目錄

簡介

必要條件

需求

採用元件

慣例

背景資訊

設定

網路圖表

組態

驗證

Catalyst 2948G-L3 show命令

Catalyst 6500 show命令

疑難排解

命令摘要

相關資訊

簡介

本檔案將提供執行Catalyst OS(CatOS)的Catalyst 6500系列交換器和Catalyst 2948G-L3交換器之間的IEEE 802.1Q主幹組態範例。本文包含使用Catalyst 2948G-L3作為核心交換機，Catalyst 6500作為接入層交換機的示例網路。在簡要說明802.1Q中繼機制後，將說明Catalyst 6500交換機和Catalyst 2948G-L3交換機上的配置。

必要條件

需求

本文件沒有特定需求。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 執行Cisco IOS®軟體版本12.0(18)W5(22b)的Catalyst 2948G-L3交換器路由器

- 執行CatOS 8.5軟體的Catalyst 6500系列交換器

慣例

請參閱思科技術提示慣例以瞭解更多有關文件慣例的資訊。

背景資訊

中繼通過兩台裝置之間的點對點鏈路傳輸來自多個VLAN的流量。中繼的兩種方法是交換機間鏈路(ISL)協定（Cisco專有協定）或802.1Q（IEEE標準）。 本文檔專門介紹802.1Q中繼。在本例中，Catalyst 6500中的VLAN通過802.1Q中繼鏈路擴展到Catalyst 2948G-L3。

Catalyst 2948G-L3是執行Cisco IOS的路由器，預設情況下，所有介面都是路由介面。您必須使用網橋組才能使用Catalyst 2948G-L3上的VLAN概念。每個網橋組都被視為一個單獨的VLAN。這些網橋組對應於所連線交換機的VLAN號。為了在Catalyst 2948G-L3上支援VLAN間路由，整合路由和橋接(IRB)和橋接虛擬介面(BVI)設定為在不同的VLAN之間路由IP。

Catalyst 2948G-L3不支援多個面向第2層的通訊協定，例如虛擬終端通訊協定(VTP)、分散式診斷和服務網路(DDSN)傳輸通訊協定(DTP)和連線埠彙總通訊協定(PAgP)。 Catalyst 2948G-L3 Cisco IOS軟體版本12.0(7)W5(15d)及更低版本不支援在802.1Q子介面上橋接。

Catalyst 2948G-L3已達到壽命終止(EoL)。 有關資訊和推薦的更換產品，請參閱適用於Cisco Catalyst 2948G-L3和4908G-L3交換機的EoL/EoS。

設定

在本例中，Catalyst 2948G-L3部署為VLAN間路由器。Catalyst 6500執行CatOS並使用802.1Q中繼連結連線到Catalyst 2948G-L3交換器。Catalyst 6500被設定為具有兩個VLAN（20和30）的存取層交換器。這兩個VLAN之間的路由是由Catalyst 2948G-L3提供的。Catalyst 6500和Catalyst 2948G-L3之間的802.1Q主幹組態，以及Catalyst 2948G-L3交換器上的VLAN間路由組態，均在本檔案中說明。

本節提供用於設定本文件中所述功能的資訊。

註：使用Command Lookup Tool(僅供已註冊客戶使用)可獲取本節中使用的命令的詳細資訊。

網路圖表

本檔案會使用以下網路設定：

組態

本檔案會使用以下設定：

- Catalyst 6500

- Catalyst 2948G-L3

Catalyst 6500

Current configuration:

!

version 8.1

!

hostname 6500

!

Catalyst 6500(enable)#

set vtp mode transparent

!--- In this example, the VTP mode is set to be transparent. !--- Set the VTP mode accordingly. This depends on your network.

!

#module 3 : 48-port 10/100BaseTX Ethernet

set vlan 20 3/20

set vlan 30 3/40

!--- The ports are assigned to the single VLAN and are !--- used as access ports.

set trunk 3/30 nonegotiate dot1q

!--- Port 3/30 is configured as dot1q trunk port and !--- the trunk mode is set to nonegotiate. !--- Trunk mode should be nonegotiate because 2948G-L3 does not support DTP.

set port enable 3/20,3/30,3/40

!--- Use the set port enable command !--- to enable a port or a range of ports.

!--- Output is suppressed.

Catalyst 2948G-L3

Current configuration:

!

version 12.0

hostname 2948G-L3

!

interface FastEthernet 20

no ip address

no ip directed-broadcast

bridge-group 20

!--- The bridge-group 20 command adds the !--- Fast Ethernet 20 interface to bridge group 20.

interface FastEthernet 40

no ip address

no ip directed-broadcast

bridge-group 30

!--- The bridge-group 30 command adds the !--- Fast Ethernet 40 interface to bridge group 30.

!

interface Fast Ethernet 30

no ip address

no ip redirects

no ip directed-broadcast

int fast ethernet 30.1

encapsulation dot1q 30

bride-group 30

exit

int fast ethernet 30.2

encapsulation dot1q 20

bridge-group 20

exit

int fast ethernet 30.3

encapsultion dot1q 1 native

bridge-group 1

exit

!--- Fast Ethernet 30 acts as a trunk port that carries VLANs 30 and 20. !--- Subinterfaces that belong to the same VLAN (network or subnet) must !--- be configured to belong to the same bridge group.

!--- VLAN 1 is the native VLAN by default.

bridge irb

!--- The bridge irb command enables IRB on !--- the router, which allows you to route traffic within the bridge groups.

bridge 30 protocol ieee

bridge 20 protocol ieee

!--- Choose IEEE as the Spanning Tree Protocol (STP).

bridge 30 route ip

bridge 20 route ip

!--- The bridge number route ip command allows you !--- to route IP traffic between the BVI interface !--- and the other IP interfaces on the router.

interface bvi 20

ip address 192.168.20.1 255.255.255.0

exit

interface bvi 30

ip address 192.168.30.1 255.255.255.0

exit

!--- Creates BVI interfaces for bridges 20 and 30. These interfaces act !--- as the gateway for VLANs 20 and 30.

!--- Output is suppressed.

注意：10/100介面上Catalyst 2948G-L3上的四個相鄰埠（例如f1至f4或f45至f48）都必須使用相同的VLAN封裝。VLAN封裝為ISL或802.1Q。

驗證

使用本節內容，確認您的組態是否正常運作。

輸出直譯器工具(僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

Catalyst 2948G-L3 show命令

- 2948G-L3#show vlan

virtual LAN ID:  30 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface:   FastEthernet30.1

This is configured as native Vlan for the following interface(s) :

FastEthernet30

Protocols Configured:   Address:              Received:        Transmitted:

Bridging        Bridge Group 20                 1                   0

Virtual LAN ID:  20 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface:   FastEthernet30.2

Protocols Configured:   Address:              Received:        Transmitted:

Bridging        Bridge Group 30               921                   0

- 2948G-L3#show bridge 20

Total of 300 station blocks, 298 free

Codes: P - permanent, S - self

Bridge Group 20:

Address       Action    Interface

0009.11b9.1a75    forward   Fa30.2

Catalyst 6500 show命令

- show trunk — 此命令驗證中繼配置，如以下輸出所示：

Console> (enable) show trunk 3/30

* - indicates vtp domain mismatch

# - indicates dot1q-all-tagged enabled on the port

$ - indicates non-default dot1q-ethertype value

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

3/30     nonegotiate  dot1q          trunking      1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

3/30     1-1005,1025-4094

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

3/30     1,20,30

- show vlan — 此命令顯示與相應VLAN相符的連線埠：

VLAN Name                             Status    IfIndex Mod/Ports, Vlans

---- -------------------------------- --------- ------- ------------------------

1    default                          active    6       1/1-2

3/1-19,3/21-39,3/41-48

20   VLAN0020                         active    71      3/20

30   VLAN0030                         active    69      3/40

1002 fddi-default                     active    7

1003 token-ring-default               active    10

1004 fddinet-default                  active    8

1005 trnet-default                    active    9

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

輸出直譯器工具(僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

附註：使用 debug 指令之前，請先參閱有關 Debug 指令的重要資訊。

PC2#ping 192.168.20.3

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.20.3, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/4 ms

PC1#ping 192.168.30.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.30.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/4 ms

PC1#ping 192.168.20.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.20.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/4 ms

命令摘要

- set interface

- set trunk

- set vlan

- 顯示介面

- show port

- show port capabilities

- show trunk

- show vtp domain

相關資訊

- 使用基於Catalyst 2948G-L3s和CatOS的交換機配置EtherChannel和802.1Q中繼

- 運行CatOS和Cisco IOS系統軟體的Catalyst交換機之間的802.1Q中繼

- Catalyst 2948G-L3示例配置

- 交換器產品支援

- LAN 交換技術支援

- 技術支援與文件 - Cisco Systems