目錄

簡介

必要條件

需求

採用元件

慣例

背景資訊

設定

網路圖表

組態

驗證

HP-UX主機命令

MDS/IPS-8命令

疑難排解

Fabric Manager和Device Manager顯示

簡介

駐留在伺服器上的思科iSCSI驅動程式是iSCSI解決方案的關鍵元件。這些iSCSI驅動程式擷取Small Computer System Interface(SCSI)命令，將其封裝到IP資料包中，並將其重定向到Cisco SN 5420、Cisco SN 5428、Cisco SN 5428-2或Cisco MDS/IPS-8.This文檔，該文檔提供了HP-UX iSCSI主機到SN 5428的示例配置。

必要條件

需求

嘗試此組態之前，請確保符合以下要求：

- 安裝與HP-UX版本相容的iSCSI驅動程式。最新版本的驅動程式可在Cisco.com上的Cisco iSCSI驅動程式(僅限註冊客戶)下載頁面上找到。README.txt檔案包含在驅動程式zip(tar)檔案中。自述檔案包含有關許可證協定、驅動程式安裝和配置說明以及驅動程式體系結構技術概述的資訊。

- 在Cisco iSCSI Driver for HP-UX Release Notes的系統要求一節中介紹了作業系統要求和修補程式要求。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 含兩個處理器的HP-UX 9000/800 A500伺服器。

註：在本實驗設定中，沒有用於iSCSI的獨立乙太網介面卡，且正在使用的介面卡為100 Mb。在任何現實環境中，您都有單獨的千兆乙太網(GE)介面卡作為iSCSI啟動器。

[/]#/opt/ignite/bin/print_manifest[...]

System Hardware

Model:              9000/800/A500-5X

Main Memory:        1024 MB

Processors:         2

OS mode:            64 bit

LAN hardware ID:    0x00306E1B6F51

Software ID:        586760518

Keyboard Language:  Not_Applicable

Storage devices                  HW Path      Interface

SEAGATE ST318404LC 17366 Mb      0/0/1/1.15.0 SCSI C896 Ultra Wide Single-Ended

SEAGATE ST318203LC 17366 Mb      0/0/2/1.15.0 SCSI C875 Ultra Wide Single-Ended

I/O Interfaces

Class          H/W Path       Driver         Description

lan            0/0/0/0        btlan3         HP PCI 10/100Base-TX Core

ext_bus        0/0/1/0        c720           SCSI C896 Ultra Wide LVD

ext_bus        0/0/1/1        c720           SCSI C896 Ultra Wide Single-Ended

ext_bus        0/0/2/0        c720           SCSI C875 Fast Wide Single-Ended

ext_bus        0/0/2/1        c720           SCSI C875 Ultra Wide Single-Ended

tty            0/0/4/0        asio0          PCI Serial (103c1048)

tty            0/0/5/0        asio0          PCI Serial (103c1048)

fc             0/2/0/0        td             HP Tachyon XL2 Fibre Channel Mass Storage Adapter

Installed Software

Your system was installed with HP-UX version B.11.00.

Your system has the following software products installed and

configured on the system disk drive(s).

Product          Revision          Description

A6795A           B.11.00.10        PCI Tachyon TL/TS/XL2 Fibre Channel

BUNDLE           B.11.00           Patch Bundle

HPUXEng64RT      B.11.00.01        English HP-UX 64-bit Runtime Environment

HWE1100          B.11.00.0203.5    Hardware Enablement Patches for HP-UX 11.00, March 2002

OnlineDiag       B.11.00.20.09     HPUX 11.0 Support Tools Bundle, Mar 2002

UXCoreMedia      B.11.00.02        HP-UX Media Kit (Reference Only. See Description)

UnlimUserLic     B.11.00.02        HP-UX Unlimited-User License

XSWGR1100        B.11.00.47.08     General Release Patches, November 1999 (ACE)

[...]

- 已使用適用於HP-UX的Cisco iSCSI驅動程式3.3.3。建議同時安裝（至少）HP提供的最新穩定地址解析協定(ARPA)傳輸累積修補程式。編寫本文檔時為PHNE_28538。此修補程式有幾個依存關係，因此您必須在需要時安裝它們。有關安裝詳細資訊，請訪問官方的HP支援網站 (僅限註冊客戶)。

[/]# swlist

# Initializing...

# Contacting target "ape"...

#

# Target:  ape:/

#

#

# Bundle(s):

#

A6795A                        B.11.00.10     PCI Tachyon TL/TS/XL2 Fibre Channel

BUNDLE                        B.11.00        Patch Bundle

HPUXEng64RT                   B.11.00.01     English HP-UX 64-bit Runtime Environment

HWE1100                       B.11.00.0203.5 Hardware Enablement Patches for HP-UX 11.00, March 2002

OnlineDiag                    B.11.00.20.09  HPUX 11.0 Support Tools Bundle, Mar 2002

QPK1100                       B.11.00.56.5   Quality Pack for HP-UX 11.00, March 2002

UXCoreMedia                   B.11.00.02     HP-UX Media Kit (Reference Only. See Description)

UnlimUserLic                  B.11.00.02     HP-UX Unlimited-User License

XSWGR1100                     B.11.00.47.08  General Release Patches, November 1999 (ACE)

#

# Product(s) not contained in a Bundle:

#

ISCSI                         3.3.3          ISCSI software

bison                         1.875          bison

flex                          2.5.4a         flex

gcc                           3.2.3          gcc

gettext                       0.11.5         gettext

less                          376            less

libiconv                      1.9            libiconv

make                          3.80           make

ncurses                       5.2            ncurses

termcap                       1.3.1          termcap

zsh                           4.0.7          zsh

[/]# swlist BUNDLE

# Initializing...

# Contacting target "ape"...

#

# Target:  ape:/

#

# BUNDLE                B.11.00        Patch Bundle

BUNDLE.PHCO_23651     1.0            fsck_vxfs(1M) cumulative patch

BUNDLE.PHKL_28496     1.0            SCSI IO Subsystem Cumulative Patch

BUNDLE.PHKL_27980     1.0            VxFS 3.1 cumulative patch: CR_EIEM

BUNDLE.PHKL_22840     1.0            IDS/9000; syscalls related to file/socket

BUNDLE.PHCO_28505     1.0            user/group(add/mod/del)(1M) cumulative patch

BUNDLE.PHKL_28150     1.0            LVM Cumulative Patch w/Performance Upgrades

BUNDLE.PHNE_28538     1.0            cumulative ARPA Transport patch

BUNDLE.PHNE_28143     1.0            LAN product cumulative patch

BUNDLE.PHNE_27902     1.0            Cumulative STREAMS Patch

BUNDLE.PHKL_29434     1.0            POSIX AIO;getdirentries;MVFS;rcp;mmap/IDS;

BUNDLE.PHKL_28766     1.0            Probe,IDDS,PM,VM,PA-8700,AIO,T600,FS,PDC,CLK

BUNDLE.PHKL_28004     1.0            Fibre Channel Mass Storage Driver Patch

BUNDLE.PHKL_27729     1.0            ioscan -u incorrect display (kernel patch).

BUNDLE.PHKL_24187     1.0            ioscan performance gain for SCSI Subsystem

BUNDLE.PHKL_24165     1.0            Kernel Patch For "ioscan -k" Performance

BUNDLE.PHKL_23409     1.0            NFS, Large Data Space, kernel memory leak

BUNDLE.PHKL_20016     1.0            2nd CPU not recognized in G70/H70/I70

BUNDLE.PHKL_18543     1.0            PM/VM/UFS/async/scsi/io/DMAPI/JFS/perf patch

BUNDLE.PHCO_27818     1.0            ioscan(1M) cumulative patch

BUNDLE.PHCO_27375     1.0            cumulative SAM/ObAM patch

- Cisco MDS 9216與軟體版本1.2(1a)。

vatican# show module

Mod  Ports  Module-Type                     Model              Status

---  -----  ------------------------------- ------------------ ------------

1    16     1/2 Gbps FC/Supervisor          DS-X9216-K9-SUP    active *

2    8      IP Storage Module               DS-X9308-SMIP      ok

Mod  Sw           Hw      World-Wide-Name(s) (WWN)

---  -----------  ------  --------------------------------------------------

1    1.2(1a)      1.0     20:01:00:0c:30:57:5e:c0 to 20:10:00:0c:30:57:5e:c0

2    1.2(1a)      0.2     20:41:00:0c:30:57:5e:c0 to 20:48:00:0c:30:57:5e:c0

Mod  MAC-Address(es)                         Serial-Num

---  --------------------------------------  ----------

1    00-0b-be-f8-7f-00 to 00-0b-be-f8-7f-04  JAB070804Q3

2    00-05-30-00-a8-56 to 00-05-30-00-a8-62  JAB070205AM

* this terminal session

vatican# show version

Cisco Storage Area Networking Operating System (SAN-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2003 by Cisco Systems, Inc. All rights reserved.

The copyright for certain works contained herein are owned by

Andiamo Systems, Inc. and/or other third parties and are used and

distributed under license.

Software

BIOS:      version 1.0.8

loader:    version 1.1(2)

kickstart: version 1.2(1a)

system:    version 1.2(1a)

BIOS compile time:       08/07/03

kickstart image file is: bootflash:/k121a

kickstart compile time:  9/1/2003 17:00:00

system image file is:    bootflash:/s121a

system compile time:     9/1/2003 17:00:00

Hardware

RAM 963108 kB

bootflash: 500736 blocks (block size 512b)

slot0:          0 blocks (block size 512b)

vatican uptime is 1 days 6 hours 17 minute(s) 25 second(s)

Last reset at 955065 usecs after Wed Sep 10 08:13:50 2003

Reason: Reset Requested by CLI command reload

System version: 1.1(2)

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

本文中所用的Cisco MDS 9000是指MDS 9000系列(MDS 9506、MDS 9509、MDS 9216)中的任何光纖通道(FC)交換機產品。 思科入侵防禦系統(IPS)刀片指的是IP儲存服務模組。如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

背景資訊

思科入侵防禦系統(IPS)模組為IP主機提供對光纖通道(FC)儲存裝置的訪問。IPS模組是DS-X9308-SIMP。它提供透明的SCSI路由。使用iSCSI協定的IP主機可以透明地訪問FC網路上的iSCSI目標IP主機通過TCP/IP連線將封裝在iSCSI協定資料單元(PDU)中的SCSI命令傳送到MDS 9000 IPS埠。在IPS模組上，連線以正確配置的GE介面的形式提供。IPS模組使您能夠建立虛擬iSCSI目標並將它們對映到FC SAN中可用的物理FC目標。它向IP主機顯示FC目標，就像物理目標已連線到IP網路一樣。

需要通過IPS模組訪問儲存裝置的每個iSCSI主機都需要安裝相容的iSCSI驅動程式。藉助iSCSI協定，iSCSI驅動程式允許iSCSI主機通過IP網路傳輸SCSI請求和響應。從主機作業系統的角度來看，iSCSI驅動程式似乎是SCSI傳輸驅動程式，類似於主機中外圍通道的FC驅動程式。從儲存裝置的角度來看，每個IP主機都顯示為FC主機。將SCSI從IP主機路由到FC儲存裝置包含以下主要操作：

- 通過IP網路在主機和IPS模組之間傳輸iSCSI請求和響應

- 在IP網路上的主機和FC儲存裝置之間路由SCSI請求和響應（將iSCSI轉換為FCP，將FCP轉換為iSCSI）。 此路由由IPS模組執行。

- 在IPS模組和FC儲存裝置之間傳輸FCP請求或響應

預設情況下，IPS模組不會將FC目標匯入iSCSI。在IPS模組使FC目標可用於iSCSI啟動器之前，必須配置動態或靜態對映。當兩者都配置時，靜態對映的FC目標具有已配置的名稱。本文提供靜態對映的示例。使用動態對映時，每次iSCSI主機連線到IPS模組時，都會建立一個新的FC N埠，並為此N埠分配的nWWN和pWWN可能不同。如果需要在iSCSI主機每次連線到IPS模組時獲得相同的nWWN和pWWN ，請使用靜態對映方法。可以在IPS模組上使用靜態對映來訪問智慧FC儲存陣列，這些儲存陣列具有基於啟動器的pWWN或nWWN的訪問控制和邏輯單元號(LUN)對映和掩蔽配置。

您可以通過建立目標通告所在的IPS埠的特定清單以及建立允許訪問目標的iSCSI啟動器節點名稱清單來控制對每個靜態對映的iSCSI目標的訪問。基於FC分割槽的訪問控制和基於iSCSI的訪問控制是為iSCSI提供訪問控制的兩種機制。這兩種方法可以同時使用。在此配置中，允許特定VSAN的預設分割槽。IPS模組使用基於iSCSI節點名稱的訪問控制清單和基於FC分割槽的訪問控制清單，在iSCSI發現和iSCSI會話建立期間實施訪問控制。

- iSCSI發現：當iSCSI主機建立iSCSI發現會話並查詢所有iSCSI目標時，IPS模組僅返回該iSCSI主機根據訪問控制策略被允許訪問的iSCSI目標清單。

- iSCSI會話建立：當IP主機發起iSCSI會話時，IPS模組驗證指定的iSCSI目標（在會話登入請求中）是否為靜態對映目標，如果為true，則驗證是否允許IP主機的iSCSI節點名稱訪問目標。如果IP主機沒有存取許可權，則其登入會遭到拒絕。

然後，IPS模組建立此IP主機的FC虛擬N埠（N埠可能已經存在），並執行FC名稱伺服器查詢，以獲取IP主機訪問的FC目標pWWN的FCID。它使用IP主機虛擬N埠的pWWN作為名稱伺服器查詢的請求者。因此，名稱伺服器對pWWN執行區域強制查詢並響應查詢。如果名稱伺服器返回FCID，則接受iSCSI會話。否則，登入請求將被拒絕。

設定

本節提供用於配置MDS 9216和Cisco iSCSI Driver for Linux的資訊。

注意：要查詢有關本文檔中使用的命令的其他資訊，請使用Cisco MDS 9000系列命令參考和Cisco MDS 9000系列軟體配置指南。

網路圖表

本檔案會使用下圖所示的網路設定：

組態

本檔案使用如下所示的組態：

- Ape(HP 9000/800 A500 HP-UX 11.00)

- 梵蒂岡(MDS 9216)

Ape(HP 9000/800 A500 HP-UX 11.00)

On the HP-UX host only the file /etc/iscsi.conf has to be modified:

[/]# cat /etc/iscsi.conf

# iSCSI configuration file - see iscsi.conf(4)

# DiscoveryAddress Settings

# -------------------------

# Add "DiscoveryAddress=xxx" entries for each iSCSI router instance.

# The driver attempts to discover iSCSI targets at that address

# and make as many targets as possible available for use.

# 'xxx' can be an IP address or a hostname.  A TCP port number can be

# specified by appending a colon and the port number to the address.

# All entries have to start in column one and must not contain any

# whitespace.

#

# Example:

#

# DiscoveryAddress=scsirouter1

DiscoveryAddress=10.48.69.242

!--- Configure the IP address of the GE interface that acceps iSCSI request from your host.

# The DiscoveryAddress Settings can take following entry.

#

# 1) Authentication Settings

# 2) ConnectionTimeout Settings

!--- Other required driver parameters could be changed in the iscsi.conf file.

......

[/]# cat /etc/iscsi.bindings

# iSCSI bindings, file format version 1.0.

# NOTE: this file is automatically maintained by the iSCSI daemon.

# You do not need to edit this file under most circumstances.

# If iSCSI targets in this file have been permanently deleted, you

# may wish to delete the bindings for the deleted targets.

#

# Format:

# bus   target  iSCSI

# id    id      TargetName

#

[...]

0       10      seagate

0       11      spa-vt

!--- The iSCSI driver discovery daemon process looks up each discovered !--- target in the /etc/iscsi.bindings file. If an entry exists in the file for the target, !--- the corresponding SCSI target ID is assigned to the target. If no entry !--- exists for the target, the smallest available SCSI target ID is assigned !--- and an entry is written to the /etc/iscsi.bindings file for this target.

!--- Note that the /etc/iscsi.bindings file permanently contains entries !--- for all iSCSI targets ever logged into from this host. If a target is !--- no longer available to a host, you can manually edit the file and remove !--- entries so that the obsolete target no longer consumes a SCSI target ID. !--- If you know the iSCSI target name of a target in advance, and you want !--- it to be assigned a particular SCSI target ID, you can add an entry !--- manually. You must stop the iSCSI driver before editing the !--- /etc/iscsi.bindings file. The maximum number of targets is 14.

!--- Enter [/]#/sbin/init.d/iscsi start to manually start the iSCSI driver.

!--- Enter [/]#/sbin/init.d/iscsi stop to manually stop the iSCSI driver.

梵蒂岡(Cisco MDS 9216)

!--- If you are starting from the factory default configuration, you !--- need to setup the IP address and mask of the management interface. !--- This would normally be done during the initial setup

.

interface mgmt0

ip address 10.48.69.156 255.255.255.192

!--- In this configuration example, all the iSCSI targets are in a single vsan

.

vsan database

vsan 1016

vsan 1016 interface fc1/3

vsan 1016 interface fc1/7

!--- These are the boot variables.

boot system bootflash:/s111a

boot kickstart bootflash:/k111a

# Simple IP configuration

ip domain-name cisco.com

ip name-server 144.254.10.123

ip default-gateway 10.48.69.129

!--- Declare that the iSCSI initiator with the IP address of the host.

# It belongs to the vsan of our choice

iscsi authentication none

iscsi initiator ip-address 10.48.69.238

vsan 1016

!--- Define the first virtual target, it is a JBOD. Identify the target !--- by its pWWN, advertise it on a GE interface, and allow access to the initiator.

iscsi virtual-target name seagate

pWWN 21:00:00:20:37:67:f7:a2

advertise interface  GigabitEthernet2/1

initiator ip address 10.48.69.238 permit

!--- The second target is a Clariion disk array. Since the maximum LUN number that you !--- can have under HP-UX without additional software is 7, define a mapping from FC LUN numbers !--- to the iSCSI LUN numbers you are going to present to the host.

iscsi virtual-target name spa-vt

pWWN 50:06:01:60:88:02:a8:2b fc-lun 0020 iscsi-lun 0003

pWWN 50:06:01:60:88:02:a8:2b fc-lun 0021 iscsi-lun 0004

advertise interface  GigabitEthernet2/1

initiator ip address 10.48.69.238 permit

!--- Permit access to the targets on the FC level. Create a simple zone configuration to do this. !--- Alternatively, you could have simply set the default zoning policy in vsan 1016 to permit.

zone name jbod vsan 1016

member pwwn 21:00:00:20:37:67:f7:a2

member symbolic-nodename 10.48.69.238

zone name spa vsan 1016

member pwwn 50:06:01:60:88:02:a8:2b

member symbolic-nodename 10.48.69.238

zoneset name iscsidoc vsan 1016

member jbod

member spa

zoneset  activate name iscsidoc vsan 1016

!--- Set the IP address and mask of the GE interface and enable it.

interface GigabitEthernet2/1

ip address 10.48.69.242 255.255.255.192

iscsi authentication none

no shutdown

# Lastly we bring up the iSCSI interface up

interface iscsi2/1

no shutdown

驗證

本節提供的資訊可用於確認您的組態是否正常運作，以及排解疑難，以免您發現問題。

命令查詢工具(僅供註冊客戶使用)支援某些show命令，此工具允許您檢視show命令輸出的分析。

HP-UX主機命令

- netstat-n或lsof — 驗證TCP連線。

- iscsi-ls — 顯示當前可用的裝置。

- dmesg — 收集診斷消息。

MDS/IPS-8命令

- show zone — 顯示區域資訊。

- show flogi database — 顯示FLOGI伺服器資訊。

- show fcns database — 顯示特定VSAN的名稱伺服器資訊。

- show vsan membership — 顯示不同VSAN的介面資訊。

- show iscsi — 顯示各種iSCSI資訊。

- show ips — 顯示有關IP服務的各種資訊。

- show scsi-target — 顯示特定VSAN的SCSI裝置（用於將FC-LUN對映到iSCSI-LUN）。

- show interface — 顯示有關各種介面的資訊。

- show ip route — 顯示IP路由資訊。

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

以下是與此組態相關的疑難排解資訊：

- 從Ape顯示(HP 9000/800 A500 HP-UX 11.00)

- 梵蒂岡顯示器(MDS 9216)

- Fabric Manager和Device Manager顯示

Ape(HP 9000/800 A500 HP-UX 11.00)

# /sbin/init.d/iscsi stop

Waiting for iscsid to terminate .....

Waiting for iscsid to terminate .....

Waiting for iscsid to terminate .....

Waiting for iscsid to terminate .....

Waiting for iscsi_[tr]x_threads to terminate .....

[/]# /sbin/init.d/iscsi start

Number of indices in scsi_isc table used by System: 5

Index used by iSCSI controller: 255

Number of free indices: 251

[/]# netstat -n | grep '10.48.69.242'

tcp        0      0  10.48.69.238.49501     10.48.69.242.3260       ESTABLISHED

tcp        0      0  10.48.69.238.49500     10.48.69.242.3260       ESTABLISHED

tcp        0      0  10.48.69.238.49499     10.48.69.242.3260       ESTABLISHED

!--- If you have lsof, you can also try the following:

[/]# lsof -i @10.48.69.242

COMMAND  PID USER   FD   TYPE     DEVICE SIZE/OFF NODE NAME

iscsid  2836 root    1u  inet 0x41aa9268   0t1300  TCP ape.cisco.com:49499->10.48.69.242:3260 (ESTABLISHED)

!--- Note that ioscan does not report iSCSI devices. To see the list

!--- of available iSCSI devices from the host, issue the iscsi-ls command.

[/]# iscsi-ls -l

#############################################################

TARGET NAME      = seagate

TARGET ID        = 10

ADDRESS          = 10.48.69.242:3260,128

STATUS           = CONNECTED 10.48.69.238:49501 <-> 10.48.69.242:3260

9/19/2003 15:40:42

SESSION          = ISID 00023d000001 TSID 80

LUN     0        = DISK  c255t10d0  'SEAGATE  ST318203FC      0004'

BLOCKS : 35566479  BLOCKSIZE : 512 CAPACITY : 17366.00MB

#############################################################

TARGET NAME      = spa-vt

TARGET ID        = 11

ADDRESS          = 10.48.69.242:3260,128

STATUS           = CONNECTED 10.48.69.238:49500 <-> 10.48.69.242:3260

9/19/2003 15:40:42

SESSION          = ISID 00023d000001 TSID 80

LUN     4        = DISK  c255t11d4  'DGC      RAID 1          0632'

BLOCKS : 6291419  BLOCKSIZE : 512 CAPACITY : 3071.00MB

LUN     3        = DISK  c255t11d3  'DGC      RAID 1          0632'

BLOCKS : 10485607  BLOCKSIZE : 512 CAPACITY : 5119.00MB

!--- To see detailed statistics for currently established iSCSI sessions, use this:

[/]# iscsi-ls -c

#############################################################

TARGET NAME      = seagate

TARGET ID        = 10

ADDRESS          = 10.48.69.242:3260,128

STATUS           = CONNECTED 10.48.69.238:49501 <-> 10.48.69.242:3260

9/19/2003 15:40:42

SESSION          = ISID 00023d000001 TSID 80

InitialR2T       = Yes

FirstBurstLength = 262144 Bytes

MaxBurstLength   = 16776192 Bytes

Header Digest    = 1

Data Digest      = 1

Login Timeout    = 15 Seconds

Auth Timeout     = 45 Seconds

Active Timeout   = 5 Seconds

Idle Timeout     = 60 Seconds

Ping Timeout     = 5 Seconds

#############################################################

TARGET NAME      = spa-vt

TARGET ID        = 11

ADDRESS          = 10.48.69.242:3260,128

STATUS           = CONNECTED 10.48.69.238:49500 <-> 10.48.69.242:3260

9/19/2003 15:40:42

SESSION          = ISID 00023d000001 TSID 80

InitialR2T       = Yes

FirstBurstLength = 262144 Bytes

MaxBurstLength   = 16776192 Bytes

Header Digest    = 1

Data Digest      = 1

Login Timeout    = 15 Seconds

Auth Timeout     = 45 Seconds

Active Timeout   = 5 Seconds

Idle Timeout     = 60 Seconds

Ping Timeout     = 5 Seconds

!--- Here are some of the entries you can expect to find in the syslog:

[/]# dmesg

[...]

iSCSI: session 0x4179b000 target 11 accepted the preferred value (None) DataDigest=CRC32C

iSCSI: session 0x41a64800 target 10 accepted the preferred value (None) DataDigest=CRC32C

iSCSI: Direct Access Device found at lun 3 on target 11

Vendor Id  : DGC

Product Id : RAID 1                     Product Rev: 0632

iSCSI: Direct Access Device found at lun 0 on target 10

Vendor Id  : SEAGATE

Product Id : ST318203FC                 Product Rev: 0004

iSCSI: Direct Access Device found at lun 4 on target 11

Vendor Id  : DGC

Product Id : RAID 1                     Product Rev: 0632

iSCSI: iscsi_recv_cmd: session (0x4179b000) recv_cmd(sc) (0x41844800), Cmd 0x25, status 0x2,

senselen 18, sense key 06, ASC/ASCQ 29/00, task (0x40718b00) to (host 255 target 11 lun 3),

TargetAlias spa-vt

Sense 70000600 0000000a 00000000 29000000 0000

READ_CAPACITY result = 0x2 Target = 0xb LUN = 0x3

iSCSI: iscsi_recv_cmd: task (0x40718b00) itt 9 to (host 255 target 11 lun 3), Cmd 0x25,

U(Overflow/Underflow) underflow, received 0(task->rxdata), residual 8, expected 8

iSCSI: iscsi_recv_cmd: session (0x4179b000) recv_cmd(sc) (0x41844800), Cmd 0x25, status 0x2, senselen 18,

sense key 06, ASC/ASCQ 29/00, task (0x40718c00) to (host 255 target 11 lun 4), TargetAlias spa-vt

Sense 70000600 0000000a 00000000 29000000 0000

READ_CAPACITY result = 0x2 Target = 0xb LUN = 0x4

iSCSI: iscsi_recv_cmd: task (0x40718c00) itt 11 to (host 255 target 11 lun 4), Cmd 0x25,

U(Overflow/Underflow) underflow, received 0(task->rxdata), residual 8, expected 8

梵蒂岡顯示器(MDS 9216)

vatican# show zone status vsan 1016

VSAN: 1016 default-zone: deny distribute: active only Interop: Off

Full Zoning Database :

Zonesets:1  Zones:3 Aliases: 0

Active Zoning Database :

Name: iscsidoc  Zonesets:1  Zones:3

Status: Activation completed at Wed Sep 17 13:03:56 2003

vatican# show zone active vsan 1016

zone name jbod vsan 1016

* fcid 0x7902e8 [pwwn 21:00:00:20:37:67:f7:a2]

* fcid 0x790100 [symbolic-nodename 10.48.69.238]

zone name spa vsan 1016

* fcid 0x790104 [pwwn 50:06:01:60:88:02:a8:2b]

* fcid 0x790100 [symbolic-nodename 10.48.69.238]

zone name spb vsan 1016

* fcid 0x790105 [pwwn 50:06:01:68:88:02:a8:2b]

* fcid 0x790100 [symbolic-nodename 10.48.69.238]

vatican# show flogi database vsan 1016

---------------------------------------------------------------------------

INTERFACE  VSAN    FCID            PORT NAME               NODE NAME

---------------------------------------------------------------------------

fc1/3      1016  0x7902e8  21:00:00:20:37:67:f7:a2  20:00:00:20:37:67:f7:a2

fc1/7      1016  0x790104  50:06:01:60:88:02:a8:2b  50:06:01:60:11:02:a8:2b

fc1/11     1016  0x790105  50:06:01:68:88:02:a8:2b  50:06:01:60:11:02:a8:2b

iscsi2/1   1016  0x790100  20:03:00:0c:30:57:5e:c2  20:02:00:0c:30:57:5e:c2

Total number of flogi = 4.

vatican# show fcns database vsan 1016

VSAN 1016:

--------------------------------------------------------------------------

FCID        TYPE  PWWN                    (VENDOR)        FC4-TYPE:FEATURE

--------------------------------------------------------------------------

0x790100    N     20:03:00:0c:30:57:5e:c2 (Cisco)         scsi-fcp:init isc..w

0x790104    N     50:06:01:60:88:02:a8:2b (Clariion)      scsi-fcp:target

0x790105    N     50:06:01:68:88:02:a8:2b (Clariion)      scsi-fcp:target

0x7902e8    NL    21:00:00:20:37:67:f7:a2 (Seagate)       scsi-fcp:target

Total number of entries = 4

--- FCID 0X790100 is the virtual N port(HBA) for the iSCSI host.

vatican# show fcns database detail vsan 1016

------------------------

VSAN:1016  FCID:0x790100

------------------------

port-wwn (vendor)     :20:03:00:0c:30:57:5e:c2 (Cisco)

node-wwn              :20:02:00:0c:30:57:5e:c2

class                 :2,3

node-ip-addr          :10.48.69.238

ipa                   :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:init iscsi-gw

symbolic-port-name    :

symbolic-node-name    :10.48.69.238

port-type             :N

port-ip-addr          :0.0.0.0

fabric-port-wwn       :20:41:00:0c:30:57:5e:c0

hard-addr             :0x000000

------------------------

VSAN:1016  FCID:0x790104

------------------------

port-wwn (vendor)     :50:06:01:60:88:02:a8:2b (Clariion)

node-wwn              :50:06:01:60:11:02:a8:2b

class                 :3

node-ip-addr          :0.0.0.0

ipa                   :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:target

symbolic-port-name    :

symbolic-node-name    :

port-type             :N

port-ip-addr          :0.0.0.0

fabric-port-wwn       :20:07:00:0c:30:57:5e:c0

hard-addr             :0x000000

------------------------

VSAN:1016  FCID:0x790105

------------------------

port-wwn (vendor)     :50:06:01:68:88:02:a8:2b (Clariion)

node-wwn              :50:06:01:60:11:02:a8:2b

class                 :3

node-ip-addr          :0.0.0.0

ipa                   :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:target

symbolic-port-name    :

symbolic-node-name    :

port-type             :N

port-ip-addr          :0.0.0.0

fabric-port-wwn       :20:0b:00:0c:30:57:5e:c0

hard-addr             :0x000000

------------------------

VSAN:1016  FCID:0x7902e8

------------------------

port-wwn (vendor)     :21:00:00:20:37:67:f7:a2 (Seagate)

node-wwn              :20:00:00:20:37:67:f7:a2

class                 :3

node-ip-addr          :0.0.0.0

ipa                   :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:target

symbolic-port-name    :

symbolic-node-name    :

port-type             :NL

port-ip-addr          :0.0.0.0

fabric-port-wwn       :20:03:00:0c:30:57:5e:c0

hard-addr             :0x000000

Total number of entries = 4

vatican# show iscsi initiator

iSCSI Node name is 10.48.69.238

iSCSI Initiator name: iqn.1987-05.com.cisco.01.a06c4e2b8b247cadceb8af1a8474da1e

iSCSI alias name: ape

Node WWN is 20:02:00:0c:30:57:5e:c2 (dynamic)

Member of vsans: 1016

Number of Virtual n_ports: 1

Virtual Port WWN is 20:03:00:0c:30:57:5e:c2 (dynamic)

Interface iSCSI 2/1, Portal group tag: 0x80

VSAN ID 1016, FCID 0x790100

vatican# show iscsi initiator configured

iSCSI Node name is 10.48.69.238

Member of vsans: 1016

vatican# show iscsi initiator detail

iSCSI Node name is 10.48.69.238

iSCSI Initiator name: iqn.1987-05.com.cisco.01.a06c4e2b8b247cadceb8af1a8474da1e

iSCSI alias name: ape

Node WWN is 20:02:00:0c:30:57:5e:c2 (dynamic)

Member of vsans: 1016

Number of Virtual n_ports: 1

Virtual Port WWN is 20:03:00:0c:30:57:5e:c2 (dynamic)

Interface iSCSI 2/1, Portal group tag is 0x80

VSAN ID 1016, FCID 0x790100

2 FC sessions, 2 iSCSI sessions

iSCSI session details

Target: spa-vt

Statistics:

PDU: Command: 10, Response: 10

Bytes: TX: 416, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.242:3260, Remote 10.48.69.238:49500

Path MTU: 1500 bytes

Retransmission timeout: 300 ms

Round trip time: Smoothed 62 ms, Variance: 3

Advertized window: Current: 256 KB, Maximum: 256 KB, Scale: 3

Peer receive window: Current: 576 KB, Maximum: 576 KB, Scale: 4

Congestion window: Current: 4 KB

Target: seagate

Statistics:

PDU: Command: 4, Response: 4

Bytes: TX: 304, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.242:3260, Remote 10.48.69.238:49501

Path MTU: 1500 bytes

Retransmission timeout: 300 ms

Round trip time: Smoothed 62 ms, Variance: 3

Advertized window: Current: 256 KB, Maximum: 256 KB, Scale: 3

Peer receive window: Current: 576 KB, Maximum: 576 KB, Scale: 4

Congestion window: Current: 4 KB

FCP Session details

Target FCID: 0x790104 (S_ID of this session: 0x790100)

pWWN: 50:06:01:60:88:02:a8:2b, nWWN: 50:06:01:60:11:02:a8:2b

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: spa-vt

Negotiated parameters

RcvDataFieldSize 1024 our_RcvDataFieldSize 1392

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 10

Target FCID: 0x7902e8 (S_ID of this session: 0x790100)

pWWN: 21:00:00:20:37:67:f7:a2, nWWN: 20:00:00:20:37:67:f7:a2

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: seagate

Negotiated parameters

RcvDataFieldSize 1392 our_RcvDataFieldSize 1392

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 4

vatican# show iscsi initiator iscsi-session detail

iSCSI Node name is 10.48.69.238

iSCSI Initiator name: iqn.1987-05.com.cisco.01.a06c4e2b8b247cadceb8af1a8474da1e

iSCSI alias name: ape

Node WWN is 20:02:00:0c:30:57:5e:c2 (dynamic)

Member of vsans: 1016

Number of Virtual n_ports: 1

Virtual Port WWN is 20:03:00:0c:30:57:5e:c2 (dynamic)

Interface iSCSI 2/1, Portal group tag is 0x80

VSAN ID 1016, FCID 0x790100

2 FC sessions, 2 iSCSI sessions

iSCSI session details

Target: spa-vt

Statistics:

PDU: Command: 10, Response: 10

Bytes: TX: 416, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.242:3260, Remote 10.48.69.238:49500

Path MTU: 1500 bytes

Retransmission timeout: 300 ms

Round trip time: Smoothed 62 ms, Variance: 2

Advertized window: Current: 256 KB, Maximum: 256 KB, Scale: 3

Peer receive window: Current: 576 KB, Maximum: 576 KB, Scale: 4

Congestion window: Current: 4 KB

Target: seagate

Statistics:

PDU: Command: 4, Response: 4

Bytes: TX: 304, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.242:3260, Remote 10.48.69.238:49501

Path MTU: 1500 bytes

Retransmission timeout: 300 ms

Round trip time: Smoothed 62 ms, Variance: 2

Advertized window: Current: 256 KB, Maximum: 256 KB, Scale: 3

Peer receive window: Current: 576 KB, Maximum: 576 KB, Scale: 4

Congestion window: Current: 4 KB

vatican# show iscsi initiator fcp-session detail

iSCSI Node name is 10.48.69.238

iSCSI Initiator name: iqn.1987-05.com.cisco.01.a06c4e2b8b247cadceb8af1a8474da1e

iSCSI alias name: ape

Node WWN is 20:02:00:0c:30:57:5e:c2 (dynamic)

Member of vsans: 1016

Number of Virtual n_ports: 1

Virtual Port WWN is 20:03:00:0c:30:57:5e:c2 (dynamic)

Interface iSCSI 2/1, Portal group tag is 0x80

VSAN ID 1016, FCID 0x790100

2 FC sessions, 2 iSCSI sessions

FCP Session details

Target FCID: 0x790104 (S_ID of this session: 0x790100)

pWWN: 50:06:01:60:88:02:a8:2b, nWWN: 50:06:01:60:11:02:a8:2b

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: spa-vt

Negotiated parameters

RcvDataFieldSize 1024 our_RcvDataFieldSize 1392

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 10

Target FCID: 0x7902e8 (S_ID of this session: 0x790100)

pWWN: 21:00:00:20:37:67:f7:a2, nWWN: 20:00:00:20:37:67:f7:a2

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: seagate

Negotiated parameters

RcvDataFieldSize 1392 our_RcvDataFieldSize 1392

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 4

vatican# show iscsi virtual-target configured

target: seagate

* Port WWN 21:00:00:20:37:67:f7:a2

=== The "*" means you have both discovery and target session. If there

is no "*" in front of the pWWN, it means you only have discovery session.

Configured node

No. of LU mapping: 1

iSCSI LUN: 0000, FC LUN: 0000

No. of advertised interface: 1

GigabitEthernet 2/1

No. of initiators permitted: 1

initiator 10.48.69.238/32 is permitted

all initiator permit is disabled

target: spa-vt

* Port WWN 50:06:01:60:88:02:a8:2b

Secondary PWWN 50:06:01:68:88:02:a8:2b

Configured node

No. of LU mapping: 2

iSCSI LUN: 0003, FC LUN: 0020

iSCSI LUN: 0004, FC LUN: 0021

No. of advertised interface: 1

GigabitEthernet 2/1

No. of initiators permitted: 1

initiator 10.48.69.238/32 is permitted

all initiator permit is disabled

vatican# show iscsi stats iscsi 2/1

iscsi2/1

5 minutes input rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

5 minutes output rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

iSCSI statistics

50932 packets input, 60370640 bytes

Command 3659 pdus, Data-out 41069 pdus, 56533832 bytes, 2476 fragments

output 115926 packets, 112863536 bytes

Response 3374 pdus (with sense 206), R2T 1897 pdus

Data-in 103999 pdus, 106404584 bytes

vatican# show ips arp interface gigabitethernet 2/1

Protocol         Address   Age (min)   Hardware Addr  Type   Interface

Internet    10.48.69.200        0     0008.e21e.c7bc  ARPA  GigabitEthernet2/1

Internet    10.48.69.201        5     0202.3d30.45c9  ARPA  GigabitEthernet2/1

Internet    10.48.69.206        5     0202.3d30.45ce  ARPA  GigabitEthernet2/1

Internet    10.48.69.209        3     0202.3d30.45d1  ARPA  GigabitEthernet2/1

Internet    10.48.69.226        2     0060.08f6.bc1a  ARPA  GigabitEthernet2/1

Internet    10.48.69.229        4     0800.209e.edab  ARPA  GigabitEthernet2/1

Internet    10.48.69.231        1     0002.b3c1.7dab  ARPA  GigabitEthernet2/1

Internet    10.48.69.233        0     0010.4200.7d5b  ARPA  GigabitEthernet2/1

Internet    10.48.69.238        0     0030.6e1b.6f51  ARPA  GigabitEthernet2/1

Internet    10.48.69.239       10     0030.6e1c.a00b  ARPA  GigabitEthernet2/1

Internet    10.48.69.241        0     000b.cdaf.b4c3  ARPA  GigabitEthernet2/1

Internet    10.48.69.248        4     0202.3d30.45f8  ARPA  GigabitEthernet2/1

Internet    10.48.69.252        1     0202.3d30.45fc  ARPA  GigabitEthernet2/1

Internet      10.10.2.28        7     0202.3d0a.021c  ARPA  GigabitEthernet2/1

vatican# show ips stats tcp interface gigabitethernet 2/1 detail

TCP Statistics for port GigabitEthernet2/1

TCP send stats

261205 segments, 117757220 bytes

140632 data, 51907 ack only packets

2655 control (SYN/FIN/RST), 0 probes, 2639 window updates

63382 segments retransmitted, 90885612 bytes

63382 retransmitted while on ethernet send queue, 1 packets split

13327 delayed acks sent

TCP receive stats

249073 segments, 72669 data packets in sequence, 61525764 bytes in sequence

2335 predicted ack, 68605 predicted data

0 bad checksum, 0 multi/broadcast, 0 bad offset

0 no memory drops, 0 short segments

4396 duplicate bytes, 205 duplicate packets

0 partial duplicate bytes, 0 partial duplicate packets

0 out-of-order bytes, 2625 out-of-order packets

0 packet after window, 0 bytes after window

0 packets after close

80504 acks, 117762158 ack bytes, 0 ack toomuch, 96274 duplicate acks

0 ack packets left of snd_una, 7 non-4 byte aligned packets

54199 window updates, 0 window probe

6343 pcb hash miss, 709 no port, 6 bad SYN, 0 paws drops

TCP Connection Stats

0 attempts, 2718 accepts, 2718 established

2716 closed, 15 drops, 0 conn drops

3 drop in retransmit timeout, 10 drop in keepalive timeout

0 drop in persist drops, 0 connections drained

TCP Miscellaneous Stats

37062 segments timed, 41787 rtt updated

817 retransmit timeout, 1 persist timeout

22654 keepalive timeout, 22643 keepalive probes

TCP SACK Stats

0 recovery episodes, 0 data packets, 0 data bytes

0 data packets retransmitted, 0 data bytes retransmitted

0 connections closed, 0 retransmit timeouts

TCP SYN Cache Stats

2720 entries, 2718 connections completed, 0 entries timed out

0 dropped due to overflow, 2 dropped due to RST

0 dropped due to ICMP unreach, 0 dropped due to bucket overflow

0 abort due to no memory, 2 duplicate SYN, 183 no-route SYN drop

0 hash collisions, 0 retransmitted

TCP Active Connections

Local  Address        Remote Address        State      Send-Q   Recv-Q

10.48.69.242:3260     10.48.69.238:49499    ESTABLISH  0        0

10.48.69.242:3260     10.48.69.238:49500    ESTABLISH  0        0

10.48.69.242:3260     10.48.69.238:49501    ESTABLISH  0        0

0.0.0.0:3260          0.0.0.0:0             LISTEN     0        0

vatican# discover scsi-target local

discovery started

vatican# show scsi-target devices vsan 1016

--------------------------------------------------------------------------------

VSAN    FCID        PWWN                      VENDOR    MODEL             REV

--------------------------------------------------------------------------------

1016    0x790104    50:06:01:60:88:02:a8:2b   DGC       RAID 0            0632

1016    0x7902e8    21:00:00:20:37:67:f7:a2   SEAGATE   ST318203FC        0004

vatican# show scsi-target lun vsan 1016

- RAID from DGC (Rev 0632)

FCID is 0x790104 in VSAN 1016, PWWN is 50:06:01:60:88:02:a8:2b

------------------------------------------------------------------------------

LUN    Capacity  Status  Serial Number    Device-Id

(MB)

------------------------------------------------------------------------------

0x0    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

da:05:b6:a9:b6:9d:7b:00

C:1 A:0 T:0 00:00:00:00

0x1    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

6a:66:0d:74:cb:33:88:6c

C:1 A:0 T:0 00:01:00:00

0x2    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

ec:81:5b:a2:c4:43:0d:8a

C:1 A:0 T:0 00:02:00:00

0x3    2147      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

e0:47:b3:be:3b:00:e0:d5

C:1 A:0 T:0 00:03:00:00

0x4    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

00:51:5b:7f:3d:9a:7b:ce

C:1 A:0 T:0 00:04:00:00

0x5    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

ab:b1:ae:80:59:c0:fc:f0

C:1 A:0 T:0 00:05:00:00

0x6    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

ad:91:58:af:d2:fd:c7:47

C:1 A:0 T:0 00:06:00:00

0x7    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

b1:ef:e7:6c:44:5c:16:97

C:1 A:0 T:0 00:07:00:00

0x8    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

84:4f:09:60:30:1e:fc:50

C:1 A:0 T:0 00:08:00:00

0x9    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

aa:6d:e2:0e:ce:7a:cc:21

C:1 A:0 T:0 00:09:00:00

0xa    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

5b:66:67:89:6c:f2:d1:56

C:1 A:0 T:0 00:0a:00:00

0xb    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

a9:32:bd:04:4a:bb:3d:9b

C:1 A:0 T:0 00:0b:00:00

0xc    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

cd:d9:96:f7:57:3f:07:0c

C:1 A:0 T:0 00:0c:00:00

0xd    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

0c:e5:ba:39:68:ca:d6:f0

C:1 A:0 T:0 00:0d:00:00

0xe    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

60:6e:ee:76:98:fc:ab:97

C:1 A:0 T:0 00:0e:00:00

0xf    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

8b:58:80:7b:12:fb:6b:12

C:1 A:0 T:0 00:0f:00:00

0x10   1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

a1:2f:6d:b0:c3:d6:c2:46

C:1 A:0 T:0 00:10:00:00

0x11   1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

2c:48:c4:74:25:4b:26:dd

C:1 A:0 T:0 00:11:00:00

0x20   5369      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

ba:18:6a:40:22:40:94:75

C:1 A:0 T:0 00:20:00:00

0x21   3221      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

74:d2:42:9e:31:8d:ff:86

C:1 A:0 T:0 00:21:00:00

- ST318203FC from SEAGATE (Rev 0004)

FCID is 0x7902e8 in VSAN 1016, PWWN is 21:00:00:20:37:67:f7:a2

------------------------------------------------------------------------------

LUN    Capacity  Status  Serial Number    Device-Id

(MB)

------------------------------------------------------------------------------

0x0    18210     Online  LRE8091500007039 C:1 A:0 T:3 20:00:00:20:37:67:f7:a2

vatican# show interface iscsi 2/1

iscsi2/1 is up

Hardware is GigabitEthernet

Port WWN is 20:41:00:0c:30:57:5e:c0

Admin port mode is ISCSI

Port mode is ISCSI

Speed is 1 Gbps

iSCSI initiator is identified by name

Number of iSCSI session: 0, Number of TCP connection: 0

Configured TCP parameters

Local Port is 3260

PMTU discover is enabled, reset timeout is 3600 sec

Keepalive-timeout is 60 sec

Minimum-retransmit-time is 300 ms

Max-retransmissions 4

Sack is disabled

Maximum allowed bandwidth is 500000 kbps

Minimum available bandwidth is 500000 kbps

Estimated round trip time is 10000 usec

5 minutes input rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

5 minutes output rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

iSCSI statistics

Input 50920 packets, 60370032 bytes

Command 3659 pdus, Data-out 41069 pdus, 56533832 bytes fragments 2476

Output 115914 packets, 112862928 bytes

Response 3374 pdus (with sense 206), R2T 1897 pdus

Data-in 103999 pdus, 106404584 bytes

vatican# show interface gigabitethernet 2/1

GigabitEthernet2/1 is up

Hardware is GigabitEthernet, address is 0005.3000.a85a

Internet address is 10.48.69.242/26

MTU 1500  bytes

Port mode is IPS

Speed is 1 Gbps

Beacon is turned off

Auto-Negotiation is turned on

iSCSI authentication: NONE

5 minutes input rate 440 bits/sec, 55 bytes/sec, 0 frames/sec

5 minutes output rate 80 bits/sec, 10 bytes/sec, 0 frames/sec

850346 packets input, 127958119 bytes

6488 multicast frames, 0 compressed

0 input errors, 0 frame, 0 overrun 0 fifo

289960 packets output, 201600774 bytes, 0 underruns

0 output errors, 0 collisions, 0 fifo

0 carrier errors

vatican# show ip route

Codes: C - connected, S - static

Default gateway is 10.48.69.129

C 10.48.69.192/26 is directly connected, gigabitethernet2-1

C 10.48.69.128/26 is directly connected, mgmt0

Fabric Manager和Device Manager顯示

本節提供來自MDS交換矩陣管理器1.2(1a)和裝置管理器1.2(1a)的螢幕截圖。

Fabric Manager中的拓撲圖

裝置管理器

在裝置管理器中選擇FC- > LUN，以顯示LUN的pWWN、LUN ID和容量。

在裝置管理器中選擇IP > -iSCSI以顯示iSCSI會話。