目錄

簡介

必要條件

需求

採用元件

相關產品

慣例

路由器ID

值傳輸

已知問題

疑難排解

單區域網路

使用ASBR的多個區域

錯誤消息：%OSPF-4-FLOOD_WAR:處理60500在區域10.40.0.0中刷新LSA ID 10.x.x.0 type-5 adv-rtr 10.40.x.x

相關資訊

簡介

本文描述運行開放最短路徑優先(OSPF)的路由器如何選擇路由器ID、傳送此值的資料包，以及如何對報告重複ID的路由器日誌消息進行故障排除。

必要條件

需求

思科建議您瞭解以下主題：

- IP路由協定

- OSPF路由協定

採用元件

本檔案中的資訊是根據Cisco IOS®軟體版本12.2。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

相關產品

此配置還可以用於以下硬體和軟體版本：

- 所有路由器，如2500和2600系列

- 第3層交換機

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

路由器ID

預設情況下，當OSPF進程初始化時，它會選擇路由器上的最高IP地址作為OSPF進程的路由器ID。路由器ID唯一標識OSPF域內的路由器。

如配置OSPF中所述，OSPF使用介面上配置的最大IP地址作為其路由器ID。如果與此IP地址關聯的介面發生故障，或者該地址被刪除，則OSPF進程必須重新計算新的路由器ID，並從其介面重新傳送其所有路由資訊。

如果環回介面配置了IP地址，Cisco IOS軟體將使用此IP地址作為其路由器ID，即使其他介面的IP地址較大。由於環回介面從不關閉，因此路由表實現了更高的穩定性。

OSPF自動優先使用環回介面，而不是其他任何介面，它在所有環回介面中選擇最高的IP地址。如果沒有環回介面，則選擇路由器中的最高IP地址。不能將OSPF定向為使用任何特定介面。一旦路由器ID被選擇，它不會更改，除非OSPF進程重新啟動或重新載入路由器。

注意：如果啟動時沒有具有有效IP地址處於up/up狀態的接口，則OSPF報告無法將路由器ID錯誤消息分配到日志。

這些命令用於檢視路由器ID。

- show ip ospf

- show ip ospf interface

R2-AGS#show ip ospf interface e0

Ethernet0 is up, line protocol is up

Internet Address 1.1.1.2 255.255.255.0, Area 0

Process ID 1, Router ID 5.5.5.5, Network Type BROADCAST, Cost: 10

Transmit Delay is 1 sec, State BDR, Priority 1

Designated Router (ID) 6.6.6.6, Interface address 1.1.1.1

Backup Designated router (ID) 5.5.5.5, Interface address 1.1.1.2

Timer intervals configured, Hello 10, Dead 40, Wait 40, Retransmit 5

Hello due in 0:00:07

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 6.6.6.6  (Designated Router)

使用Cisco IOS軟體版本12.0(1)T中引入的router-id OSPF指令，可以變更路由器上選取最高IP位址作為路由器ID的預設行為。如需詳細資訊，請參閱Cisco錯誤ID CSCdi38380(僅限註冊客戶)。使用OSPF router-id命令時，OSPF進程的路由器ID是手動選擇的路由器ID。在本示例中，OSPF進程的路由器ID為10.10.10.10。

!

router ospf 100

router-id 10.10.10.10

show ip ospf database 命令也可用於檢查路由器ID:

Router#show ip ospf database

OSPF Router with ID (10.10.10.10) (Process ID 100)

值傳輸

在解釋使用OSPF解決重複的路由器ID之前，您需要瞭解五種OSPF資料包型別。以下是封包型別：

- Hello

- 資料庫說明(DD)

- 鏈路狀態請求

- 鏈路狀態更新

- 連結狀態確認

所有OSPF資料包都以標準的24個二進位制八位數報頭開頭。請注意，報頭包含一個路由器ID欄位，該欄位表示發起OSPF資料包的路由的唯一ID。

版本 |型別 |資料包長度

路由器ID

區域ID

校驗和 | AuType

驗證

驗證

封包資料

通常，OSPF資料包攜帶鏈路狀態通告(LSA)，該通告描述路由器的所有鏈路或介面以及鏈路的狀態。雖然所有LSA都以相同的報頭開頭，但以下三個欄位標識單個LSA:

- 類型

- 鏈路狀態ID

- 通告路由器

OSPF使用鏈路狀態更新資料包泛洪LSA並傳送LSA以響應鏈路狀態請求。OSPF鄰居負責將相應的LSA重新封裝到新的更新資料包中，以便進一步泛洪，以便將OSPF LSA傳播到其源網路之外。因此，多個路由器可以檢測並傳播重複的路由器ID。

完成以下步驟以確定是否存在重複的路由器ID:

1. 對應該具有此ID的路由器執行show ip ospf database router x.x.x.x命令。此命令顯示路由器LSA（型別1）的內容，該路由器通告路由器及其所有直連介面。瞭解路由器的介面清單和分配的IP地址。

2. 在報告副本的路由器上執行幾次show ip ospf database router x.x.x.x命令。最短路徑優先(SPF)演算法可以每10秒運行一次。

如果擷取這些命令，應該能擷取變更資訊。此示例是show ip ospf database router命令的輸出。

r2.2.2.2#show ip ospf database router 1.1.1.1

OSPF Router with ID (2.2.2.2) (Process ID 2)

Router Link States (Area 0)

LS age: 279

Options: (No TOS-capability, DC)

LS Type: Router Links

Link State ID: 1.1.1.1

!--- For router links, the Link State ID is always the same as the !--- advertising router (next line).

Advertising Router: 1.1.1.1

!--- This is the router ID of the router which created !--- this LSA.

LS Seq Number: 8000001A

Checksum: 0xA6FA

Length: 48

Number of Links: 2

Link connected to: another Router (point-to-point)

!--- This line shows that this router (1.1.1.1) is a neighbor !--- with 2.2.2.2.

(Link ID) Neighboring Router ID: 2.2.2.2

(Link Data) Router Interface address: 0.0.0.12

!--- In case of an unnumbered link, use the Management Information !--- Base (MIB) II IfIndex value, which usually starts with 0.

Number of TOS metrics: 0

TOS 0 Metrics: 64

!--- This is the OSPF cost of the link that connects the two routers.

Link connected to: a Stub Network

!--- This entry represents the Ethernet segment 4.0.0.0/8.

(Link ID) Network/subnet number: 4.0.0.0

(Link Data) Network Mask: 255.0.0.0

Number of TOS metrics: 0

TOS 0 Metrics: 10

!--- This is the OSPF cost of the Ethernet segment.

已知問題

當兩台路由器在OSPF域中使用相同的路由器ID時，路由可能無法正常工作。思科錯誤ID CSCdr61598(僅註冊客戶)和CSCdu08678(僅註冊客戶)增強了重複路由器ID的檢測和報告機制。存取Bug Toolkit(僅供註冊客戶使用)，以便檢視有關這些Cisco錯誤ID的其他資訊。有兩種重複的路由器ID型別：

1. 區域重複路由器ID

%OSPF-4-DUP_RTRID1: Detected router with duplicate

router ID 100.0.0.2 in area 0

說明 - OSPF在區域中檢測到具有相同路由器ID的路由器。

建議的操作 — OSPF路由器ID應唯一。確保該區域中的所有路由器都具有唯一的路由器ID。

2. 第4類LSA

%OSPF-4-DUP_RTRID2: Detected router with duplicate

router ID 100.0.0.2 in Type-4 LSA advertised by 100.0.0.1

說明 - OSPF檢測到另一區域中具有相同路由器ID的路由器。此路由器在型別4 LSA中通告。

建議的操作 — OSPF路由器ID應唯一。確保遠端區域的所有自治系統邊界路由器(ASBR)都具有唯一的路由器ID。

當路由器同時充當OSPF域中的區域邊界路由器(ABR)和ASBR時，可能會發生重複路由器ID的錯誤報告，如以下示例日誌消息所示。

OSPF-4-DUP_RTRID_AS Detected router with duplicate

router ID 10.97.10.2 in Type-4 LSA advertised by 10.97.20.2

思科錯誤ID CSCdu71404(僅供註冊客戶使用)解決了OSPF域範圍的檢測問題。

- 如果路由器收到第4類LSA，並且鏈路狀態ID等於路由器ID，而路由器不是ABR，則會發生遠端區域中的有效路由器ID重複，並且應記錄錯誤消息。

- 如果路由器不是ABR，它可以接收第4類LSA，從另一個ABR得知其自身。這種情況不代表路由器ID重複問題，因此不應記錄錯誤消息。

第4類LSA也稱為ASBR彙總LSA。發出show ip ospf database asbr-summary命令以觀察這些LSA，如本例所示。

ABR建立（型別4）ASBR彙總LSA，以便將ASBR的可達性通告到其他區域。

r2.2.2.2#show ip ospf database asbr-summary 1.1.1.1

OSPF Router with ID (2.2.2.2) (Process ID 2)

Summary ASB Link States (Area 0)

LS age: 266

Options: (No TOS-capability, DC)

LS Type: Summary Links(AS Boundary Router)

Link State ID: 1.1.1.1 (AS Boundary Router address)

!--- ABR (Router 2.2.2.2) advertises that it knows how !--- to reach the ASBR (Router 1.1.1.1).

Advertising Router: 2.2.2.2

LS Seq Number: 80000001

Checksum: 0x935C

Length: 28

Network Mask: /0

TOS: 0  Metric: 64

!--- This is the cost of ABR to reach the ASBR.

如果LSA是第4類，則鏈路狀態ID是通告的ASBR的路由器ID。有關詳細資訊，請參閱OSPF如何將外部路由傳播到多個區域。

疑難排解

此疑難排解是使用Cisco IOS軟體版本完成，該版本是在Cisco錯誤ID CSCdr61598(僅限註冊客戶)和Cisco錯誤ID CSCdu08678(僅限註冊客戶)整合之前發佈的。

單區域網路

此圖是這些步驟中所述的單區域網路的表示。

1. 發出show proc cpu | include OSPF命令。這樣您就可以看到利用CPU的OSPF進程。

r4#show proc cpu | include OSPF

3        4704       473       9945  1.38%  0.81%  0.68%   0 OSPF Hello

71        9956      1012       9837  1.47%  1.62%  1.41%   0 OSPF Router

如上例所示，OSPF的CPU使用率較高。這表示連結穩定性或路由器ID重複肯定有錯誤。

2. 發出show ip ospf statistics命令。這允許您檢視SPF演算法是否比普通演算法運行。

r4#show ip ospf statistics

Area 0: SPF algorithm executed 46 times

SPF calculation time

Delta T   Intra D-Intra Summ    D-Summ  Ext     D-Ext   Total   Reason

00:01:36   0    0       0       0       0       0       0       N,

00:01:26   0    0       0       0       0       0       0       R, N,

00:01:16   0    0       0       0       0       0       0       R, N,

00:01:06   0    0       0       0       0       0       0       R, N,

00:00:56   0    0       0       0       0       0       0       R, N,

00:00:46   0    0       0       0       0       0       0       R, N,

00:00:36   0    0       0       0       0       0       0       R, N, kmbgvc

00:00:26   0    0       0       0       0       0       0       R, N,

00:00:16   0    0       0       0       0       0       0       R, N,

00:00:06   0    0       0       0       0       0       0       R, N,

show ip ospf statistics命令顯示每10秒重新計算SPF，如上例所示。由路由器和網路LSA觸發。當前路由器所在的同一區域出現問題。

3. 發出show ip ospf database命令。

r4#show ip ospf database

OSPF Router with ID (50.0.0.4) (Process ID 1)

Router Link States (Area 0)

Link ID         ADV Router      Age         Seq#       Checksum Link count

50.0.0.1        50.0.0.1        681         0x80000002 0x7E9D   3

50.0.0.2        50.0.0.2        674         0x80000004 0x2414   5

50.0.0.4        50.0.0.4        705         0x80000003 0x83D    4

50.0.0.5        50.0.0.5        706         0x80000003 0x5C24   6

50.0.0.6        50.0.0.6        16          0x80000095 0xAF63   6

50.0.0.7        50.0.0.7        577         0x80000005 0x86D5   8

Net Link States (Area 0)

Link ID         ADV Router      Age         Seq#       Checksum

192.168.2.6     50.0.0.6        6           0x8000007A 0xABC7

show ip ospf database 命令顯示一個LSA較新（16歲），其序列號比同一OSPF資料庫中的其他LSA高得多。您需要確定哪台路由器傳送了此LSA。由於通告路由器ID位於同一區域，因此該路由器是已知的(50.0.0.6)。 此路由器ID很可能重複。您需要找出哪些其它路由器具有相同的router-id。

4. 此示例顯示show ip ospf database命令的多個例項。

r4#show ip ospf database router adv-router 50.0.0.6

OSPF Router with ID (50.0.0.4) (Process ID 1)

Router Link States (Area 0)

LS age: 11

Options: (No TOS-capability, DC)

LS Type: Router Links

Link State ID: 50.0.0.6

Advertising Router: 50.0.0.6

LS Seq Number: 800000C0

Checksum: 0x6498

Length: 72

Number of Links: 4

Link connected to: a Transit Network

(Link ID) Designated Router address: 192.168.2.6

(Link Data) Router Interface address: 192.168.2.6

Number of TOS metrics: 0

TOS 0 Metrics: 10

Link connected to: another Router (point-to-point)

(Link ID) Neighboring Router ID: 50.0.0.7

(Link Data) Router Interface address: 192.168.0.21

Number of TOS metrics: 0

TOS 0 Metrics: 64

Link connected to: a Stub Network

(Link ID) Network/subnet number: 192.168.0.20

(Link Data) Network Mask: 255.255.255.252

Number of TOS metrics: 0

TOS 0 Metrics: 64

Link connected to: a Stub Network

(Link ID) Network/subnet number: 50.0.0.6

(Link Data) Network Mask: 255.255.255.255

Number of TOS metrics: 0

TOS 0 Metrics: 1

r4#show ip ospf database router adv-router 50.0.0.6

OSPF Router with ID (50.0.0.4) (Process ID 1)

Router Link States (Area 0)

LS age: 7

Options: (No TOS-capability, DC)

LS Type: Router Links

Link State ID: 50.0.0.6

Advertising Router: 50.0.0.6

LS Seq Number: 800000C7

!--- The sequence number has increased.

Checksum: 0x4B95

Length: 96

Number of Links: 6

!--- The number of links has increased although the network has been stable.

Link connected to: a Stub Network

(Link ID) Network/subnet number: 192.168.3.0

(Link Data) Network Mask: 255.255.255.0

Number of TOS metrics: 0

TOS 0 Metrics: 10

Link connected to: another Router (point-to-point)

(Link ID) Neighboring Router ID: 50.0.0.5

(Link Data) Router Interface address: 192.168.0.9

Number of TOS metrics: 0

TOS 0 Metrics: 64

Link connected to: a Stub Network

(Link ID) Network/subnet number: 192.168.0.8

(Link Data) Network Mask: 255.255.255.252

Number of TOS metrics: 0

TOS 0 Metrics: 64

Link connected to: another Router (point-to-point)

(Link ID) Neighboring Router ID: 50.0.0.2

(Link Data) Router Interface address: 192.168.0.2

Number of TOS metrics: 0

TOS 0 Metrics: 64

Link connected to: a Stub Network

(Link ID) Network/subnet number: 192.168.0.0

(Link Data) Network Mask: 255.255.255.252

Number of TOS metrics: 0

TOS 0 Metrics: 64

Link connected to: a Stub Network

(Link ID) Network/subnet number: 50.0.0.6

(Link Data) Network Mask: 255.255.255.255

Number of TOS metrics: 0

TOS 0 Metrics: 1

5. 如果您知道自己的網路，您可以找到通告這些鏈路的路由器。第一個輸出顯示LSA由鄰居為50.0.0.7的路由器傳送，而第二個輸出顯示鄰居為50.0.0.5和50.0.0.6。發出show ip ospf命令以查詢這些路由器並訪問它們，以驗證它們的OSPF router-id。在本例設定中，它們是R6和R3。

3>show ip ospf

Routing Process "ospf 1" with ID 50.0.0.6

Supports only single TOS(TOS0) routes

Supports opaque LSA

r6#show ip ospf

Routing Process "ospf 1" with ID 50.0.0.6

Supports only single TOS(TOS0) routes

Supports opaque LSA

6. 發出show run | beg router ospf命令以檢查從OSPF配置開始的配置。

R6#show run | include router ospf

router ospf 1

router-id 50.0.0.6

log-adjacency-changes

network 50.0.0.0 0.0.0.255 area 0

network 192.168.0.0 0.0.0.255 area 0

network 192.168.2.0 0.0.0.255 area 0

r3#show run | begin router ospf

router ospf 1

log-adjacency-changes

network 50.0.0.0 0.0.0.255 area 0

network 192.168.0.0 0.0.0.255 area 0

network 192.168.3.0 0.0.0.255 area 0

在上一個示例中，router-id命令被刪除，OSPF進程沒有重新啟動。同樣的問題也可能源自在其他位置刪除和配置的環回介面。

7. 發出clear ip ospf 1 process命令和show ip ospf命令以清除該進程。

r3#clear ip ospf 1 process

Reset OSPF process? [no]: y

r3#show ip ospf

Routing Process "ospf 1" with ID 50.0.0.6

Supports only single TOS(TOS0) routes

Supports opaque LSA

如上例所示，仍然顯示錯誤的IP地址。

8. 發出show ip int brie命令以檢查介面。

r3#show ip int brie

Interface                  IP-Address      OK? Method Status                Protocol

Ethernet0/0                192.168.3.1     YES NVRAM  up                    up

Serial1/0                  192.168.0.2     YES NVRAM  up                    up

Serial2/0                  192.168.0.9     YES NVRAM  up                    up

Loopback0                  unassigned      YES NVRAM  up                    up

Loopback1                  50.0.0.6        YES NVRAM  up                    up

!--- The highest Loopback IP address

若要更正此問題，請確保路由器上配置的最高環回在OSPF網路中是唯一的，或在OSPF路由器配置模式下使用router-id <ip address>命令靜態配置router-id。

使用ASBR的多個區域

這些問題的症狀是，外部路由（通過R6從靜態重分配到OSPF進程獲知）從OSPF區域0內所有路由器的路由表中翻轉，ASBR路由器從OSPF區域0內的路由表中翻轉。外部路由是120.0.0.0/16，在區域0的路由器5上發現問題。從這裡開始排除故障。

1. 連續多次發出show ip route命令以檢視症狀。

r5#show ip route 120.0.0.0

Routing entry for 120.0.0.0/16, 1 known subnets

O E2    120.0.0.0 [110/20] via 192.168.0.9, 00:00:03, Serial2/0

r5#show ip route 120.0.0.0

% Network not in table

r5#

2. 檢視OSPF資料庫以檢查是否收到LSA。如果連續多次發出show ip ospf database命令，您會發現兩台路由器（50.0.0.6和50.0.0.7）接收了LSA。如果檢視第二個條目的存在時間（如果存在），您會發現其值發生了顯著變化。

r5#show ip ospf database | begin Type-5

Type-5 AS External Link States

Link ID         ADV Router      Age         Seq#       Checksum Tag

120.0.0.0       50.0.0.6        2598        0x80000001 0xE10E   0

120.0.0.0       50.0.0.7        13          0x80000105 0xD019   0

r5#show ip ospf database | begin Type-5

Type-5 AS External Link States

Link ID         ADV Router      Age         Seq#       Checksum Tag

120.0.0.0       50.0.0.6        2599        0x80000001 0xE10E   0

120.0.0.0       50.0.0.7        14          0x80000105 0xD019   0

r5#show ip ospf database | begin Type-5

Type-5 AS External Link States

Link ID         ADV Router      Age         Seq#       Checksum Tag

120.0.0.0       50.0.0.6        2600        0x80000001 0xE10E   0

120.0.0.0       50.0.0.7        3601        0x80000106 0x6F6    0

r5#show ip ospf database | begin Type-5

Type-5 AS External Link States

Link ID         ADV Router      Age         Seq#       Checksum Tag

120.0.0.0       50.0.0.6        2602        0x80000001 0xE10E   0

r5#show ip ospf database | begin Type-5

Type-5 AS External Link States

Link ID         ADV Router      Age         Seq#       Checksum Tag

120.0.0.0       50.0.0.6        2603        0x80000001 0xE10E   0

r5#

3. 如果您檢視從50.0.07（即廣告路由器）接收的LSA的序列號，也會發現奇怪的行為。檢視從50.0.0.7收到的其他LSA。如果連續多次發出show ip ospf database adv-router 50.0.0.7命令，則條目變化很快，如本例所示。

r5#show ip ospf database adv-router 50.0.0.7

OSPF Router with ID (50.0.0.5) (Process ID 1)

Router Link States (Area 0)

Link ID         ADV Router      Age         Seq#       Checksum Link count

50.0.0.7        50.0.0.7        307         0x8000000D 0xDF45   6

Type-5 AS External Link States

Link ID         ADV Router      Age         Seq#       Checksum Tag

120.0.0.0       50.0.0.7        9           0x8000011B 0xA42F   0

r5#show ip ospf database network adv-router 50.0.0.7

OSPF Router with ID (50.0.0.5) (Process ID 1)

r5#show ip ospf database network adv-router 50.0.0.7

OSPF Router with ID (50.0.0.5) (Process ID 1)

最後這個輸出未顯示任何內容。路由正在擺動或者存在其他型別的問題，很可能是OSPF域中的路由器ID重複。

4. 發出show ip ospf database命令，以便檢視50.0.0.7通告的外部LSA。

r5#show ip ospf database external adv-router 50.0.0.7

OSPF Router with ID (50.0.0.5) (Process ID 1)

Type-5 AS External Link States

Delete flag is set for this LSA

LS age: MAXAGE(3600)

Options: (No TOS-capability, DC)

LS Type: AS External Link

Link State ID: 120.0.0.0 (External Network Number )

Advertising Router: 50.0.0.7

LS Seq Number: 80000136

Checksum: 0xA527

Length: 36

Network Mask: /16

Metric Type: 2 (Larger than any link state path)

TOS: 0

Metric: 16777215

Forward Address: 0.0.0.0

External Route Tag: 0

r5#show ip ospf database  external adv-router 50.0.0.7

OSPF Router with ID (50.0.0.5) (Process ID 1)

r5#

5. 檢視SPF計算原因以驗證這一點。X表示SPF由於外部LSA（型別5）擺動而每10秒運行一次，因此您會看到SPF正在運行。

r5#show ip ospf statistic

Area 0: SPF algorithm executed 2 times

SPF calculation time

Delta T   Intra D-Intra Summ    D-Summ  Ext     D-Ext   Total   Reason

00:47:23   0    0       0       0       0       0       0       X

00:46:33   0    0       0       0       0       0       0       X

00:33:21   0    0       0       0       0       0       0       X

00:32:05   0    0       0       0       0       0       0       X

00:10:13   0    0       0       0       0       0       0       R, SN, X

00:10:03   0    0       0       0       0       0       0       R, SN, X

00:09:53   0    0       0       0       0       0       0       R,

00:09:43   0    0       0       0       0       0       0       R, SN, X

00:09:33   0    0       0       0       0       0       0       X

00:09:23   0    0       0       0       0       0       0       X

6. 已知問題位於當前區域之外。把注意力放在ABR上。Telnet至ABR路由器2，以便在OSPF區域0以外的其他區域獲得更高的可見性。發出show ip ospf border-routers 和show ip ospf database network adv-router 命令。

r2#show ip ospf border-routers

OSPF Process 1 internal Routing Table

Codes: i - Intra-area route, I - Inter-area route

i 50.0.0.7 [20] via 192.168.2.1, Ethernet0/0, ASBR, Area 1, SPF 25

r2#show ip ospf database network adv-router 50.0.0.7

OSPF Router with ID (50.0.0.2) (Process ID 1)

Net Link States (Area 1)

Routing Bit Set on this LSA

LS age: 701

Options: (No TOS-capability, DC)

LS Type: Network Links

Link State ID: 192.168.1.2 (address of Designated Router)

Advertising Router: 50.0.0.7

LS Seq Number: 80000001

Checksum: 0xBC6B

Length: 32

Network Mask: /24

Attached Router: 50.0.0.7

Attached Router: 50.0.0.1

7. 有故障的路由器與50.0.0.1位於同一個LAN中。它必須是路由器6。發出show ip ospf命令。

r6#show ip ospf

Routing Process "ospf 1" with ID 50.0.0.7

Supports only single TOS(TOS0) routes

Supports opaque LSA

It is an autonomous system boundary router.

8. 找到故障路由器後，請參閱本文檔的單區域網路部分以糾正問題。

錯誤消息：%OSPF-4-FLOOD_WAR:處理60500在區域10.40.0.0中刷新LSA ID 10.x.x.0 type-5 adv-rtr 10.40.x.x

%OSPF-4-FLOOD_WAR:收到區域10.40.0.0中PROCESS 60500 flush LSA ID 10.35.70.4 type-5 adv-rtr 10.40.0.105的錯誤消息。

此錯誤消息指出路由器以高速率啟動或刷新LSA。網路中的典型情況可能是網路中的一台路由器發起LSA，而第二台路由器刷新該LSA。以下提供了此錯誤消息的詳細說明：

- Process 60500 — 報告錯誤的OSPF進程。在本示例中，進程ID為60500。

- reoriginates或flushes（關鍵字） — 表示路由器是起始LSA還是刷新。在此錯誤消息中，路由器刷新LSA。

- LSA ID 10.35.70.4 -檢測到泛洪戰的鏈路狀態ID。在本例中，它是10.35.70.4。

- type -5 - LSA型別。此示例具有第5類LSA。

注意：泛洪戰爭對每個LSA都有不同的根本原因。

- adv-rtr — 起始LSA的路由器(即10.40.0.105)。

- Area - LSA所屬的區域。在本例中，LSA屬於10.40.0.0。

解決方案

請注意此錯誤的型別詳細資訊；在本例中，type-5。表示位於不同區域的兩台路由器上有重複的路由器ID。因此，必須更改其中一台路由器的路由器ID。

相關資訊

- 如何配置OSPF

- OSPF資料庫說明指南

- OSPF鄰居問題說明

- show ip ospf interface命令顯示什麼？

- 開放最短路徑優先(OSPF)支援頁面

- 技術支援與文件 - Cisco Systems