目錄

簡介

必要條件

需求

採用元件

慣例

症狀

原因/問題描述

條件/環境

解析

相關資訊

簡介

本文提供有關如何使動態L2L隧道落入不同隧道組的資訊。

必要條件

需求

本文件沒有特定需求。

採用元件

本文件所述內容不限於特定軟體和硬體版本。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

症狀

在本文檔的示例中，網路管理員需要建立VPN策略，其中連線到集線器的不同遠端VPN分支應連線到單獨的隧道組，以便可以將不同的VPN策略應用到每個遠端連線。

原因/問題描述

在動態L2L隧道中，隧道（啟動器）的一側有一個動態IP地址。由於接收方不知道它們來自哪個IP地址，因此與靜態L2L隧道不同，不同的對等方會自動歸入預設L2L組。但是，在某些情況下，這是不可接受的，使用者可能需要為每個對等體分配不同的組策略或預共用金鑰。

條件/環境

解析

這可以通過以下兩種方式實現：

- 憑證

ASA上的隧道組查詢過程將基於輻條顯示的證書欄位來確定連線。

no tunnel-group-map enable rules

tunnel-group-map enable ou

tunnel-group-map enable ike-id

tunnel-group-map enable peer-ip

tunnel-group-map default-group DefaultRAGroup

- PSK和主動模式

並非所有使用者都有PKI基礎設施。但是，仍可以使用攻擊性模式引數完成相同的工作，如下所述：

中心

crypto ipsec transform-set myset esp-3des esp-sha-hmac

crypto ipsec security-association lifetime seconds 28800

crypto ipsec security-association lifetime kilobytes 4608000

crypto dynamic-map mydyn 10 set transform-set myset

crypto map mymap 65535 ipsec-isakmp dynamic mydyn

crypto map mymap interface outside

crypto isakmp enable outside

crypto isakmp policy 10

authentication pre-share

encryption 3des

hash sha

group 2

lifetime 86400

tunnel-group SPOKE1 type ipsec-l2l

tunnel-group SPOKE1 ipsec-attributes

pre-shared-key cisco123

tunnel-group SPOKE2 type ipsec-l2l

tunnel-group SPOKE2 ipsec-attributes

pre-shared-key cisco456

輻條1

access-list interesting extended permit ip

192.168.15.0 255.255.255.0 192.168.1.0 255.255.255.0

crypto ipsec transform-set myset esp-3des esp-sha-hmac

crypto ipsec security-association lifetime seconds 28800

crypto ipsec security-association lifetime kilobytes 4608000

crypto map mymap 10 match address interesting

crypto map mymap 10 set peer 10.198.16.141

crypto map mymap 10 set transform-set myset

crypto map mymap 10 set phase1-mode aggressive

crypto map mymap interface outside

crypto isakmp identity key-id SPOKE1

crypto isakmp enable outside

crypto isakmp policy 10

authentication pre-share

encryption 3des

hash sha

group 2

lifetime 86400

tunnel-group 10.198.16.141 type ipsec-l2l

tunnel-group 10.198.16.141 ipsec-attributes

pre-shared-key cisco123

輻條2

ip access-list extended interesting

permit ip 192.168.16.0 0.0.0.255 192.168.1.0 0.0.0.255

crypto isakmp policy 10

encr 3des

authentication pre-share

group 2

crypto isakmp peer address 10.198.16.141

set aggressive-mode password cisco456

set aggressive-mode client-endpoint fqdn SPOKE2

crypto ipsec transform-set myset esp-3des esp-sha-hmac

crypto map mymap 10 ipsec-isakmp

set peer 10.198.16.141

set transform-set myset

match address interesting

interface FastEthernet0/0

crypto map mymap

集線器驗證

Session Type: LAN-to-LAN Detailed

Connection   : SPOKE2

Index        : 59                     IP Addr      : 10.198.16.132

Protocol     : IKE IPsec

Encryption   : 3DES                   Hashing      : SHA1

Bytes Tx     : 400                    Bytes Rx     : 400

Login Time   : 23:45:00 UTC Thu Oct 27 2011

Duration     : 0h:00m:18s

IKE Tunnels: 1

IPsec Tunnels: 1

IKE:

Tunnel ID    : 59.1

UDP Src Port : 500                    UDP Dst Port : 500

IKE Neg Mode : Aggressive             Auth Mode    : preSharedKeys

Encryption   : 3DES                   Hashing      : SHA1

Rekey Int (T): 86400 Seconds          Rekey Left(T): 86381 Seconds

D/H Group    : 2

Filter Name  :

IPsec:

Tunnel ID    : 59.2

Local Addr   : 192.168.1.0/255.255.255.0/0/0

Remote Addr  : 192.168.16.0/255.255.255.0/0/0

Encryption   : 3DES                   Hashing      : SHA1

Encapsulation: Tunnel

Rekey Int (T): 3600 Seconds           Rekey Left(T): 3581 Seconds

Rekey Int (D): 4608000 K-Bytes        Rekey Left(D): 4608000 K-Bytes

Idle Time Out: 30 Minutes             Idle TO Left : 29 Minutes

Bytes Tx     : 400                    Bytes Rx     : 400

Pkts Tx      : 4                      Pkts Rx      : 4

NAC:

Reval Int (T): 0 Seconds              Reval Left(T): 0 Seconds

SQ Int (T)   : 0 Seconds              EoU Age(T)   : 21 Seconds

Hold Left (T): 0 Seconds              Posture Token:

Redirect URL :

Connection   : SPOKE1

Index        : 60                     IP Addr      : 10.198.16.142

Protocol     : IKE IPsec

Encryption   : 3DES                   Hashing      : SHA1

Bytes Tx     : 400                    Bytes Rx     : 400

Login Time   : 23:45:12 UTC Thu Oct 27 2011

Duration     : 0h:00m:08s

IKE Tunnels: 1

IPsec Tunnels: 1

IKE:

Tunnel ID    : 60.1

UDP Src Port : 500                    UDP Dst Port : 500

IKE Neg Mode : Aggressive             Auth Mode    : preSharedKeys

Encryption   : 3DES                   Hashing      : SHA1

Rekey Int (T): 86400 Seconds          Rekey Left(T): 86391 Seconds

D/H Group    : 2

Filter Name  :

IPsec:

Tunnel ID    : 60.2

Local Addr   : 192.168.1.0/255.255.255.0/0/0

Remote Addr  : 192.168.15.0/255.255.255.0/0/0

Encryption   : 3DES                   Hashing      : SHA1

Encapsulation: Tunnel

Rekey Int (T): 28800 Seconds          Rekey Left(T): 28791 Seconds

Rekey Int (D): 4608000 K-Bytes        Rekey Left(D): 4608000 K-Bytes

Idle Time Out: 30 Minutes             Idle TO Left : 29 Minutes

Bytes Tx     : 400                    Bytes Rx     : 400

Pkts Tx      : 4                      Pkts Rx      : 4

NAC:

Reval Int (T): 0 Seconds              Reval Left(T): 0 Seconds

SQ Int (T)   : 0 Seconds              EoU Age(T)   : 9 Seconds

Hold Left (T): 0 Seconds              Posture Token:

Redirect URL :

相關資訊

- 技術支援與文件 - Cisco Systems