目錄

簡介

背景資訊

Backup Configuration-db

恢復vManage

步驟 1.vManage上的最低配置

步驟 2.復製備份配置和根證書

步驟 3.安裝根證書

步驟 4.更新基本資訊

步驟 5.安裝vManage證書

步驟 6.恢複資料庫

步驟 7.檢查服務

步驟 8.重新驗證控制器

步驟 9.將更新傳送到控制器

簡介

本文檔介紹通過使用配置資料庫備份還原vManage所涉及的步驟。

背景資訊

本文檔假定已定期進行配置資料庫備份，由於某種原因，獨立vManage不可恢復，需要軟體重置或新安裝。

本文檔可幫助您恢復所有策略、模板、配置和邊緣裝置證書。

Backup Configuration-db

vManage_rcdn01# request nms configuration-db backup path 05_08_20_configdb

Starting backup of configuration-db

config-db backup logs are available in /var/log/nm/neo4j-backup.log file

Successfully saved database to /opt/data/backup/05_08_20_configdb.tar.gz

scp到外部伺服器。

vManage_rcdn01# vshell

vManage_rcdn01:~$ scp /opt/data/backup/05_08_20_configdb.tar.gz user@10.2.3.1://home/ftpuser/ftp/amaugust/

amaugust@10.2.3.1's password:

05_08_20_configdb.tar.gz                                                     100%  484KB  76.6MB/s   00:00

恢復vManage

通過命令重置vManage來模擬災難：

vManage_rcdn01# request software reset

現在，您已經有了新的vManage（類似於所示的vManage），建議在恢復備份之前按照正確的順序執行恢復過程。

步驟 1.vManage上的最低配置

system

host-name             vManage_rcdn01

system-ip             xx.xx.xx.xx

site-id               100

organization-name     ****.cisco

vbond vbond.list

!

!

vpn 0

host vbond.list ip 10.2.3.4 10.2.3.5

interface eth0

ip address 10.1.3.8/24

tunnel-interface

no shutdown

!

ip route 0.0.0.0/0 10.1.3.1

!

vpn 512

interface eth1

ip address 10.11.3.8/24

no shutdown

!

ip route 0.0.0.0/0 10.1.3.1

!

步驟 2.復製備份配置和根證書

vManage_rcdn01:~$ scp am****@xx.xx.xx.xx://home/ftpuser/ftp/am****/05_08_20_configdb.tar.gz  .

am****@xx.xx.xx.xx's password:

05_08_20_configdb.tar.gz                                                    100%  484KB  76.6MB/s   00:00

Verify

vManage_rcdn01:~$ ls -lh

total 492K

-rw-r--r-- 1 admin admin  394 May  8 15:20 archive_id_rsa.pub

-rwxr-xr-x 1 admin admin 485K May  8 15:3905_08_20_configdb.tar.gz

Copy root certificate from other controller:

vManage_rcdn01:~$ scp admin@vbond://home/admin/root.crt .

viptela 18.4.4

admin@vbond's password:

root.crt                                                                   100% 1380     2.8MB/s   00:00

步驟 3.安裝根證書

vManage_rcdn01# request root-cert-chain install /home/admin/root.crt

Uploading root-ca-cert-chain via VPN 0

Copying ... /home/admin/root.crt via VPN 0

Updating the root certificate chain..

Successfully installed the root certificate chain

步驟 4.更新基本資訊

導航至  Administration > Settings 並配置vBond IP、組織名稱和證書的基本資訊。

步驟 5.安裝vManage證書

使用 root.crt 安裝在Step 2。

步驟 6.恢複資料庫

vManage_rcdn01# request nms configuration-db restore path /home/admin/05_08_20_configdb.tar.gz

Configuration database is running in a standalone mode

0 [main] INFO com.viptela.vmanage.server.deployment.cluster.ClusterConfigurationFileHandler  - Trying to update existing working copy of server_configs.json file

4 [main] INFO com.viptela.vmanage.server.deployment.cluster.ClusterConfigurationFileHandler  - Working copy of server_configs.json NOT updated due to unmodified configs

Successfully saved cluster configuration for localhost

Starting DB backup from: localhost

Creating directory: local

cmd to backup db: sh /usr/bin/vconfd_script_nms_neo4jwrapper.sh backup localhost /opt/data/backup/local 8g

Finished DB backup from: localhost

Stopping NMS application server on localhost

Stopping NMS configuration database on localhost

Reseting NMS configuration database on localhost

Restoring from DB backup: /opt/data/backup/staging/graph.db-backup

cmd to restore db: sh /usr/bin/vconfd_script_nms_neo4jwrapper.sh  restore /opt/data/backup/staging/graph.db-backup

Successfully restored DB backup: /opt/data/backup/staging/graph.db-backup

Starting NMS configuration database on localhost

Waiting for 10s before starting other instances...

Polling neo4j at: localhost

NMS configuration database on localhost has started.

Updating DB with the saved cluster configuration data

Successfully reinserted cluster meta information

Starting NMS application-server on localhost

Waiting for 120s for the instance to start...

Removed old database directory: /opt/data/backup/local/graph.db-backup

Successfully restored database

此步驟需要更多時間，具體取決於備份。

您可以通過以下方式驗證該流程：  tailing  vShell上的日誌。

vManage_rcdn01:~$ tail -fq /var/log/nms/vmanage-server.log /var/log/nms/neo4j-out.log

步驟 7.檢查服務

vManage_rcdn01# request nms all status

步驟 8.重新驗證控制器

目前，您可以觀察到所有策略、模板和配置都已載入到vManage中，但所有控制器均已關閉。

您需要重新驗證所有控制器。

導航至  Configuration > Devices.編輯每個控制器並填寫管理IP地址（管理IP可以在本地配置中找到）使用者名稱和密碼。

步驟 9.將更新傳送到控制器

現在，您會看到所有裝置都可以通過vManage進行管理。