目錄

問題：

問題：

症狀:當我嘗試通過思科網路安全裝置(WSA)存取網站時，Proxy會顯示一則錯誤訊息，顯示Proxy Unlicensed:

This Page Cannot Be Displayed

----------------------

Internet access is not available without proper licensing of the

security device.

Please contact your corporate network administrator and provide

the code shown below.

Note: To access the management interface of the security device,

enter the configured IP address with port 8080.

---------------------

Notification code: PROXY_UNLICENSED

功能金鑰未過期。有什麼問題？

環境:思科網路安全裝置(WSA),AsyncOS的所有版本

未接受EULA（終端使用者許可協定），但應該接受。

您可以通過以下兩種方式獲得此認可：

1. 運行系統設定嚮導並完成指導式設定過程：「系統管理」頁籤>「系統設定」>「系統設定嚮導」。

2. 轉到「安全服務」頁籤>「Web代理」>「編輯設定」。 如果EULA出現，則尚未被接受，這仍需要完成。如果按一下Edit Settings（編輯設定）按鈕可以編輯代理選項，則已被接受。