目錄

簡介

必要條件

需求

採用元件

慣例

設定

網路圖表

組態

驗證

疑難排解

相關資訊

簡介

本文說明如何為IPv6(HSRPv2)組配置備用熱備份路由器協定(HSRP)以跟蹤對象並根據對象狀態更改HSRP優先順序。

每個跟蹤對象都有一個在跟蹤命令列介面(CLI)上指定的唯一編號。HSRPv2使用此數字跟蹤特定對象。跟蹤進程定期輪詢跟蹤對象以查詢值更改，並立即或在指定延遲之後向HSRPv2傳送任何更改（作為啟動或關閉值）。本檔案使用track interface命令設定要追蹤的介面。

必要條件

需求

嘗試此組態之前，請確保符合以下要求：

- 配置HSRP的知識；有關詳細資訊，請參閱配置HSRP。

- 實施IPv6編址和基本連線的基礎知識；有關詳細資訊，請參閱實施IPv6編址和基本連線。

- 增強型目標跟蹤的基礎知識

- 在配置HSRP IPv6之前，必須在介面上啟用HSRPv2。

- 必須在裝置上啟用IPv6單播路由，才能配置HSRP IPv6。

採用元件

本文檔中的配置基於運行Cisco IOS®軟體版本15.0(1)的Cisco7200系列路由器。

慣例

如需檔案慣例的相關資訊，請參閱思科技術提示慣例。

設定

R2和R3路由器通過串列介面連線到R1。R2和R3的快速乙太網介面配置了HSRP IPv6,R2充當活動路由器，R3充當備用路由器。在路由器R2中，跟蹤過程配置為跟蹤串列介面1/0的介面線路協定的狀態：如果R2的串列介面S1/0關閉，R3路由器會將其狀態從Standby更改為Active。

註：使用Command Lookup Tool(僅限註冊客戶)查詢有關本文檔中使用的命令的更多資訊。

網路圖表

本檔案會使用以下網路設定：

組態

本檔案會使用以下設定：

- 路由器R1配置

- 路由器R2配置

- 路由器R3配置

路由器R1配置

!

version 15.0

!

hostname R1

!

ipv6 unicast-routing

ipv6 cef

!

!

interface Serial1/0

no ip address

ipv6 address 2010:10:10:10::1/64

serial restart-delay 0

!

!

interface Serial1/1

no ip address

ipv6 address 2011:11:11:11::1/64

serial restart-delay 0

!

end

路由器R2配置

!

version 15.0

!

hostname R2

!

ipv6 unicast-routing

ipv6 cef

!

track 1 interface Serial1/0 line-protocol

!--- Tracking process 1 is configured in the router !--- to track state of the interface line protocol !--- of serial interface 1/0

!

interface Serial1/0

no ip address

ipv6 address 2010:10:10:10::2/64

serial restart-delay 0

!

!

interface FastEthernet2/0

no ip address

duplex auto

speed auto

ipv6 address 1010:1:1:1::10/64

standby version 2

standby 10 ipv6 autoconfig

!--- Assigns a standby group and standby IP address.

standby 10 preempt delay minimum 45

!--- The preempt command allows the router to become the !--- active router when it has the priority higher than all the other !--- HSRP-configured routers. Without this command, even if a router has higher !--- priority value, it will not become an active router. !--- The delay minimum value causes the local router to postpone !--- taking over the active role for a minimum of 45 seconds.

standby 10 track 1 decrement 10

!--- Configures HSRP to track an object and change the Hot Standby !--- priority on the basis of the state of the object.

!--- In this example,the HSRP tracks the interface s1/0 mentioned !--- in the track process 1.

!--- Decrement value specified the amount by which the Hot Standby !--- priority for the router is decremented (or incremented) when the tracked object !--- goes down (or comes back up). The range is from 1 to 255. The default is 10.

!

end

路由器R3配置

!

version 15.0

!

hostname R3

!

ipv6 unicast-routing

ipv6 cef

!

interface Serial1/0

no ip address

ipv6 address 2011:11:11:11::2/64

serial restart-delay 0

!

interface FastEthernet2/0

no ip address

duplex auto

speed auto

ipv6 address 1010:1:1:1::11/64

standby version 2

standby 10 ipv6 autoconfig

standby 10 priority 95

standby 10 preempt delay minimum 45

!

end

驗證

在R2和R3路由器上使用show standby命令檢驗配置。

路由器R2

R2#show standby

FastEthernet2/0 - Group 10 (version 2)

State is Active

5 state changes, last state change 00:26:03

Virtual IP address is FE80::5:73FF:FEA0:A

Active virtual MAC address is 0005.73a0.000a

Local virtual MAC address is 0005.73a0.000a (v2 IPv6 default)

Hello time 3 sec, hold time 10 sec

Next hello sent in 1.872 secs

Preemption enabled, delay min 45 secs

Active router is local

Standby router is FE80::C802:AFF:FE10:38, priority 95 (expires in 8.048 sec)

Priority 100 (default 100)

Track object 1 state Up decrement 10

Group name is "hsrp-Fa2/0-10" (default)

路由器R3

R3#show standby

FastEthernet2/0 - Group 10 (version 2)

State is Standby

4 state changes, last state change 00:26:25

Virtual IP address is FE80::5:73FF:FEA0:A

Active virtual MAC address is 0005.73a0.000a

Local virtual MAC address is 0005.73a0.000a (v2 IPv6 default)

Hello time 3 sec, hold time 10 sec

Next hello sent in 0.176 secs

Preemption enabled, delay min 45 secs

Active router is FE80::C801:14FF:FEF4:38, priority 100 (expires in 9.888 sec)

MAC address is ca01.14f4.0038

Standby router is local

Priority 95 (configured 95)

Group name is "hsrp-Fa2/0-10" (default)

為了顯示跟蹤資訊，請在路由器R2中使用show track命令。

路由器R2

R2#show track 1

Track 1

Interface Serial1/0 line-protocol

Line protocol is Up

3 changes, last change 00:28:39

Tracked by:

HSRP FastEthernet2/0 10

!--- Displays the information about the objects that !--- are tracked by tracking process 1.

R2#show track int brief

Track   Object                           Parameter        Value Last Change

1       interface   Serial1/0            line-protocol    Up    00:31:19

!--- Displays the information about the tracked interface.

如果活動路由器（本例中為R2）關閉，備用路由器會立即將其狀態更改為Active，如下表所示：

當活動路由器(R2)關閉時……

路由器R2
R2(config)#interface s1/0

R2(config-if)#shut

R2(config-if)#

*May 21 20:56:54.223: %TRACKING-5-STATE: 1 interface Se1/0 line-protocol Up->Down

R2(config-if)#

*May 21 20:56:56.203: %LINK-5-CHANGED: Interface Serial1/0, changed state to administratively down

*May 21 20:56:57.203: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial1/0, changed state to down

R2(config-if)#

*May 21 20:57:43.087: %HSRP-5-STATECHANGE: FastEthernet2/0 Grp 10 state Active -> Speak

R2(config-if)#

*May 21 20:57:54.479: %HSRP-5-STATECHANGE: FastEthernet2/0 Grp 10 state Speak -> Standby

!--- When the interface goes down, the active router changes !--- its state to Standby.

路由器R3

R3#

*May 21 20:56:53.419: %HSRP-5-STATECHANGE: FastEthernet2/0 Grp 10 state Standby-> Active

!--- The standby router is now the active router.

R3#show standby

FastEthernet2/0 - Group 10 (version 2)

State is Active

5 state changes, last state change 00:02:32

Virtual IP address is FE80::5:73FF:FEA0:A

Active virtual MAC address is 0005.73a0.000a

Local virtual MAC address is 0005.73a0.000a (v2 IPv6 default)

Hello time 3 sec, hold time 10 sec

Next hello sent in 0.080 secs

Preemption enabled, delay min 45 secs

Active router is local

Standby router is FE80::C801:14FF:FEF4:38, priority 90 (expires in 9.664 sec)

Priority 95 (configured 95)

Group name is "hsrp-Fa2/0-10" (default)

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

相關資訊

- IPv6技術支援

- 在IPv6中配置第一跳冗餘協定

- 熱待命路由器通訊協定(HSRP):常見問題

- RFC 2281 — 思科熱待命路由器通訊協定(HSRP)

- 技術支援與文件 - Cisco Systems