目錄

簡介

必要條件

需求

採用元件

慣例

背景資訊

配置流程

配置和輸出示例

相關資訊

簡介

本文說明如何在具有執行Cisco IOS®軟體的Supervisor Engine的Catalyst 4500/4900交換器上復原遺失的密碼。

必要條件

需求

本文件沒有特定需求。

採用元件

本文件所述內容不限於特定軟體和硬體版本。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路運作中，請確保您瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

背景資訊

附註：在Catalyst 4500/4000系列交換器中，Supervisor Engine II+、II+10GE、II+TS、III、IV、V和V-10GE僅支援Cisco IOS軟體，而Supervisor Engine I和II僅支援Catalyst OS軟體。若要復原Supervisor Engine I或II上的密碼，請參閱執行CatOS的Catalyst的密碼復原程式。

本文描述如何在具有Supervisor Engine II-Plus(WS-X4013+)、Supervisor Engine II-Plus-TS(WS-X4013+TS)、Supervisor Engine II-Plus-10GE(WS-X4013+10GE)、Supervisor Engine III(WS-X4014)的Catalyst上恢復丟失或未知的密碼Supervisor Engine IV(WS-X4515)、Supervisor Engine V(WS-X4516)、Supervisor Engine V-10GE(WS-X4516-10GE)模組、Cisco Catalyst 4948、Cisco Catalyst 4948 10GE和Cisco Catalyst 4900M交換機。

配置流程

在Catalyst 4500/4900交換器上復原密碼：

附註：在執行這些步驟時，請確保您對交換機具有物理訪問權，並且使用控制檯訪問Supervisor Engine模組。如需交換器主控台連線的詳細資訊，請參閱將資料機連線到Catalyst交換器上的主控台連線埠。

提示：如果按照上述步驟操作，交換機配置不會丟失。作為最佳實踐，思科建議您在TFTP伺服器或網路管理伺服器上擁有所有思科裝置配置的備份副本。

1. 為裝置重新通電。

要重新通電，請關閉裝置，然後重新開啟。

在5秒內按Ctrl-C可阻止自動啟動。此操作將您置於ROM監控(ROMmon)提示模式。

!--- Here, you power cycle the switch.

**********************************************************

*                                                        *

* Welcome to ROM Monitor for WS-X4014 System.            *

* Copyright (c) 1999-2000, 2001 by Cisco Systems, Inc.   *

* All rights reserved.                                   *

*                                                        *

**********************************************************

ROM Monitor Program Version 12.1(10r)EY(1.21)

Board type 1, Board revision 7

Swamp FPGA revision 16, Dagobah FPGA revision 43

Timer interrupt test passed.

MAC Address  : 00-02-b9-83-af-fe

IP Address   : 172.16.84.122

Netmask      : 255.255.255.0

Gateway      : 172.16.84.1

TftpServer   : Not set.

Main Memory  : 256 MBytes

***** The system will autoboot in 5 seconds *****  Type control-C to prevent autobooting.

!--- At this point, press Ctrl-C.

Autoboot cancelled......... please wait!!!

Autoboot cancelled......... please wait!!!

rommon 1 > [interrupt]

!--- The module ended in the ROMmon.

rommon 1 > [interrupt]

2. 發出 confreg 命令 rommon  提示。

選擇此處以粗體顯示的內容，以便進行密碼恢復：

rommon 1 > set

rommon 1 > confreg

Configuration Summary :

=> load ROM after netboot fails

=> console baud: 9600

=> autoboot from: commands specified in 'BOOT' environment variable

do you wish to change the configuration? y/n  [n]:  y

enable  "diagnostic mode"? y/n  [n]:  n

enable  "use net in IP bcast address"? y/n  [n]:  n

disable "load ROM after netboot fails"? y/n  [n]:  n

enable  "use all zero broadcast"? y/n  [n]:  n

enable  "break/abort has effect"? y/n  [n]:  n

enable  "ignore system config info"? y/n  [n]:  y

change console baud rate? y/n  [n]:  n

change the boot characteristics? y/n  [n]:  n

Configuration Summary :

=> load ROM after netboot fails

=> ignore system config info

=> console baud: 9600

=> autoboot from: commands specified in 'BOOT' environment variable

do you wish to save this configuration? y/n  [n]:   y

You must reset or power cycle for new configuration to take effect

附註：您還可以使用confreg 0x2142命令，將配置暫存器值設定為繞過NVRAM中儲存的啟動配置。

rommon 1 > confreg 0x2142

You must reset or power cycle for the new configuration to take effect.

3. 發出 reset 命令，以便模組重新啟動。

由於您在步驟2中所做的更改，模組將重新啟動，但會忽略儲存的配置。

rommon 2 > reset

Resetting .......

rommon 3 >

**********************************************************

*                                                        *

* Welcome to ROM Monitor for WS-X4014 System.            *

* Copyright (c) 1999-2000, 2001 by Cisco Systems, Inc.   *

* All rights reserved.                                   *

*                                                        *

**********************************************************

!--- Output suppressed.

Press RETURN to get started!

!--- Press Return.

00:00:21: %SYS-5-RESTART: System restarted --

Cisco Internetwork Operating System Software

IOS (tm) Catalyst 4000 L3 Switch Software (cat4000-IS-M),

Version 12.1(8a)EW,  RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2002 by cisco Systems, Inc.

Compiled Thu 24-Jan-02 17:34 by ccai

00:00:21: %SNMP-5-COLDSTART: SNMP agent on host Switch

is undergoing a cold start

Switch>

4. 確保配置暫存器值為0x2142。

此值使模組從快閃記憶體啟動，而不載入已儲存的配置。在Switch提示時發出enable命令以進入啟用模式。然後，發出show version命令以檢查配置暫存器值。

Switch>enable

Switch#show version

Cisco Internetwork Operating System Software

IOS (TM) Catalyst 4000 L3 Switch Software (cat4000-IS-M),

Version 12.1(8a)EW,  RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2002 by cisco Systems, Inc.

Compiled Thu 24-Jan-02 17:34 by ccai

Image text-base: 0x00000000, data-base: 0x00AA2B8C

ROM: 12.1(10r)EY(1.21)

Switch uptime is 5 minutes

System returned to ROM by reload

Running default software

cisco WS-C4006 (MPC8245) processor (revision 7) with 262144K bytes of memory.

Processor board ID FOX04183666

Last reset from Reload

32 Gigabit Ethernet/IEEE 802.3 interface(s)

467K bytes of non-volatile configuration memory.

Configuration register is 0x2142

Switch#

5. 發出 configure memory  命令或 copy startup-config running-config  命令將NVRAM複製到記憶體中。

請勿發出 configure terminal 命令，顯示模組上的預設配置。

Switch#configure memory

Uncompressed configuration from 1307 bytes to 3014 bytes

Switch#

00:13:52: %SYS-5-CONFIG_I: Configured from memory by console

c-4006-SUPIII#

6. 發出 show ip interface brief   命令，以確保之前使用的介面顯示up/up狀態。

如果在口令恢復之前使用的任何介面顯示down，請在該介面上發出no shutdown命令以啟用該介面。

7. 發出write terminal命令或show running-config命令以顯示模組上儲存的配置。

c-4006-SUPIII# show running-config

Building configuration...

Current configuration : 3014 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

service compress-config

!

hostname c-4006-SUPIII

!

boot system flash bootflash:

!

vtp mode transparent

!--- Output suppressed.

line con 0

stopbits 1

line vty 0 4

login

!

end

c-4006-SUPIII#

現在，您可以更改模組上的密碼了。

8. 發出以下命令更改密碼：

c-4006-SUPIII#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

c-4006-SUPIII(config)#no enable secret

!--- This step is necessary if the switch had an enable secret password.

c-4006-SUPIII(config)#enable secret < password >

[Choose a strong password with at least one capital letter,

one number, and one special character.]

!--- This command sets the new password.

9. 請確保將配置暫存器值更改回0x2102。

在configprompt(配置提示符)下完成這些步驟，以更改並驗證配置暫存器值。

c-4006-SUPIII(config)#config-register 0x2102

c-4006-SUPIII(config)# ^Z

c-4006-SUPIII#

00:19:01: %SYS-5-CONFIG_I: Configured from console by console

c-4006-SUPIII#write memory

!--- This step saves the configuration.

Building  configuration...

Compressed configuration from 3061 bytes to 1365 bytes[OK]

c-4006-SUPIII#show version

!--- This step verifies the value change.

Cisco Internetwork Operating System Software

IOS (TM) Catalyst 4000 L3 Switch Software (cat4000-IS-M),

Version 12.1(8a)EW,  RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2002 by cisco Systems, Inc.

Compiled Thu 24-Jan-02 17:34 by ccai

Image text-base: 0x00000000, database: 0x00AA2B8C

ROM: 12.1(10r)EY(1.21)

c-4006-SUPIII uptime is 20 minutes

System returned to ROM by reload

Running default software

cisco WS-C4006 (MPC8245) processor (revision 7) with 262144K bytes of memory.

Processor board ID FOX04183666

Last reset from Reload

32 Gigabit Ethernet/IEEE 802.3 interface(s)

467K bytes of nonvolatile configuration memory.

Configuration register is 0x2142 (will be 0x2102 at next reload)

c-4006-SUPIII#

此時，您已更改密碼。

配置和輸出示例

此範例輸出是Catalyst 4000 Supervisor Engine III上的密碼復原程式的結果。

c-4006-SUPIII> enable

Password:

Password:

Password:

% Bad secrets

!--- Here, you power cycle the switch.

**********************************************************

*                                                        *

* Welcome to ROM Monitor for WS-X4014 System.            *

* Copyright (c) 1999-2000, 2001 by Cisco Systems, Inc.   *

* All rights reserved.                                   *

*                                                        *

**********************************************************

ROM Monitor Program Version 12.1(10r)EY(1.21)

Board type 1, Board revision 7

Swamp FPGA revision 16, Dagobah FPGA revision 43

Timer interrupt test passed.

MAC Address  : 00-02-b9-83-af-fe

IP Address   : 172.16.84.122

Netmask      : 255.255.255.0

Gateway      : 172.16.84.1

TftpServer   : Not set.

Main Memory  : 256 Mbytes

***** The system  will  autoboot in 5 seconds *****

Type control-C to prevent autobooting.

!--- At this point, press Ctrl-C.

Autoboot cancelled......... please wait!!!

Autoboot cancelled......... please wait!!!

rommon 1 > [interrupt]

rommon 1 > [interrupt]

rommon 1 > confreg

Configuration Summary :

=> load ROM after netboot fails

=> console baud: 9600

=> autoboot from: commands specified in 'BOOT' environment variable

do you wish to change the configuration? y/n [n]: y

enable "diagnostic mode"? y/n [n]: n

enable "use net in IP bcast address"? y/n [n]: n

disable "load ROM after netboot fails"? y/n [n]: n

enable "use all zero broadcast"? y/n [n]: n

enable "break/abort has effect"? y/n [n]: n

enable "ignore system config info"? y/n [n]: y

change console baud rate? y/n [n]: n

change the boot characteristics? y/n [n]: n

Configuration Summary :

=> load ROM after netboot fails

=> ignore system config info

=> console baud: 9600

=> autoboot from: commands specified in 'BOOT' environment variable

do you wish to save this configuration? y/n [n]: y

You must reset or power cycle for new configuration to take effect

rommon 2 > reset

Resetting .......

rommon 3 >

**********************************************************

*                                                        *

* Welcome to ROM Monitor for WS-X4014 System.            *

* Copyright (c) 1999-2000, 2001 by Cisco Systems, Inc.   *

* All rights reserved.                                   *

*                                                        *

**********************************************************

ROM Monitor Program Version 12.1(10r)EY(1.21)

Board type 1, Board revision 7

Swamp FPGA revision 16,

Dagobah FPGA revision 43

Timer interrupt test passed.

MAC Address : 00-02-b9-83-af-fe

IP Address : 172.16.84.122

Netmask : 255.255.255.0

Gateway : 172.16.84.1

TftpServer : Not set.

Main Memory : 256 Mbytes

***** The system will autoboot in 5 seconds *****

Type control-C to prevent autobooting.

. . . . .

******** The system will autoboot now ********

config-register = 0x2142

Autobooting using BOOT variable specified file.....

Current BOOT file is --- bootflash:

Rommon reg: 0x2B004180

Decompressing the image : ###########################

#####################################################

####################################### [OK]

k2diags version 1.6

prod: WS-X4014 part: 73-6854-07 serial: JAB0546060Z

Power-on-self-test for Module 1: WS-X4014

Status: (. = Pass, F = Fail)

Traffic using serdes loopback (L2; one port at a time)...

switch port 0: . switch port 1: . switch port 2: .

switch port 3: . switch port 4: . switch port 5: .

switch port 6: . switch port 7: . switch port 8: .

!--- Output suppressed.

Module 1 Passed

Exiting to ios...

Rommon reg: 0x2B000180

Decompressing the image : ##########################

!--- Output suppressed.

######################################################### [OK]

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco Internetwork Operating System Software

IOS (TM) Catalyst 4000 L3 Switch Software (cat4000-IS-M),

Version 12.1(8a)EW,  RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2002 by cisco Systems, Inc.

Compiled Thu 24-Jan-02 17:34 by ccai

Image text-base: 0x00000000, database: 0x00AA2B8C

cisco WS-C4006 (MPC8245) processor (revision 7) with 262144K bytes of memory.

Processor board ID FOX04183666

Last reset from Reload

32 Gigabit Ethernet/IEEE 802.3 interface(s)

467K bytes of nonvolatile configuration memory.

Press RETURN to get started!

00:00:21: %SYS-5-RESTART: System restarted --

Cisco Internetwork Operating System Software

IOS (TM) Catalyst 4000 L3 Switch Software (cat4000-IS-M),

Version 12.1(8a)EW,  RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2002 by cisco Systems, Inc.

Compiled Thu 24-Jan-02 17:34 by ccai

00:00:21: %SNMP-5-COLDSTART: SNMP agent on host Switch is undergoing a cold start

Switch>enable

Switch#show version

Cisco Internetwork Operating System Software

IOS (TM) Catalyst 4000 L3 Switch Software (cat4000-IS-M),

Version 12.1(8a)EW, RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2002 by cisco Systems, Inc.

Compiled Thu 24-Jan-02 17:34 by ccai

Image text-base: 0x00000000, database: 0x00AA2B8C

ROM: 12.1(10r)EY(1.21)

Switch uptime is 5 minutes

System returned to ROM by reload

Running default software

cisco WS-C4006 (MPC8245) processor (revision 7) with 262144K bytes of memory.

Processor board ID FOX04183666

Last reset from Reload

32 Gigabit Ethernet/IEEE 802.3 interface(s)

467K bytes of nonvolatile configuration memory.

Configuration register is 0x2142

Switch#

Switch#configure memory

Uncompressed configuration from 1307 bytes to 3014 bytes

c-4006-SUPIII#

00:13:52: %SYS-5-CONFIG_I: Configured from memory by console

c-4006-SUPIII#show running-config

Building configuration...

Current configuration : 3014 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

service compress-config

!

hostname c-4006-SUPIII

!

boot system flash bootflash:

!

vtp mode transparent

!

vlan 20

private-vlan primary

!

vlan 100

!

vlan 202

private-vlan association 440

!

vlan 440

private-vlan isolated

!

vlan 500

ip subnet-zero

no ip domain-lookup

!

ip multicast-routing

!

!

interface GigabitEthernet1/1

no switchport

ip address 10.1.1.1 255.255.255.0

ip pim dense-mode

!

interface GigabitEthernet1/2

no switchport

ip address 10.2.2.2 255.255.255.0

!

!--- Output suppressed.

!

interface Vlan1

ip address 172.16.84.140 255.255.255.0

ip pim dense-mode

!

interface Vlan2

no ip address

shutdown

!

interface Vlan20

no ip address

shutdown

!

!--- Output suppressed.

!

line con 0

stopbits 1

line vty 0 4

login

!

end

c-4006-SUPIII#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

c-4006-SUPIII(config)#no enable secret

!--- This step is necessary if the switch had an enable secret password.

c-4006-SUPIII(config)#enable secret < password >

[Choose a strong password with at least one capital letter,

one number, and one special character.]

c-4006-SUPIII(config)#config-register 0x2102

c-4006-SUPIII(config)#^Z

c-4006-SUPIII#

00:19:01: %SYS-5-CONFIG_I: Configured from console by console

c-4006-SUPIII#write memory

Building configuration...

Compressed configuration from 3061 bytes to 1365 bytes[OK]

c-4006-SUPIII#show version

Cisco Internetwork Operating System Software

IOS (TM) Catalyst 4000 L3 Switch Software (cat4000-IS-M),

Version 12.1(8a)EW,  RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/tac

Copyright (c) 1986-2002 by cisco Systems, Inc.

Compiled Thu 24-Jan-02 17:34 by ccai

Image text-base: 0x00000000, database: 0x00AA2B8C

ROM: 12.1(10r)EY(1.21)

c-4006-SUPIII uptime is 20 minutes

System returned to ROM by reload

Running default software

cisco WS-C4006 (MPC8245) processor (revision 7) with 262144K bytes of memory.

Processor board ID FOX04183666

Last reset from Reload

32 Gigabit Ethernet/IEEE 802.3 interface(s)

467K bytes of nonvolatile configuration memory.

Configuration register is 0x2142 (will be 0x2102 at next reload)

c-4006-SUPIII#

相關資訊

- 密碼復原期間的標準Break按鍵順序組合

- 密碼復原程序

- LAN交換器產品支援

- 技術支援與文件 - Cisco Systems