目錄

簡介

必要條件

需求

採用元件

慣例

背景資訊

設定

網路圖表

組態

驗證

疑難排解

相關資訊

簡介

本文提供在路由器之間建立多鏈路捆綁的配置示例。要在兩台路由器之間有多個多重連結，您需要為每個套件組合設定不同的驗證使用者名稱。

必要條件

需求

本文件沒有特定需求。

採用元件

本檔案中的資訊是根據Cisco IOS®軟體版本12.0(7)T。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

背景資訊

我們在此建立的示例配置具有以下功能：

- 它使用多鏈路介面，其下有一個物理成員介面。

- 它使用BRI介面作為多鏈路介面的備份。此BRI介面具有多鏈路功能，以及主多鏈路介面的所有其他特性。

- 在從備份介面切換到主介面時，我們使用兩個相互獨立的多鏈路捆綁包。其中一個來自多鏈路介面，另一個來自BRI。預設情況下，多重連結套件組合由驗證使用者名稱識別。但是，在從備份(BRI)切換到主（多鏈路）介面時，這會產生問題。此示例配置向您展示如何解決此問題。

設定

本節提供用於設定本文件中所述功能的資訊。

注意：要查詢有關本文檔中使用的命令的其他資訊，請使用命令查詢工具(僅限註冊客戶)。

網路圖表

本檔案會使用以下網路設定：

組態

本檔案會使用以下設定：

- Router3

- Router2

Router3

Router3#show running-config

!

version 12.0

!

hostname Router3

!

!

username MultilinkRouter2 password 0 cisco

username Router2BRI password 0 cisco

!--- The username must match the one in the ppp chap hostname command on the remote router

!

!

isdn switch-type basic-net3

!

multilink bundle-name authenticated

!--- to differentiate bundles based on authenticated usernames

!

interface Multilink1

ip address 192.168.19.6 255.255.255.0

no cdp enable

ppp authentication chap

ppp chap hostname MultilinkRouter3

!--- alternate CHAP hostname

ppp chap password 7 121A0C041104

ppp multilink

multilink-group 1

!

interface Serial1

no ip address

no ip directed-broadcast

encapsulation ppp

no fair-queue

ppp multilink

multilink-group 1

!

interface BRI0

no ip address

no ip directed-broadcast

encapsulation ppp

no ip route-cache

no ip mroute-cache

dialer rotary-group 1

isdn switch-type basic-net3

ppp authentication chap

ppp multilink

!

interface Dialer1

ip address 192.168.20.1 255.255.255.0

no ip directed-broadcast

encapsulation ppp

dialer in-band

dialer idle-timeout 30

dialer map ip 10.0.0.0 name Router2 broadcast 6084

dialer map ip 192.168.20.2 name Router2 broadcast 6084

dialer load-threshold 1 either

dialer watch-group 1

dialer-group 1

ppp authentication chap

ppp chap hostname Router3BRI

!--- alternate CHAP hostname

ppp chap password 7 094F471A1A0A

ppp multilink

!

router eigrp 1

network 10.0.0.0

network 192.168.19.0

network 192.168.20.0

no auto-summary

eigrp log-neighbor-changes

!

ip classless

no ip http server

!

access-list 150 deny eigrp any any

access-list 150 deny udp any any

access-list 150 permit ip any any

dialer watch-list 1 ip 10.0.0.0 255.0.0.0

dialer-list 1 protocol ip list 150

!

line con 0

exec-timeout 0 0

transport input none

line aux 0

line vty 0 4

login

!

end

Router2

Router2#show running-config

!

version 12.0

!

hostname Router2

!

!

username MultilinkRouter3 password 0 cisco

username Router3BRI password 0 cisco

!--- The username must match the one in the ppp chap hostname command on the remote router

!

isdn switch-type basic-net3

!

multilink bundle-name authenticated

!

interface Multilink1

ip address 192.168.19.5 255.255.255.0

no cdp enable

ppp authentication chap

ppp chap hostname MultilinkRouter2

ppp chap password 7 104D000A0618

!--- alternate CHAP hostname

ppp multilink

multilink-group 1

!

interface Serial1

no ip address

no ip directed-broadcast

encapsulation ppp

no fair-queue

clockrate 2000000

ppp multilink

multilink-group 1

!

interface BRI0

no ip address

no ip directed-broadcast

encapsulation ppp

no ip route-cache

no ip mroute-cache

dialer pool-member 1

isdn switch-type basic-net3

ppp authentication chap

ppp multilink

!

interface Dialer1

ip address 192.168.20.2 255.255.255.0

no ip directed-broadcast

encapsulation ppp

dialer remote-name Router3

dialer pool 1

dialer string 6082

dialer-group 1

ppp authentication chap

ppp chap hostname Router2BRI

!--- alternate CHAP hostname

ppp chap password 7 00071A150754

ppp multilink

!

router eigrp 1

network 10.0.0.0

network 192.168.19.0

network 192.168.20.0

no auto-summary

eigrp log-neighbor-changes

!

access-list 150 deny eigrp any any

access-list 150 deny udp any any

access-list 150 permit ip any any

dialer-list 1 protocol ip list 150

!

!

line con 0

exec-timeout 0 0

transport input none

line aux 0

line vty 0 4

!

end

驗證

本節提供的資訊可用於確認您的組態是否正常運作。

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

- show ppp multilink — 測試網路是否正常運行。

以下輸出是在上述網路圖所示的裝置上輸入此命令的結果。

Router3#show ppp multilink

Multilink1, bundle name is MultilinkRouter2

0 lost fragments, 0 reordered, 0 unassigned, sequence 0x0/0x0 rcvd/sent

0 discarded, 0 lost received, 1/255 load

Member links: 1 active, 0 inactive (max not set, min not set)

Serial1

Virtual-Access1, bundle name is Router2BRI

Dialer interface is Dialer1

0 lost fragments, 0 reordered, 0 unassigned, sequence 0x18/0x3F rcvd/sent

0 discarded, 0 lost received, 1/255 load

Member links: 2 (max not set, min not set)

BRI0:1

BRI0:2

Router2#show ppp multilink

Multilink1, bundle name is MultilinkRouter3

0 lost fragments, 0 reordered, 0 unassigned, sequence 0x0/0x0 rcvd/sent

0 discarded, 0 lost received, 1/255 load

Member links: 1 active, 0 inactive (max not set, min not set)

Serial1

Virtual-Access1, bundle name is Router3BRI

Dialer interface is Dialer1

0 lost fragments, 0 reordered, 0 unassigned, sequence 0x18/0x3F rcvd/sent

0 discarded, 0 lost received, 1/255 load

Member links: 2 (max not set, min not set)

BRI0:1

BRI0:2

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

相關資訊

- 多鏈路PPP捆綁包的命名標準

- 更多PPP技術提示

- 更多訪問撥號技術提示

- 技術支援 - Cisco Systems