目錄

簡介

必要條件

需求

採用元件

慣例

背景資訊

設定

網路圖表

組態

驗證

相關資訊

簡介

本檔案將提供Catalyst 3750系列交換器上Cisco EnergyWise功能的範例設定和驗證。具體來說，本檔案將介紹如何在Catalyst 3750交換器上設定Cisco EnergyWise功能。

必要條件

需求

嘗試此組態之前，請確保符合以下要求：

- 具備有關Cisco Catalyst 3750系列交換器上的組態的基本知識

- 對Cisco EnergyWise功能有基礎認識

採用元件

本檔案中的資訊是根據Cisco Catalyst 3750系列交換器。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

請參閱思科技術提示慣例以瞭解更多有關文件慣例的資訊。

背景資訊

Cisco EnergyWise是一種電源管理功能，能夠監控和控制整個IT基礎設施的電源。Cisco EnergyWise提供了一個框架，通過該框架，網路本身可用於向所有裝置型別開放電源管理。

Cisco EnergyWise域是用於電源監控的裝置的管理分組。支援EnergyWise SDK客戶端的Cisco EnergyWise端點響應使用Cisco EnergyWise協定從管理應用程式或其他域成員啟動的EnergyWise查詢。

設定

本節提供設定本檔案中所述Cisco EnergyWise功能所需的資訊。

註：使用Command Lookup Tool(僅限註冊客戶)可獲取本節中使用的命令的詳細資訊。

網路圖表

本檔案會使用以下網路設定：

組態

本檔案會使用以下設定：

Catalyst 3750交換器

configure terminal

!--- Enable Cisco EnergyWise on supported platforms.

Switch(config)#energywise domain Cisco security shared-secret 0 cisco protocol

udp port 43440 ip 10.78.4.48

!--- Set the EnergyWise importance for the platform.

Switch(config)#energywise importance 80

!--- Set the EnergyWise keywords for the platform.

Switch(config)#energywise keywords lab1,lab2

Switch(config)#service password-encryption

!--- Enable communication between management applications which support EnergyWise protocol and domain.

Switch(config)#energywise management security shared-secret 7 070C285F4D06 port 60500

!--- Set the EnergyWise name for the platform.

Switch(config)#energywise name floor.lab

!--- Configure a static neighbor.

Switch(config)#energywise neighbor 2.2.4.31 43440

!--- Set the EnergyWise role for the platform.

Switch(config)#energywise role access4lab1

Switch(config)#energywise allow query save

!--- Configure Cisco EnergyWise on a port.

Switch(config)#time-range onlabfloor

Switch(config-time-range)#absolute start 00:00 01 January 2012 end 23:59 01 Jan 2012

Switch(config-time-range)#periodic weekdays 7:00 to 19:00

Switch(config-time-range)#periodic weekend 10:00 to 17:00

Switch(config)#time-range offlabfloor

Switch(config-time-range)#absolute start 00:00 01 January 2012 end 23:59 01 Jan 2012

Switch(config-time-range)#periodic weekdays 00:00 to 08:00

Switch(config-time-range)#periodic weekdays 20:00 to 23:59

Switch(config-time-range)#periodic weekend 00:00 to 10:00

Switch(config-time-range)#periodic weekend 17:00 to 23:59

Switch(config)#interface fastEthernet 1/0/3

!--- Configure a recurring event on the interface.

Switch(config-if)#energywise level 10 recurrence importance 80 time-range onlabfloor

Switch(config-if)#energywise level 0 recurrence importance 80 time-range offlabfloor

Switch(config-if)#energywise name IP_phone

Switch(config-if)#energywise role manager

Switch(config-if)#end

!--- Save the configurations in the device.

switch(config)#copy running-config startup-config

Switch(config)#exit

驗證

使用本節內容，確認您的組態是否正常運作。

輸出直譯器工具(僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

使用show energywise 命令以顯示EnergyWise設定和狀態。

例如：

Switch#show energywise

Module/

Interface   Role              Name                  Usage      Lvl   Imp  Type

---------   ----              ----                  -----      ---   ---  ----

access4lab1       Switch                45.0  (W)  10    80   parent

使用show energywise children命令顯示連線的端點的狀態。

例如：

Switch#show energywise children

Module/

Interface   Role              Name                  Usage      Lvl   Imp  Type

---------   ----              ----                  -----      ---   ---  ----

access4lab1       Switch                45.0  (W)  10    80   parent

Fa1/0/3     IP Phone 7975     SEP0022905B90D4       12.0  (W)  10    1    PoE

Total Displayed: 2      Usage: 143.3

使用show energywise children provisioned命令以顯示交換機和所連線端點的EnergyWise資訊摘要。

例如：

Switch#show energywise children provisioned

Module/

Interface   Role              Name                  Usage      Lvl   Imp  Type

---------   ----              ----                  -----      ---   ---  ----

access4lab1       Switch                45.0  (W)  10    80   parent

Fa1/0/1     interface         Fa0.5                 0.0   (W)  10    1    PoE

Fa1/0/2     interface         Fa0.5                 0.0   (W)  10    1    PoE

Fa1/0/3     IP Phone 7975     SEP0022905B90D4       12.0  (W)  10    1    PoE

Fa1/0/4     interface         Fa0.5                 0.0   (W)  10    1    PoE

<output truncated>

Total Displayed: 24     Usage: 139.9

使用show energywise domain 命令以顯示EnergyWise域資訊。

例如：

Switch#show energywise domain

Name      : Switch

Domain    : Cisco

Protocol  : udp

IP        : 10.78.4.48

Port      : 43440

使用show energywise usage children命令以顯示域成員和連線的端點的實際功率。

例如：

Switch#show energywise usage children

Interface   Name                     Usage      Caliber

---------   ----                     _____      _____

Switch                   45.0  (W)   max

Fa1/0/1     Fa1.0.1                  0.0   (W)   presumed

Fa1/0/2     Fa1.0.2                  0.0   (W)   presumed

Fa1/0/3     SEP0022905B90D4          12.0  (W)   trusted

Fa1/0/2     Fa1.0.4                  0.0   (W)   presumed

<output truncated>

Total Displayed: 24     Usage: 139.9

使用show energywise neighbors 命令以顯示交換器的鄰居表。

例如：

Switch#show energywise neighbors

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater, P - Phone, U - Unknown

Id   Neighbor Name                 Ip:Port                 Prot   Capability

--   -------------                 -------                 ----   ----------

1                                  10.78.4.49:43440        static U

2    IP_phone A                    10.78.4.50:43440        udp    U

3    3560e-37-222                  20.1.2.222:6767         cdp    S I

使用show energywise level current命令顯示域成員的實際電源級別。使用energywise level recurrence importance importance time-range time-range-name 全域性配置命令時，show energywise level current的輸出將在下一個示例中顯示。

例如：

Switch#show energywise level current

Interface   Name                     Level  Value

---------   ----                     -----  -----

Switch                   10     45.0  (W)

使用show energywise recurrences命令以顯示定期事件的EnergyWise設定和狀態。

例如：

Switch#show energywise recurrences

Id     Addr       Class Action Lvl Cron/Time-range

--     ----       ----- ------ --- ---------------

1      Fa2/0/3    QUERY SET    10  onlabfloor

2      Fa2/0/3    QUERY SET     0  offlabfloor

使用show energywise statistics命令以顯示事件和錯誤的計數器。

例如：

Switch#show energywise statistics

Children:  2  Errors:  0  Drops:  31  Events:  102

相關資訊

- Cisco Catalyst 3750系列交換器支援頁面

- 交換器產品支援

- LAN 交換技術支援

- 技術支援與文件 - Cisco Systems