目錄

簡介

必要條件

需求

採用元件

設定

網路圖表

配置步驟

遷移步驟

驗證

疑難排解

常見問題

問：是否可以將新成員從M卡新增到vPC對等鏈路，但將當前的F1成員留在捆綁包中，然後在新增新成員後將其刪除？

簡介

本檔案定義了將虛擬PortChannel(vPC)對等連結從Nexus 7000 F1模組遷移至M1模組所需的步驟。當F1模組因可擴充性或其他原因而需要升級時，可能會發生此情況。

必要條件

需求

思科建議您瞭解以下主題：

- Nexus作業系統CLI

- vPC規則

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- Nexus 7000版本6.1.x及更高版本

- M1/F1系列線路卡

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

設定

網路圖表

對於此測試，藍線將對映相互通訊的兩台主機的資料路徑。

配置步驟

模組3和模組4是N7K-F132XP-15線卡。這是從vPC角度進行的當前配置。

N7K1# show run vpc

version 6.1(2)feature vpc

vpc domain 10

role priority 100

peer-keepalive destination 10.201.254.254 source 10.201.254.253 vrf VPC

peer-gateway

auto-recovery

interface port-channel1

vpc peer-link

interface port-channel20

vpc 20

interface port-channel30

vpc 30

N7K2# show run vpc

version 6.1(2)

feature vpc

vpc domain 10

role priority 200

peer-keepalive destination 10.201.254.253 source 10.201.254.254 vrf VPC

peer-gateway

auto-recovery

interface port-channel1

vpc peer-link

interface port-channel20

vpc 20

interface port-channel30

vpc 30

interface port-channel50

vpc 50

遷移步驟

1. 關閉vPC對等鏈路埠通道1。
Int po1

Shut
此操作暫停輔助端的vPC鏈路。vPC鏈路將位於主端。

2. 關閉埠e3/1和e4/1並從兩個Nexus模組中刪除通道組配置。
Int e3/1,e4/1

Shut

No channel-group 1

N7K1# show port-c sum

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

--------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

--------------------------------------------------------------------------------

1     Po1(SD)     Eth      NONE      --

20    Po20(SU)    Eth      LACP      Eth3/4(P)

30    Po30(SU)    Eth      LACP      Eth4/4(P)

50    Po50(SD)    Eth      LACP      Eth2/12(D)

100   Po100(RU)   Eth      LACP      Eth2/48(P)

3. 使用M1埠並將其捆綁到vPC埠通道中。使用模組7上的埠，該模組是N7K-M108X2-12L線卡。配置e7/7，使其與兩端e3/1或e4/1具有相同的配置。在本示例中，使用單個埠。在真實情況下，有多個埠。但是，這些步驟同樣適用。

interface Ethernet7/7

switchport

switchport mode trunk

channel-group 1 mode active

no shutdown

N7K1# show port-c sum

Flags:   D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

--------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

--------------------------------------------------------------------------------

1     Po1(SD)     Eth      LACP      Eth7/7(D)

20    Po20(SU)    Eth      LACP      Eth3/4(P)

30    Po30(SU)    Eth      LACP      Eth4/4(P)

50    Po50(SD)    Eth      LACP      Eth2/12(D)

100   Po100(RU)   Eth      LACP      Eth2/48(P)

4. 在兩端開啟埠通道1。

Int po1

No shut
這會調出輔助端的vPC連結。現在，您的對等鏈路位於M1線卡上。

在此測試中，當使用輔助路徑的流量故障轉移到主路徑時，該流量將發生小中斷。始終建議為這些型別的更改設定更改視窗，以便適應任何不需要的意外事件。

驗證

目前沒有適用於此組態的驗證程序。

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

常見問題

問：是否可以將新成員從M卡新增到vPC對等鏈路，但將當前的F1成員留在捆綁包中，然後在新增新成員後將其刪除？

A.不能使用來自不同卡型別（例如M1和F1）的埠形成對等鏈路。