integrated routing and bridging.

!

!

interface Dot11Radio0

!--- This is the wireless radio interface configuration.

no ip address

!

ssid Cisco

!--- Here, the SSID is given as "Cisco".

authentication open

!--- This defines the authentication as open.

!

speed basic-1.0 basic-2.0 basic-5.5 6.0 9.0 basic-11.0 12.0 18.0 24.0 36.0 48.0 54.0

station-role root

bridge-group 1

bridge-group 1 subscriber-loop-control

bridge-group 1 spanning-disabled

bridge-group 1 block-unknown-source

no bridge-group 1 source-learning

no bridge-group 1 unicast-flooding

!

!

interface BVI1

ip address 192.168.2.1 255.255.255.0

!

ip classless

!

!--- Note: Configure the bridge 1 protocol IEEE and the bridge 1 route IP !--- before you create interface BVI1 or add the radio interface to bridge group 1.

!

bridge 1 protocol ieee

bridge 1 route ip

!

line con 0

line aux 0

line vty 0 4

!

no scheduler allocate

end

驗證

使用本節內容，確認您的組態是否正常運作。

輸出直譯器工具(僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

使用以下命令驗證DHCP和無線操作是否正確：

- show dot11 associations

- show ip dhcp binding

在show dot11 associations命令的輸出和show ip dhcp binding命令的輸出中，MAC地址和IP地址必須匹配。以下是範例：

1800-ISR#show dot11 associations

802.11 Client Stations on Dot11Radio0:

SSID [Cisco] :

MAC Address     IP address      Device           Name          Parent         State

0040.96ac.345c  192.168.2.101   CB21AG/PI21AG    WLCLIENT      self           Associated

!

!--- Output suppressed.

!

1800-ISR#show ip dhcp binding

Bindings from all pools not associated with VRF:

IP address          Client-ID/              Lease expiration       Type

Hardware address/

User name

192.168.2.101       0100.4096.ac34.5c       Dec 18 2005 05:07 PM   Automatic

1800-ISR#

疑難排解

使用本節內容，對組態進行疑難排解。

疑難排解指令

附註：使用 debug 指令之前，請先參閱有關 Debug 指令的重要資訊。

發出debug ip dhcp server packet命令以調試IP DHCP伺服器。使用未加密的開放驗證WLAN時，此命令可提供最迅速和最有效的疑難排解方法。

debug ip dhcp server packet命令顯示以下資料事務：

debug ip dhcp server packet命令的以下輸出是DHCP請求成功的示例：

1800-ISR#debug ip dhcp server packet

*Dec 17 15:40:50.379: DHCPD: DHCPREQUEST received from client 0100.4096.ac34.5c.

!

!--- This shows the client DHCP discover packet that is sent to the router.

!

*Dec 17 15:40:50.379: DHCPD: No default domain to append - abort update

*Dec 17 15:40:50.379: DHCPD: Sending DHCPACK to client 0100.4096.ac34.5c (192.168.2.101)

!

!--- This shows the router DHCP acknowledgment (ACK) that is sent back to the client.

!

*Dec 17 15:40:50.379: DHCPD: creating ARP entry (192.168.2.101, 0040.96ac.345c).

*Dec 17 15:40:50.379: DHCPD: unicasting BOOTREPLY to client 0040.96ac.345c (192.168.2.101)

疑難排解程序

如果在debug ip dhcp server packet命令的輸出中未看到DHCP提供，請開始對802.11協定進行故障排除。請完成以下步驟：

1. 驗證無線客戶端設定、SSID和無安全/加密設定。

附註：ISR和客戶端中的SSID必須相同。在這種情況下，SSID為「Cisco」。 圖1和圖2顯示了Cisco Aironet案頭實用程式(ADU)和Aironet客戶端實用程式(ACU)中的SSID設定。 您看到的視窗取決於無線客戶端卡和您使用的韌體版本。

圖1 - Cisco ADU SSID設定

圖2 - Cisco ACU SSID設定

圖3 - Windows無線零設定

2. 驗證Wi-Fi相容性。

請參閱Wi-Fi Alliance 頁面，驗證使用的無線網路介面卡(NIC)的Wi-Fi相容性。

3. 如需進一步的技術協助，請聯絡思科技術支援。

相關資訊

- Cisco IOS DHCP伺服器

- 思科接入路由器無線配置指南

- 技術支援與文件 - Cisco Systems