目錄

簡介

開始之前
慣例

必要條件

採用元件

背景理論

設定

網路圖表

組態

驗證

疑難排解

疑難排解程序

Fabric Manager和Device Manager顯示

IBM Shark定義

相關資訊

簡介

Cisco的iSCSI驅動程式位於伺服器上，是iSCSI解決方案的關鍵元件。這些iSCSI驅動程式會攔截SCSI命令，將其封裝到IP資料包中，然後將其重定向到Cisco SN 5420、Cisco SN 5428、Cisco SN5428-2或Cisco MDS/IPS-8。本文檔提供了Solaris iSCSI主機到MDS/IPS-8的配置示例。

開始之前

慣例

本文中所用的Cisco MDS 9000是指MDS 9000系列(MDS 9506、MDS 9509、MDS 9216)中的任何光纖通道(FC)交換機產品。

IPS刀片指的是IP儲存服務模組。如需文件慣例的詳細資訊，請參閱 思科技術提示慣例。

必要條件

安裝與Windows Server 2003版本相容的iSCSI驅動程式。最新版本的驅動程式可以在Cisco.com上的Cisco iSCSI Driver for Windows Server 2003（僅限註冊客戶）頁面上找到。README.txt檔案包含在驅動程式zip(tar)檔案中。自述檔案包含有關許可證協定、驅動程式安裝和配置說明以及驅動程式體系結構技術概述的資訊。

用於Microsoft Windows 2003的Cisco iSCSI驅動程式需要Windows Server 2003 Enterprise Edition、Standard Edition或Web Edition。

採用元件

本檔案中的資訊是根據以下軟體和硬體版本。

- 使用Windows Server 2003 Standard Edition的主機

- 用於Windows Server 2003的Cisco iSCSI驅動程式3.1.2。在「iSCSI配置」視窗的左下角可以看到iSCSI驅動程式版本。

- Cisco MDS 9216與軟體版本1.2(1a)

canterbury# show module

Mod  Ports  Module-Type                     Model              Status

---  -----  ------------------------------- ------------------ ------------

1    16     1/2 Gbps FC/Supervisor          DS-X9216-K9-SUP    active *

2    8      IP Storage Services Module      DS-X9308-SMIP      ok

Mod  Sw           Hw      World-Wide-Name(s) (WWN)

---  -----------  ------  --------------------------------------------------

1    1.2(1a)      1.0     20:01:00:0c:30:6c:24:40 to 20:10:00:0c:30:6c:24:40

2    1.2(1a)      0.3     20:41:00:0c:30:6c:24:40 to 20:48:00:0c:30:6c:24:40

Mod  MAC-Address(es)                         Serial-Num

---  --------------------------------------  ----------

1    00-0b-be-f8-7f-08 to 00-0b-be-f8-7f-0c  JAB070804QK

2    00-05-30-00-ad-e2 to 00-05-30-00-ad-ee  JAB070806SB

* this terminal session

Canterbury#show ver

Cisco Storage Area Networking Operating System (SAN-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2003 by Cisco Systems, Inc. All rights reserved.

The copyright for certain works contained herein are owned by

Andiamo Systems, Inc. and/or other third parties and are used and

distributed under license.

Software

BIOS:      version 1.0.8

loader:    version 1.1(2)

kickstart: version 1.2(1a)

system:    version 1.2(1a)

BIOS compile time:       08/07/03

kickstart image file is: bootflash:/k121a

kickstart compile time:  9/1/2003 17:00:00

system image file is:    bootflash:/s121a

system compile time:     9/1/2003 17:00:00

Hardware

RAM 960080 kB

bootflash: 500736 blocks (block size 512b)

slot0:          0 blocks (block size 512b)

Canterbury uptime is 1 days 12 hours 3 minute(s) 29 second(s)

Last reset at 39578 usecs after Mon Oct 13 07:32:38 2003

Reason: Reset Requested by CLI command reload

System version: 1.2(1a)

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您在即時網路中工作，請確保在使用任何命令之前瞭解其潛在影響。

背景理論

IP儲存模組為IP主機提供對FC儲存裝置的訪問。IPS模組是DS-X9308-SIMP。它提供透明的SCSI路由。使用iSCSI協定的IP主機可以透明地訪問FC網路上的SCSI(FCP)目標IP主機通過TCP/IP連線將封裝在iSCSI協定資料單元(PDU)中的SCSI命令傳送到MDS 9000 IPS埠。在IPS模組上，連線以正確配置的千兆乙太網(GE)介面的形式提供。IPS模組使您能夠建立虛擬iSCSI目標並將它們對映到FC SAN中可用的物理FC目標。它將FC目標呈現給IP主機，就像物理目標在本地連線到IP網路一樣。

每個需要通過IPS模組訪問儲存的iSCSI主機都需要安裝相容的iSCSI驅動程式。使用iSCSI協定，iSCSI驅動程式允許iSCSI主機通過IP網路傳輸SCSI請求和響應。從主機作業系統的角度來看，iSCSI驅動程式似乎是SCSI傳輸驅動程式，類似於主機中外圍通道的FC驅動程式。從儲存裝置的角度來看，每個IP主機都顯示為FC主機。

將SCSI從IP主機路由到FC儲存裝置包含以下主要操作：

- 通過IP網路在主機和IPS模組之間傳輸iSCSI請求和響應。

- 在IP網路上的主機和FC儲存裝置之間路由SCSI請求和響應（將iSCSI轉換為FCP，反之亦然）。 此路由由IPS模組執行。

- 在IPS模組和FC儲存裝置之間傳輸FCP請求或響應。

預設情況下，IP儲存模組不會將FC目標匯入iSCSI。在IPS模組使FC目標可用於iSCSI啟動器之前，必須配置動態或靜態對映。當兩者都配置時，靜態對映的FC目標具有已配置的名稱。在此配置中，您將看到靜態對映的示例。使用動態對映時，每次iSCSI主機連線到IPS模組時，都會建立一個新的FC N埠，並為此N埠分配的nWWN和pWWN可能不同。如果需要在iSCSI主機每次連線到IPS模組時獲得相同的nWWN和pWWN ，請使用靜態對映方法。可以在IPS模組上使用靜態對映來訪問智慧FC儲存陣列，這些儲存陣列具有基於啟動器的pWWN和/或nWWN的訪問控制和LUN對映/掩蔽配置。

您可以通過指定將向其通告靜態對映的iSCSI目標的IPS埠清單以及指定允許訪問它的iSCSI啟動器節點名稱清單來控制對各個靜態對映的iSCSI目標的訪問。基於FC分割槽的訪問控制和基於iSCSI的訪問控制是為iSCSI提供訪問控制的兩種機制。這兩種方法可以同時使用。在此配置中，允許特定VSAN的預設分割槽。IPS模組使用基於iSCSI節點名稱的訪問控制清單和基於FC分割槽的訪問控制清單，在iSCSI發現和iSCSI會話建立期間實施訪問控制。

- iSCSI發現：當iSCSI主機建立iSCSI發現會話並查詢所有iSCSI目標時，IPS模組僅返回該iSCSI主機根據訪問控制策略被允許訪問的iSCSI目標清單。

- iSCSI會話建立：當IP主機發起iSCSI會話時，IPS模組驗證指定的iSCSI目標（在會話登入請求中）是否為靜態對映目標，如果為true，則驗證是否允許IP主機的iSCSI節點名稱訪問目標。如果IP主機沒有存取許可權，則其登入會遭到拒絕。

IP儲存模組為此IP主機建立一個FC虛擬N埠（N埠可能已經存在），並為IP主機正在訪問的FC目標pWWN的FCID執行FC名稱伺服器查詢。它使用IP主機虛擬N埠的pWWN作為名稱伺服器查詢的請求者。因此，名稱伺服器對pWWN執行區域強制查詢並響應查詢。如果名稱伺服器返回FCID，則接受iSCSI會話。否則，登入請求將被拒絕。

設定

本節提供用於配置MDS 9216和Cisco iSCSI Driver for Solaris的資訊。

附註：要查詢有關本文檔中使用的命令的其他資訊，請使用Cisco MDS 9000系列命令參考和Cisco MDS 9000系列軟體配置指南。

網路圖表

本文檔使用下圖所示的網路設定。

組態

本文檔使用如下所示的配置。

- Vuk(Windows Server 2003)

- 坎特伯里(MDS 9216)

Vuk(Windows Server 2003)

初始配置任務包括以下操作：

- 設定驅動程式將訪問的MDS 9000系列系統的iSCS目標IP地址。

- 設定iSCSI目標身份驗證使用者名稱和密碼。

- 儲存iSCSI目標配置，並設定驅動程式的啟動型別。

要配置驅動程式，請執行以下步驟：

1. 以具有管理員許可權的使用者身份登入電腦。

2. 按一下Start，指向Settings，按一下Control Panel，然後按兩下iSCSI Config。
Iscsi Config程式導致顯示Win 2000/XP/2003對話方塊的Cisco iSCSI配置。

3. 在Cisco iSCSI config for Win 2000對話方塊中，按如下方式配置MDS 9000系列系統中SCSI路由例項的IP地址：

- 在「Target Host Names/IP Addresses」文本框中，鍵入MDS 9000系列系統中SCSI路由例項的IP地址。在此配置示例中，IP地址為10.48.69.222。

- 按一下「Add」。IP地址顯示在目標主機名/IP地址文本框下方的顯示區域。

4. 按一下儲存並退出。

5. 重新啟動電腦。

坎特伯里(Cisco MDS 9216)

vsan database

vsan 222 name ozden

!---  VSAN 222 has been used for iSCSI targets.

vsan database

vsan 222 interface fc1/5

!--- Seagate is connected to fc1/5.

vsan 222 interface fc1/6

vsan 222 interface fc1/7

!--- IBM Shark is connected to fc1/7.

vsan 222 interface fc1/8

!--- System boot variables.

boot system bootflash:/s121a

boot kickstart bootflash:/k121a

!--- IP configurations.

ip domain-name cisco.com

ip name-server 144.254.10.123

ip default-gateway 10.48.69.129

ip routing

iscsi authentication none

!--- Identify the iSCSI initiator based on the IP address of your host. !--- A static virtual N port is defined for each NIC or network interface. !--- LUN-mapping and LUN-masking on the storage device has to be done with the static pWWN !--- that you have defined for the initiator. Refer to the Enterprise Storage Server Specialist !--- (ESSS) screen capture in the Fabric Manager and Device Manager Displays section !--- for more information.

iscsi initiator ip-address 10.48.69.241

static nWWN 22:01:00:0c:30:6c:24:42

static pWWN 21:03:00:0c:30:6c:24:42

!--- Targets via Vsan 222 are accesible by iSCSI initiators.

vsan 222

!--- A virtual target has been defined for the JBOD. The target has !--- been identified by it's pWWN. The target has been advertised via !--- GE interface 2/5. Host 10.48.69.241 is the only initiator.

iscsi virtual-target name seagate

pWWN 21:00:00:04:cf:db:3e:a7 fc-lun 0x0000 iscsi-lun 0x0000

advertise interface GigabitEthernet2/5

initiator ip address 10.48.69.241 permit

!--- A virtual target has been defined for the IBM Shark. The target has been identified by the pWWN. !--- Do not specify the LUN if you wish to map the entire FC target to an iSCSI target. !--- In the virtual-target shark-lun, LUN-mapping options have been used. FC-LUN 0x0000 has been !--- mapped to iSCSI-LUN 0x0000. It is also possible to map FC-LUN 0x0000 to a different iSCSI-LUN number.

iscsi virtual-target name shark-lun

pWWN 50:05:07:63:00:c4:94:4c fc-lun 0x0000 iscsi-lun 0x0000

pWWN 50:05:07:63:00:c4:94:4c fc-lun 0x0001 iscsi-lun 0x0001

advertise interface GigabitEthernet2/5

initiator ip address 10.48.69.241 permit

line console

exec-timeout 0

line vty

exec-timeout 0

ntp server 10.48.64.100

switchname canterbury

..

zone default-zone permit vsan 1

!--- Default zone policy is set to permit for VSAN 222.

zone default-zone permit vsan 222

interface GigabitEthernet2/5

ip address 10.48.69.222 255.255.255.192

no shutdown

...

interface fc1/5

no shutdown

interface fc1/6

interface fc1/7

no shutdown

...

interface mgmt0

ip address 10.48.69.156 255.255.255.192

!---The iSCSI interface has to be set no shut.

interface iscsi2/5

no shutdown

驗證

本節提供的資訊可用於確認您的組態是否正常運作。

- show zone status — 顯示區域資訊。

- show fcns database vsan 222 — 顯示特定VSAN的名稱伺服器資訊。

- show flogi database vsan 222 -顯示特定VSAN的FLOGI伺服器資訊。

- show vsan membership — 顯示不同VSAN的介面資訊。

- show iscsi initiator detail — 顯示iSCSI啟動器資訊。

- show iscsi initiator iscsi-session detail — 顯示iSCSI啟動器會話的詳細資訊。

- show iscsi initiator fcp-session detail — 顯示iSCSI啟動器FCP會話的詳細資訊。

- show ips stats tcp interface gigabitethernet 2/5 detail — 顯示特定GE介面的TCP統計資訊。

- show iscsi virtual-target configured — 顯示已在MDS 9000上配置的iSCSI虛擬目標。

- show iscsi initiator configured — 顯示已在MDS 9000上配置的iSCSI啟動器。

- show ips arp interface gigabitethernet 2/5 — 顯示特定GE介面的IPS arp資訊。

- show scsi-target lun vsan 222 -顯示特定VSAN的SCSI裝置（用於將FC-LUN對映到iSCSI-LUN）。

- show int iscsi 2/5 — 顯示iSCSI介面。

- show iscsi stats iscsi 2/5 — 顯示iSCSI統計資訊。

- show int gigabitethernet 2/5 — 顯示GE介面。

- show ip route — 顯示IP路由資訊。

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

附註：要查詢有關IP儲存問題故障排除的其他資訊，請使用Cisco MDS 9000系列故障排除指南。

疑難排解程序

以下是與此組態相關的疑難排解資訊。

- 從Vuk顯示(Windows Server 2003)

- 來自Canterbury Cisco MDS 9216的顯示器

從Vuk顯示(Windows Server 2003)

在Cisco iSCSI config視窗中，按一下Status以檢查主機是否成功登入到iSCSI目標。在命令列中，發出netstat -an | find/i "established"以檢視在10.48.69.222之間建立的TCP會話。

要檢視新磁碟，請在案頭上按一下右鍵My Computer。按兩下Computer Manager。

在System Tool下的控制檯樹中，按一下Device Manager

要使驅動程式在Windows 2003 Server下正常運行，驅動程式需要建立偽磁碟驅動器。這將在「磁碟管理」MMC應用程式下顯示為未知磁碟。使用者可以忽略此情況，因為它不會以任何方式影響系統的效能或功能。不可以刪除。

要管理儲存，請按一下右鍵案頭上的My Computer。按兩下Computer Manager。

在控制檯樹中的儲存下，按一下磁碟管理。

來自坎特伯雷的顯示器(Cisco MDS 9216)

canterbury#show vsan membership

vsan 1 interfaces:

fc1/3 fc1/10 fc1/12 fc1/13 fc1/14 fc1/16

vsan 222 interfaces:

fc1/5 fc1/6 fc1/7 fc1/8

vsan 4094(isolated_vsan) interfaces:

canterbury#show zone status

VSAN: 1 default-zone: permit distribute: active only Interop: 100

Full Zoning Database :

Zonesets:0 Zones:0 Aliases: 0

Active Zoning Database :

Database Not Available

Status:

VSAN: 222 default-zone: permit distribute: active only Interop: 100

Full Zoning Database :

Zonesets:0 Zones:0 Aliases: 0

Active Zoning Database :

Database Not Available

Status:

!--- VSAN 222 has been used for this configuration, default-zone behavior has been set to permit.

canterbury#show flogi database vsan 222

---------------------------------------------------------------------------

INTERFACE VSAN FCID PORT NAME NODE NAME

---------------------------------------------------------------------------

fc1/5 222 0x62011e 21:00:00:04:cf:db:3e:a7 20:00:00:04:cf:db:3e:a7

fc1/7 222 0x620003 50:05:07:63:00:c4:94:4c 50:05:07:63:00:c0:94:4c

iscsi2/5 222 0x620001 21:03:00:0c:30:6c:24:42 22:01:00:0c:30:6c:24:42

Total number of flogi = 3.

!--- FCID 0X620001 is the virtual N port(HBA) for the iSCSI host Vuk.

canterbury#show fcns database vsan 222

VSAN 222:

--------------------------------------------------------------------------

FCID TYPE PWWN (VENDOR) FC4-TYPE:FEATURE

--------------------------------------------------------------------------

0x620001 N 21:03:00:0c:30:6c:24:42 (Cisco) scsi-fcp:init isc..w

0x620003 N 50:05:07:63:00:c4:94:4c (IBM) scsi-fcp:target fc..

0x62011e NL 21:00:00:04:cf:db:3e:a7 (Seagate) scsi-fcp:target

Total number of entries = 3

canterbury#show fcns database detail vsan 222

------------------------

VSAN:222 FCID:0x620001

------------------------

port-wwn (vendor) :21:03:00:0c:30:6c:24:42 (Cisco)

node-wwn :22:01:00:0c:30:6c:24:42

class :2,3

node-ip-addr :10.48.69.241

ipa :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:init iscsi-gw

!--- Virtual N port for host.

symbolic-port-name :

symbolic-node-name :10.48.69.241

port-type :N

port-ip-addr :0.0.0.0

fabric-port-wwn :20:51:00:0c:30:6c:24:40

hard-addr :0x000000

------------------------

VSAN:222 FCID:0x620003

------------------------

port-wwn (vendor) :50:05:07:63:00:c4:94:4c (IBM)

node-wwn :50:05:07:63:00:c0:94:4c

class :2,3

node-ip-addr :0.0.0.0

ipa :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:target fcsb2-ch-cu fcsb2-cu-ch

symbolic-port-name :

symbolic-node-name :

port-type :N

port-ip-addr :0.0.0.0

fabric-port-wwn :20:07:00:0c:30:6c:24:40

hard-addr :0x000000

------------------------

VSAN:222 FCID:0x62011e

------------------------

port-wwn (vendor) :21:00:00:04:cf:db:3e:a7 (Seagate)

node-wwn :20:00:00:04:cf:db:3e:a7

class :3

node-ip-addr :0.0.0.0

ipa :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:target

symbolic-port-name :

symbolic-node-name :

port-type :NL

port-ip-addr :0.0.0.0

fabric-port-wwn :20:05:00:0c:30:6c:24:40

hard-addr :0x000000

Total number of entries = 3

canterbury#show iscsi session

Initiator 10.48.69.241

Initiator name iqn.1987-05.com.cisco:02.9a74eb40e94d.vuk-win2003

Session #1

Discovery session, ISID 00023d000023, Status active

Session #2

Target shark-lun

VSAN 222, ISID 00023d000024, Status active, no reservation

Session #3

Target seagate

VSAN 222, ISID 00023d000025, Status active, no reservation

canterbury#show iscsi initiator

iSCSI Node name is 10.48.69.241

iSCSI Initiator name: iqn.1987-05.com.cisco:02.9a74eb40e94d.vuk-win2003

iSCSI alias name: VUK-WIN2003

Node WWN is 22:01:00:0c:30:6c:24:42 (dynamic)

Member of vsans: 222

Number of Virtual n_ports: 1

Virtual Port WWN is 21:03:00:0c:30:6c:24:42 (configured)

Interface iSCSI 2/5, Portal group tag: 0x84

VSAN ID 222, FCID 0x620001

canterbury#show iscsi initiator detail

iSCSI Node name is 10.48.69.241

iSCSI Initiator name: iqn.1987-05.com.cisco:02.9a74eb40e94d.vuk-win2003

iSCSI alias name: VUK-WIN2003

Node WWN is 22:01:00:0c:30:6c:24:42 (dynamic)

Member of vsans: 222

Number of Virtual n_ports: 1

Virtual Port WWN is 21:03:00:0c:30:6c:24:42 (configured)

Interface iSCSI 2/5, Portal group tag is 0x84

VSAN ID 222, FCID 0x620001

2 FC sessions, 2 iSCSI sessions

iSCSI session details

Target: seagate

Statistics:

PDU: Command: 16, Response: 16

Bytes: TX: 188, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.222:3260, Remote 10.48.69.241:1035

Path MTU: 1500 bytes

Retransmission timeout: 350 ms

Round trip time: Smoothed 165 ms, Variance: 46

Advertized window: Current: 125 KB, Maximum: 125 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 9 KB

Target: shark-lun

Statistics:

PDU: Command: 2343, Response: 2343

Bytes: TX: 46363700, RX: 45494272

Number of connection: 1

TCP parameters

Local 10.48.69.222:3260, Remote 10.48.69.241:1034

Path MTU: 1500 bytes

Retransmission timeout: 390 ms

Round trip time: Smoothed 136 ms, Variance: 65

Advertized window: Current: 125 KB, Maximum: 125 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 11 KB

FCP Session details

Target FCID: 0x62011e (S_ID of this session: 0x620001)

pWWN: 21:00:00:04:cf:db:3e:a7, nWWN: 20:00:00:04:cf:db:3e:a7

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: seagate

Negotiated parameters

RcvDataFieldSize 1404 our_RcvDataFieldSize 1404

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 16

Target FCID: 0x620003 (S_ID of this session: 0x620001)

pWWN: 50:05:07:63:00:c4:94:4c, nWWN: 50:05:07:63:00:c0:94:4c

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: shark-lun

Negotiated parameters

RcvDataFieldSize 2048 our_RcvDataFieldSize 1404

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 2343

canterbury#show iscsi initiator iscsi-session detail

iSCSI Node name is 10.48.69.241

iSCSI Initiator name: iqn.1987-05.com.cisco:02.9a74eb40e94d.vuk-win2003

iSCSI alias name: VUK-WIN2003

Node WWN is 22:01:00:0c:30:6c:24:42 (dynamic)

Member of vsans: 222

Number of Virtual n_ports: 1

Virtual Port WWN is 21:03:00:0c:30:6c:24:42 (configured)

Interface iSCSI 2/5, Portal group tag is 0x84

VSAN ID 222, FCID 0x620001

2 FC sessions, 2 iSCSI sessions

iSCSI session details

Target: seagate

Statistics:

PDU: Command: 16, Response: 16

Bytes: TX: 188, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.222:3260, Remote 10.48.69.241:1035

Path MTU: 1500 bytes

Retransmission timeout: 350 ms

Round trip time: Smoothed 165 ms, Variance: 46

Advertized window: Current: 125 KB, Maximum: 125 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 9 KB

Target: shark-lun

Statistics:

PDU: Command: 2343, Response: 2343

Bytes: TX: 46363700, RX: 45494272

Number of connection: 1

TCP parameters

Local 10.48.69.222:3260, Remote 10.48.69.241:1034

Path MTU: 1500 bytes

Retransmission timeout: 390 ms

Round trip time: Smoothed 136 ms, Variance: 65

Advertized window: Current: 125 KB, Maximum: 125 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 11 KB

canterbury#show iscsi initiator fcp-session detail

iSCSI Node name is 10.48.69.241

iSCSI Initiator name: iqn.1987-05.com.cisco:02.9a74eb40e94d.vuk-win2003

iSCSI alias name: VUK-WIN2003

Node WWN is 22:01:00:0c:30:6c:24:42 (dynamic)

Member of vsans: 222

Number of Virtual n_ports: 1

Virtual Port WWN is 21:03:00:0c:30:6c:24:42 (configured)

Interface iSCSI 2/5, Portal group tag is 0x84

VSAN ID 222, FCID 0x620001

2 FC sessions, 2 iSCSI sessions

FCP Session details

Target FCID: 0x62011e (S_ID of this session: 0x620001)

pWWN: 21:00:00:04:cf:db:3e:a7, nWWN: 20:00:00:04:cf:db:3e:a7

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: seagate

Negotiated parameters

RcvDataFieldSize 1404 our_RcvDataFieldSize 1404

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 16

Target FCID: 0x620003 (S_ID of this session: 0x620001)

pWWN: 50:05:07:63:00:c4:94:4c, nWWN: 50:05:07:63:00:c0:94:4c

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: shark-lun

Negotiated parameters

RcvDataFieldSize 2048 our_RcvDataFieldSize 1404

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 2343

canterbury#show ips stats tcp interface gigabitethernet 2/5

TCP Statistics for port GigabitEthernet2/5

Connection Stats

0 active openings, 345 accepts

0 failed attempts, 0 reset received, 345 established

Segment stats

160524 received, 158647 sent, 1 retransmitted

0 bad segments received, 1 reset sent

TCP Active Connections

Local Address Remote Address State Send-Q Recv-Q

10.48.69.222:3260 10.48.69.241:1026 ESTABLISH 0 0

10.48.69.222:3260 10.48.69.241:1034 ESTABLISH 0 0

10.48.69.222:3260 10.48.69.241:1035 ESTABLISH 0 0

0.0.0.0:3260 0.0.0.0:0 LISTEN 0 0

canterbury#show ips stats tcp interface gigabitethernet 2/5 detail

TCP Statistics for port GigabitEthernet2/5

TCP send stats

158647 segments, 132538432 bytes

113573 data, 44411 ack only packets

318 control (SYN/FIN/RST), 0 probes, 344 window updates

1 segments retransmitted, 48 bytes

1 retransmitted while on ethernet send queue, 0 packets split

29286 delayed acks sent

TCP receive stats

160524 segments, 102518 data packets in sequence, 125344708 bytes in sequence

0 predicted ack, 94889 predicted data

0 bad checksum, 0 multi/broadcast, 0 bad offset

0 no memory drops, 0 short segments

0 duplicate bytes, 0 duplicate packets

0 partial duplicate bytes, 0 partial duplicate packets

0 out-of-order bytes, 0 out-of-order packets

0 packet after window, 0 bytes after window

0 packets after close

58221 acks, 132539086 ack bytes, 0 ack toomuch, 6563 duplicate acks

0 ack packets left of snd_una, 0 non-4 byte aligned packets

37322 window updates, 0 window probe

865 pcb hash miss, 171 no port, 1 bad SYN, 0 paws drops

TCP Connection Stats

0 attempts, 345 accepts, 345 established

342 closed, 341 drops, 0 conn drops

0 drop in retransmit timeout, 10 drop in keepalive timeout

0 drop in persist drops, 0 connections drained

TCP Miscellaneous Stats

26399 segments timed, 26398 rtt updated

1 retransmit timeout, 0 persist timeout

6702 keepalive timeout, 6692 keepalive probes

TCP SACK Stats

0 recovery episodes, 0 data packets, 0 data bytes

0 data packets retransmitted, 0 data bytes retransmitted

0 connections closed, 0 retransmit timeouts

TCP SYN Cache Stats

345 entries, 345 connections completed, 0 entries timed out

0 dropped due to overflow, 0 dropped due to RST

0 dropped due to ICMP unreach, 0 dropped due to bucket overflow

0 abort due to no memory, 0 duplicate SYN, 2 no-route SYN drop

0 hash collisions, 0 retransmitted

TCP Active Connections

Local Address Remote Address State Send-Q Recv-Q

10.48.69.222:3260 10.48.69.241:1026 ESTABLISH 0 0

10.48.69.222:3260 10.48.69.241:1034 ESTABLISH 0 0

10.48.69.222:3260 10.48.69.241:1035 ESTABLISH 0 0

0.0.0.0:3260 0.0.0.0:0 LISTEN 0 0

canterbury#show iscsi virtual-target configured

target: seagate

* Port WWN 21:00:00:04:cf:db:3e:a7

!--- The "*" means you have both discovery and target session. If there is no "*" in !--- front of the pWWN, it means either you only have discovery session or !--- you have no active session.

Configured node

No. of LU mapping: 1

iSCSI LUN: 0x0000, FC LUN: 0x0000

No. of advertised interface: 1

GigabitEthernet 2/5

No. of initiators permitted: 1

initiator 10.48.69.241/32 is permitted

all initiator permit is disabled

target: shark-lun

* Port WWN 50:05:07:63:00:c4:94:4c

Configured node

No. of LU mapping: 2

iSCSI LUN: 0x0000, FC LUN: 0x0000

iSCSI LUN: 0x0001, FC LUN: 0x0001

No. of advertised interface: 1

GigabitEthernet 2/5

No. of initiators permitted: 1

initiator 10.48.69.241/32 is permitted

all initiator permit is disabled

canterbury#show iscsi initiator configured

iSCSI Node name is 10.48.69.241

Member of vsans: 222

No. of PWWN: 1

Port WWN is 21:03:00:0c:30:6c:24:42

canterbury#show ips arp interface gigabitethernet 2/5

Protocol Address Age (min) Hardware Addr Type Interface

Internet 10.48.69.200 0 0008.e21e.c7bc ARPA GigabitEthernet2/5

Internet 10.48.69.202 4 0202.3d30.45ca ARPA GigabitEthernet2/5

Internet 10.48.69.206 4 0202.3d30.45ce ARPA GigabitEthernet2/5

Internet 10.48.69.226 10 0060.08f6.bc1a ARPA GigabitEthernet2/5

Internet 10.48.69.229 10 0800.209e.edab ARPA GigabitEthernet2/5

Internet 10.48.69.232 5 0003.4796.34c3 ARPA GigabitEthernet2/5

Internet 10.48.69.238 5 0030.6e1b.6f51 ARPA GigabitEthernet2/5

Internet 10.48.69.239 11 0030.6e1c.a00b ARPA GigabitEthernet2/5

Internet 10.48.69.241 4 000b.cdaf.b4c3 ARPA GigabitEthernet2/5

Internet 10.48.69.248 2 0202.3d30.45f8 ARPA GigabitEthernet2/5

Internet 10.10.2.28 5 0202.3d0a.021c ARPA GigabitEthernet2/5

canterbury#show scsi-target devices vsan 222

--------------------------------------------------------------------------------

VSAN FCID PWWN VENDOR MODEL REV

--------------------------------------------------------------------------------

222 0x62011e 21:00:00:04:cf:db:3e:a7 SEAGATE ST336753FC 0003

222 0x620003 50:05:07:63:00:c4:94:4c IBM 2105F20 .114

!--- All LUNs that have been exported by the IBM Shark are not shown in the display output.

canterbury#show scsi-target lun vsan 222

- ST336753FC from SEAGATE (Rev 0003)

FCID is 0x62011e in VSAN 222, PWWN is 21:00:00:04:cf:db:3e:a7

------------------------------------------------------------------------------

LUN Capacity Status Serial Number Device-Id

(MB)

------------------------------------------------------------------------------

0x0 36704 Online 3HX00Q2600007326 C:1 A:0 T:3 20:00:00:04:cf:db:3e:a7

- 2105F20 from IBM (Rev .114)

FCID is 0x620003 in VSAN 222, PWWN is 50:05:07:63:00:c4:94:4c

------------------------------------------------------------------------------

LUN Capacity Status Serial Number Device-Id

(MB)

------------------------------------------------------------------------------

0x5100 4000 Online 10022196 C:2 A:0 T:1 IBM 2105

0x5101 4000 Online 10122196 C:2 A:0 T:1 IBM 2105

....

0x5011 5000 Online 01122196 C:2 A:0 T:1 IBM 2105

0x5012 5000 Online 01222196 C:2 A:0 T:1 IBM 2105

0x5013 5000 Online 01322196 C:2 A:0 T:1 IBM 2105

0x5014 5000 Online 01422196 C:2 A:0 T:1 IBM 2105

0x5400 3000 Online 40022196 C:2 A:0 T:1 IBM 2105

0x5401 5000 Online 40122196 C:2 A:0 T:1 IBM 2105

0x5200 3000 Online 20022196 C:2 A:0 T:1 IBM 2105

0x5201 3000 Online 20122196 C:2 A:0 T:1 IBM 2105

0x5202 3000 Online 20222196 C:2 A:0 T:1 IBM 2105

0x5203 3000 Online 20322196 C:2 A:0 T:1 IBM 2105

0x5204 3000 Online 20422196 C:2 A:0 T:1 IBM 2105

0x5205 3000 Online 20522196 C:2 A:0 T:1 IBM 2105

0x5206 3000 Online 20622196 C:2 A:0 T:1 IBM 2105

0x5207 3000 Online 20722196 C:2 A:0 T:1 IBM 2105

0x5208 3000 Online 20822196 C:2 A:0 T:1 IBM 2105

0x5209 3000 Online 20922196 C:2 A:0 T:1 IBM 2105

.....

canterbury#show int iscsi 2/5

iscsi2/5 is up

Hardware is GigabitEthernet

Port WWN is 20:51:00:0c:30:6c:24:40

Admin port mode is ISCSI

Port mode is ISCSI

Speed is 1 Gbps

iSCSI initiator is identified by name

Number of iSCSI session: 3, Number of TCP connection: 3

Configured TCP parameters

Local Port is 3260

PMTU discover is enabled, reset timeout is 3600 sec

Keepalive-timeout is 60 sec

Minimum-retransmit-time is 300 ms

Max-retransmissions 4

Sack is disabled

QOS code point is 0

Forwarding mode: pass-thru

TMF Queueing Mode : disabled

5 minutes input rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

5 minutes output rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

iSCSI statistics

Input 132567 packets, 125344708 bytes

Command 8637 pdus, Data-out 117005 pdus, 118916096 bytes

Output 113573 packets, 132538432 bytes

Response 8439 pdus (with sense 10), R2T 3913 pdus

Data-in 93902 pdus, 127070632 bytes

canterbury#show iscsi stats iscsi 2/5

iscsi2/5

5 minutes input rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

5 minutes output rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

iSCSI statistics

132567 packets input, 125344708 bytes

Command 8637 pdus, Data-out 117005 pdus, 118916096 bytes, 0 fragments

output 113573 packets, 132538432 bytes

Response 8439 pdus (with sense 10), R2T 3913 pdus

Data-in 93902 pdus, 127070632 bytes

canterbury#show int gigabitethernet 2/5

GigabitEthernet2/5 is up

Hardware is GigabitEthernet, address is 0005.3000.adea

Internet address is 10.48.69.222/26

MTU 1500 bytes

Port mode is IPS

Speed is 1 Gbps

Beacon is turned off

Auto-Negotiation is turned on

5 minutes input rate 224 bits/sec, 28 bytes/sec, 0 frames/sec

5 minutes output rate 80 bits/sec, 10 bytes/sec, 0 frames/sec

205453 packets input, 138346789 bytes

0 multicast frames, 0 compressed

0 input errors, 0 frame, 0 overrun 0 fifo

165673 packets output, 141485482 bytes, 0 underruns

0 output errors, 0 collisions, 0 fifo

0 carrier errors

canterbury#show ip route

Codes: C - connected, S - static

Gateway of last resort is 10.48.69.129

C 10.48.69.192/26 is directly connected, GigabitEthernet2/5

C 10.48.69.128/26 is directly connected, mgmt0

canterbury#

Fabric Manager和Device Manager顯示

本節提供來自MDS交換矩陣管理器1.2(2)和裝置管理器1.2(2)的螢幕截圖。

Fabric Manager中的拓撲圖

從裝置管理器選擇FC-LUN以顯示pWWN、LUN ID和LUN的容量。

選擇FC-LUN以顯示裝置管理器中的目標。

選擇IP-iSCSI以從裝置管理器顯示iSCSI會話。

IBM Shark定義

本部分提供了來自企業儲存伺服器專家(ESSS)的螢幕捕獲。

在ESS上定義了一個主機，該主機使用為啟動器定義的靜態WWPN 21:03:00:0c:30:6c:24:42。已為此主機分配了兩個卷。

相關資訊

- Cisco iSCSI軟體下載（僅限註冊客戶）

- 用於Windows 2000的iSCSI驅動程式常見問題

- Cisco Windows 2000 iSCSI驅動程式發行說明

- 用於Windows 2000的iSCSI驅動程式故障排除

- Cisco MDS 9000系列故障排除指南，版本1.2(1a)

- 技術支援與文件 - Cisco Systems