目錄

簡介

必要條件

需求

採用元件

慣例

設定

網路圖表

組態

驗證

疑難排解

相關資訊

簡介

本文檔提供了X.25背對背連線的配置示例。您可以使用它來驗證連線和硬體是否正常工作。

必要條件

需求

本文檔的讀者應基本瞭解以下內容：

- X.25

- TCP/IP

採用元件

本檔案中的資訊是根據以下軟體和硬體版本。

- 此組態適用於所有Cisco IOS®軟體版本。本文中的所有路由器（Cisco 2500路由器）都使用Cisco IOS軟體版本12.2(10b)。

- X.25連線的DCE端通過WAN DCE電纜連線。

- X.25連線的DTE端通過WAN DTE電纜連線。

有關WAN DCE和DTE電纜的詳細資訊，請參閱串列電纜。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

設定

本節提供用於設定本檔案中所述方案的資訊。

注意：要查詢有關本文檔中使用的命令的其他資訊，請使用命令查詢工具(僅限註冊客戶)。

網路圖表

本文檔使用下圖所示的網路設定。

預設串列封裝為思科高級資料鏈路控制(HDLC)。 必須使用encapsulation x25命令顯式配置X.25封裝方法。dce選項將操作指定為邏輯X.25 DCE裝置。

在背對背串列連線上，電纜的DCE端的路由器充當物理層DCE，並為線路提供時鐘訊號。在介面配置模式下的clock rate命令使位於電纜（在本例中為Prasit）DCE端的路由器能夠為線路提供時鐘訊號。

註：上述兩台路由器中的任何一台都可以充當邏輯X.25 DCE裝置，無論電纜的哪一端連線到路由器。換句話說，encapsulation x25 dce命令可以放在上述兩台路由器中的任意一台上。

組態

本檔案使用下列組態。在此配置中，Prasit同時充當物理層和X.25 DCE，Spicey充當物理層和X.25 DTE。

- 普拉西

- 斯皮塞

普拉西

interface Serial0

ip address 5.0.2.1 255.255.255.0

encapsulation x25 dce

!--- Specifies a serial interface's !--- operation as an X.25 DCE device.

x25 address 7890

!--- Sets the X.121 address.

x25 map ip 5.0.2.2 1234

!--- Sets up the LAN protocols-to-remote !--- host mapping.

clockrate 64000

!--- Specifies a serial interface's operation !--- as a physical layer DCE device.

no cdp enable

斯皮塞

interface Serial1

ip address 5.0.2.2 255.255.255.0

encapsulation x25

!--- Specifies a serial interface's operation !--- as an X.25 device. Default X.25 !--- encapsulation mode is "dte".

x25 address 1234

x25 map ip 5.0.2.1 7890

no cdp enable

驗證

本節提供的資訊可用於確認您的組態是否正常運作。

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

- show controllers serial — 顯示介面硬體和所連線電纜的相關資訊。有關詳細資訊，請參閱命令參考。

- ping — 檢查主機可達性和網路連線。有關詳細資訊，請參閱命令參考。

- show x25 vc — 顯示有關X.25 SVC和PVC的資訊。有關詳細資訊，請參閱命令參考。

- show interfaces serial — 顯示有關介面特性的資訊，如封裝、頻寬和其他詳細資訊。有關詳細資訊，請參閱命令參考。

以下輸出是在此示例配置中的裝置上輸入這些命令的結果。

使用show controllers命令檢查Prasit是物理層DCE，Spicey是物理層DTE。此命令為您提供有關物理層是否工作以及連線的電纜型別的資訊。

prasit# show controllers serial 0

HD unit 0, idb = 0x1D3A2C, driver structure at 0x1DAFE8

buffer size 1524 HD unit 0, V.35 DCE cable, clockrate 64000

!---Output suppressed.

spicey# show controllers serial 1

HD unit 1, idb = 0x153E94, driver structure at 0x15A1F8

buffer size 1524 HD unit 1, V.35 DTE cable

!---Output suppressed.

要驗證X.25背對背配置，請執行以下步驟。

1. 從X.25 DCE（在本例中為Prasit）對X.25 DTE(Spicey)執行ping操作。

在這種情況下，使用SVC1，這是預設情況下配置的最小值。

prasit# ping 5.0.2.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 5.0.2.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 36/38/48 ms

prasit# show x25 vc

SVC 1,  State: D1,  Interface: Serial0

Started 00:00:07, last input 00:00:07, output 00:00:07

Connects 1234 <-> ip 5.0.2.2

Call PID cisco, Data PID none

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 5  PR: 5  ACK: 4  Remote PR: 5  RCNT: 1  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 500/500 packets 5/5 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

prasit# show interfaces serial 0

Serial0 is up, line protocol is up

Hardware is HD64570

Internet address is 5.0.2.1/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation X25, loopback not set

X.25 DCE, address 7890, state R1, modulo 8, timer 0

Defaults: idle VC timeout 0

cisco encapsulation

input/output window sizes 2/2, packet sizes 128/128

Timers: T10 60, T11 180, T12 60, T13 60

Channels: Incoming-only none, Two-way 1-1024, Outgoing-only none

RESTARTs 1/0 CALLs 2+0/0+0/0+0 DIAGs 0/0

LAPB DCE, state CONNECT, modulo 8, k 7, N1 12056, N2 20

T1 3000, T2 0, interface outage (partial T3) 0, T4 0

VS 5, VR 5, tx NR 5, Remote VR 5, Retransmissions 0

Queues: U/S frames 0, I frames 0, unack. 0, reTx 0

IFRAMEs 29/29 RNRs 0/0 REJs 0/0 SABM/Es 0/1 FRMRs 0/0 DISCs 0/0

Last input 00:00:13, output 00:00:13, output hang never

Last clearing of "show interface" counters 00:22:38

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

33 packets input, 2679 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

42 packets output, 2693 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

DCD=up  DSR=up  DTR=up  RTS=up  CTS=up

prasit#

2. 然後從X.25 DTE(Spicey)對X.25 DCE(Prasit)執行ping。

spicey# ping 5.0.2.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 5.0.2.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 32/32/36 ms

spicey#

spicey# show x25 vc

SVC 1,  State: D1,  Interface: Serial1

Started 00:01:03, last input 00:01:03, output 00:01:03

Connects 7890 <-> ip 5.0.2.1

Call PID ietf, Data PID none

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 5  PR: 5  ACK: 5  Remote PR: 4  RCNT: 0  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 500/500 packets 5/5 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

spicey# show interfaces serial 1

Serial1 is up, line protocol is up

Hardware is HD64570

Internet address is 5.0.2.2/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation X25, loopback not set

X.25 DTE, address 1234, state R1, modulo 8, timer 0

Defaults: idle VC timeout 0

cisco encapsulation

input/output window sizes 2/2, packet sizes 128/128

Timers: T20 180, T21 200, T22 180, T23 180

Channels: Incoming-only none, Two-way 1-1024, Outgoing-only none

RESTARTs 1/1 CALLs 0+0/2+0/0+0 DIAGs 0/0

LAPB DTE, state CONNECT, modulo 8, k 7, N1 12056, N2 20

T1 3000, T2 0, interface outage (partial T3) 0, T4 0

VS 5, VR 5, tx NR 5, Remote VR 5, Retransmissions 0

Queues: U/S frames 0, I frames 0, unack. 0, reTx 0

IFRAMEs 29/29 RNRs 0/0 REJs 0/0 SABM/Es 1/0 FRMRs 0/0 DISCs 0/0

Last input 00:01:10, output 00:01:10, output hang never

Last clearing of "show interface" counters 00:23:59

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

42 packets input, 2693 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

32 packets output, 2657 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

2 carrier transitions

DCD=up  DSR=up  DTR=up  RTS=up  CTS=up

3. 使用以下命令清除Spicey的Serial1上的X.25連線：

spicey# clear x25 serial 1

Force Restart [confirm]

4. 清除X.25連線後，嘗試從DTE（在本例中為Spicey）對DCE(Prasit)執行ping。

在此案例中，使用SVC1024（已配置的最高）。

spicey# ping 5.0.2.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 5.0.2.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 32/36/44 ms

spicey# show x25 vc

SVC 1024,  State: D1,  Interface: Serial1

Started 00:00:04, last input 00:00:04, output 00:00:04

Connects 7890 <-> ip 5.0.2.1

Call PID cisco, Data PID none

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 5  PR: 5  ACK: 4  Remote PR: 5  RCNT: 1  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 500/500 packets 5/5 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

5. 再次在配置中使用相同的命令。

prasit# ping 5.0.2.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 5.0.2.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 32/34/36 ms

prasit# show x25 vc

SVC 1024,  State: D1,  Interface: Serial0

Started 00:01:34, last input 00:01:34, output 00:01:34

Connects 1234 <-> ip 5.0.2.2

Call PID ietf, Data PID none

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 5  PR: 5  ACK: 5  Remote PR: 4  RCNT: 0  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 500/500 packets 5/5 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

相關資訊

- X.25背景

- 配置X.25和LAPB

- X.25技術支援頁面

- 技術支援 - Cisco Systems