目錄

簡介

必要條件

需求

採用元件

慣例

設定

網路圖表

組態

驗證

疑難排解

相關資訊

簡介

本文檔提供在PIX/自適應安全裝置(ASA)7.x軟體上通過基於策略的靜態網路地址轉換(NAT)將一個本地IP地址對映到兩個或多個全域性IP地址的示例配置。

必要條件

需求

嘗試此組態之前，請確保符合以下要求：

- 確保您瞭解PIX/ASA 7.x CLI的工作知識和配置訪問清單和靜態NAT的先前經驗。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 此特定示例使用ASA 5520。但是，策略NAT配置在運行7.x的任何PIX或ASA裝置上均可運行。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

請參閱思科技術提示慣例以瞭解更多有關文件慣例的資訊。

設定

此配置示例有一個位於ASA後方192.168.100.50的內部Web伺服器。要求是伺服器需要通過其內部IP地址192.168.100.50及其外部地址172.16.171.125來訪問外部網路介面。還有一項安全策略要求，即只有通過172.16.171.0/24網路才能訪問私有IP地址192.168.100.50。此外，網際網路控制訊息通訊協定(ICMP)和連線埠80流量是允許傳入內部Web伺服器的唯一通訊協定。由於有兩個全域性IP地址對映到一個本地IP地址，因此需要使用策略NAT。否則，PIX/ASA會拒絕帶有重疊地址錯誤的兩個一對一靜態圖。

註：使用Command Lookup Tool(僅供已註冊客戶使用)可獲取本節中使用的命令的詳細資訊。

網路圖表

本文使用此網路設定

組態

本檔案會使用此組態。

ciscoasa(config)#show run

: Saved

:

ASA Version 7.2(2)

!

hostname ciscoasa

enable password 8Ry2YjIyt7RRXU24 encrypted

names

!

interface GigabitEthernet0/0

nameif outside

security-level 0

ip address 172.16.171.124 255.255.255.0

!

interface GigabitEthernet0/1

nameif inside

security-level 100

ip address 192.168.100.1 255.255.255.0

!

interface GigabitEthernet0/2

shutdown

no nameif

no security-level

no ip address

!

interface GigabitEthernet0/3

shutdown

no nameif

no security-level

no ip address

!

interface Management0/0

nameif management

security-level 100

ip address 192.168.1.1 255.255.255.0

management-only

!

passwd 2KFQnbNIdI.2KYOU encrypted

ftp mode passive

!--- policy_nat_web1 and policy_nat_web2 are two access-lists that match the source !--- address we want to translate on. Two access-lists are required, though they !--- can be exactly the same.

access-list policy_nat_web1 extended permit ip host 192.168.100.50 any

access-list policy_nat_web2 extended permit ip host 192.168.100.50 any

!--- The inbound_outside access-list defines the security policy, as previously described. !--- This access-list is applied inbound to the outside interface.

access-list inbound_outside extended permit tcp 172.16.171.0 255.255.255.0

host 192.168.100.50 eq www

access-list inbound_outside extended permit icmp 172.16.171.0 255.255.255.0

host 192.168.100.50 echo-reply

access-list inbound_outside extended permit icmp 172.16.171.0 255.255.255.0

host 192.168.100.50 echo

access-list inbound_outside extended permit tcp any host 172.16.171.125 eq www

access-list inbound_outside extended permit icmp any host 172.16.171.125 echo-reply

access-list inbound_outside extended permit icmp any host 172.16.171.125 echo

pager lines 24

logging asdm informational

mtu management 1500

mtu inside 1500

mtu outside 1500

no failover

icmp unreachable rate-limit 1 burst-size 1

no asdm history enable

arp timeout 14400

!--- This first static allows users to reach the translated global IP address of the !--- web server. Since this static appears first in the configuration, for connections !--- initiated outbound from the internal web server, the ASA translates the source !--- address to 172.16.171.125.

static (inside,outside) 172.16.171.125  access-list policy_nat_web1

!--- The second static allows networks to access the web server by its private !--- IP address of 192.168.100.50.

static (inside,outside) 192.168.100.50  access-list policy_nat_web2

!--- Apply the inbound_outside access-list to the outside interface.

access-group inbound_outside in interface outside

route outside 0.0.0.0 0.0.0.0 172.16.171.1 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 icmp 0:00:02

timeout sunrpc 0:10:00 h323 0:05:00 h225 1:00:00 mgcp 0:05:00 mgcp-pat 0:05:00

timeout sip 0:30:00 sip_media 0:02:00 sip-invite 0:03:00 sip-disconnect 0:02:00

timeout uauth 0:05:00 absolute

http server enable

http 192.168.1.0 255.255.255.0 management

no snmp-server location

no snmp-server contact

snmp-server enable traps snmp authentication linkup linkdown coldstart

telnet timeout 5

ssh timeout 5

console timeout 0

!

class-map inspection_default

match default-inspection-traffic

!

!

policy-map type inspect dns preset_dns_map

parameters

message-length maximum 512

policy-map global_policy

class inspection_default

inspect dns preset_dns_map

inspect ftp

inspect h323 h225

inspect h323 ras

inspect rsh

inspect rtsp

inspect esmtp

inspect sqlnet

inspect skinny

inspect sunrpc

inspect xdmcp

inspect sip

inspect netbios

inspect tftp

!

service-policy global_policy global

prompt hostname context

驗證

本節提供的資訊可用於確認您的組態是否正常運作。

輸出直譯器工具(僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

1. 在上游IOS®路由器172.16.171.1上，驗證您是否可以通過ping命令到達Web伺服器的兩個全域性IP地址。

router#ping 172.16.171.125

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 172.16.171.125, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/4 ms

router#ping 192.168.100.50

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.100.50, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/4 ms

2. 在ASA上，驗證您是否看到轉換(xlate)表中構建的轉換。

ciscoasa(config)#show xlate global 192.168.100.50

2 in use, 28 most used

Global 192.168.100.50 Local 192.168.100.50

ciscoasa(config)#show xlate global 172.16.171.125

2 in use, 28 most used

Global 172.16.171.125 Local 192.168.100.50

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

如果ping或連線失敗，則嘗試使用syslog來確定轉換配置是否存在任何問題。在少量使用的網路（如實驗室環境）中，日誌記錄緩衝區大小通常足以用於排除故障。否則，您需要將系統日誌傳送到外部系統日誌伺服器。啟用到第6級緩衝區的日誌記錄，以檢視這些系統日誌條目中的配置是否正確。

ciscoasa(config)#logging buffered 6

ciscoasa(config)#logging on

!--- From 172.16.171.120, initiate a TCP connection to port 80 to both the external !--- (172.16.171.125) and internal addresses (192.168.100.50).

ciscoasa(config)#show log

Syslog logging: enabled

Facility: 20

Timestamp logging: disabled

Standby logging: disabled

Deny Conn when Queue Full: disabled

Console logging: disabled

Monitor logging: disabled

Buffer logging: level debugging, 4223 messages logged

Trap logging: disabled

History logging: disabled

Device ID: disabled

Mail logging: disabled

ASDM logging: level informational, 4032 messages logged

%ASA-5-111008: User 'enable_15' executed the 'clear logging buffer' command.

%ASA-7-609001: Built local-host outside:172.16.171.120

%ASA-7-609001: Built local-host inside:192.168.100.50

%ASA-6-302013: Built inbound TCP connection 67 for outside:172.16.171.120/33687

(172.16.171.120/33687) to inside:192.168.100.50/80 (172.16.171.125/80)

%ASA-6-302013: Built inbound TCP connection 72 for outside:172.16.171.120/33689

(172.16.171.120/33689) to inside:192.168.100.50/80 (192.168.100.50/80)

如果在日誌中看到轉換錯誤，請仔細檢查NAT配置。如果未觀察到任何系統日誌，請使用ASA上的capture功能嘗試捕獲介面上的流量。為了設定捕獲，必須首先指定訪問清單以匹配特定型別的流量或TCP流。接下來，您必須將此捕獲應用到一個或多個介面，才能開始捕獲資料包。

!--- Create a capture access-list to match on port 80 traffic to !--- the external IP address of 172.16.171.125. !--- Note: These commands are over two lines due to spatial reasons.

ciscoasa(config)#access-list acl_capout permit tcp host 172.16.171.120

host 172.16.171.125 eq 80

ciscoasa(config)#access-list acl_capout permit tcp host 172.16.171.125

eq 80 host 172.16.171.120

ciscoasa(config)#

!--- Apply the capture to the outside interface.

ciscoasa(config)#capture capout access-list acl_capout interface outside

!--- After you initiate the traffic, you see output similar to this when you view !--- the capture. Note that packet 1 is the SYN packet from the client, while packet !--- 2 is the SYN-ACK reply packet from the internal server. If you apply a capture !--- on the inside interface, in packet 2 you should see the server reply with !--- 192.168.100.50 as its source address.

ciscoasa(config)#show capture capout

4 packets captured

1: 13:17:59.157859 172.16.171.120.21505 > 172.16.171.125.80: S

2696120951:2696120951(0) win 4128 <mss 1460>

2: 13:17:59.159446 172.16.171.125.80 > 172.16.171.120.21505: S

1512093091:1512093091(0) ack 2696120952 win 4128 <mss 536>

3: 13:17:59.159629 172.16.171.120.21505 > 172.16.171.125.80: .

ack 1512093092 win 4128

4: 13:17:59.159873 172.16.171.120.21505 > 172.16.171.125.80: .

ack 1512093092 win 4128

相關資訊

- ASA 7.2命令參考

- Cisco PIX防火牆軟體

- Cisco Secure PIX防火牆命令參考

- 安全產品現場通知（包括PIX）

- 要求建議 (RFC)

- 技術支援與文件 - Cisco Systems