目錄

簡介

必要條件

需求

採用元件

慣例

拓撲圖

設定

組態

驗證

疑難排解

相關資訊

簡介

在此配置中，有兩個不同的X.25資源（我們使用dspu-host來模擬此設定中的終端裝置）。 有關下游實體裝置(DSPU)的詳細資訊，請參閱以下檔案：

- 配置DSPU和SNA服務點支援

- 下游物理裝置常見問題

這兩個終端裝置通過X.25與大型機站點中的不同介面卡進行通訊。遠端X.25資源被配置為使用不同的目標地址（使用不同的長度和地址）。 X.121目的地位址與路由器的「qllc dlsw子位址」相匹配的任何傳入呼叫都會被分派到資料連結交換Plus(DLSw+)（具有ID.STN IND）。 當DLSw+收到有關池中虛擬MAC地址的「你能到達」查詢時，限定邏輯鏈路控制(QLLC)代碼會嘗試將虛電路(VC)設定為對映到指定的虛擬MAC地址的X.121地址。如果收到來電，QLLC會將具有虛擬MAC地址的ID.STN.IND從池傳送到DLSw+。

必要條件

需求

本文件沒有特定需求。

採用元件

本檔案中的資訊是根據軟體和硬體版本：

- Patos使用了Cisco IOS®軟體版本12.2(6a)(Cisco 2612)

- Namur & Goode(Cisco 2500、Cisco 4000)中使用了Cisco IOS軟體版本12.0(20)

- Nesle(Cisco 4500)中使用了Cisco IOS軟體版本12.1(7)

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

拓撲圖

設定

本節提供用於設定本文件中所述功能的資訊。

注意：要查詢有關本文檔中使用的命令的其他資訊，請使用命令查詢工具(僅限註冊客戶)。

組態

大型機的MAC地址如下：

- 4000.7507.0000

- 4000.7507.ffff

本檔案使用如下所示的組態：

- 思科7507（肉食）

- Cisco 2612（路徑）

- Cisco 4500(Nesle)

- Cisco 2500(Namur)

- Cisco 4000(Goode)

思科7507（肉食）

source-bridge ring-group 100

dlsw local-peer peer-id 10.48.64.75 promiscuous

!

interface Channel4/2

ip address 10.48.64.225 255.255.255.240

no keepalive

lan TokenRing 0

source-bridge 88 1 100

adapter 0 4000.7507.0000

adapter 1 4000.7507.ffff

Cisco 2612（路徑）

!

source-bridge ring-group 200

dlsw local-peer peer-id 10.48.64.40

dlsw remote-peer 0 tcp 10.48.64.75

!

interface Ethernet0/0

ip address 10.48.64.40 255.255.255.0

half-duplex

!

interface Serial0/0

no ip address

!

interface TokenRing0/0

no ip address

ring-speed 16

!

interface Serial0/1

no ip address

encapsulation x25

x25 alias .*

!--- It is used against the destination !--- address of a received call.

x25 htc 10

x25 win 7

x25 wout 7

qllc accept-all-calls

qllc dlsw subaddress 123456789012345 vmacaddr 4000.3333.0000 2 partner 4000.7507.0000

qllc dlsw subaddress 2224 vmacaddr 4000.2222.0000 2 partner 4000.7507.ffff

!

ip default-gateway 10.48.64.1

ip classless

no ip http server

ip pim bidir-enable

!

!

dial-peer cor custom

!

Cisco 4500(Nesle)

!

x25 routing

!

!

!

interface Ethernet0

ip address 10.48.64.34 255.255.255.0

media-type 10BaseT

!

interface Ethernet1

no ip address

shutdown

media-type 10BaseT

!

interface Ethernet2

no ip address

media-type 10BaseT

!

interface Serial0

no ip address

encapsulation x25 dce

clockrate 250000

!

interface Serial1

no ip address

!

interface Serial2

no ip address

encapsulation x25 dce

no ip mroute-cache

clockrate 250000

!

interface Serial3

no ip address

encapsulation x25 dce

clockrate 250000

!

interface TokenRing0

no ip address

ring-speed 16

!

ip default-gateway 10.48.64.1

ip classless

no ip http server

x25 route input-interface Serial2 interface Serial0

x25 route input-interface Serial3 interface Serial0

x25 route 555 interface Serial2

x25 route 666 interface Serial3

!

line con 0

exec-timeout 0 0

line aux 0

exec-timeout 0 0

line vty 0 4

exec-timeout 0 0

password 7 071836

login

!

ntp clock-period 17179258

ntp server 10.48.64.100

end

Cisco 2500(Namur)

hostname namur

!

logging buffered 150000 debugging

enable password 7 120E12

!

dspu host OZDEN xid-snd 00000000 x25 2224 qllc 12 interface Serial1

!

interface Ethernet0

no ip address

no ip directed-broadcast

shutdown

!

interface Serial0

no ip address

no ip directed-broadcast

shutdown

!

interface Serial1

no ip address

no ip directed-broadcast

encapsulation x25

no ip mroute-cache

x25 address 555

x25 htc 10

x25 win 7

x25 wout 7

dspu enable-host qllc 12

dspu start OZDEN

!

interface TokenRing0

no ip address

no ip directed-broadcast

shutdown

!

Cisco 4000(Goode)

dspu host GOODE xid-snd 11132323 x25 123456789012345 qllc 20 interface Serial1

!

interface Ethernet0

ip address 10.48.64.17 255.255.255.0

no ip directed-broadcast

media-type 10BaseT

!

interface Serial0

no ip address

no ip directed-broadcast

shutdown

!

interface Serial1

no ip address

no ip directed-broadcast

encapsulation x25

no ip mroute-cache

x25 address 666

x25 htc 10

x25 win 7

x25 wout 7

dspu enable-host qllc 20

dspu start GOODE

!

驗證

本節提供的資訊可用於確認您的配置處於活動狀態。

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

- show llc2 — 顯示路由器中活動的LLC2連線。

- show version — 顯示軟體版本資訊。

- show dlsw peer — 顯示dlsw對等連線資訊。

- show dlsw circuit detail — 顯示DLSW電路的詳細資訊。

- show qllc serial 0/1 — 顯示有關QLLC serial 0/1的資訊。

- show x25 interface serial 0/1 — 顯示X.25 serial interface 0/1上的線路和協定的狀態。

- show x25 route — 顯示X.25路由表。

- show x25 interface serial 0 — 顯示X.25 serial interface 0上線路和協定的狀態。

- show dspu — 顯示DSPU特徵的狀態。

- show x25 interface serial 1 — 顯示X.25 serial interface 1上線路和協定的狀態。

肉食

#show llc2

....

Channel4/2 DTE: 4000.7507.ffff 4000.2222.0000 04 04 state NORMAL

V(S)=1, V??)=1, Last N??)=1, Local window=7, Remote Window=127

akmax=3, n2=8,

xid-retry timer      0/0       ack timer       0/1000

p timer              0/1000    idle timer   5430/10000

rej timer            0/3200    busy timer      0/9600

adm timer            0/60000   llc1 timer      0/1000

akdelay timer        0/100     txQ count       0/200

RIF: 06B0.0581.0640

Channel4/2 DTE: 4000.7507.0000 4000.3333.0000 04 04 state NORMAL

V(S)=6, V??)=6, Last N??)=6, Local window=7, Remote Window=127

akmax=3, n2=8,

xid-retry timer      0/0       ack timer       0/1000

p timer              0/1000    idle timer   5630/10000

rej timer            0/3200    busy timer      0/9600

adm timer            0/60000   llc1 timer      0/1000

akdelay timer        0/100     txQ count       0/200

RIF: 06B0.0581.0640

帕多斯

pathos#show version

Cisco Internetwork Operating System Software

IOS (tm) C2600 Software (C2600-IS-M), Version 12.2(6a), RELEASE SOFTWARE (fc1)

Copyright ??) 1986-2001 by cisco Systems, Inc.

Compiled Sat 01-Dec-01 22:30 by pwade

Image text-base: 0x80008088, data-base: 0x810616B4

pathos#show dlsw peer

Peers:                state     pkts_rx   pkts_tx  type  drops ckts TCP   uptime

TCP 10.48.64.75     CONNECT        118        91  conf      0    2   0 00:32:12

Total number of connected peers: 1

Total number of connections:     1

pathos#show dlsw circuit detail

Index           local addr(lsap)    remote addr(dsap)  state          uptime

234881048       4000.2222.0000(04)  4000.7507.ffff(04) CONNECTED      00:29:50

PCEP: 81C25730   UCEP: 81D88528

Port:Se0/1          peer 10.48.64.75(2065)

Flow-Control-Tx  CW:20, Permitted:19; Rx CW:20, Granted:39; Op: Repeat

Congestion: Low(02), Flow Op: Half: 0/0 Reset 0/0

RIF = --no rif--

Bytes:             429/453        Info-frames:           1/1

XID-frames:          5/4          UInfo-frames:          0/0

HPR saps: local 0x0, remote 0x4

1426063385      4000.3333.0000(04)  4000.7507.0000(04) CONNECTED      00:29:49

PCEP: 81D081B4   UCEP: 81D108B0

Port:Se0/1          peer 10.48.64.75(2065)

Flow-Control-Tx  CW:20, Permitted:34; Rx CW:20, Granted:34; Op: Repeat

Congestion: Low(02), Flow Op: Half: 0/0 Reset 0/0

RIF = --no rif--

Bytes:             554/513        Info-frames:           6/6

XID-frames:          5/4          UInfo-frames:          0/0

HPR saps: local 0x0, remote 0x4

Total number of circuits connected: 2

pathos#show qllc serial 0/1

Interface Serial0/1

vc 2 66620

Circuit State P4/D1, Logical Link State QLOpened 4000.3333.0000(04)->4000.7507.0000(04)

0 packets held

vc 1 55512

Circuit State P4/D1, Logical Link State QLOpened 4000.2222.0000(04)->4000.7507.ffff(04)

0 packets held

pathos#

pathos#show x25 interface  serial 0/1

SVC 1,  State: D1,  Interface: Serial0/1

Started 00:30:51, last input 00:30:50, output 00:30:50

Connects 55512 <-->

qllc 4000.2222.0000

Window size input: 7, output: 7

Packet size input: 128, output: 128

PS: 0  PR: 7  ACK: 6  Remote PR: 0  RCNT: 1  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 463/441 packets 8/7 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

SVC 2,  State: D1,  Interface: Serial0/1

Started 00:30:51, last input 00:30:50, output 00:30:50

Connects 66620 <-->

qllc 4000.3333.0000

Window size input: 7, output: 7

Packet size input: 128, output: 128

PS: 5  PR: 4  ACK: 2  Remote PR: 5  RCNT: 2  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 523/566 packets 13/12 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

pathos#

內勒

nesle#show x25 route

#  Match                         Substitute          Route to

1  input-int Serial2                                 Serial0

2  input-int Serial3                                 Serial0

3  dest 555                                          Serial2

4  dest 666                                          Serial3

nesle#show x25 interface serial 0

SVC 1,  State: D1,  Interface: Serial0

Started 00:32:47, last input 00:32:46, output 00:32:46

Connects 55512 <--> 2224 from Serial2 SVC 10

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 7  PR: 0  ACK: 0  Remote PR: 6  RCNT: 0  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 441/463 packets 7/8 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

SVC 2,  State: D1,  Interface: Serial0

Started 00:32:47, last input 00:32:46, output 00:32:46

Connects 66620 <--> 123456789012345 from Serial3 SVC 1024

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 4  PR: 5  ACK: 5  Remote PR: 2  RCNT: 0  RNR: no

Window is closed

P/D state timeouts: 0  timer (secs): 0

data bytes 566/523 packets 12/13 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

nesle#show x25 interface serial 2

SVC 10,  State: D1,  Interface: Serial2

Started 00:32:51, last input 00:32:50, output 00:32:50

Connects 55512 <--> 2224 to Serial0 SVC 1

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 0  PR: 7  ACK: 6  Remote PR: 0  RCNT: 1  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 463/441 packets 8/7 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

nesle#show x25 interface serial 3

SVC 1024,  State: D1,  Interface: Serial3

Started 00:32:53, last input 00:32:52, output 00:32:52

Connects 66620 <--> 123456789012345 to Serial0 SVC 2

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 5  PR: 4  ACK: 2  Remote PR: 5  RCNT: 2  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 523/566 packets 13/12 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

納穆爾

namur#show dspu

dspu host OZDEN Serial1 (QLLC) PU STATUS Active

FRAMES RECEIVED 8 FRAMES SENT 8

LUs USED BY DSPU 0 LUs ACTIVE 0

LUs USED BY API 0 LUs ACTIVE 0

LUs ACTIVATED BY HOST BUT NOT USED 0

namur#show x25 interface serial 1

SVC 10,  State: D1,  Interface: Serial1

Started 00:34:55, last input 00:34:54, output 00:34:54

Connects 2224 <-->

qllc

Window size input: 7, output: 7

Packet size input: 128, output: 128

PS: 7  PR: 0  ACK: 0  Remote PR: 6  RCNT: 0  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 441/463 packets 7/8 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

namur#

古德

goode#show dspu

dspu host GOODE Serial1 (QLLC) PU STATUS Active

FRAMES RECEIVED 18 FRAMES SENT 18

LUs USED BY DSPU 0 LUs ACTIVE 0

LUs USED BY API 0 LUs ACTIVE 0

LUs ACTIVATED BY HOST BUT NOT USED 5

goode#show x25 interface serial 1

SVC 1024,  State: D1,  Interface: Serial1

Started 00:41:25, last input 00:41:25, output 00:41:25

Connects 123456789012345 <-->

qllc

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 4  PR: 5  ACK: 5  Remote PR: 2  RCNT: 0  RNR: no

Window is closed

P/D state timeouts: 0  timer (secs): 0

data bytes 566/523 packets 12/13 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

goode#

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

相關資訊

- 資料連結交換Plus(DLSw+)技術支援頁面

- IBM技術支援

- 技術支援與文件 - Cisco Systems