目錄

簡介

必要條件

需求

採用元件

慣例

設定

網路圖表

組態

驗證

驗證命令

驗證輸出

疑難排解

疑難排解指令

調試輸出示例

相關資訊

簡介

本文檔介紹使用最新軟體在Cisco PIX防火牆和NetScreen防火牆之間建立IPsec LAN到LAN隧道的必要過程。每個裝置後都有一個專用網路，通過IPsec隧道與其他防火牆通訊。

必要條件

需求

嘗試此組態之前，請確保符合以下要求：

- NetScreen防火牆使用信任/不信任介面上的IP地址進行配置。

- 已建立與Internet的連線。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- PIX防火牆軟體版本6.3(1)

- NetScreen最新修訂版

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

請參閱思科技術提示慣例以瞭解更多有關文件慣例的資訊。

設定

本節提供用於設定本文件中所述功能的資訊。

註：使用Command Lookup Tool(僅供已註冊客戶使用)可獲取本節中使用的命令的詳細資訊。

網路圖表

本檔案會使用以下網路設定：

組態

本檔案會使用以下設定：

- PIX防火牆

- NetScreen防火牆

配置PIX防火牆

PIX防火牆

PIX Version 6.3(1)

interface ethernet0 10baset

interface ethernet1 100full

nameif ethernet0 outside security0

nameif ethernet1 inside security100

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname pixfirewall

domain-name cisco.com

fixup protocol ftp 21

fixup protocol h323 h225 1720

fixup protocol h323 ras 1718-1719

fixup protocol http 80

fixup protocol ils 389

fixup protocol rsh 514

fixup protocol rtsp 554

fixup protocol sip 5060

fixup protocol sip udp 5060

fixup protocol skinny 2000

fixup protocol smtp 25

fixup protocol sqlnet 1521

names

!--- Access control list (ACL) for interesting traffic to be encrypted and !--- to bypass the Network Address Translation (NAT) process.

access-list nonat permit ip 10.0.25.0 255.255.255.0 10.0.3.0 255.255.255.0

pager lines 24

logging on

logging timestamp

logging buffered debugging

icmp permit any inside

mtu outside 1500

mtu inside 1500

!--- IP addresses on the interfaces.

ip address outside 172.18.124.96 255.255.255.0

ip address inside 10.0.25.254 255.255.255.0

ip audit info action alarm

ip audit attack action alarm

pdm logging informational 100

pdm history enable

arp timeout 14400

global (outside) 1 interface

!--- Bypass of NAT for IPsec interesting inside network traffic.

nat (inside) 0 access-list nonat

nat (inside) 1 0.0.0.0 0.0.0.0 0 0

!--- Default gateway to the Internet.

route outside 0.0.0.0 0.0.0.0 172.18.124.1 1

timeout xlate 0:05:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h225 1:00:00

timeout h323 0:05:00 mgcp 0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

aaa-server LOCAL protocol local

http 10.0.0.0 255.0.0.0 inside

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

!--- This command avoids applied ACLs or conduits on encrypted packets.

sysopt connection permit-ipsec

!--- Configuration of IPsec Phase 2.

crypto ipsec transform-set mytrans esp-3des esp-sha-hmac

crypto map mymap 10 ipsec-isakmp

crypto map mymap 10 match address nonat

crypto map mymap 10 set pfs group2

crypto map mymap 10 set peer 172.18.173.85

crypto map mymap 10 set transform-set mytrans

crypto map mymap interface outside

!--- Configuration of IPsec Phase 1.

isakmp enable outside

!--- Internet Key Exchange (IKE) pre-shared key !--- that the peers use to authenticate.

isakmp key testme address 172.18.173.85 netmask 255.255.255.255

isakmp identity address

isakmp policy 10 authentication pre-share

isakmp policy 10 encryption 3des

isakmp policy 10 hash sha

isakmp policy 10 group 2

isakmp policy 10 lifetime 86400

telnet timeout 5

ssh timeout 5

console timeout 0

dhcpd lease 3600

dhcpd ping_timeout 750

terminal width 80

配置NetScreen防火牆

完成以下步驟以配置NetScreen防火牆。

1. 選擇Lists > Address，轉到Trusted頁籤，然後按一下New Address。

2. 新增在隧道上加密的NetScreen內部網路，然後按一下OK。

注意：確保選擇了「信任」選項。

此範例使用遮罩為255.255.255.0的網路10.0.3.0。

3. 選擇Lists > Address，轉到Untrusted頁籤，然後按一下New Address。

4. 新增NetScreen防火牆在加密資料包時使用的遠端網路，然後按一下OK。

注意：將VPN配置為非NetScreen網關時，請勿使用地址組。如果您使用地址組，則VPN互操作性將失敗。使用地址組時，非NetScreen安全網關不知道如何解釋NetScreen建立的代理ID。

對此有幾種變通辦法：

- 將地址組劃分為各個通訊簿條目。基於每個通訊簿條目指定單個策略。

- 如果可能，在非NetScreen網關（防火牆裝置）上將代理ID配置為0.0.0.0/0。

此範例使用網路10.0.25.0（遮罩為255.255.255.0）。

5. 選擇Network > VPN，轉到Gateway頁籤，然後按一下New Remote Tunnel Gateway以配置VPN網關（第1階段和第2階段IPsec策略）。

6. 使用PIX外部介面的IP地址終止隧道，並配置要繫結的第1階段IKE選項。完成後按一下OK。

此示例使用這些欄位和值。

- 網關名稱：To501

- 靜態IP地址：172.18.124.96

- 模式：主要（ID保護）

- 預共用金鑰："測試"

- 第1階段建議：pre-g2-3des-sha

成功建立遠端隧道網關後，將出現一個類似此的螢幕。

7. 轉到P1建議頁籤，然後按一下New Phase 1 Proposal以配置建議1。

8. 輸入第1階段建議的配置資訊，然後按一下OK。

此示例將這些欄位和值用於階段1交換。

- 名稱:ToPix501

- 驗證:普雷沙雷

- DH組：組2

- 加密：3DES-CBC

- 雜湊：SHA-1

- 生存期：3600秒

第1階段成功新增到NetScreen配置後，會出現一個類似於此示例的螢幕。

9. 轉到P2計畫書頁籤，然後按一下New Phase 2 Proposal以配置第2階段。

10. 輸入第2階段建議的配置資訊，然後按一下OK。

此示例將這些欄位和值用於第2階段交換。

- 名稱:ToPix501

- 完全向前保密：DH-2（1024位）

- 加密演算法：3DES-CBC

- 驗證演算法：SHA-1

- 生存期：26400秒

第2階段成功新增到NetScreen配置後，會出現一個類似於此示例的螢幕。

11. 選擇AutoKey IKE頁籤，然後按一下New AutoKey IKE Entry以建立和配置AutoKeys IKE。

12. 輸入AutoKey IKE的配置資訊，然後按一下OK。

此示例對AutoKey IKE使用這些欄位和值。

- 名稱:VPN-1

- 遠端網關隧道名稱：To501

（這之前在「網關」頁籤上建立。）

- 第2階段建議：ToPix501

（這之前在P2 Proposal頁籤上建立。）

- VPN監控器：啟用

（這使NetScreen裝置能夠設定簡單網路管理協定[SNMP]陷阱，以便監控VPN監控器的狀況。）

成功配置VPN-1規則後，會出現一個類似於此示例的螢幕。

13. 選擇Network > Policy，轉到Outgoing頁籤，然後按一下New Policy以配置允許加密IPsec流量的規則。

14. 輸入策略的配置資訊，然後按一下OK。

此示例對策略使用這些欄位和值。Name欄位是可選的，在此示例中未使用。

- 來源位址:InsideNetwork

(這之前在「受信任」(Trusted)頁籤上定義。)

- 目的地位址:遠端網路

(這之前在「不受信任」(Untrusted)頁籤下定義。)

- 服務：任何

- Action:通道

- VPN隧道：VPN-1

（先前在AutoKey IKE頁籤上將其定義為VPN隧道。）

- 修改匹配的傳入VPN策略：已檢查

（此選項自動建立與外部網路VPN流量匹配的入站規則。）

15. 新增策略時，請確保出站VPN規則在策略清單中排在第一位。（為入站流量自動建立的規則位於「入站」頁籤上。）

如果需要更改策略的順序，請完成以下步驟：

1. 按一下Outgoing（傳出）頁籤。

2. 按一下Configure列中的循環箭頭以顯示Move Policy Micro視窗。

3. 更改策略的順序，使VPN策略高於策略ID 0（使VPN策略位於清單頂部）。

轉到Incoming頁籤以檢視入站流量的規則。

驗證

本節提供的資訊可用於確認您的組態是否正常運作。

驗證命令

輸出直譯器工具(僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

- ping — 診斷基本網路連線。

- show crypto ipsec sa — 顯示第2階段安全關聯。

- show crypto isakmp sa — 顯示第1階段安全關聯。

驗證輸出

ping和show命令的輸出示例如下所示。

此ping操作是從NetScreen防火牆後的主機發起的。

C:\>ping 10.0.25.1 -t

Request timed out.

Request timed out.

Reply from 10.0.25.1: bytes=32 time<105ms TTL=128

Reply from 10.0.25.1: bytes=32 time<114ms TTL=128

Reply from 10.0.25.1: bytes=32 time<106ms TTL=128

Reply from 10.0.25.1: bytes=32 time<121ms TTL=128

Reply from 10.0.25.1: bytes=32 time<110ms TTL=128

Reply from 10.0.25.1: bytes=32 time<116ms TTL=128

Reply from 10.0.25.1: bytes=32 time<109ms TTL=128

Reply from 10.0.25.1: bytes=32 time<110ms TTL=128

Reply from 10.0.25.1: bytes=32 time<118ms TTL=128

show crypto ipsec sa命令的輸出如下所示。

pixfirewall(config)#show crypto ipsec sa

interface: outside

Crypto map tag: mymap, local addr. 172.18.124.96

local  ident (addr/mask/prot/port):

(10.0.25.0/255.255.255.0/0/0)

remote ident (addr/mask/prot/port):

(10.0.3.0/255.255.255.0/0/0)

current_peer: 172.18.173.85:500

PERMIT, flags={origin_is_acl,}

#pkts encaps: 11, #pkts encrypt: 11, #pkts digest 11

#pkts decaps: 11, #pkts decrypt: 13, #pkts verify 13

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0,

#pkts decompress failed: 0, #send errors 0, #recv errors 1

local crypto endpt.: 172.18.124.96,

remote crypto endpt.: 172.18.173.85

path mtu 1500, ipsec overhead 56, media mtu 1500

current outbound spi: f0f376eb

inbound esp sas:

spi: 0x1225ce5c(304467548)

transform: esp-3des esp-sha-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 3, crypto map: mymap

sa timing: remaining key lifetime (k/sec):

(4607974/24637)

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0xf0f376eb(4042487531)

transform: esp-3des esp-sha-hmac ,

in use settings ={Tunnel, }

slot: 0, conn id: 4, crypto map: mymap

sa timing: remaining key lifetime (k/sec):

(4607999/24628)

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

show crypto isakmp sa命令的輸出如下所示。

pixfirewall(config)#show crypto isakmp sa

Total     : 1

Embryonic : 0

dst            src        state   pending  created

172.18.124.96  172.18.173.85  QM_IDLE     0        1

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

疑難排解指令

附註：使用 debug 指令之前，請先參閱有關 Debug 指令的重要資訊。

- debug crypto engine — 顯示有關加密引擎的消息。

- debug crypto ipsec — 顯示有關IPsec事件的資訊。

- debug crypto isakmp — 顯示有關IKE事件的消息。

調試輸出示例

此處顯示了PIX防火牆的debug輸出示例。

debug crypto engine

debug crypto ipsec

debug crypto isakmp

crypto_isakmp_process_block:src:172.18.173.85,

dest:172.18.124.96 spt:500 dpt:500

OAK_MM exchange

ISAKMP (0): processing SA payload. message ID = 0

ISAKMP (0): Checking ISAKMP transform 1 against priority 10 policy

ISAKMP:      encryption 3DES-CBC

ISAKMP:      hash SHA

ISAKMP:      default group 2

ISAKMP:      auth pre-share

ISAKMP:      life type in seconds

ISAKMP:      life duration (basic) of 28800

ISAKMP (0): atts are acceptable. Next payload is 0

ISAKMP (0): processing vendor id payload

ISAKMP (0): processing vendor id payload

ISAKMP (0): SA is doing pre-shared key authentication

using id type ID_IPV4_ADDR

return status is IKMP_NO_ERROR

crypto_isakmp_process_block:src:172.18.173.85,

dest:172.18.124.96 spt:500 dpt:500

OAK_MM exchange

ISAKMP (0): processing KE payload. message ID = 0

ISAKMP (0): processing NONCE payload. message ID = 0

return status is IKMP_NO_ERROR

crypto_isakmp_process_block:src:172.18.173.85,

dest:172.18.124.96 spt:500 dpt:500

OAK_MM exchange

ISAKMP (0): processing ID payload. message ID = 0

ISAKMP (0): processing HASH payload. message ID = 0

ISAKMP (0): SA has been authenticated

ISAKMP (0): ID payload

next-payload : 8

type         : 1

protocol     : 17

port         : 500

length       : 8

ISAKMP (0): Total payload length: 12

return status is IKMP_NO_ERROR

ISAKMP (0): sending INITIAL_CONTACT notify

ISAKMP (0): sending NOTIFY message 24578 protocol 1

VPN Peer: ISAKMP: Added new peer: ip:172.18.173.85/500

Total VPN Peers:1

VPN Peer: ISAKMP: Peer ip:172.18.173.85/500 Ref cnt

incremented to:1

Total VPN Peers:1

crypto_isakmp_process_block:src:172.18.173.85,

dest:172.18.124.96 spt:500 dpt:500

ISAKMP (0): processing DELETE payload. message ID = 534186807,

spi size = 4IPSEC(key_engin

e): got a queue event...

IPSEC(key_engine_delete_sas): rec'd delete notify from ISAKMP

IPSEC(key_engine_delete_sas):

delete all SAs shared with 172.18.173.85

return status is IKMP_NO_ERR_NO_TRANS

crypto_isakmp_process_block:src:172.18.173.85,

dest:172.18.124.96 spt:500 dpt:500

OAK_QM exchange

oakley_process_quick_mode: OAK_QM_IDLE

ISAKMP (0): processing SA payload. message ID = 4150037097

ISAKMP : Checking IPSec proposal 1

ISAKMP: transform 1, ESP_3DES

ISAKMP:   attributes in transform:

ISAKMP:      SA life type in seconds

ISAKMP:      SA life duration (VPI) of 0x0 0x0 0x67 0x20

ISAKMP:      encaps is 1

ISAKMP:      authenticator is HMAC-SHA

ISAKMP:      group is 2

ISAKMP (0): atts are acceptable.

IPSEC(validate_proposal_request): proposal part #1,

(key eng. msg.) dest= 172.18.124.96, src= 172.18.173.85,

dest_proxy= 10.0.25.0/255.255.255.0/0/0 (type=4),

src_proxy= 10.0.3.0/255.255.255.0/0/0 (type=4),

protocol= ESP, transform= esp-3des esp-sha-hmac ,

lifedur= 0s and 0kb,

spi= 0x0(0), conn_id= 0, keysize= 0, flags= 0x24

ISAKMP (0): processing NONCE payload. message ID = 4150037097

ISAKMP (0): processing KE payload. message ID = 4150037097

ISAKMP (0): processing ID payload. message ID = 4150037097

ISAKMP (0): ID_IPV4_ADDR_SUBNET src 10.0.3.0/255.255.255.0

prot 0 port 0

ISAKMP (0): processing ID payload. message ID = 4150037097

ISAKMP (0): ID_IPV4_ADDR_SUBNET dst 10.0.25.0/255.255.255.0

prot 0 port 0IPSEC(key_engine)

: got a queue event...

IPSEC(spi_response): getting spi 0x1225ce5c(304467548) for SA

from   172.18.173.85 to   172.18.124.96 for prot 3

return status is IKMP_NO_ERROR

crypto_isakmp_process_block:src:172.18.173.85,

dest:172.18.124.96 spt:500 dpt:500

OAK_QM exchange

oakley_process_quick_mode:

OAK_QM_AUTH_AWAITmap_alloc_entry: allocating entry 3

map_alloc_entry: allocating entry 4

ISAKMP (0): Creating IPSec SAs

inbound SA from 172.18.173.85 to 172.18.124.96

(proxy 10.0.3.0 to 10.0.25.0)

has spi 304467548 and conn_id 3 and flags 25

lifetime of 26400 seconds

outbound SA from 172.18.124.96 to 172.18.173.85

(proxy 10.0.25.0 to 10.0.3.0)

has spi 4042487531 and conn_id 4 and flags 25

lifetime of 26400 secondsIPSEC(key_engine): got a queue event...

IPSEC(initialize_sas): ,

(key eng. msg.) dest= 172.18.124.96, src= 172.18.173.85,

dest_proxy= 10.0.25.0/255.255.255.0/0/0 (type=4),

src_proxy= 10.0.3.0/255.255.255.0/0/0 (type=4),

protocol= ESP, transform= esp-3des esp-sha-hmac ,

lifedur= 26400s and 0kb,

spi= 0x1225ce5c(304467548), conn_id= 3,

keysize= 0, flags= 0x25

IPSEC(initialize_sas): ,

(key eng. msg.) src= 172.18.124.96, dest= 172.18.173.85,

src_proxy= 10.0.25.0/255.255.255.0/0/0 (type=4),

dest_proxy= 10.0.3.0/255.255.255.0/0/0 (type=4),

protocol= ESP, transform= esp-3des esp-sha-hmac ,

lifedur= 26400s and 0kb,

spi= 0xf0f376eb(4042487531), conn_id= 4, keysize= 0, flags= 0x25

VPN Peer: IPSEC: Peer ip:172.18.173.85/500 Ref cnt

incremented to:2 Total VPN Peers:1

VPN Peer: IPSEC: Peer ip:172.18.173.85/500 Ref cnt

incremented to:3 Total VPN Peers:1

return status is IKMP_NO_ERROR

相關資訊

- IPSec 協商/IKE 通訊協定

- Cisco PIX防火牆軟體

- Cisco Secure PIX防火牆命令參考

- 安全產品現場通知（包括PIX）

- 要求建議 (RFC)

- 技術支援與文件 - Cisco Systems