目錄

簡介

必要條件

需求

採用元件

慣例

主要任務

工作

逐步說明

驗證

疑難排解

相關資訊

簡介

本文檔提供有關如何在Cisco VPN 3000集中器上恢復軟體映像的說明。這些指令可用於將軟體映像切換回集中器上的另一個代碼版本。

VPN集中器有兩個位置用於儲存映像檔案：活動位置，儲存系統中當前運行的映像；和備用位置。更新映像會覆蓋備份位置中儲存的映像檔案，並使其成為下次重新啟動的活動位置。

必要條件

需求

本文件沒有特定先決條件。

採用元件

本檔案中的資訊是根據以下軟體和硬體版本。

- Cisco VPN 3000 Concentrator 4.1版及更高版本

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您在即時網路中工作，請確保在使用任何命令之前瞭解其潛在影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

主要任務

工作

本節提供用於設定本文件中所述功能的資訊。

逐步說明

下面將介紹恢復軟體映象的分步過程。

1. 將控制檯連線到VPN集中器。

2. 重新啟動或重新啟動集中器。

3. 在「Boot configured XXXMb of RAM（啟動配置的RAM的XXXMb）」消息後，查詢三個點，然後按Ctrl-G(^G)。

4. 選擇選項5 — 從啟動選單選項切換活動映像。

5. 選擇選項1 — 繼續載入主代碼。

Resetting System...

Boot-ROM Initializing...

Boot configured 64 MB of RAM.

...

!--- Press Ctrl-G here.

Cisco Systems, Inc./VPN 3000 Concentrator Series Version 4.0.int_3 Nov 18 2002 1

5:07:22

Boot Menu Options

-----------------

1 - Continue to load main code

2 - Complete boot without loading main code

3 - Load code without execution

4 - Execute code without loading

5 - Toggle active image

6 - Force main code to ignore config file

7 - Dump the MPC106/107 registers

Select choice 5

The active code image has been changed.

Cisco Systems, Inc./VPN 3000 Concentrator Series Version 4.0.int_3 Nov 18 2002 1

5:07:22

Boot Menu Options

-----------------

1 - Continue to load main code

2 - Complete boot without loading main code

3 - Load code without execution

4 - Execute code without loading

5 - Toggle active image

6 - Force main code to ignore config file

7 - Dump the MPC106/107 registers

Select choice 1

Loading image ..........

Verifying image checksum ...........

Active image loaded and verified...

Starting loaded image...

Starting power-up diagnostics...

驗證

目前沒有適用於此組態的驗證程序。

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

相關資訊

- 公告：2.5 >軟體降級到2.2.1時出現CVPN 3000 MAC地址問題

- Cisco VPN 3000系列集中器支援頁面

- Cisco VPN 3000系列使用者端支援頁面

- IPSec支援頁面

- 技術支援 - Cisco Systems