目錄

簡介

必要條件

需求

採用元件

慣例

將NAM軟體升級到版本3.x

工作

逐步說明

驗證

疑難排解

相關資訊

簡介

本文提供如何將網路分析模組(NAM)軟體升級為版本3.x的逐步程式。

必要條件

需求

嘗試此組態之前，請確保符合以下要求：

- 熟悉檔案傳輸通訊協定(FTP)

- 通過命令列熟悉Catalyst交換機管理

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- X6380（原始NAM）

- NAM 3.0版軟體

- NAM-1和NAM-2硬體裝置

- 執行CatOS 7.3.1的Catalyst 6505

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

將NAM軟體升級到版本3.x

工作

本節提供將NAM軟體升級到版本3.x的資訊。

逐步說明

完成以下步驟即可升級軟體：

1. 下載檔案：

- 原始NAM — 請參閱適用於Cat 6500的Software Download-NAM(Prod.代碼：WS-X6380-NAM)(僅限註冊客戶)並獲取c6nam.3-1-1.bin.gz文件。

- NAM1/NAM2 — 請參閱適用於Cat 6500的Software Download-NAM(Prod.代碼：WS-SVC-NAMx)(僅限註冊客戶)並獲取c6svc-nam.3-1-1.bin.gz文件。

2. 將該檔案放在要使用的FTP伺服器上帳戶的根目錄中。

註：此圖示使用WS-X6380-NAM，但它同時適用於WS-SVC-NAM-1和WS-SVC-NAM-2。

此範例使用以下資訊：

- FTP伺服器為：

- 名稱:rtp-sycamore.cisco.com

- 地址：172.18.123.68

- 帳戶ID無效。

- 帳戶密碼已加密。

- 案例的根目錄為：~ rtp-sycamore cse %4> pwd /local/home/cse。

- 檔案列在此處，因此它是：/local/home/cse/c6nam.3-1-1.bin.gz。

~ rtp-sycamore cse %4>ls -al c6nam.3-1-1.bin.gz -rw-r—r— 1其他756712445月28日11:17 c6nam.3-1-1.bin.gz

3. 若要確認FTP伺服器是否正常運作，請進行測試以確認是否可從其他工作站存取此FTP伺服器：

註：此處使用rtp-cse-205作為示例。

rtp-cse-205_oansari-> ftp rtp-sycamore

Connected to rtp-sycamore.cisco.com.

220 rtp-sycamore FTP server (SunOS 5.7) ready.

Name (rtp-sycamore:oansari): cse

331 Password required for cse.

Password: csecse

230 User cse logged in.

Remote system type is UNIX.

Using binary mode to transfer files.

4. 存取FTP伺服器時，請確保檔案可用：

ftp> ls c6nam.3-1-1.bin.gz

227 Entering Passive Mode (172,18,123,68,222,205)

150 ASCII data connection for /bin/ls (64.102.51.64,35372) (0 bytes).

-rw-r--r-- 1 cse other 75671244 May 28 11:17 c6nam.3-1-1.bin.gz

226 ASCII Transfer complete.

當您驗證檔案存在且可用時，您就可以更加確信檔案傳輸到NAM會成功。這可確認FTP服務正在運行，且有必要的檔案可供下載到FTP使用者端。

5. 開始升級NAM的步驟。範例如下：

1. 檢查模組：

nms-6506a> (enable) sh mod

...

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

1   1    2     1000BaseX Supervisor      WS-X6K-SUP1A-2GE    yes ok

15  1    1     Multilayer Switch Feature WS-F6K-MSFC         no  ok

2   2    0     FlexWAN Module            WS-X6182-2PA        no  power-down

4   4    2     Network Analysis Module   WS-X6380-NAM        no  ok

5   5    8     1000BaseX Ethernet        WS-X6408-GBIC       no  ok

6   6    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

輸出顯示，相關的NAM位於插槽4中，狀態為ok。

2. 檢查CatOS交換器的版本：

nms-6506a> (enable) sh ver

WS-C6506 Software, Version NmpSW: 7.3(1)

注意：版本必須是7.3(1)或更高版本。如果您的交換機沒有此版本，請不要繼續升級NAM。首先升級交換機軟體。

3. 如果指定的版本是7.3(1)或更高版本，則重置NAM:

nms-6506a> (enable) reset 4 hdd:2

This command will reset module 4.

Unsaved configuration on module 4 will be lost

Do you want to continue (y/n) [n]? y

Module 4 shut down in progress, do not remove module until shutdown completed.

nms-6506a> (enable)

注意：對於NAM1/NAM2，您必須使用以下命令：reset <module> cf:1。

您會在終端上看到以下輸出：

2003 May 28 11:28:36 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "unknown(1)"

2003 May 28 11:28:36 %SNMP-5-MODULETRAP:Module 4 [Down] Trap

2003 May 28 11:28:36 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "failed(7)"

003 May 28 11:28:50 %SNMP-5-FRUREMOVEDTRAP:module 4 removed

2003 May 28 11:28:50 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483090709 ticks

2003 May 28 11:28:50 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "unknown(1)"

2003 May 28 11:29:07 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483092362 ticks

2003 May 28 11:29:07 %SNMP-5-FRUINSERTEDTRAP:module 4 inserted

2003 May 28 11:30:26 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "ok(2)"

2003 May 28 11:30:26 %SNMP-5-MODULETRAP:Module 4 [Up] Trap

2003 May 28 11:30:27 %SNMP-5-FRUREMOVEDTRAP:module 4 removed

2003 May 28 11:30:27 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483100353 ticks

2003 May 28 11:30:27 %SNMP-5-FRUINSERTEDTRAP:module 4 inserted

2003 May 28 11:30:27 %SYS-3-MOD_PORTINTFINSYNC:Port Interface in sync

for Module 4

4. 確保NAM成功重新啟動：

nms-6506a> (enable) sh mod 4

Mod Slot Ports Module-Type Model Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

4 4 2 Network Analysis Module WS-X6380-NAM no ok

!--- Yes, it is up again.

5. 會話進入NAM並發出upgrade命令：

nms-6506a> (enable) sess 4

Trying NAM-4...

Connected to NAM-4.

Escape character is '^]'.

Cisco Network Analysis Module (WS-X6380-NAM)

Maintenance Partition

!--- Notice how this states Maint Partition now.

login: root

Password:

!--- Enter the password (the default password here is 'cisco').

Network Analysis Module (WS-X6380-NAM) Console, 1.2(1a)m

Copyright (c) 1999, 2000, 2001 by cisco Systems, Inc.

root@nms-6506a-nam.123.cisco.com#upgrade ftp://cse:csecse@172.18.123.68/

local/home/cse/c6nam.3-1-1.bin.gz

!--- Notice that the complete path was specified after the IP address, !--- the same path that was retrieved from the "pwd" command on the server. !--- For this reason, it is encouraged to use your UNIX server as your !--- FTP server. If necessary, get your sysadmin to enable FTP on it !--- temporarily to upgrade this NAM. !--- This step takes the longest time to upgrade.

root@nms-6506a-nam.123.cisco.com#upgrade ftp://cse:csecse@172.18.123.68/

local/home/cse/c6nam.3-1-1.bin.gz500 'SIZE c6nam.3-1-1.bin.gz':

command not understood.

ftp://cse:csecse@172.18.123.68/local/home/cse/c6nam.3-1-1.bin.gz

(unknown size) - [|] 41362K

!--- This goes on for a long time.

!--- You have to be patient through this. !--- Then, after a lot of time, (can run for hours):

75671250 bytes transferred in 3010.21 sec (24.55k/sec)

downloaded image version 3.1(1)

Upgrade file ftp://cse:csecse@172.18.123.68/local/home/cse/c6nam.3-1-1.bin.gz

is downloaded. Upgrading will wipe out the

contents of the application partition on the hard disk.

Do you want to proceed installing it [y|N]: y

Proceeding with installation. Please do not interrupt.

If installation is interrupted or fails, boot this

partition again and restart upgrade.

!--- After a few minutes, you should see this:

Upgrade complete. You can boot the new application partition.

root@nms-6506a-nam.123.cisco.com#

6. 返回並重設交換器：

root@nms-6506a-nam.123.cisco.com#exit

nms-6506a> (enable) reset 4

This command will reset module 4.

Unsaved configuration on module 4 will be lost

Do you want to continue (y/n) [n]? y

Module 4 shut down in progress, do not remove module until shutdown completed.

you might see these log messages as well:

2003 May 28 12:47:45 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "unknown(1)"

2003 May 28 12:47:45 %SNMP-5-MODULETRAP:Module 4 [Down] Trap

2003 May 28 12:47:45 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "failed(7)"

2003 May 28 12:48:00 %SNMP-5-FRUREMOVEDTRAP:module 4 removed

2003 May 28 12:48:00 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483565551 ticks

2003 May 28 12:48:00 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "unknown(1)"

2003 May 28 12:48:16 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483567205 ticks

2003 May 28 12:48:16 %SNMP-5-FRUINSERTEDTRAP:module 4 inserted

2003 May 28 12:48:00 %SNMP-5-FRUREMOVEDTRAP:module 4 removed

2003 May 28 12:48:00 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483565551 ticks

2003 May 28 12:48:00 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "unknown(1)"

2003 May 28 12:48:16 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483567205 ticks

2003 May 28 12:48:16 %SNMP-5-FRUINSERTEDTRAP:module 4 inserted

2003 May 28 12:50:22 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "ok(2)"

2003 May 28 12:50:22 %SNMP-5-MODULETRAP:Module 4 [Up] Trap

2003 May 28 12:50:22 %SNMP-5-FRUREMOVEDTRAP:module 4 removed

2003 May 28 12:50:22 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483579792 ticks

2003 May 28 12:50:22 %SNMP-5-FRUINSERTEDTRAP:module 4 inserted

2003 May 28 12:50:23 %SYS-3-MOD_PORTINTFINSYNC:Port Interface in sync

for Module 4

7. 最後，再次登入NAM:

nms-6506a> (enable) sess 4

Trying NAM-4...

Connected to NAM-4.

Escape character is '^]'.

Cisco Network Analysis Module (WS-X6380-NAM)

!--- NOTE #1: The 3.1 application image upgrade requires a special !--- one-time extra reboot for optimal NAM 3.1 operation. !--- Reboot the NAM immediately after logging in. !--- NOTE #2: Although it is NOT recommended, if for some reason you either !--- want to downgrade the application image later on this NAM or reinstall !--- the maintenance image, it is necessary to first install the NAM !--- downgrade patch.

login: root

Password:

Terminal type: vt100

Cisco Network Analysis Module (WS-X6380-NAM) Console, 3.1(1)

Copyright (c) 1999-2003 by cisco Systems, Inc.

root@nms-6506a-nam.123.cisco.com#

root@nms-6506a-nam.123.cisco.com# reboot

!--- Reboot the NAM one last time.

Reboot the NAM? (Y/N) [N]: y

6. 等待NAM重新啟動

!--- Note: NAM 3.1 takes a little longer to reboot (7-10 minutes).

Look for these logs:

2003 May 28 12:55:08 %SNMP-5-ENTITYMODTRAP:Module 4 status changed to "unknown(1)"

2003 May 28 12:55:08 %SNMP-5-MODULETRAP:Module 4 [Down] Trap

2003 May 28 12:55:08 %SNMP-5-ENTITYMODTRAP:Module 4 status changed to "failed(7)"

2003 May 28 12:55:23 %SNMP-5-FRUREMOVEDTRAP:module 4 removed

2003 May 28 12:55:23 %SNMP-5-ENTITYTRAP:Entity Mib last change time 483609821 ticks

2003 May 28 12:55:23 %SNMP-5-ENTITYMODTRAP:Module 4 status changed to "unknown(1)"

2003 May 28 12:55:39 %SNMP-5-ENTITYTRAP:Entity Mib last change time 483611474 ticks

2003 May 28 12:55:39 %SNMP-5-FRUINSERTEDTRAP:module 4 inserted

最後：

2003 May 28 12:57:17 %SNMP-5-ENTITYMODTRAP:Module 4 status changed to "ok(2)"

2003 May 28 12:57:17 %SNMP-5-MODULETRAP:Module 4 [Up] Trap

2003 May 28 12:57:18 %SNMP-5-FRUREMOVEDTRAP:module 4 removed

2003 May 28 12:57:18 %SNMP-5-ENTITYTRAP:Entity Mib last change time 483621409 ticks

2003 May 28 12:57:18 %SNMP-5-FRUINSERTEDTRAP:module 4 inserted

2003 May 28 12:57:18 %SYS-3-MOD_PORTINTFINSYNC:Port Interface in sync for Module 4

驗證

使用本節內容，確認您的組態是否正常運作。

輸出直譯器工具(僅供已註冊客戶使用)(OIT)支援某些show命令。使用OIT檢視show命令輸出的分析。

- show mod

nms-6506a> (enable) sh mod 4

Mod Slot Ports Module-Type Model Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

4 4 2 Network Analysis Module WS-X6380-NAM no ok

(i) login again to see the version:

nms-6506a> (enable)sess 4

Trying NAM-4...

Connected to NAM-4.

Escape character is '^]'.

Cisco Network Analysis Module (WS-X6380-NAM)

login: root

Password:

Terminal type: vt100

Cisco Network Analysis Module (WS-X6380-NAM) Console, 3.1(1)

Copyright (c) 1999-2003 by cisco Systems, Inc.

root@nms-6506a-nam.123.cisco.com#

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

相關資訊

- 思科網路分析模組流量分析器使用手冊3.6

- 技術支援與文件 - Cisco Systems