目錄

簡介

必要條件

需求

採用元件

相關產品

慣例

設定

網路圖表

組態

交換器(mix_stack)組態

驗證

相關資訊

簡介

LAN環境中的每台路由器都會始終看到組播控制平面流量。末節IP組播用於減少和最小化接入層的LAN上出現的不必要的組播流量，並節省介質上的頻寬，以將組播流量轉發到上游分佈/核心層。

在Catalyst 3750和3560系列交換機中，PIM末節組播功能支援分佈層和接入層之間的組播路由。它支援兩種型別的PIM介面：上行鏈路PIM介面和PIM被動介面。特別是，配置了PIM被動模式的路由介面不會傳遞/轉發PIM控制平面流量；它僅傳遞/轉發IGMP流量。

必要條件

需求

嘗試此組態之前，請確保符合以下要求：

- PIM末節路由器不會路由分佈路由器之間的傳輸流量。此行為通過單播(EIGRP)末節路由實施。需要正確的單點傳播末節路由配置來協助此PIM末節路由器行為。PIM末節功能不會阻止路由器管理員配置RIP、靜態路由或PIM RP以繞過此限制。

- 第2層存取網域中只允許使用直接連線多點傳送(IGMP)接收器和來源。訪問域不支援PIM協定。

- 不支援冗餘PIM末節路由器拓撲。

採用元件

本檔案中的資訊是根據Catalyst 3750交換器的輸出。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

相關產品

此組態也可以用於以下交換器型別：

- Catalyst 3750和3560系列交換器

Cisco Catalyst 3750和3560交換器支援PIM存根多點傳送路由代碼版本12.2(37)SE和更新版本。

慣例

請參閱思科技術提示慣例以瞭解更多有關文件慣例的資訊。

設定

本節提供用於設定本文件中所述功能的資訊。

上行鏈路上使用PIM SSM與上游路由器通訊。使用者可以使用任何其他PIM模式（例如，密集或稀疏）。

有關3750系列交換器上多點傳送路由設定的其他資訊，請參閱設定IP多點傳送路由。

註：使用Command Lookup Tool(僅供已註冊客戶使用)可獲取本節中使用的命令的詳細資訊。

網路圖表

本檔案會使用以下網路設定：

組態

本檔案會使用以下設定：

完成以下步驟以配置PIM末節路由：

1. 發出以下命令，以在交換器或交換器堆疊上全域啟用多點傳送路由：

mix_stack(config)#ip multicast-routing distributed

2. 發出以下命令，以使用預設組範圍定義IP組播地址的SSM範圍：

mix_stack(config)#ip pim ssm default

3. 發出以下命令以在上行鏈路上啟用PIM SSM:

mix_stack(config)#interface GigabitEthernet3/0/25

!--- By default switch configures the Layer 2 parameters. So in order to configure the Layer 3 parameter, use the next command.

mix_stack(config-if)#no switchport

mix_stack(config-if)#ip pim sparse-dense-mode

4. 發出以下命令以在VLAN介面上啟用PIM末節路由：

mix_stack(config)#interface vlan100

mix_stack(config-if)#ip pim passive

交換器(mix_stack)組態

mix_stack#show run

Building configuration...

Current configuration : 7810 bytes

!

version 12.2

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname mix_stack

!

!

switch 2 provision ws-c3750e-24pd

switch 3 provision ws-c3750g-24ts

switch 5 provision ws-c3750-24fs

switch 9 provision ws-c3750e-24pd

!

ip routing

!

!

ip multicast-routing distributed

!

!--- Output suppressed.

!

!

vlan 100

!

!

interface GigabitEthernet2/0/1

switchport access vlan 100

no keepalive

spanning-tree portfast

!

interface GigabitEthernet2/0/2

switchport access vlan 100

no keepalive

spanning-tree portfast

!

!

!--- Output suppressed.

!

!

interface GigabitEthernet3/0/25

no switchport

ip address 3.1.1.2 255.255.255.248

ip pim sparse-dense-mode

!

!

!--- Output suppressed.

!

!

interface GigabitEthernet9/0/24

no switchport

ip address 10.1.1.1 255.255.255.0

ip pim passive

no keepalive

!

!

!--- Output suppressed.

!

!

interface Vlan1

no ip address

!

interface Vlan100

ip address 100.1.1.1 255.255.255.0

ip pim passive

!

!

!--- Output suppressed.

!

!

ip pim ssm default

!

!

!--- Output suppressed.

!

!

control-plane

!

!

line con 0

exec-timeout 0 0

speed 115200

line vty 0 4

login

line vty 5 15

login

!

end

驗證

使用本節內容，確認您的組態是否正常運作。

輸出直譯器工具(僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

發出show ip pim interface命令，以顯示為每個介面啟用的PIM存根。

mix_stack#show ip pim interface

Address    Interface               Ver/    Nbr     Query   DR     DR

Mode    Count   Intvl   Prior

3.1.1.2    GigabitEthernet3/0/25   v2/SD   1       30      1      3.1.1.2

100.1.1.1  Vlan100                 v2/P    0       30      1      100.1.1.1

10.1.1.1   GigabitEthernet9/0/24   v2/P    0       30      1      10.1.1.1

發出show ip igmp groups detail，以顯示已加入特定多點傳送來源/組的相關使用者端。

mix_stack#show ip igmp groups 232.0.0.9 det

Flags: L - Local, U - User, SG - Static Group, VG - Virtual Group,

SS - Static Source, VS - Virtual Source,

Ac - Group accounted towards access control limit

Interface: GigabitEthernet9/0/24

Group: 232.0.0.9

Flags: SSM

Uptime: 00:00:10

Group mode: INCLUDE

Last reporter: 10.1.1.2

CSR Grp Exp: 00:02:57

Group source list: (C - Cisco Src Report, U - URD, R - Remote, S - Static,

V - Virtual, M - SSM Mapping, L - Local,

Ac - Channel accounted towards access control limit)

Source Address Uptime v3 Exp CSR Exp Fwd Flags

200.1.1.3 00:00:10 stopped 00:02:57 Yes CM

Interface: Vlan100

Group: 232.0.0.9

Flags: SSM

Uptime: 01:42:08

Group mode: INCLUDE

Last reporter: 100.1.1.3

CSR Grp Exp: 00:02:00

Group source list: (C - Cisco Src Report, U - URD, R - Remote, S - Static,

V - Virtual, M - SSM Mapping, L - Local,

Ac - Channel accounted towards access control limit)

Source Address Uptime v3 Exp CSR Exp Fwd Flags

200.1.1.3 01:42:12 stopped 00:02:00 Yes CM

mix_stack#

發出show ip mroute 以驗證多點傳送流是否從來源轉送到相關的使用者端。

mix_stack#show ip mroute 232.0.0.9

IP Multicast Routing Table

Flags: D - Dense, S - Sparse, B - Bidir Group, s - SSM Group, C - Connected,

L - Local, P - Pruned, R - RP-bit set, F - Register flag,

T - SPT-bit set, J - Join SPT, M - MSDP created entry,

X - Proxy Join Timer Running, A - Candidate for MSDP Advertisement,

U - URD, I - Received Source Specific Host Report,

Z - Multicast Tunnel, z - MDT-data group sender,

Y - Joined MDT-data group, y - Sending to MDT-data group

V - RD & Vector, v - Vector

Outgoing interface flags: H - Hardware switched, A - Assert winner

Timers: Uptime/Expires

Interface state: Interface, Next-Hop or VCD, State/Mode

(200.1.1.3, 232.0.0.9), 01:44:23/00:02:52, flags: sTI

Incoming interface: GigabitEthernet3/0/25, RPF nbr 3.1.1.1

Outgoing interface list:

GigabitEthernet9/0/24, Forward/Sparse-Dense, 00:02:24/00:02:50

Vlan100, Forward/Sparse-Dense, 01:44:23/00:02:52

相關資訊

- Cisco Catalyst 3750系列交換器 — 支援檔案

- 交換器產品支援

- LAN 交換技術支援

- 技術支援與文件 - Cisco Systems