目錄

簡介

必要條件

慣例

需求

採用元件

設定

網路圖表

為802.1q中繼配置Catalyst 3500 PWR XL

在3500 PWR XL上配置VTP設定

在3500 PWR XL上配置IP預設網關

為802.1q中繼配置ICS 7750 SSP

在ICS 7750 SSP上配置VTP設定

在ICS 7750 MRP上配置802.1q VLAN

在ICS 7750 MRP上配置預設IP路由

使用SM SPE上的ICSConfig為機箱中的卡配置預設網關

驗證

疑難排解

相關資訊

簡介

本文檔介紹如何設定運行軟體版本2.5或2.6的Cisco ICS 7750(至少帶有一個多服務路由處理器(MRP)300)，以便它可以連線到使用802.1q VLAN的本地網路。Cisco ICS軟體版本2.5和2.6的VLAN功能有限。機箱中的所有卡都必須位於使用未標籤幀的本地VLAN（通常為VLAN1）上。MRP可以為網路中的其他802.1q VLAN定義額外的子介面，以允許VLAN間流量。

必要條件

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

需求

嘗試此組態之前，請確認已滿足以下必要條件：

- Cisco ICS 7750 ICSConfig實用程式運行起來沒有任何錯誤。

- Cisco ICS管理工具可識別機箱中的所有卡。

- 您有一個外部交換機設定，它具有802.1q VLAN，其中繼埠將連線到Cisco ICS 7750上的系統交換機處理器(SSP)。

- 系統處理引擎(SPE)卡必須位於本地VLAN上。

- SSP的管理VLAN必須位於本徵VLAN上。

- MRP FastEthernet interface 0/0必須是本地VLAN介面。

本徵VLAN通常是VLAN 1，其幀不使用802.1q標籤。

Cisco ICS 7750軟體版本2.5和2.6要求7750機箱中的所有卡都配置為連線到本地VLAN（通常是VLAN 1），以便它們傳送未標籤的802.1q幀。MRP和SSP可以根據需要連線到其他VLAN，這些VLAN使用標籤的802.1q幀將ICS 7750連線到本地網路。

本檔案假設您已熟悉以下主題：

- 在Catalyst交換機和基於Cisco IOS®的路由器上使用802.1q VLAN。如果您想檢視802.1q中繼的概念和實施，Virtual LAN/VLAN Trunk Protocol(VLAN/VTP)Support Page上提供了幾個文檔。

- 管理VLAN。如需詳細資訊，請參閱在Catalyst 4500/4000、5500/5000、6500/6000和Catalyst固定組態交換器上設定管理IP位址。

- 使用VLAN中繼線通訊協定(VTP)。 如需詳細資訊，請參閱瞭解和設定VLAN中繼線通訊協定(VTP)。

採用元件

本檔案中的資訊是根據以下軟體和硬體版本。

- 使用Cisco ICS軟體2.5和2.6版進行驗證

- 具備SAP和SSP的Cisco ICS 7750

- 1個MRP 300

- 5個SPE

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您處於使用中的網路中，請確保您在使用任何指令之前瞭解其潛在影響。

設定

網路圖表

本文檔使用下圖所示的網路設定。

在此圖中，您可以看到所有卡都連線到VLAN 1。此外，MRP和SSP也連線到VLAN 2至4。這是當您完成本文檔中的任務後，網路的外觀。

為802.1q中繼配置Catalyst 3500 PWR XL

在此配置中，Catalyst交換機連線到埠0/1上的SSP埠。請使用此處顯示的命令進行設定。

3500 PWR XL 802.1q中繼配置

3500XL>enable

3500XL#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

3500XL(config)#interface FastEthernet0/1

3500XL(config-if)#switchport trunk encapsulation dot1q

3500XL(config-if)#switchport mode trunk

3500XL(config-if)#switchport trunk allowed vlan all

3500XL(config-if)#exit

3500XL(config)#exit

3500XL#copy running-config startup-config

Destination filename [startup-config]?

Building configuration...

[OK]

3500XL#

驗證設定

本節提供的資訊可用於確認您的組態是否正常運作。

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

在下面的輸出中，您可以看到：

- switchport為Enabled。

- 管理和操作模式都設定為Trunk。

- 中繼封裝設定為802.1q。

- 工作中繼封裝設定為dot1q。

- 本徵VLAN是VLAN 1。

- 活動VLAN為1到4。

此命令輸出來自show interface fastEthernet 0/1 switchport命令。

cat2924#show interface fastEthernet 0/1 switchport

Name: Fa2/1

Switchport: Enabled

Administrative mode: trunk

Operational Mode: trunk

Administrative Trunking Encapsulation: dot1q

Operational Trunking Encapsulation: dot1q

Negotiation of Trunking: Disabled

Access Mode VLAN: 0 ((Inactive))

Trunking Native Mode VLAN: 1 (default)

Trunking VLANs Enabled: ALL

Trunking VLANs Active: 1-4

Pruning VLANs Enabled: 2-1001

cat2924#

Priority for untagged frames: 0

Override vlan tag priority: FALSE

Voice VLAN: none

Appliance trust: none

3500XL#

組態疑難排解

沒有步驟可對配置的此部分進行故障排除。

在3500 PWR XL上配置VTP設定

3500 PWR XL是此網路中的伺服器。使用以下命令設定VTP設定。

3500 PWR XL VTP

3500XL#vlan database

3500XL(vlan)#vtp server

Device mode already VTP SERVER.

3500XL(vlan)#vtp domain tacweb

Changing VTP domain name from tt to tacweb

3500XL(vlan)#vtp password 1P6c3J9z

Setting device VLAN database password to 1P6c3J9z

3500XL(vlan)#exit

APPLY completed.

Exiting....

3500XL#

驗證設定

本節提供的資訊可用於確認您的組態是否正常運作。

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

在下面的輸出中，您可以看到：

- 有八個已知VLAN。

- VTP模式為Server。

- VTP域是tacweb。

以下是show vtp status命令的輸出示例。

3500XL#show vtp status

VTP Version                     : 2

Configuration Revision          : 2

Maximum VLANs supported locally : 254

Number of existing VLANs        : 8

VTP Operating Mode              : Server

VTP Domain Name                 : tacweb

VTP Pruning Mode                : Disabled

VTP V2 Mode                     : Disabled

VTP Traps Generation            : Disabled

MD5 digest                      : 0x25 0x8F 0xFF 0x30 0xEF 0xB1 0xA2 0x57

Configuration last modified by 10.21.9.1 at 4-9-93 18:53:07

3500XL#

組態疑難排解

未提供排除此部分配置故障的步驟。

在3500 PWR XL上配置IP預設網關

3500 PWR XL是此網路中的伺服器。使用以下命令設定IP預設網關。

3500 PWR XL IP預設閘道

3500XL>en

Password:3500XL#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

3500XL(config)#ip default-gateway 10.21.9.61

3500XL(config)#exit

3500XL#copy running-config startup-config

Destination filename [startup-config]?

Building configuration...

[OK]

3500XL#

驗證設定

未提供驗證此部分配置的步驟。

組態疑難排解

未提供排除此部分配置故障的步驟。

為802.1q中繼配置ICS 7750 SSP

本任務在ICS 7750 SSP上建立兩個埠作為802.1q中繼埠。您配置的埠是將SSP連線到外部Catalyst交換機並將SSP連線到內部MRP乙太網介面的埠。MRP位於ICS 7750機箱的插槽1中。插槽1是SSP上的埠0/3。使用此處顯示的命令設定此項。

ICS 7750 SSP 802.1q中繼配置

SSP>enable

SSP#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

SSP(config)#interface FastEthernet0/1

SSP(config-if)#switchport trunk encapsulation dot1q

SSP(config-if)#switchport mode trunk

SSP(config-if)#switchport trunk allowed vlan all

SSP(config-if)#interface FastEthernet0/3

SSP(config-if)# switchport trunk encapsulation dot1q

SSP(config-if)# switchport mode trunk

SSP(config-if)#switchport trunk allowed vlan all

SSP(config-if)#exit

SSP(config)#exit

SSP#copy running-config startup-config

Destination filename [startup-config]?

Building configuration...

[OK]

SSP#

註：此配置中的MRP是位於ICS 7750機箱前面的最左側的插槽。卡插槽編號從左到右為3到8。這就是此配置中使用的介面為FastEthernet 0/1和0/3的原因。

驗證設定

本節提供的資訊可用於確認您的組態是否正常運作。

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，這允許您檢視show命令輸出的分析。

在此處的輸出中，您可以看到：

- switchport為Enabled。

- 管理和操作模式都設定為Trunk。

- 中繼封裝設定為802.1q。

- 工作中繼封裝設定為dot1q。

- 本徵VLAN是VLAN:1.

- 活動VLAN為1-4。

以下是show interface fastEthernet mod_num/port_num switchport命令輸出的範例。

SSP#show interface fastEthernet 0/1 switchport

Name: Fa0/1

Switchport: Enabled

Administrative mode: trunk

Operational Mode: trunk

Administrative Trunking Encapsulation: dot1q

Operational Trunking Encapsulation: dot1q

Negotiation of Trunking: Disabled

Access Mode VLAN: 0 ((Inactive))

Trunking Native Mode VLAN: 1 (default)

Trunking VLANs Enabled: ALL

Trunking VLANs Active: 1-4

Pruning VLANs Enabled: 2-1001

SSP#

Priority for untagged frames: 0

Override vlan tag priority: FALSE

Voice VLAN: none

Appliance trust: none

SSP#

以下是show interface fastEthernet mod_num/port_num switchport命令的另一個範例。

SSP#show interface fastEthernet 0/3 switchport

Name: Fa0/3

Switchport: Enabled

Administrative mode: trunk

Operational Mode: trunk

Administrative Trunking Encapsulation: dot1q

Operational Trunking Encapsulation: dot1q

Negotiation of Trunking: Disabled

Access Mode VLAN: 0 ((Inactive))

Trunking Native Mode VLAN: 1 (default)

Trunking VLANs Enabled: ALL

Trunking VLANs Active: 1-4

Pruning VLANs Enabled: 2-1001

Priority for untagged frames: 0

Override vlan tag priority: FALSE

Voice VLAN: none

Appliance trust: none

SSP#

組態疑難排解

未提供用於對此部分配置進行故障排除的步驟。

在ICS 7750 SSP上配置VTP設定

SSP是此網路中的VTP客戶端。使用此處顯示的命令設定此項。

注意：SSP只能支援256個VLAN。如果您的網路具有超過256個VLAN，則需要啟用VLAN修剪以減少SSP在VTP通告中看到的VLAN數量。如需詳細資訊，請參閱瞭解和設定VLAN中繼線通訊協定(VTP)。

ICS 7750 SSP VTP

SSP>enable

SSP#vlan database

SSP(vlan)#vtp client

Setting device to VTP CLIENT mode.

SSP(vlan)#vtp domain tacweb

Changing VTP domain name from hhgttg to tacweb

SSP(vlan)#vtp password 1P6c3J9z

Setting device VLAN database password to 1P6c3J9z

SSP(vlan)#exit

!--- This message appears. Although the message is normal, it is not !--- completely accurate. It is possible to change some VTP parameters on a VTP Client. !--- In this case the VTP domain name and password were changed. If this switch !--- never had a domain name configured, it would have learned it from its upstream VTP !--- partner. There is no harm in entering the domain name manually.

In CLIENT state, no apply attempted.Exiting....

SSP#

驗證設定

本節提供的資訊可用於確認您的組態是否正常運作。

Output Interpreter工具(僅供註冊客戶使用)支援某些show命令，此工具允許您檢視show命令輸出的分析。

在此處的輸出中，您可以看到：

- 有八個已知VLAN。

- VTP模式為Client。

- VTP域是tacweb。

以下是show vtp status命令的輸出示例。

SSP#show vtp status

VTP Version                     : 2

Configuration Revision          : 2

Maximum VLANs supported locally : 254

Number of existing VLANs        : 8

VTP Operating Mode              : Client

VTP Domain Name                 : tacweb

VTP Pruning Mode                : Disabled

VTP V2 Mode                     : Disabled

VTP Traps Generation            : Enabled

MD5 digest                      : 0x25 0x8F 0xFF 0x30 0xEF 0xB1 0xA2 0x57

Configuration last modified by 10.21.9.1 at 4-9-93 18:53:07

SSP#

在此處的輸出中，您可以看到：

- 連線埠2、4、5、6、7和8位於VLAN 1中（連線埠1和3為主干連線埠）。

- 所有VLAN均處於活動狀態。

註：VLAN 1002、1003、1004和1005是預設VLAN。這就是為什麼show vtp status命令會顯示八個VLAN:VLAN 1（預設）；。您新增的VLAN 2-4和四個保持為預設VLAN。

以下是show vlan brief指令輸出的範例。

SSP#show vlan brief

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/2, Fa0/4, Fa0/5, Fa0/6,

Fa0/7, Fa0/8

2    vlan2                            active

3    vlan3                            active

4    vlan4                            active

1002 fddi-default                     active

1003 token-ring-default               active

1004 fddinet-default                  active

1005 trnet-default                    active

SSP#

在此輸出中，可以看到SSP知道VLAN 2至4。

還有其他方法可用於檢驗VTP是否正常運行。一種方法是更改VTP伺服器上的VLAN名稱，並檢驗VLAN名稱更改是否已傳播到VTP客戶端。VTP配置修訂版號也應增加1。

組態疑難排解

未提供排除此部分配置故障的步驟。

在ICS 7750 MRP上配置802.1q VLAN

MRP是此網路的VLAN間路由器。使用此處顯示的命令設定此項。

ICS 7750 MRP 802.1q

MRP>enable

Password:

MRP#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

MRP(config)#interface FastEthernet0/0

MRP(config-if)#ip address 10.21.9.61 255.255.255.0

!--- Interface 0/0 is the Native VLAN interface that uses untagged frames. !--- Do not configure 802.1q encapsulation on it.

MRP(config-if)#interface FastEthernet0/0.1

MRP(config-if)#encapsulation dot1Q 2

MRP(config-if)#ip address 10.21.8.61 255.255.255.0

MRP(config-if)#no cdp enable

MRP(config-if)#interface FastEthernet0/0.2

MRP(config-if)#encapsulation dot1Q 3

MRP(config-if)#ip address 10.21.7.61 255.255.255.0

MRP(config-if)#no cdp enable

MRP(config-if)#interface FastEthernet0/0.3

MRP(config-if)#encapsulation dot1Q 4

MRP(config-if)#ip address 10.25.14.196 255.255.255.248

MRP(config-if)#no cdp enable

MRP(config-if)#exit

MRP(config)#exit

MRP#

驗證設定

本節提供的資訊可用於確認您的組態是否正常運作。

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

以下是show vlan指令輸出的範例。

MRP#show vlans

Virtual LAN ID: 1 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface: FastEthernet0/0

This is configured as Native VLAN for the following interface(s) :

FastEthernet0/0

Protocols Configured: Address:   Received: Transmitted:

IP              10.21.9.61 3664824   3660021

Virtual LAN ID: 2 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface: FastEthernet0/0.1

Protocols Configured: Address:   Received: Transmitted:

IP              10.21.8.61 3020581   3116540

Virtual LAN ID: 3 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface: FastEthernet0/0.2

Protocols Configured: Address:   Received: Transmitted:

IP              10.21.7.61 100073    82743

Virtual LAN ID: 4 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface: FastEthernet0/0.3

Protocols Configured: Address:     Received: Transmitted:

IP              10.25.14.196 157686    34398

MRP#

組態疑難排解

未提供排除此部分配置故障的步驟。

在ICS 7750 MRP上配置預設IP路由

配置IP路由引數，將MRP設定為本地網路上的終端系統可以使用的遠端IP網路的可行預設網關。

有關IP路由、預設網關和最後選用網關的詳細說明不在本檔案的範圍之內。本文檔中提供的選項只是確保足夠IP路由連線的可能解決方案之一。有關此主題的詳細資訊，請參閱使用IP命令配置最後選用網關。

在此網路設計中，本地網路中的終端系統使用MRP的IP地址作為其所連線的VLAN的預設網關。例如，VLAN 3上的裝置會將10.21.7.61設定為其預設閘道。如果IP流量要發往遠端IP網路，MRP會通過VLAN 4將流量轉發到網路圖中的另一台路由器。

使用此處顯示的命令設定此項。

ICS 7750 MRP預設網路；最後選用網關

MRP>enable

Password:

MRP#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

MRP(config)#

MRP(config)#ip classless

MRP(config)#ip default-network 0.0.0.0

MRP(config)#ip route 0.0.0.0 0.0.0.0 10.25.14.193

MRP(config-if)#exit

MRP(config)#exit

MRP#

驗證設定

本節提供的資訊可用於確認您的組態是否正常運作。

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

以下是show ip route命令的輸出示例。

MRP#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.25.14.193 to network 0.0.0.0

10.0.0.0/8 is variably subnetted, 4 subnets, 2 masks

C       10.21.9.0/24 is directly connected, FastEthernet0/0

C       10.21.8.0/24 is directly connected, FastEthernet0/0.1

C       10.21.7.0/24 is directly connected, FastEthernet0/0.3

C       10.25.14.192/29 is directly connected, FastEthernet0/0.2

S*   0.0.0.0/0 [1/0] via 10.25.14.193

MRP#

在上面的輸出中，您可以看到通向網路0.0.0.0.0的最後選用網關是10.25.14.193，並且MRP具有通過IP地址10.25.14.193到達0.0.0.0的路由。這是網路圖中另一路由器的IP地址。

以下是ping ip_address命令的命令輸出範例。

3500XL#ping 10.21.9.61

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.21.9.61, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/2/5 ms

3500XL#ping 10.21.8.61

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.21.8.61, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/2/5 ms

3500XL#ping 10.21.7.61

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.21.7.61, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 5/5/6 ms

3500XL#ping 10.25.14.196

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.25.14.196, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/3/5 ms

3500XL#

3500XL#ping 10.25.14.193

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.25.14.196, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/3/5 ms

3500XL#

在上方輸出中，您可以看到3500交換機能夠ping通分配給MRP上VLAN的每個子網地址。10.21.9.61是使用未標籤幀的本地VLAN(VLAN 1)。

組態疑難排解

未提供排除此部分配置故障的步驟。

使用SM SPE上的ICSConfig為機箱中的卡配置預設網關

在本任務中，您必須進行驗證，如果需要，請更改機箱中卡的預設網關。

1. 訪問SM SPE上的Internet Explorer或與SM SPE連線的其它裝置。

2. 啟動ICSConfig，然後輸入url http://ip_address/icsconfig。

CheckDiscovery過程開始。

3. CheckDiscovery流程完成後，系統將提示您按一下Continue with ICSConfig。

4. 出現「ICS 7700 System Configuration（ICS 7700系統配置）」選單時，按一下「ICS 7700 System Setup（ICS 7700系統設定）」。

5. 將顯示「摘要」螢幕，並顯示當前設定。向下滾動到名為Network Configuration-DNS and Gateway的部分。

在這種情況下，預設網關已正確設定。本任務的剩餘部分向您展示了在需要時如何更改此設定。

如果系統已正確設定，則無需完成此任務。按一下Cancel並關閉所有開啟的視窗。

如果需要更改此設定，請繼續此任務。按一下Network Configuration-DNS and Gateway連結。

6. 出現更改預設網關的選單時，輸入正確的IP地址，然後按一下Continue。

7. 當再次顯示「摘要」螢幕時，按一下下一步。

8. 出現「Ready to Submit（準備提交）」螢幕時，按一下Submit。

9. 等待，直到完成設定進行螢幕。

10. 出現提示時，按一下Close Window。

驗證設定

此任務沒有特定的驗證步驟。繼續前往下面的驗證部分。

組態疑難排解

此任務沒有特定的故障排除步驟。繼續前往下面的驗證部分。

驗證

本節提供的資訊可用於確認您的組態是否正常運作。

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，這允許您檢視show命令輸出的分析。

您可以驗證SPE卡是否可以訪問VLAN 2至4中的終端系統，方法是藉助從DOS提示符視窗發出的ping命令，對其它VLAN的MRP上的IP地址執行ping。

1. 在任一SPE的控制檯上選擇Start > Run > cmd [Enter]。

2. Ping MRP上的IP地址。

注意：由於SPE位於VLAN 1（子網10.21.9.0）上，因此您不需要為此VLAN對MRP介面執行ping操作。下麵包含此步驟，以顯示SPE可以訪問此配置中的所有子網。

C:\>ping 10.21.9.61

Pinging 10.21.9.61 with 32 bytes of data:

Reply from 10.21.9.61: bytes=32 time<10ms TTL=255

Reply from 10.21.9.61: bytes=32 time=10ms TTL=255

Reply from 10.21.9.61: bytes=32 time=10ms TTL=255

Reply from 10.21.9.61: bytes=32 time=10ms TTL=255

Ping statistics for 10.21.9.61:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum = 10ms, Average = 7ms

C:\>ping 10.21.8.61

Pinging 10.21.8.61 with 32 bytes of data:

Reply from 10.21.8.61: bytes=32 time<10ms TTL=255

Reply from 10.21.8.61: bytes=32 time<10ms TTL=255

Reply from 10.21.8.61: bytes=32 time<10ms TTL=255

Reply from 10.21.8.61: bytes=32 time<10ms TTL=255

Ping statistics for 10.21.8.61:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum = 0ms, Average = 0ms

C:\>ping 10.21.7.61

Pinging 10.21.7.61 with 32 bytes of data:

Reply from 10.21.7.61: bytes=32 time<10ms TTL=255

Reply from 10.21.7.61: bytes=32 time<10ms TTL=255

Reply from 10.21.7.61: bytes=32 time<10ms TTL=255

Reply from 10.21.7.61: bytes=32 time<10ms TTL=255

Ping statistics for 10.21.7.61:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum = 0ms, Average = 0ms

C:\>ping 10.25.14.196

Pinging 10.25.14.196 with 32 bytes of data:

Reply from 10.25.14.196: bytes=32 time=10ms TTL=255

Reply from 10.25.14.196: bytes=32 time=10ms TTL=255

Reply from 10.25.14.196: bytes=32 time=10ms TTL=255

Reply from 10.25.14.196: bytes=32 time=10ms TTL=255

Ping statistics for 10.25.14.196:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 10ms, Maximum = 10ms, Average = 10ms

C:\>ping 10.25.14.193

Pinging 10.25.14.193 with 32 bytes of data:

Reply from 10.25.14.193: bytes=32 time<10ms TTL=128

Reply from 10.25.14.193: bytes=32 time<10ms TTL=128

Reply from 10.25.14.193: bytes=32 time<10ms TTL=128

Reply from 10.25.14.193: bytes=32 time<10ms TTL=128

Ping statistics for 10.25.14.193:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum = 0ms, Average = 0ms

C:\>

疑難排解

VLAN間路由問題的最常見原因是配置錯誤。

SPE上也可能存在覆蓋預設網關設定的靜態IP路由。在SPE的DOS提示符下使用c:\> netstat -rn命令驗證當前路由表。請刪除所有衝突路由，然後重試測試。如果路由發生衝突，則必須確定建立路由的方式並防止路由再次發生。

相關資訊

- Cisco ICS 7750系統軟體2.5.0版發行說明

- Cisco ICS 7750系統軟體2.6.0版發行說明

- 虛擬LAN/VLAN主幹協定(VLAN/VTP)支援頁面

- 語音技術支援

- 語音和整合通訊產品支援

- Cisco IP電話故障排除

- 技術支援與文件 - Cisco Systems