目錄

簡介

必要條件

硬體和軟體版本

慣例

設定

網路圖表

組態

驗證

顯示命令

相關資訊

簡介

本文提供如何使用EIGRPv6和IPv6 BGP之間的相互重分佈將邊界網關協定(IPv6 BGP)預設路由重分佈到增強型內部網關路由協定(EIGRPv6)的示例配置。

必要條件

嘗試此組態之前，請確保符合以下要求：

- 具有EIGRPv6的基本知識

- 具有IPv6 BGP基礎知識

- 具有IPv6編址基礎知識

硬體和軟體版本

本文檔中的配置基於採用Cisco IOS®軟體版本15.0(1)的Cisco 7200系列路由器。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

設定

在本示例中，路由器R2和R1使用IPv6 eBGP相互通訊。路由器R1和R3使用EIGRPv6。預設路由是通過發出neighbor default-originate 命令在路由器R2中建立的。要將IPv6 eBGP路由相互重分發到EIGRPv6，請使用redistribute bgp命令和EIGRP度量。同樣，若要將EIGRPv6路由重分發到IPv6BGP，請在地址系列配置模式下使用redistribute eigrp AS number 命令。

註：使用Command Lookup Tool(僅限註冊客戶)可以查詢有關本文檔中使用的命令的詳細資訊。

網路圖表

本檔案會使用以下網路設定：

組態

本檔案會使用以下設定：

- 路由器R1

- 路由器R2

- 路由器R3

路由器R1

R1#show run

Building configuration...

!

version 15.0

!

hostname R1

!

ipv6 unicast-routing

ipv6 cef

!

!

interface Loopback10

no ip address

ipv6 address BB10::10/128

!

interface Loopback20

no ip address

ipv6 address BB20::20/128

!

interface Loopback30

no ip address

ipv6 address BB30::30/128

ipv6 eigrp 1

!

interface Serial1/0

no ip address

ipv6 address 3030:1:1:1::11/64

serial restart-delay 0

!

interface Serial1/1

no ip address

ipv6 address 4040:1:1:1::10/64

ipv6 eigrp 1

serial restart-delay 0

!

!

router bgp 505

no synchronization

bgp router-id 1.1.1.1

bgp log-neighbor-changes

neighbor 3030:1:1:1::10 remote-as 500

no auto-summary

!

address-family ipv6

redistribute eigrp 1

!--- EIGRP is redistributed in to BGP.

no synchronization

network BB10::10/128

network BB20::20/128

neighbor 3030:1:1:1::10 activate

exit-address-family

!

!

ipv6 router eigrp 1

eigrp router-id 1.1.1.1

redistribute bgp 505 metric 100 1 255 1 1500

!--- EIGRP for IPv6 has a shutdown feature. !--- Make sure that the routing process is in "no shut" mode !--- in order to start running the protocol.

!--- BGP is redistributed with EIGRP default metrics.

!

end

路由器R2

R2#show run

Building configuration...

!

hostname R2

!

ipv6 unicast-routing

ipv6 cef

!

!

interface Loopback10

no ip address

ipv6 address AB10::10/128

!

interface Loopback20

no ip address

ipv6 address AB20::20/128

!

interface Serial1/0

no ip address

ipv6 address 3030:1:1:1::10/64

serial restart-delay 0

!

router bgp 500

no synchronization

bgp router-id 2.2.2.2

bgp log-neighbor-changes

neighbor 3030:1:1:1::11 remote-as 505

neighbor 3030:1:1:1::11 default-originate

no auto-summary

!

address-family ipv6

no synchronization

network AB10::10/128

network AB20::20/128

neighbor 3030:1:1:1::11 activate

neighbor 3030:1:1:1::11 default-originate

exit-address-family

!

end

!--- Originates default route to the !--- neighbor 3030:1:1:1::11.

路由器R3

R3#show run

!

version 15.0

!

hostname R3

!

ipv6 unicast-routing

ipv6 cef

!

interface Loopback10

no ip address

ipv6 address CC10::10/128

ipv6 eigrp 1

!

interface Loopback20

no ip address

ipv6 address CC20::20/128

ipv6 eigrp 1

!

interface Serial1/0

no ip address

ipv6 address 4040:1:1:1::11/64

ipv6 eigrp 1

serial restart-delay 0

!

!

ipv6 router eigrp 1

eigrp router-id 3.3.3.3

!

end

驗證

使用本節內容，確認您的組態是否正常運作。

輸出直譯器工具(僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show指令輸出的分析。

顯示命令

為了檢驗路由器R3是否收到重分佈的IPv6 BGP預設路由，請在路由器R3中使用show ipv6 route eigrp命令。

show ipv6 route eigrp

在路由器R3中
R3#show ipv6 route eigrp

IPv6 Routing Table - default - 9 entries

Codes: C - Connected, L - Local, S - Static, U - Per-user Static route

B - BGP, HA - Home Agent, MR - Mobile Router, R - RIP

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

D - EIGRP, EX - EIGRP external, ND - Neighbor Discovery

O - OSPF Intra, OI - OSPF Inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

EX  ::/0 [170/26112256]

via FE80::C806:16FF:FE08:0, Serial1/0

EX  AB10::10/128 [170/26112256]

via FE80::C806:16FF:FE08:0, Serial1/0

EX  AB20::20/128 [170/26112256]

via FE80::C806:16FF:FE08:0, Serial1/0

D   BB30::30/128 [90/2297856]

via FE80::C806:16FF:FE08:0, Serial1/0

!--- The above output shows that the default route !--- is redistributed in EIGRP. EX indicates EIGRP external routes.

為了檢驗EIGRPv6路由在路由器R2中是否正確重分佈，請在路由器R2中使用show ipv6 route bgp命令。

show ipv6 route bgp

在路由器R2中
R2#show ipv6 route bgp

IPv6 Routing Table - default - 9 entries

Codes: C - Connected, L - Local, S - Static, U - Per-user Static route

B - BGP, HA - Home Agent, MR - Mobile Router, R - RIP

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

D - EIGRP, EX - EIGRP external, ND - Neighbor Discovery

O - OSPF Intra, OI - OSPF Inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

B   BB10::10/128 [20/0]

via FE80::C806:16FF:FE08:0, Serial1/0

B   BB20::20/128 [20/0]

via FE80::C806:16FF:FE08:0, Serial1/0

B   CC10::10/128 [20/2297856]

via FE80::C806:16FF:FE08:0, Serial1/0

B   CC20::20/128 [20/2297856]

via FE80::C806:16FF:FE08:0, Serial1/0

!--- The above output shows that the eigrp routes !--- are redistributed in to BGP.

使用ping命令檢驗路由器R2和R3之間的連通性。

ping

從路由器R2:

R2#ping  CC10::10

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to CC10::10, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/40/96 ms

R2#ping CC20::20

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to CC20::20, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/44/100 ms

從路由器R3:

R3#ping AA10::10

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to AA10::10, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/33/92 ms

R3#ping AA20::20

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to AA20::20, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/33/92 ms

!--- The above ping responses shows that R1 and R3 are able !--- to communicate with each other.

相關資訊

- BGP 支援頁面

- IPv6支援頁面

- Cisco IOS IPv6命令參考

- BGP 個案研究

- EIGRP支援頁

- 技術支援與文件 - Cisco Systems