目錄

簡介

必要條件

需求

採用元件

設定

網路圖表

將增強型ARM用於蜂窩模式MPLS

組態

將增強型ARM用於通過ATM VP隧道的幀模式MPLS

C8540MSR-1(Catalyst 8540MSR)

組態

驗證

疑難排解

相關資訊

簡介

本檔案將提供Catalyst 8540增強型ATM路由器模組(ARM)上的多重協定層交換(MPLS)的範例組態。 ARM模組的主要功能是增強連線兩個不同世界的能力 — 分組/交換（基於幀）和ATM（基於信元）。 此功能也可以擴展到MPLS。具有增強型ARM的Catalyst 8540 MSR可以安裝在基於資料包和信元的網路的邊緣，並在同一機箱中啟用兩種MPLS模式。Catalyst 8540 MSR上的增強型ARM(ARM2)對於ATM介面上的標籤邊緣路由(LER)功能是必需的 — 它充當標籤交換路徑(LSP)中每個傳入和傳出ATM介面的代理介面，以執行MPLS封包處理。Catalyst 8540非常適合於蜂窩模式到幀模式MPLS整合（通過部署增強型ATM路由器模組來實現）。 一個機箱中最多可使用兩個ARM2卡。

本文提供兩個不同配置的示例，說明ARM 2的使用。

- 將增強型ARM用於蜂窩模式（在ARM 2上終止蜂窩模式MPLS）

- 將增強型ARM用於通過ATM over ATM VP隧道的幀模式MPLS。

必要條件

需求

本文件沒有特定需求。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 兩個Cisco C8540 MSR，Cisco IOS®版本12.1(10)EY(256 MB DRAM)

- Cisco C8510 MSR，Cisco IOS版本12.1(7a)EY1(64 MB DRAM)

- C8540-ARM2（增強型ATM路由器模組）

- WAI-OC3-4MM（4埠OC-3線卡）

- C85MS-4F-OC12MM（4埠OC-12線卡）

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您在即時網路中工作，請確保在使用任何命令之前瞭解其潛在影響。

設定

本節提供用於設定本文件中所述功能的資訊。OSPF用作內部路由協定。

網路圖表

本檔案會使用下圖所示的網路設定：

以上圖表適用於以下場景：

- 將增強型ARM用於蜂窩模式（在ARM 2上終止蜂窩模式MPLS）

- 將增強型ARM用於通過ATM over ATM VP隧道的幀模式MPLS。

請注意，單元模式的組態使用路徑C8540MSR-2到C8510MSR-3到C8540MSR-1，而本檔案所述的訊框模式的組態使用VP通道連線C8540MSR-2和C8540MSR-1。

將增強型ARM用於蜂窩模式MPLS

在Catalyst 8540 MSR上，所有ATM介面都支援MPLS，且與ATM訊號（例如ILMI）和ATM路由(PNNI)並行運作。 當您新增mpls ip介面命令(或舊版Cisco IOS中的tag-switching ip)並要求為每個轉發等效類(FEC)或IP目標建立一個單向標籤虛擬電路(LVC)或標籤虛擬電路(TVC)時，會啟用蜂窩模式MPLS。標籤虛擬電路在發起方LER處稱為頭端LVC，在目標LER處稱為尾端LVC，在LSR處稱為transit LVC。如果Cat8540 MSR充當純ATM LSR（MPLS P路由器），CPU不會為ATM核心中獲知的路由建立頭端LVC。源自CPU且目的地為遠端LSR的流量通過MPLS控制VC傳送。ATM介面可以連結到ARM2埠，如果是，LVC將在ARM2埠終止。實際上，當您將ATM介面連結到ARM2連線埠時，ARM2會充當ATM LER（MPLS PE路由器），並為在ATM核心中獲知的路由啟動頭端LVC（終止LVC）。

可以將ATM介面、ATM VP和分層VP隧道配置為在ARM2埠上終止（僅在8540 MSR平台上可用）。 出於負載均衡的目的，ATM介面可以連結到增強型ARM的兩個埠之一。要在ARM2埠上終止蜂窩模式MPLS，請使用mpls-forwarding interface ATMx/y/z介面配置命令，其中ATMx/y/z是增強型ARM埠)。 該命令僅適用於主介面。

組態

- C8540MSR-2

- C8510MSR-3

C8540MSR-2(Catalyst 8540MSR)

C8540MSR-2#show hardware

C8540 named c8540MSR-2, Date: 04:46:41 UTC Mon Feb 10 2003

Slot Ctrlr-Type    Part No.  Rev  Ser No  Mfg Date  RMA No.  Hw Vrs  Tst EEP

---- ------------  ---------- -- -------- --------- -------- ------- --- ---

0/* Super Cam     73-2739-03 B0 03170SXG Apr 27 99 0          3.0

0/1 155MM PAM     73-1496-03 A0 09006167 Aug 01 95 00-00-00   3.1     0   2

2/* OCM Board     73-2833-06 A0 03210XWB May 26 99 0          6.0

2/0 QUAD 622 Gen  73-2852-05 A0 03210YN8 May 26 99 0          5.0

9/* ETHERNET PAM  73-3754-05 A0 03374A9K Mar 17 99 0          4.1

12/* CMPM Card     73-3944-05 A0 04209EX0 Aug 29 00 0          5.0

12/0 ARM2 PAM      73-5533-01 A0 0424A160 Aug 29 00 0          5.1

12/1 ARM2 PAM      73-5533-01 A0 0424A183 Aug 29 00 0          5.1

C8540MSR-2#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

C8540MSR-2(config)#int atm 0/1/2

C8540MSR-2(config-if)#mpls ip

! Cell mode MPLS enabled

C8540MSR-2(config-if)#ip add 10.254.14.237 255.255.255.252

C8540MSR-2(config-if)#mpls label protocol ldp

! LDP enabled on the interface

C8540MSR-2(config-if)#end

C8540MSR-2#show atm vc int atm 0/1/2

Interface         VPI  VCI   Type   X-Interface      X-VPI X-VCI Encap  Status

ATM0/1/2          0    5     PVC    ATM0             0     57     QSAAL  UP

ATM0/1/2          0    16    PVC    ATM0             0     37     ILMI   UP

ATM0/1/2          0    18    PVC    ATM0             0     202    PNNI   UP

ATM0/1/2          0    32    PVC    ATM0             0     256    SNAP   UP

C8540MSR-2#show mpls int atm 0/1/2

Interface       IP            Tunnel   Operational

ATM0/1/2        Yes (ldp)     No       Yes         (ATM labels)

C8540MSR-2#show mpls int atm 0/1/2 det

Interface ATM0/1/2:

IP labeling enabled (ldp)

LSP Tunnel labeling not enabled

MPLS operational

MTU = 4470

ATM tagging: Label VPI = 1

Label VCI range = 33 - 65535

Control VC = 0/32

C8540MSR-2#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

C8540MSR-2(config)#int atm 0/1/2

C8540MSR-2(config-if)#mpls-forwarding int atm 12/0/1

! Terminate Cell mode MPLS on ARM2

C8540MSR-2(config-if)#end

C8540MSR-2#show atm vc int atm 0/1/2

Interface       VPI  VCI   Type   X-Interface   X-VPI X-VCI Encap  Status

ATM0/1/2        0    5     PVC    ATM0           0    57    QSAAL  UP

ATM0/1/2        0    16    PVC    ATM0           0    37    ILMI   UP

ATM0/1/2        0    18    PVC    ATM0           0   202    PNNI   UP

ATM0/1/2        0    32    PVC    ATM12/0/1      2   120    SNAP   UP

ATM0/1/2        1    35    TVC(O) ATM12/0/1      2   121    MUX    UP

ATM0/1/2        1    36    TVC(O) ATM12/0/1      2   122    MUX    UP

ATM0/1/2        1    37    TVC(O) ATM12/0/1      2   123    MUX    UP

ATM0/1/2        1    41    TVC(O) ATM12/0/1      2   124    MUX    UP

C8540MSR-2#show mpls int

Interface           IP            Tunnel   Operational

FastEthernet9/0/0   Yes (ldp)     No       Yes

ATM0/1/2            Yes (ldp)     No       Yes     (ATM labels)

! Note: ATM labels -> Cell mode

ATM12/0/0.60        Yes(ldp)      No       Yes

附註：在第二個8540 MSR(C8540MSR-1)上應該使用前面顯示的相同配置過程。此處不顯示此配置，因為若要使MPLS啟動並運行，需要相同的步驟。

C8510MSR-3(Catalyst 8510MSR)

C8510MSR-1#show running-config

Building configuration...

!

interface Loopback0

ip address 10.254.231.1 255.255.255.255

!

interface ATM0/0/2

ip address 10.254.14.245 255.255.255.252

logging event subif-link-status

no atm ilmi-keepalive

mpls label protocol ldp

tag-switching ip

!

interface ATM0/0/3

ip address 10.254.14.238 255.255.255.252

logging event subif-link-status

load-interval 30

no atm ilmi-keepalive

mpls label protocol ldp

tag-switching ip

!

router ospf 1

log-adjacency-changes

network 10.0.0.0 0.255.255.255 area 0.0.0.0

將增強型ARM用於通過ATM VP隧道的幀模式MPLS

具有增強型ARM線路卡的Catalyst 8540 MSR還可以在ATM上運行幀模式MPLS。為了說明增強型ARM在幀模式MPLS中的使用情況，請檢視本文檔中的「使用增強型ARM實現通過ATM隧道的MPLS」配置示例。ATM VP通道有時用於連線兩個站點。可以使用大型「管道」VP隧道而不是配置單個VC。為了說明該選項（通常在遠端站點之間需要大量虛電路的公司使用），在C8540MSR-1和C8540MSR-2之間建立了VP隧道。兩個8540MSR通過ATM2/0/0直接連線（OC-12，已使用分層VP隧道ATM2/0/0.60）。 兩個增強型ARM模組在ATM子介面上運行幀模式MPLS。因此，已配置資料PVC/aal5snap。

此範例顯示在C8540MSR-1中執行的步驟，其目的是為使用ATM VP通道的訊框模式MPLS設定增強型ARM。

C8540MSR-1(Catalyst 8540MSR)

C8540MSR-1#show hardware

C8540 named c8540-r6-1, Date: 04:46:41 UTC Mon Feb 10 2003

Slot Ctrlr-Type    Part No.  Rev  Ser No  Mfg Date   RMA No. Hw Vrs  Tst EEP

---- ------------  ---------- -- -------- --------- -------- ------- --- ---

0/* Super Cam     73-2739-03 B0 03170SUQ Apr 27 99 0          3.0

0/1 155MM PAM     73-1496-03 A6 03199939 Aug 01 95 00-00-00   3.1     0   2

2/* OCM Board     73-2833-06 A0 03210XWB May 26 99 0          6.0

2/0 QUAD 622 Gen  73-2852-05 A0 03210YN8 May 26 99 0          5.0

9/* ETHERNET PAM  73-3754-05 A0 031111EO Mar 17 99 0          4.1

11/* CMPM Card     73-3944-05 A0 04209F5E Aug 29 00 0          5.0

11/0 ARM2 PAM      73-5533-01 A0 0424A162 Aug 29 00 0          5.1

11/1 ARM2 PAM      73-5533-01 A0 0424A17C Aug 29 00 0          5.1

C8540MSR-1#conf t

Enter configuration commands, one per line.  End with CNTL/Z.

C8540MSR-1(config)#atm hierarchical-tunnel

C8540MSR-1(config)#atm connection-traffic-table-row index 60 cbr pbr 120000

C8540MSR-1(config)#int atm 2/0/0

C8540MSR-1(config-if)#atm pvp 6 hierarchical rx-cttr 60 tx-cttr 60

C8540MSR-1(config-if)#int atm 2/0/0.60

C8540MSR-1(config-subif)#exit

C8540MSR-1(config)#int atm 11/0/0.60 point-to-point

C8540MSR-1(config-subif)#ip address 10.254.14.10 255.255.255.252

C8540MSR-1(conf-sif)#atm pvc 2 60 pd on encap aal5snap int atm 2/0/0.60 60 60

C8540MSR-1(config-subif)#mpls label protocol ldp

C8540MSR-1(config-subif)#mpls ip

C8540MSR-1(config-subif)#end

C8540MSR-1#show atm vc int atm 11/0/0.60 | include ATM2/

ATM11/0/0         2    60    PVC    ATM2/0/0.60      60    60    SNAP   UP

C8540MSR-1#show mpls int

Interface              IP            Tunnel   Operational

ATM0/0/1               Yes (ldp)     No       Yes         (ATM labels)

ATM0/0/2               Yes           No       No          (ATM labels)

FastEthernet9/0/4      Yes           No       No

ATM0/1/0               Yes (ldp)     No       No          (ATM labels)

ATM11/0/1              Yes           No       No

ATM11/0/0.5            Yes (tdp)     No       Yes

ATM11/0/0.60           Yes (ldp)     No       Yes

! Note: no ATM labels -> Frame mode

C8540MSR-1#show mpls int atm 11/0/0.60 det

Interface ATM11/0/0.60:

IP labeling enabled (ldp)        LSP Tunnel labeling not enabled

MPLS operational        MTU = 4470

C8540MSR-1#show atm vp

Interface         VPI  Type  X-Interface         X-VPI     Status

ATM2/0/0          60   PVP                                 HIE. TUNNEL

組態

下面顯示了網路圖中MSR配置的相關部分：

- C8540MSR-2

- C8540MSR-1

- C8510MSR-3(此組態與使用增強型ARM進行細胞模式MPLS的組態相同。)

C8540MSR-2(Catalyst 8540MSR)

C8540MSR-2#show running-config

Building configuration...

!

mpls label protocol ldp

atm hierarchical-tunnel

atm connection-traffic-table-row index 60 cbr pcr 120000

!

interface Loopback0

ip address 10.254.225.1 255.255.255.255

!

interface ATM0/1/2

description IP subnet 10.254.14.236

ip address 10.254.14.237 255.255.255.252

ip ospf cost 4

no atm ilmi-keepalive

mpls label protocol ldp

tag-switching ip

mpls-forwarding interface ATM12/0/1

! terminates cell mode MPLS on the ARM module

interface ATM2/0/0

no ip address

no atm ilmi-keepalive

atm pvp 60 hierarchical rx-cttr 60 tx-cttr 60

!

interface ATM2/0/0.60 point-to-point

description Hierarchical VP Tunnel for frame mode MPLS over ATM

!

interface FastEthernet9/0/0

ip address 10.64.0.2 255.255.255.252

load-interval 30

duplex full

speed 100

tag-switching ip

mpls-forwarding interface ATM12/0/0

! EPIF based FE line cards do not support MPLS natively

! link to ARM2 (ATM 12/0/0) enables MPLS on those cards

interface ATM12/0/0

description Enhanced ARM - ARM2

no ip address

!

interface ATM12/0/0.60 point-to-point

description ARM2 subinterface used for Frame mode MPLS over HVPT 60

ip address 10.254.14.9 255.255.255.252

atm pvc 2 60 pd on  encap

al5snap interface  ATM2/0/0.60 60 60

mpls label protocol ldp

tag-switching ip

! an ARM2 point-to-point subinterface (point-to-point) supported as of

! Cisco IOS release 12.1(10)EY only

!

router ospf 1

router-id 10.254.225.1

log-adjacency-changes

network 10.0.0.0 0.255.255.255 area 0.0.0.0

!

C8540MSR-1(Catalyst 8540MSR)

C8540MSR-1#show running-config

Building configuration...

sdm sram Label 32768

sdm sram Tag-Cos 32768

!

tag-switching tdp router-id Loopback0

!

atm hierarchical-tunnel

atm connection-traffic-table-row index 60 cbr pcr 120000

!

interface Loopback0

ip address 10.254.232.1 255.255.255.255

!

interface ATM0/1/0

ip address 10.254.14.246 255.255.255.252

ip ospf cost 100

logging event subif-link-status

no atm ilmi-keepalive

mpls label protocol ldp

tag-switching ip

mpls-forwarding interface ATM11/0/0

!

interface ATM2/0/0

no ip address

no atm ilmi-keepalive

atm pvp 60 hierarchical rx-cttr 60 tx-cttr 60

!

interface ATM2/0/0.60 point-to-point

no atm ilmi-keepalive

!

interface FastEthernet9/0/4

ip address 10.177.1.1 255.255.255.252

tag-switching ip

mpls-forwarding interface ATM11/0/0

!

interface ATM11/0/0

no ip address

!

interface ATM11/0/0.60 point-to-point

ip address 10.254.14.10 255.255.255.252

atm pvc 2 60 pd on  encap aal5snap interface  ATM2/0/0.60 60 60

mpls label protocol ldp

tag-switching ip

!

router ospf 1

router-id 10.254.232.1

log-adjacency-changes

network 10.177.1.0 0.0.0.3 area 0.0.0.0

network 10.254.0.0 0.0.255.255 area 0.0.0.0

!

end

驗證

使用以下命令以驗證MPLS是否已啟動並正常工作：

- show mpls interfaces [detail] — 驗證標籤分發協定是否在請求的介面上運行

- show mpls ldp neighbors — 顯示LDP會話/鄰居連線的狀態

- show mpls ldp discovery — 確定介面的LDP識別符號和LDP hello交換狀態

- show mpls forwarding-table - 檢查MPLS轉發資訊庫(FIB)表

- show mpls ip binding - 檢查MPLS IP標籤資訊庫(LIB)表

C8540MSR-1#show mpls interfaces

Interface              IP            Tunnel   Operational

ATM0/0/1               Yes (ldp)     No       Yes         (ATM labels)

ATM0/1/0               Yes (ldp)     No       Yes         (ATM labels)

ATM11/0/0.60           Yes (ldp)     No       Yes

C8540MSR-1#show mpls interfaces atm 0/1/0 detail

Interface ATM0/1/0:

IP labeling enabled (ldp)

LSP Tunnel labeling not enabled

MPLS operational

MTU = 4470

ATM tagging: Label VPI = 1

Label VCI range = 33 - 65535

Control VC = 0/32

C8540MSR-1#show mpls ldp neighbor

Peer LDP Ident: 10.254.225.1:0; Local LDP Ident 10.254.232.1:0

TCP connection: 10.254.225.1.646 - 10.254.232.1.11016

State: Oper; Msgs sent/rcvd: 106/93; Downstream

Up time: 00:56:36

LDP discovery sources:

ATM11/0/0.60, Src IP addr: 10.254.14.9

Addresses bound to peer LDP Ident:

2.2.2.1         10.64.4.190     10.254.225.1    1.254.8.1

10.254.14.221   10.254.14.225   10.254.14.237   10.254.14.9

Peer LDP Ident: 10.254.231.1:4; Local LDP Ident 10.254.232.1:2

TCP connection: 10.254.14.245.646 - 10.254.14.246.11017

State: Oper; Msgs sent/rcvd: 45/45; Downstream on demand

Up time: 00:38:27

LDP discovery sources:

ATM0/1/0, Src IP addr: 10.254.14.245

C8540MSR-1#show mpls ldp discovery

Local LDP Identifier:     10.254.232.1:0

Discovery Sources:

Interfaces:

ATM0/1/0 (ldp): xmit/recv           LDP Id: 10.254.231.1:4; IP addr:    10.254.14.245

ATM11/0/0.60 (ldp): xmit/recv       LDP Id: 10.254.225.1:0

C8540MSR-1#show mpls forwarding-table

Local  Outgoing    Prefix              Bytes tag  Outgoing   Next Hop

tag    tag or VC   or Tunnel Id        switched   interface

16     Untagged    10.254.14.220/30    0          AT11/0/0.60 point2point

17     27          10.254.247.1/32     0          AT11/0/0.60

point2point

20     22          10.254.14.240/30    0          AT11/0/0.60

point2point

21     26          10.254.231.1/32     0          AT11/0/0.60

point2point

24     Untagged    10.254.14.224/30    0          AT11/0/0.60

point2point

25     24          10.254.227.1/32     0          AT11/0/0.60

point2point

26     Pop tag     10.254.14.236/30    0          AT11/0/0.60

point2point

33     Untagged    10.254.221.1/32     0          AT11/0/0.60

point2point

45     18          10.254.14.12/30     0          AT11/0/0.60 point2point

SORBRCV0(c8540-r6-1)#show mpls ip bind

...

10.254.221.1/32

in label:     33

10.254.222.1/32

in label:     36

out vc label: 1/53      lsr: 10.254.233.1:2   ATM0/0/1

Active    ingress 4 hops (vcd 49)

10.254.223.1/32

in label:     34

out vc label: 1/54      lsr: 10.254.233.1:2   ATM0/0/1

Active    ingress 3 hops (vcd 43)

10.254.225.1/32

in label:     28

out label:    imp-null  lsr: 10.254.225.1:0

10.254.227.1/32

in label:     25

out label:    24        lsr: 10.254.225.1:0

10.254.232.1/32

in label:     imp-null

in vc label:  1/34      lsr: 10.254.233.1:2   ATM0/0/1

Active    egress (vcd 59)

out label:    33        lsr: 10.254.225.1:0

10.254.233.1/32

in label:     29

out label:    34        lsr: 10.254.225.1:0

out vc label: 1/60      lsr: 10.254.233.1:2   ATM0/0/1

Active    ingress 2 hops (vcd 38)

10.254.242.1/32

in label:     19

out vc label: 1/61      lsr: 10.254.233.1:2   ATM0/0/1

Active    ingress 5 hops (vcd 50)

10.254.247.1/32

in label:     17

out label:    27        lsr: 10.254.225.1:0

疑難排解

有關MPLS故障排除的其他資訊，請參閱MPLS故障排除一般故障排除文檔，其中詳細介紹了MPLS故障排除。

相關資訊

- MPLS技術支援

- ATM技術支援

- 工具與資源 — Cisco Systems

- 技術支援與文件 - Cisco Systems