目錄

簡介

開始之前

需求

採用元件

慣例

設定

網路圖表

組態

驗證

疑難排解

簡介

本檔案將提供範例設定，以設定資料連結交換(DLSw)在DLSw對等路由器任一端的序列介面上，進行同步資料連結控制(SDLC)到SDLC連線的連線。

開始之前

需求

嘗試此設定之前，請確保符合以下要求：

- 路由器必須運行IBM功能集。

- 必須配置DLSw對等體。

- 連線的兩端必須是支援SDLC的串列介面。

採用元件

本檔案所述內容不限於特定硬體和軟體版本。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

設定

本節提供用於設定本文件中所述功能的資訊。

網路圖表

本文使用此網路設定

組態

本檔案會使用以下設定：

- PU 2.0連線

- PU 2.1連線

PU 2.0連線

Router A

dlsw local-peer peer-id 1.1.1.1

dlsw remote-peer 0 tcp 1.1.1.2

int s 0

interface Serial2/0

no ip address

encapsulation sdlc

no keepalive

serial restart-delay 0

sdlc role secondary

sdlc vmac 4000.1000.0000

sdlc address C1

sdlc partner 4000.2000.00c1 C1

sdlc dlsw default

Router B

dlsw local-peer peer-id 1.1.1.2

dlsw remote-peer 0 tcp 1.1.1.1

interface Serial2/0

no ip address

encapsulation sdlc

no keepalive

serial restart-delay 0

sdlc role primary

sdlc vmac 4000.2000.0000

sdlc address C1

sdlc partner 4000.1000.00c1 C1

sdlc dlsw default

PU 2.1連線

Router A

dlsw local-peer peer-id 1.1.1.1

dlsw remote-peer 0 tcp 1.1.1.2

int s 0

interface Serial2/0

no ip address

encapsulation sdlc

no keepalive

serial restart-delay 0

sdlc role secondary

sdlc vmac 4000.1000.0000

sdlc address C1 xid-passthru

sdlc partner 4000.2000.00c1 C1

sdlc dlsw default

Router B

dlsw local-peer peer-id 1.1.1.2

dlsw remote-peer 0 tcp 1.1.1.1

interface Serial2/0

no ip address

encapsulation sdlc

no keepalive

serial restart-delay 0

sdlc role none

sdlc vmac 4000.2000.0000

sdlc address C1

sdlc partner 4000.1000.00c1 C1

sdlc dlsw default

驗證

本節提供的資訊可用於確認您的組態是否正常運作。

- show dlsw peer — 顯示對等體的狀態。

- show dlsw reachability — 顯示本地和遠端MAC地址的狀態。

- show dlsw circuit — 顯示電路狀態。

- show int serial x/x — 顯示介面狀態。

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

- 有關詳細資訊，請參閱DLSw故障排除。