目錄

簡介

必要條件

需求

採用元件

慣例

網路圖表

常規配置任務

設定 InterVLAN 路由

常見問題：VLAN介面顯示down/down

驗證設定

附錄

Supervisor Engine模組組態

RSM配置

相關資訊

簡介

本文提供如何使用內部路由器（第3層[L3]卡/模組）在Catalyst交換器（執行Catalyst OS [CatOS]系統軟體）上設定InterVLAN路由的基本資訊。 術語內部路由器是指Catalyst 5500/5000和6500/6000交換器上的以下L3卡/模組：

- Catalyst 6500/6000系列交換器上的多層交換器功能卡(MSFC)

- Catalyst 6500/6000系列交換器上的MSFC2

- Catalyst 5500/5000系列交換器上的路由交換器功能卡(RSFC)

- Catalyst 5500/5000系列交換器上的路由交換器模組(RSM)

任何執行CatOS的Catalyst 5500/5000或Catalyst 6500/6000系列交換器（搭配支援的L3卡）都可以在本檔案中使用以取得相同的結果。

必要條件

需求

本文檔的讀者應瞭解以下主題：

注意：本文不會討論如何使用第3層服務模組(WS-X4232-L3)在Catalyst 4500/4000交換器上設定InterVLAN路由。 有關詳細資訊，請參閱以下檔案：

- Catalyst 4000第3層服務模組的安裝和配置說明中的「為InterVLAN路由配置模組」部分

- Catalyst 4000系列路由器模組的配置和概述(WS-X4232-L3)

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 採用RSM的Catalyst 5500交換器

- 執行CatOS 6.1(1)軟體的Supervisor Engine模組(WS-X5530)

- 執行Cisco IOS®軟體版本12.0(5)W5(12)的RSM(WS-X5302)

已使用clear config all和write erase命令清除所有裝置上的配置，以確保它們具有預設配置。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

網路圖表

註：除非本文檔要求您連線workstation1和workstation2，否則不要連線workstation1。本檔案指出了客戶在路由器模組上設定InterVLAN路由或多個VLAN介面時報告的常見問題。請參閱常見問題：VLAN介面顯示關閉/關閉部分以瞭解詳細資訊。

常規配置任務

本節總結了本文所執行的主要配置任務：

- 配置交換機以進行管理

- 在交換機上建立VLAN

- 將埠新增到已配置的VLAN

- 配置內部路由器以進行管理

- 設定 InterVLAN 路由

- 驗證設定

設定 InterVLAN 路由

完成以下步驟，在Catalyst交換器上設定InterVLAN路由：

1. 存取Supervisor Engine上的主控台連線埠。

如果您難以存取主控台，請參閱以下檔案：

- 適用於Catalyst 5500/5000系列交換器 — 將終端機連線到Catalyst交換器上的主控台連線埠。

- 適用於Catalyst 6500/6000系列交換器 — 將終端機連線到Catalyst交換器上的主控台連線埠和將資料機連線到Catalyst交換器上的主控台連線埠的連線終端一節

2. 配置交換機以進行基本管理。

使用這組命令配置Catalyst交換機以進行管理：

Console> enable) set system name Cat5500

!--- Configure the system name.

System name set.

Cat5500> (enable) set interface sc0 172.16.80.40 255.255.255.0

!--- Configure the IP address.

Interface sc0 IP address and netmask set.

Cat5500> (enable) set ip route 0.0.0.0 172.16.80.1

!--- Configure the default gateway.

注意：如果您要管理位於路由器另一端的交換機，則需要在交換機上配置預設網關，因為該交換機不參與IP路由，因此不知道網路的第3層拓撲。您還可以使用set ip route default 172.16.80.1命令來配置預設網關，而不是使用set ip route 0.0.0.0 172.16.80.1命令。

3. 在交換機上配置所需的VLAN數量。

根據網路圖表，您需要在交換器上設定兩個新的VLAN（VLAN 10和VLAN 20）。

在可以建立新的VLAN之前，交換機必須處於VLAN中繼線協定(VTP)伺服器模式或VTP透明模式。如果交換機是VTP伺服器，您必須先定義VTP域名，然後才能新增任何VLAN。無論網路中交換機的數量（一台或多台），也不管您是否使用VTP將VLAN傳播到網路中的其他交換機，都必須定義該值。有關VTP的詳細資訊，請參閱以下文檔：

- 瞭解和設定VLAN中繼線通訊協定(VTP)

交換機上的預設VTP配置為：

Cat5500> (enable) show vtp domain

Domain Name                      Domain Index VTP Version Local Mode  Password

-------------------------------- ------------ ----------- ----------- ----------

1            2           server      -

Vlan-count Max-vlan-storage Config Revision Notifications

---------- ---------------- --------------- -------------

5          1023             0               disabled

Last Updater    V2 Mode  Pruning  PruneEligible on Vlans

--------------- -------- -------- -------------------------

0.0.0.0         disabled disabled 2-1000

使用set vtp命令設定域名和模式：

Cat5500> (enable) set vtp domain mode transparent

VTP domain  modified

!--- Set the VTP mode.

Cat5500> (enable) set vtp domain cisco

VTP domain cisco modified

!--- Set the VTP domain name.

附註：  在示例中，VTP模式設定為透明。根據您的網路，相應地設定VTP模式。之所以選擇透明模式，是為了避免受到其它交換機的影響，也避免影響實驗中的其它交換機。

4. 發出show vtp domain命令以驗證VTP配置：

Cat5500> (enable) show vtp domain

Domain Name                      Domain Index VTP Version Local Mode  Password

-------------------------------- ------------ ----------- ----------- ----------

cisco                            1            2           Transparent -

Vlan-count Max-vlan-storage Config Revision Notifications

---------- ---------------- --------------- -------------

5          1023             0               disabled

Last Updater    V2 Mode  Pruning  PruneEligible on Vlans

--------------- -------- -------- -------------------------

0.0.0.0         disabled disabled 2-1000

5. 在交換機上建立VLAN。

預設情況下，交換器上只有一個名為VLAN 1的VLAN。VLAN 1也稱為預設VLAN。預設情況下，所有連線埠都屬於此VLAN。不能重新命名或刪除此VLAN。

要建立VLAN，請使用set vlan命令：

Cat5500> (enable) set vlan

Usage: set vlan  <mod/port>

(An example of mod/port is 1/1,2/1-12,3/1-2,4/1-12)

set vlan  [name ] [type ] [state ]

[said ] [mtu ] [ring ]

[decring ]

[bridge ] [parent ]

[mode ] [stp ]

[translation ] [backupcrf <off/on>

[aremaxhop ] [stemaxhop ]

(name = 1..32 characters, state = (active, suspend)

type = (ethernet, fddi, fddinet, trcrf, trbrf)

said = 1..4294967294, mtu = 576..18190

hex_ring_number = 0x1..0xfff, decimal_ring_number = 1..4095

bridge_number = 0x1..0xf, parent = 2..1005, mode = (srt, srb)

stp = (ieee, ibm, auto), translation = 1..1005

hopcount = 1..13)

Set vlan commands:

----------------------------------------------------------------------------

set vlan                     Set vlan information

set vlan mapping             Map an 802.1Q vlan to an Ethernet vlan

set vlan                     Vlan number(s)

Cat5500> (enable) set vlan 10

!--- Create VLAN 10.

VTP advertisements transmitting temporarily stopped

and will resume after the command finishes.

Vlan 10 configuration successful

Cat5500> (enable) set vlan 20

!--- Create VLAN 20.

VTP advertisements transmitting temporarily stopped

and will resume after the command finishes.

Vlan 20 configuration successful

Cat5500> (enable) set vlan 10 4/1-12

!--- Add ports to VLAN 10.

VLAN 10 modified.

VLAN 1 modified.

VLAN  Mod/Ports

---- -----------------------

10    4/1-12

Cat5500> (enable) set vlan 20 4/13-20

!--- Add ports to VLAN 20.

VLAN 20 modified.

VLAN 1 modified.

VLAN  Mod/Ports

---- -----------------------

20    4/13-20

Cat5500> (enable) show vlan

VLAN Name                             Status    IfIndex Mod/Ports, Vlans

---- -------------------------------- --------- ------- ------------------------

1    default                          active    443     1/1-2

3/1-3

4/21-24

11/1-48

12/1-2

10   VLAN0010                         active    448     4/1-12

20   VLAN0020                         active    449     4/13-20

1002 fddi-default                     active    444

1003 token-ring-default               active    447

1004 fddinet-default                  active    445

1005 trnet-default                    active    446

VLAN Type  SAID       MTU   Parent RingNo BrdgNo Stp  BrdgMode Trans1 Trans2

---- ----- ---------- ----- ------ ------ ------ ---- -------- ------ ------

1    enet  100001     1500  -      -      -      -    -        0      0

10   enet  100010     1500  -      -      -      -    -        0      0

20   enet  100020     1500  -      -      -      -    -        0      0

1002 fddi  101002     1500  -      -      -      -    -        0      0

1003 trcrf 101003     1500  -      -      -      -    -        0      0

1004 fdnet 101004     1500  -      -      -      -    -        0      0

1005 trbrf 101005     1500  -      -      -      ibm  -        0      0

!--- Output suppressed.

6. 在連線到工作站或伺服器的埠上配置生成樹協定(STP)PortFast。

發出以下命令以啟用STP PortFast功能：

Cat5500> (enable) set spantree portfast 4/1-20 enable

Warning: Spantree port fast start should only be enabled on ports connected to a

single host. Connecting

hubs, concentrators, switches, bridges, etc. to a fast start port can cause

temporary spanning tree loops.

Use with caution.

Spantree ports 4/1-20 fast start enabled.

注意：此步驟是可選的，但最好在連線到常規工作站或伺服器的埠上啟用STP PortFast。有關啟用PortFast的詳細資訊，請參閱以下檔案：

- 使用 PortFast 和其他命令修復工作站啟動連線延遲

7. 在路由器模組上為要在其中路由流量的每個VLAN配置VLAN介面。

發出session module# 命令以存取路由器模組，其中module# 是路由器模組所在的插槽。在示例中，RSM位於插槽7中，如下所示：

Cat5500> (enable) show module 7

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

7   7    1     Route Switch              WS-X5302            no  ok

Mod Module-Name         Serial-Num

--- ------------------- --------------------

7                       00006591991

Mod MAC-Address(es)                        Hw     Fw         Sw

--- -------------------------------------- ------ ---------- -----------------

7   00-e0-1e-91-b5-08 to 00-e0-1e-91-b5-09 4.5    20.20      12.0(5)W5(12)

Cat5500> (enable) session 7

Trying Router-7...

Connected to Router-7.

Escape character is '^]'.

Router>

8. 在路由器模組上配置啟用口令和Telnet口令。

同樣地，此步驟是可選的，但如果您嘗試直接使用Telnet而不是通過Supervisor Engine訪問路由器模組，則需要使用Telnet密碼。使用這組命令配置路由器模組上的口令：

Router> enable

Router# configure terminal

!--- Enter the global configuration mode.

Enter configuration commands, one per line.  End with CNTL/Z.

Router(config)# enable password cisco

!--- Set enable password.

Router(config)# line vty 0 4

Router(config-line)# login

Router(config-line)# password cisco

!--- Set Telnet password.

Router(config-line)# end

Router#

05:22:40: %SYS-5-CONFIG_I: Configured from console by vty0 (127.0.0.2)

Router#

9. 建立兩個VLAN介面，為這些VLAN介面分配IP地址，並在模組上啟用路由。

注意：此步驟是配置InterVLAN路由的關鍵。

注意：在路由器模組上，VLAN介面是虛擬介面，但它們配置為物理介面。

在特權執行模式下發出以下命令集：

Router# configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

!--- Configure interface VLAN 1 and assign it an IP address. !--- An interface VLAN 1 is configured for management purposes only !--- so that you can establish a Telnet session or ping the switch !--- from the workstation.

Router(config)# interface vlan 1

Router(config-if)# no shutdown

Router(config-if)# ip address 172.16.80.79 255.255.255.0

Router(config-if)# exit

!--- Configure interface VLAN 10 and assign it an IP address.

Router(config)# interface vlan 10

Router(config-if)# no shutdown

Router(config-if)# ip address 10.10.10.1 255.255.255.0

Router(config-if)# exit

!--- Configure interface VLAN 20 and assign it an IP address.

Router(config)# interface vlan 20

Router(config-if)# ip address 10.10.11.1 255.255.255.0

Router(config-if)# no shutdown

Router(config)# ip routing

!--- Enable routing protocol on the module. !--- The following two commands are optional; !--- they are only used if you have multiple routers in your network. !--- Depending on your network, you may want to use a different routing protocol.

Router(config)# router rip

Router(config-router)# network 10.0.0.0

Router(config-router)# network 172.16.0.0

Router(config-router)# Ctrl-Z

Router#

07:05:17: %SYS-5-CONFIG_I: Configured from console by vty0 (127.0.0.2)

Router# write memory

!--- Save the configuration.

Building configuration...

Router#

此時，根據網路圖表,InterVLAN設定已完成。

10. 在Router#提示時發出exit命令以返回Supervisor Engine模組：

Router# exit

Cat5500> (enable

常見問題：VLAN介面顯示down/down

本節介紹客戶嘗試在Catalyst 5500/5000或Catalyst 6500/6000系列路由器模組(RSM、MSFC、RSFC)上設定VLAN介面時遇到的常見問題。

客戶報告他們無法ping通路由器模組上配置的部分或所有VLAN介面。此外，當他們發出show interface vlan vlan#指令時，其狀態不會顯示為up/up。它們確保在這些介面上配置了no shutdown。唯一顯示為up/up的VLAN介面是VLAN 1。

在這種情況下，如果您的部分或所有VLAN介面沒有顯示/顯示，首先應檢查交換機上是否存在有關VLAN的任何活動埠。

重要附註：只有在交換機（路由器介面除外）上至少有一個埠分配給該VLAN，並且該埠已連線時，路由器模組上的VLAN介面才會開啟/開啟。配置為中繼的連線埠也滿足此VLAN開啟/關閉要求。如果不滿足此條件，路由器介面將不會啟動。

在網路圖表一節中，系統會警告您不要將工作站連線到Catalyst 5500交換器。此時，如果您發出這組命令，您會發現只有介面VLAN 1顯示/開啟，而另外兩個介面關閉：

Router# show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

Vlan1                      172.16.80.79    YES manual up                    up

Vlan10                     10.10.10.1      YES manual down                  down

Vlan20                     10.10.11.1      YES manual down                  down

Router# show interface vlan 1

Vlan1 is up, line protocol is up

Hardware is Cat5k Virtual Ethernet, address is 0010.f6a9.9800 (bia 0010.f6a9.9800)

Internet address is 172.16.80.79/24

MTU 1500 bytes, BW 100000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:00, output 00:00:02, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 1 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

!--- Output suppressed.

Router# show interface vlan 10

Vlan10 is down, line protocol is down

Hardware is Cat5k Virtual Ethernet, address is 0010.f6a9.9800 (bia 0010.f6a9.9800)

Internet address is 10.10.10.1/24

MTU 1500 bytes, BW 100000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:01, output 00:25:48, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

!--- Output suppressed.

Router# show interface vlan 20

Vlan20 is down, line protocol is down

Hardware is Cat5k Virtual Ethernet, address is 0010.f6a9.9800 (bia 0010.f6a9.9800)

Internet address is 10.10.11.1/24

MTU 1500 bytes, BW 100000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:01, output 00:01:04, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 2000 bits/sec, 2 packets/sec

5 minute output rate 1000 bits/sec, 2 packets/sec

!--- Output suppressed.

Router#

介面VLAN 1處於up/up狀態，儘管在交換機上，VLAN 1中沒有任何已連線埠和活動埠。在VLAN 1中有一個活動埠/介面，即Supervisor模組上的sc0介面。預設情況下，sc0介面是VLAN 1的成員。在交換機(Supervisor Engine)上發出以下命令檢查sc0介面配置：

Cat5500> (enable) show interface

sl0: flags=51 <UP ,POINTOPOINT ,RUNNING>

slip 0.0.0.0 dest 0.0.0.0

sc0: flags=63 <UP ,BROADCAST ,RUNNING>

vlan 1 inet 172.16.80.40 netmask 255.255.255.0 broadcast 172.16.80.255

Cat5500> (enable)

此時，在埠4/1上連線工作站1，在埠4/13上連線工作站2。在交換機上發出show port 4/1和show port 4/13命令，以確保這些埠的狀態顯示為「已連線」：

Cat5500> (enable) show port 4/1

Port  Name               Status     Vlan       Level  Duplex Speed Type

----- ------------------ ---------- ---------- ------ ------ ----- ------------

4/1                     connected  10         normal a-half  a-10 10/100BaseTX

!--- Output suppressed.

Cat5500> (enable) show port 4/13

Port  Name               Status     Vlan       Level  Duplex Speed Type

----- ------------------ ---------- ---------- ------ ------ ----- ------------

4/13                    connected  20         normal a-full a-100 10/100BaseTX

!--- Output suppressed.

Cat5500> (enable)

現在，登入到路由器模組並檢查介面VLAN 10和VLAN 20的狀態。您應該將它們視為up/up。發出此組命令以檢查路由器模組上VLAN介面的狀態：

Cat5500> (enable) session 7

Trying Router-7...

Connected to Router-7.

Escape character is '^]'.

User Access Verification

Password:

!--- Enter the password; in this case, it is cisco.

Router> enable

Password:

!--- Enter the password; in this case, it is cisco.

Router# show ip interface brief

Interface                  IP-Address      OK? Method Status                Protocol

Vlan1                      172.16.80.79    YES manual up                    up

Vlan10                     10.10.10.1      YES manual up                    up

Vlan20                     10.10.11.1      YES manual up                    up

Router# show interface vlan 10

Vlan10 is up, line protocol is up

Hardware is Cat5k Virtual Ethernet, address is 0010.f6a9.9800 (bia 0010.f6a9.9800)

Internet address is 10.10.10.1/24

MTU 1500 bytes, BW 100000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:01, output 00:46:14, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

!--- Output suppressed.

Router# show interface vlan 20

Vlan20 is up, line protocol is up

Hardware is Cat5k Virtual Ethernet, address is 0010.f6a9.9800 (bia 0010.f6a9.9800)

Internet address is 10.10.11.1/24

MTU 1500 bytes, BW 100000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:00, output 00:00:56, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 2000 bits/sec, 5 packets/sec

5 minute output rate 2000 bits/sec, 2 packets/sec

!--- Output suppressed.

Router# exit

Cat5500> (enable)

驗證設定

可以執行幾個ping測試來驗證本文檔中說明的配置。在本節中，您將使用workstation2對workstation1、交換機的sc0介面和路由器模組的VLAN介面執行ping操作。

注意：請確保已將工作站上的預設網關設定為路由器模組上的VLAN介面。根據網路圖表,workstation1上的預設閘道設定為10.10.10.1，而workstation2設定為10.10.11.1。

測試1:從Workstation2 ping Workstation1

C:\> ipconfig

!--- This command is used to check the IP configuration on the !--- Windows 2000 workstation. Use the appropriate commands on the workstations !--- that you use.

Windows 2000 IP Configuration

Ethernet adapter Local Area Connection:

Connection-specific DNS Suffix  . :

IP Address. . . . . . . . . . . . : 10.10.11.254

Subnet Mask . . . . . . . . . . . : 255.255.255.0

Default Gateway . . . . . . . . . : 10.10.11.1

C:\> ping 10.10.10.254

Pinging 10.10.10.254 with 32 bytes of data:

Reply from 10.10.10.254: bytes=32 time=10ms TTL=31

Reply from 10.10.10.254: bytes=32 time<10ms TTL=31

Reply from 10.10.10.254: bytes=32 time<10ms TTL=31

Reply from 10.10.10.254: bytes=32 time<10ms TTL=31

Ping statistics for 10.10.10.254:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum =  10ms, Average =  2ms

測試2:從Workstation2 ping Supervisor Engine上的sc0介面

C:\> ping 172.16.80.40

Pinging 172.16.80.40 with 32 bytes of data:

Reply from 172.16.80.40: bytes=32 time<10ms TTL=59

Reply from 172.16.80.40: bytes=32 time<10ms TTL=59

Reply from 172.16.80.40: bytes=32 time<10ms TTL=59

Reply from 172.16.80.40: bytes=32 time<10ms TTL=59

Ping statistics for 172.16.80.40:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum =  0ms, Average =  0ms

測試3:從工作站2 ping路由器模組上的介面VLAN 1

C:\> ping 172.16.80.79

Pinging 172.16.80.79 with 32 bytes of data:

Reply from 172.16.80.79: bytes=32 time<10ms TTL=255

Reply from 172.16.80.79: bytes=32 time<10ms TTL=255

Reply from 172.16.80.79: bytes=32 time<10ms TTL=255

Reply from 172.16.80.79: bytes=32 time<10ms TTL=255

Ping statistics for 172.16.80.79:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum =  0ms, Average =  0ms

測試4:從Workstation2 ping路由器模組上的介面VLAN 10

C:\> ping 10.10.10.1

Pinging 10.10.10.1 with 32 bytes of data:

Reply from 10.10.10.1: bytes=32 time<10ms TTL=255

Reply from 10.10.10.1: bytes=32 time<10ms TTL=255

Reply from 10.10.10.1: bytes=32 time<10ms TTL=255

Reply from 10.10.10.1: bytes=32 time<10ms TTL=255

Ping statistics for 10.10.10.1:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum =  0ms, Average =  0ms

測試5:從Workstation2 ping路由器模組上的介面VLAN 20

C:\> ping 10.10.11.1

Pinging 10.10.11.1 with 32 bytes of data:

Reply from 10.10.11.1: bytes=32 time<10ms TTL=255

Reply from 10.10.11.1: bytes=32 time<10ms TTL=255

Reply from 10.10.11.1: bytes=32 time<10ms TTL=255

Reply from 10.10.11.1: bytes=32 time<10ms TTL=255

Ping statistics for 10.10.11.1:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum =  0ms, Average =  0ms

附錄

Supervisor Engine模組組態

Cat5500> (enable) show config

This command shows non-default configurations only.

Use show config all to show both default and non-default configurations.

...

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Tue Apr 10 2001, 09:09:54

!

#version 6.1(1)

!

set option fddi-user-pri enabled

set password $2$lx7B$WipkVnLnbYIfrBSqD2SN9.

set enablepass $2$6/eK$I3lDb2nnP7Fc9JKF3XwRW/

set prompt Cat5500>

!

#errordetection

set errordetection portcounter enable

!

#system

set system name  Cat5500

!

#frame distribution method

set port channel all distribution mac both

!

#vtp

set vtp domain cisco

set vtp mode transparent

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state active stp ieee

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state active stp ibm

set vlan 10,20

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state active

mode srb aremaxhop 7 stemaxhop 7 backupcrf off

!

#ip

set interface sc0 1 172.16.80.40/255.255.255.0 172.16.80.255

set ip route 0.0.0.0/0.0.0.0         172.16.80.79

!

#set boot command

set boot config-register 0x2102

clear boot system all

!

# default port status is enable

!

!

#module 1 : 2-port 1000BaseSX Supervisor

!

#module 2 : 4-port 10/100BaseTX Supervisor

!

#module 3 : 3-port 1000BaseX Ethernet

!

#module 4 : 24-port 10/100BaseTX Ethernet

set vlan 10   4/1-12

set vlan 20   4/13-20

set spantree portfast    4/1-20 enable

!

#module 5 : 2-port MM OC-3 Dual-Phy ATM

!

#module 6 empty

!

#module 7 : 1-port Route Switch

!

#module 8 empty

!

#module 9 empty

!

#module 10 empty

!

#module 11 : 48-port 10BaseT Ethernet

!

#module 12 : 2-port MM MIC FDDI

!

#module 13 empty

end

Cat5500> (enable)

RSM配置

Router# show running-config

Building configuration...

Current configuration:

!

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Router

!

enable password cisco

!

ip subnet-zero

ip cef

!

!

process-max-time 200

!

interface Vlan1

ip address 172.16.80.79 255.255.255.0

no ip directed-broadcast

!

interface Vlan10

ip address 10.10.10.1 255.255.255.0

no ip directed-broadcast

!

interface Vlan20

ip address 10.10.11.1 255.255.255.0

no ip directed-broadcast

!

ip classless

!

!

line con 0

transport input none

line aux 0

line vty 0 4

password cisco

login

!

end

Router#

相關資訊

- Catalyst 4000系列路由器模組的配置和概述(WS-X4232-L3)

- 使用 PortFast 和其他命令修復工作站啟動連線延遲

- LAN 產品支援頁面

- LAN 交換支援頁面

- 技術支援 - Cisco Systems