目錄

簡介

必要條件

採用元件

設定

步驟1 — 確定交換機角色

第2步 — 故障轉移

第3步 — 驗證故障轉移

步驟4 — 移除交換機

步驟5 — 暫存並安裝更換交換機

第6步 — 配置並加入VSS

驗證

常見問題

VSL保持關閉狀態

疑難排解

相關資訊:

簡介

本檔案介紹在虛擬交換系統(VSS)模式下運作的Cisco Catalyst 4500系列交換器的交換器更換程式。

必要條件

思科建議您瞭解以下主題：

- Cisco VSS

- VSS活動和VSS備用交換機

- 虛擬交換器連結(VSL)

採用元件

本檔案中的資訊是根據搭載Cisco IOS®版本03.05.01的WS-C4500X-32。但是同樣的程式也可套用於搭載Supervisor 7引擎(Sup7)的4500機箱。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

設定

注意：如果可能，思科建議在維護視窗中完成向VSS的轉換。

步驟1 — 確定交換機角色

第一步是識別必須更換的交換機。在本例中，必須更換活動交換機（交換機1）。show switch virtual命令提供作用中資訊和備用資訊。

4500X-VSS#show switch virtual

Executing the command on VSS member switch role = VSS Active, id = 1

Switch mode                  : Virtual Switch

Virtual switch domain number : 100

Local switch number          : 1

Local switch operational role: Virtual Switch Active

Peer switch number           : 2

Peer switch operational role : Virtual Switch Standby

Executing the command on VSS member switch role = VSS Standby, id = 2

Switch mode                  : Virtual Switch

Virtual switch domain number : 100

Local switch number          : 2

Local switch operational role: Virtual Switch Standby

Peer switch number           : 1

Peer switch operational role : Virtual Switch Active

第2步 — 故障轉移

現在，您已瞭解哪台交換機處於活動狀態（交換機1）以及哪台交換機處於備用狀態（交換機2）。下一步是將控制平面責任故障轉移到交換機2，以便您為更換交換機1做好準備。redundancy force-switchover 命令執行所需的操作。

注意：冗餘故障轉移可能導致停機時間，具體取決於操作冗餘狀態。意識到此步驟完全重新載入當前活動的交換機（交換機1），以便將控制責任傳遞給對等裝置（交換機2）。

4500X-VSS#redundancy force-switchover

This will reload the active unit and force switchover to standby[confirm]

Preparing for switchover..

*Mar  2 13:38:06.553: %SYS-5-SWITCHOVER: Switchover requested by Exec. Reason:

Stateful Switchover.

<Sun Mar  2 13:38:09 2014> Message from sysmgr: Reason Code:[3] Reset Reason:

Reset/Reload requested by [console]. [Reload command]

第3步 — 驗證故障轉移

在移除有故障的交換機之前，必須驗證系統是否已完全故障轉移。若要驗證備援狀態，請輸入show redundancy指令。

4500X-VSS#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 1 week, 3 days, 22 hours, 37 minutes

Switchovers system experienced = 8

Standby failures = 0

Last switchover reason = user_forced

Hardware Mode = Duplex

Configured Redundancy Mode = Stateful Switchover

Operating Redundancy Mode = Stateful Switchover

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

------------------------------

Active Location = slot 2/1

Current Software state = ACTIVE

Uptime in current state = 55 minutes

Image Version = Cisco IOS Software, Cisco IOS-XE Software, Catalyst

4500 L3 Switch Software (cat4500e-UNIVERSAL-M),

Version 03.05.01.E RELEASE SOFTWARE (fc2)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Sat 23-Nov-13 00:46 by prod_re

BOOT = bootflash:cat4500e-universal.SPA.03.05.01.E.152-1.E1.bin,1;

Configuration register = 0x2102

Peer Processor Information :

------------------------------

Standby Location = slot 1/1

Current Software state = STANDBY HOT

Uptime in current state = 0 minute

Image Version = Cisco IOS Software, Cisco IOS-XE Software,

Catalyst 4500 L3 Switch Software (cat4500e-UNIVERSAL-M),

Version 03.05.01.E RELEASE SOFTWARE (fc2)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Sat 23-Nov-13 00:46 by prod_

BOOT = bootflash:cat4500e-universal.SPA.03.05.01.E.152-1.E1.bin,1;

Configuration register = 0x2102

在輸出中，Current Software state = STANDBY HOT表示系統已穩定且此時已完全同步。現在，您可以繼續物理移除交換機。

步驟4 — 移除交換機

此時，有故障的交換機已準備好進行物理拆除。必須認識到，如果拓撲在移除時不是完全冗餘，則您可以保持服務影響。思科建議您實作多機箱EtherChannel(MEC)，協助確保連結保持作用中。

注意:MEC是EtherChannel，其埠在VSS的兩台交換機上終止。 VSS MEC可以連線到支援EtherChannel的任何網路元素（如主機、伺服器、路由器或交換機）。

步驟5 — 暫存並安裝更換交換機

您必須在此機箱的備用機箱中使用相同的Cisco IOS映像和許可證功能集，才能正確加入當前VSS域。本示例涉及下載和安裝03.05.01版以便與當前對等項匹配。安裝後，物理鏈路必須按照被更換的交換機的確切位置連線，然後必須引導交換機。交換機現在必須使用空白配置聯機，並處於獨立狀態，因為尚未將其配置為VSS成員。

第6步 — 配置並加入VSS

您必須設定VSS域和交換機編號。

註：此資訊與上一交換器會使用的資訊相同。在本例中，網域為100，交換器編號為1。

4500X-VSS(config)#switch virtual domain 100

4500X-VSS(config-vs-domain)#switch 1

接下來，您必須設定用於VSL鏈路的物理介面和埠通道。

4500X-VSS(config)# interface Port-channel 10

4500X-VSS(config-if)#switchport

4500X-VSS(config-if)#switch virtual link 1

4500X-VSS(config)# int range tenGigabitEthernet 1/1/15-16

4500X-VSS(config-if-range) channel-group 10 mode on

最後，您必須將交換器模式從standalone轉換為virtual。一旦完成此設定，交換器就會重新載入。

4500X-VSS# switch convert mode virtual

當Switch 1完成重新載入時，它會從VSL鏈路檢測到當前活動的VSS交換機，並自動同步配置。

驗證

現在，您的交換機必須返回到完全冗餘的VSS中。show switch virtual命令可確保每台交換機都處於正確的狀態。若要確認您重新處於狀態化切換(SSO)或熱備用狀態，請輸入其他show redundancy命令。

4500X-VSS#show switch virtual

Executing the command on VSS member switch role = VSS Active, id = 2

Switch mode                  : Virtual Switch

Virtual switch domain number : 100

Local switch number          : 2

Local switch operational role: Virtual Switch Active

Peer switch number           : 1

Peer switch operational role : Virtual Switch Standby

Executing the command on VSS member switch role = VSS Standby, id = 1

Switch mode                  : Virtual Switch

Virtual switch domain number : 100

Local switch number          : 1

Local switch operational role: Virtual Switch Standby

Peer switch number           : 2

Peer switch operational role : Virtual Switch Active

4500X-VSS#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 1 week, 4 days, 9 hours, 27 minutes

Switchovers system experienced = 8

Standby failures = 0

Last switchover reason = user_forced

Hardware Mode = Duplex

Configured Redundancy Mode = Stateful Switchover

Operating Redundancy Mode = Stateful Switchover

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

------------------------------

Active Location = slot 2/1

Current Software state = ACTIVE

Uptime in current state = 1 hours, 3 minutes

Image Version = Cisco IOS Software, Cisco IOS-XE Software, Catalyst 4500

L3 Switch Software (cat4500e-UNIVERSAL-M), Version

03.05.01.E RELEASE SOFTWARE (fc2)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Sat 23-Nov-13 00:46 by prod_re

BOOT = bootflash:cat4500e-universal.SPA.03.05.01.E.152-1.E1.bin,1;

Configuration register = 0x2102

Peer Processor Information :

------------------------------

Standby Location = slot 1/1

Current Software state = STANDBY HOT

Uptime in current state = 1 hours, 3 minutes

Image Version = Cisco IOS Software, Cisco IOS-XE Software, Catalyst 4500

L3 Switch Software (cat4500e-UNIVERSAL-M), Version

03.05.01.E RELEASE SOFTWARE (fc2)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Sat 23-Nov-13 00:46 by prod_

BOOT = bootflash:cat4500e-universal.SPA.03.05.01.E.152-1.E1.bin,1;

Configuration register = 0x2102

常見問題

VSL保持關閉狀態

如果在兩台交換機之一或兩台都完成引導時VSL保持關閉，則如果沒有雙主用檢測機制，可以進入雙主用狀態。系統在檢測到對等Supervisor之前（通常通過在交換機引導後啟動VSL鏈路）保持雙活動狀態。檢測到雙活動狀態後，其中一個管理引擎將進入恢復模式，並關閉其所在機箱的所有本地介面。VSL鏈路完全恢復後，必須重新載入處於恢復模式的交換機/Supervisor，以便它能夠在VSS中作為備用鏈路正確重新協商。

疑難排解

要驗證VSL鏈路，請輸入：

4500X-VSS#show switch virtual link

Executing the command on VSS member switch role = VSS Active, id = 2

VSL Status : UP

VSL Uptime : 11 hours, 53 minutes

VSL Control Link : Te2/1/1

VSL Encryption : Configured Mode - Off, Operational Mode - Off

Executing the command on VSS member switch role = VSS Standby, id = 1

VSL Status : UP

VSL Uptime : 11 hours, 53 minutes

VSL Control Link : Te1/1/1

VSL Encryption : Configured Mode - Off, Operational Mode - Off

要使VSS使用SSO冗餘運行，VSS必須滿足以下條件：

- 兩台交換器上的軟體版本相同

- VSL配置一致性

在啟動順序中，VSS備用交換機將啟動配置檔案中的虛擬交換機資訊傳送到VSS活動交換機。

VSS Active交換機確保在兩台交換機上正確匹配此資訊：

- 交換機虛擬域

- 交換機虛擬節點

- 交換機優先順序（可選）

- VSL埠通道：交換機虛擬鏈路識別符號

- VSL埠：通道組編號、關閉、VSL埠總數

相關資訊:

- Catalyst 4500系列交換器Cisco IOS版本XE 3.5.0E和15.2.1

- 思科技術支援與下載