目錄

簡介

必要條件

需求

採用元件

慣例

設定

配置摘要

網路圖表

組態

驗證

疑難排解

相關資訊

簡介

本文檔提供了PPP背對背連線的配置示例。通過這樣的配置，您可以驗證連線和硬體是否正常工作，甚至使用IP路由進行某些測試。

必要條件

需求

本文件沒有特定需求。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 此組態適用於所有Cisco IOS®軟體版本。

- DCE端通過WAN DCE電纜連線。

- DTE端通過WAN DTE電纜連線。

有關WAN DCE或DTE電纜的詳細資訊，請參閱串列電纜文檔。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

設定

本節提供用於設定本文件中所述功能的資訊。

配置摘要

在此配置中，Router1使用V35-MT纜線（思科參考線為CAB-V35MT），Router2使用V35-FC纜線（思科參考線為CAB-V35FC）。 這表示時鐘由Router2提供。通過在serial 0介面下發出clock rate 64000命令，使用的時鐘速率為64000 bps。

注意：配置此命令後，在配置中將顯示為clock rate 64000。現在兩根電纜已相互連線。

乙太網介面通過發出no keepalive 命令進行配置。這樣，就不必將它們連線到LAN網路以使它們啟動並運行。使用每台路由器上的靜態路由，可以使用Router1的乙太網介面的IP地址（反之亦然）對Router2的乙太網介面的IP地址執行ping操作。 當然，這在測試環境中非常有用。

網路圖表

本檔案根據以下組態：

組態

本檔案會使用以下設定：

- 路由器1

- 路由器2

Router1

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Router1

!

enable password cisco

!

ip subnet-zero

!

!

!

!

interface Ethernet0

ip address 10.1.0.1 255.255.255.0

no keepalive

!

interface Serial0

ip address 10.0.0.1 255.255.255.0

encapsulation ppp

!

ip classless

ip route 10.2.0.0 255.255.255.0 10.0.0.2

ip http server

!

!

line con 0

line aux 0

line vty 0 4

no login

!

end

Router2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Router2

!

enable password cisco

!

ip subnet-zero

!

!

!

!

interface Ethernet0

ip address 10.2.0.1 255.255.255.0

no keepalive

!

interface Serial0

ip address 10.0.0.2 255.255.255.0

encapsulation ppp

no fair-queue

clock rate 64000

!

ip classless

ip route 10.1.0.0 255.255.255.0 10.0.0.1

ip http server

!

!

line con 0

line aux 0

line vty 0 4

no login

!

end

驗證

本節提供的資訊可用於確認您的組態是否正常運作。

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

- 發出show controllers命令以檢查電纜和時脈頻率：

以下是show controllers命令的輸出：

Router1#show controllers serial 0 | i V.35

buffer size 1524  HD unit 0, V.35 DTE cable

Router1#

- 發出show interfaces serial 0命令，檢查資料包是否傳送和接收(請參見packets input、packets output、5 minute input rate和5 minute output rate。有關所使用的封裝的資訊，請參閱封裝PPP。

以下是show interfaces serial 0命令的輸出：

Router1#show interfaces serial 0

Serial0 is up, line protocol is up

Hardware is HD64570

Internet address is 10.0.0.1/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

LCP Open

Open: IPCP, CDPCP

Last input 00:00:00, output 00:00:00, output hang never

Last clearing of "show interface" counters 00:07:53

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/5/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 1158 kilobits/sec

5 minute input rate 2000 bits/sec, 2 packets/sec

5 minute output rate 2000 bits/sec, 2 packets/sec

155 packets input, 55066 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

168 packets output, 60037 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

DCD=up  DSR=up  DTR=up  RTS=up  CTS=up

Router1#

- 要使用IP地址10.2.0.1生成對10.2.0.2的ping，可以發出ping命令：

以下是ping命令的輸出：

Router1#ping

Protocol [ip]:

Target IP address: 10.2.0.1

Repeat count [5]:

Datagram size [100]:

Timeout in seconds [2]:

Extended commands [n]: y

Source address or interface: 10.1.0.1

Type of service [0]:

Set DF bit in IP header? [no]:

Validate reply data? [no]:

Data pattern [0xABCD]:

Loose, Strict, Record, Timestamp, Verbose[none]:

Sweep range of sizes [n]:

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.2.0.1, timeout is 2 seconds: Packet sent with a source address of 10.1.0.1 !!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 32/32/32 ms Router1#

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

- show controllers — 顯示電纜和時脈頻率。

- show interfaces serial 0 — 驗證資料包是否已傳送和接收。

- ping — 用於測試裝置的連線。

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

相關資訊

- 更多WAN技術提示

- 技術支援 - Cisco Systems