目錄

簡介

必要條件

需求

採用元件

慣例

背景資訊

設定

網路圖表

組態

驗證

疑難排解

疑難排解指令

相關資訊

簡介

本文提供一個範例組態，其中遠端主機透過公共交換電話網路(PSTN)撥號線路上的傳輸控制通訊協定(TCP)網路連線到X.25。主機不傳送或接收任何X.25封包。但是，其連線的遠端路由器充當X.25資料包組合器/解組合器(PAD)，並為主機封裝和解封X.25資料包。

注意：這稱為「反向填充區」，因為X25呼叫只能從X25裝置（伺服器）建立到非同步主機，反之亦然。轉發墊需要不同的配置。

必要條件

需求

本文件沒有特定需求。

採用元件

Cisco IOS®軟體版本11.2中引入了通訊協定轉譯服務中可用的PAD相關功能增強功能。

以下平台支援PAD增強功能：

- Cisco 2500系列路由器

- Cisco 26xx系列路由器

- Cisco 36xx系列路由器

- Cisco 4000路由器

- Cisco 4500路由器

- 思科4700路由器

- Cisco AS5200系列路由器

- Cisco 7000系列路由器

- Cisco 7200系列路由器

- Cisco 7500系列路由器

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

背景資訊

透過TCP進行的X.25上的PAD(XOT)可啟用對目的地的PAD呼叫，這些目的地無法透過實體X.25介面到達，但透過TCP通道到達。此功能使來自IP鏈路上的路由器的PAD呼叫能夠到達X.25裝置。PAD over XOT還允許從IP鏈路傳入的XOT連線被接受為本地路由器上的PAD或協定轉換連線。

設定

本節提供用於設定本文件中所述功能的資訊。

注意：要查詢有關本文檔中使用的命令的其他資訊，請使用命令查詢工具(僅限註冊客戶)。

網路圖表

本檔案會使用以下網路設定：

組態

本檔案會使用以下設定：

遠端路由器

Current configuration:

!

version 12.0

service pad from-xot

!---used for allowing incoming xot to pad connection

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

!OPTIONAL

x29 profile default 2:0, 4:1, 15:0, 7:21

!---apply customized x29 profile as default to all incoming connections

!

hostname Remote

!

memory-size iomem 25

ip subnet-zero

no ip domain-lookup

!

x25 routing

!

interface Serial0

ip address 10.10.100.2 255.255.255.0

no ip directed-broadcast

!

interface Serial1

ip address 10.10.175.1 255.255.255.0

no ip directed-broadcast

!

interface FastEthernet0

ip address 10.10.10.42 255.255.255.0

no ip directed-broadcast

half-duplex

!

ip classless

no ip http server

!

x25 route ^100 xot 10.10.100.1

x25 host remote 250

!---map the x25 address of 25099 to the router's

hostname

!

line con 0

no exec

exec-timeout 0 0

transport input none

line aux 0

!---to async host

no exec

modem InOut

rotary 99

!---enable reverse PAD

transport input pad

flowcontrol hardware

line vty 0 4

login local

!

主路由器

Current configuration:

!

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Main

!

!

memory-size iomem 25

ip subnet-zero

no ip domain-lookup

!

x25 routing

!

!

!

interface Serial0

ip address 10.10.100.1 255.255.255.0

no ip directed-broadcast

clockrate 800000

!

interface Serial1

no ip directed-broadcast

encapsulation x25 dce

x25 address 150

clockrate 56000

!

interface FastEthernet0

no ip address

no ip directed-broadcast

half-duplex

!

ip classless

no ip http server

!

x25 route ^250 xot 10.10.100.2

x25 route ^100 interface Serial1

!

line con 0

transport input none

line aux 0

line vty 0 4

login local

!

no scheduler allocate

end

驗證

目前沒有適用於此組態的驗證程序。

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

疑難排解指令

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

注意：發出debug命令之前，請參閱有關Debug命令的重要資訊。

- debug x25 events — 顯示有關所有X.25流量或特定X.25服務類別的資訊。

- debug pad — 顯示所有PAD連線的調試消息。

對於從伺服器到主機的X.25成功呼叫，將顯示以下調試輸出。我們在遠端路由器上執行了這些debug命令。

Remote#debug x25 events

Remote#debug pad

WORKING CALL

2d01h: pad_ctxt_up: id 808D6F18, reason 80742B9C (event 0, impetus 10)

2d01h: [10.10.100.1,11042/10.10.100.2,1998]: XOT I P/Inactive Call (20) 8

lci 1

2d01h:   From (5): 10006 To (5): 25099

2d01h:   Facilities: (6)

2d01h:     Packet sizes: 128 128

2d01h:     Window sizes: 2 2

2d01h:   Call User Data (4): 0x01000000 (pad)

2d01h: PAD: incoming call to 25099 on line 5 CUD length 4

2d01h: PAD: Creating TTY daemon on tty5 for vc 1

2d01h: [10.10.100.1,11042/10.10.100.2,1998]: XOT O P3 Call Confirm (5) 8

lci 1

2d01h:   From (0):  To (0):

2d01h:   Facilities: (0)

2d01h: PAD5: Call completed

2d01h: PAD5: Output X29 packet type 4 (Read X.3 param) len 1

2d01h: PAD5: Control packet received.

2d01h: PAD5: Input X29 packet type 0 (Parameter indication) len 45

1:1, 2:1, 3:2, 4:0, 5:0, 6:5, 7:2,

8:0, 9:0, 10:0, 11:14, 12:1, 13:4, 14:0, 15:1,

16:8, 17:24, 18:18, 19:2, 20:255, 21:7, 22:0,

2d01h: PAD5: Setting ParamsIn, length 44

2d01h: PAD5: Output X29 packet type 6 (Set and Read) len 9 2:0, 4:1,

15:0,7:21,

2d01h: PAD5: Control packet received.

2d01h: PAD5: Input X29 packet type 0 (Parameter indication) len 9 2:0,

4:1, 15:0, 7:21,

相關資訊

- X.25技術提示

- 技術支援 - Cisco Systems