目錄

簡介

必要條件

需求

採用元件

慣例

設定

網路圖表

組態

驗證

疑難排解

疑難排解指令

故障排除輸出示例

相關資訊

簡介

本文檔提供使用浮動靜態路由實施ISDN備份的示例配置，並提供此類配置的基本故障排除資訊。

有關最常見的ISDN備份實現資訊以及它們之間的比較，請參閱以下文檔：評估備份介面、浮動靜態路由和撥號器監視DDR備份。

必要條件

需求

本文件沒有特定需求。

採用元件

本檔案中的資訊是根據以下軟體和硬體版本。

- 兩台運行Cisco IOS®軟體版本12.2(3)和12.2(5)的Cisco 2500路由器

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您在即時網路中工作，請確保在使用任何命令之前瞭解其潛在影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

設定

本節提供用於設定本文件中所述功能的資訊。

注意：要查詢有關本文檔中使用的命令的其他資訊，請使用命令查詢工具(僅限註冊客戶)。

網路圖表

本文檔使用下圖所示的網路設定。

組態

本文檔使用如下所示的配置。

- krimson（思科2500路由器）

- kevin（思科2500路由器）

krimson（思科2500路由器）

krimson#show running-config

Building configuration...

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname krimson

!

username kevin password 0 <password>

!

isdn switch-type basic-net3

!

!

interface Loopback0

ip address 10.7.7.1 255.255.255.0

!

interface Serial0

ip address 10.1.2.1 255.255.255.0

!

interface BRI0

no ip address

encapsulation ppp

no ip route-cache

no ip mroute-cache

load-interval 30

dialer pool-member 1

isdn switch-type basic-net3

no fair-queue

no cdp enable

ppp authentication chap

!

interface Dialer0

ip address 10.9.9.1 255.255.255.0

encapsulation ppp

no ip route-cache

no ip mroute-cache

dialer pool 1

dialer remote-name kevin

dialer string 8114

dialer-group 1

no cdp enable

ppp authentication chap

!

ip classless

ip route 10.8.8.0 255.255.255.0 10.1.2.2

ip route 10.8.8.0 255.255.255.0 10.9.9.2 180

no ip http server

!

dialer-list 1 protocol ip permit

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

exec-timeout 0 0

password <password> login

!

end

kevin（思科2500路由器）

kevin#show running-config

Building configuration...

Current configuration : 1205 bytes

!

version 12.2

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname kevin

!

username krimson password 0 <password>

!

isdn switch-type basic-net3

!

!

!

interface Loopback0

ip address 10.8.8.1 255.255.255.0

!

interface Serial0

ip address 10.1.2.2 255.255.255.0

clockrate 2000000

!

interface Serial1

no ip address

shutdown

!

interface BRI0

no ip address

encapsulation ppp

dialer pool-member 1

isdn switch-type basic-net3

no cdp enable

ppp authentication chap

!

interface Dialer0

ip address 10.9.9.2 255.255.255.0

encapsulation ppp

dialer pool 1

dialer remote-name krimson

dialer string 8113

dialer-group 1

no cdp enable

ppp authentication chap

!

!

dialer-list 1 protocol ip permit

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

exec-timeout 0 0

password <password> login

!

end

驗證

本節提供的資訊可用於確認您的組態是否正常運作。

Output Interpreter工具(僅供註冊客戶使用)支援某些show命令，這允許您檢視show命令輸出的分析。

- show ip route — 顯示IP路由表條目。

- show interfaces — 顯示路由器或訪問伺服器上配置的所有介面的統計資訊。

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

疑難排解指令

Output Interpreter工具(僅供註冊客戶使用)支援某些show命令，這允許您檢視show命令輸出的分析。

注意：發出debug指令之前，請先參閱有關Debug指令的重要資訊。

- debug isdn q931 — 顯示有關本地路由器（使用者端）與網路之間的ISDN網路連線（第3層）的呼叫建立和拆除的資訊。

- debug isdn events — 顯示ISDN介面使用者端（路由器上）發生的ISDN事件。可以顯示的ISDN事件是Q.931事件（呼叫建立和ISDN網路連線斷開）。

- debug dialer — 顯示有關撥號器介面上的資料包或事件的調試資訊。

- debug ppp negotiation — 使debug ppp命令顯示PPP啟動期間傳輸的PPP資料包，其中會協商PPP選項。

- debug ppp authentication — 使debug ppp命令顯示身份驗證協定消息，包括質詢身份驗證協定(CHAP)資料包交換和口令身份驗證協定(PAP)交換。

故障排除輸出示例

在這裡，我們可以通過在遠端端的串列介面上使用shutdown和no shutdown命令來測試備份功能。這通常會導致通往相關目的網路的主要ip路由消失。

我們首先來看一下主要介面的初始狀態和ip路由表：

呼叫端：

krimson#show interface serial 0

Serial0 is up, line protocol is up

Hardware is HD64570

Internet address is 10.1.2.1/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation HDLC, loopback not set

Keepalive set (10 sec)

Last input 00:00:07, output 00:00:07, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 1158 kilobits/sec

5 minute input rate 1000 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

92 packets input, 7599 bytes, 0 no buffer

Received 62 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

99 packets output, 8991 bytes, 0 underruns

0 output errors, 0 collisions, 12 interface resets

0 output buffer failures, 0 output buffers swapped out

4 carrier transitions

DCD=up DSR=up DTR=up RTS=up CTS=up

krimson#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter

area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.48.74.1 to network 0.0.0.0

10.0.0.0/8 is variably subnetted, 5 subnets, 2 masks

C 10.1.2.0/24 is directly connected, Serial0

S 10.8.8.0/24 [1/0] via 10.1.2.2

!--- The IP route for the destination network points to the primary link.

C 10.9.9.0/24 is directly connected, Dialer0

C 10.7.7.0/24 is directly connected, Loopback0

C 10.48.74.0/23 is directly connected, Ethernet0

S* 0.0.0.0/0 [254/0] via 10.48.74.1

被叫端：

kevin#show interface serial 0

Serial0 is up, line protocol is up

Hardware is HD64570

Internet address is 10.1.2.2/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation HDLC, loopback not set

Keepalive set (10 sec)

Last input 00:00:00, output 00:00:08, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 1158 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

106 packets input, 9432 bytes, 0 no buffer

Received 71 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

98 packets output, 8016 bytes, 0 underruns

0 output errors, 0 collisions, 4 interface resets

0 output buffer failures, 0 output buffers swapped out

1 carrier transitions

DCD=up DSR=up DTR=up RTS=up CTS=up

kevin#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter

area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.48.74.1 to network 0.0.0.0

10.0.0.0/8 is variably subnetted, 4 subnets, 2 masks

C 10.1.2.0/24 is directly connected, Serial0

C 10.9.9.0/24 is directly connected, Dialer0

C 10.8.8.0/24 is directly connected, Loopback0

C 10.48.74.0/23 is directly connected, Ethernet0

S* 0.0.0.0/0 [254/0] via 10.48.74.1

kevin#

現在，我們可以在遠端串列介面上使用shutdown命令來模擬鏈路故障：

krimson#

*Mar 4 15:25:18.302: %LINK-3-UPDOWN: Interface Serial0, changed state to

down

*Mar 4 15:25:19.302: %LINEPROTO-5-UPDOWN: Line protocol on Interface

Serial0, changed state to down

我們可以看到主鏈路已斷開。

krimson#show interface serial 0

Serial0 is down, line protocol is down

Hardware is HD64570

Internet address is 10.1.2.1/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation HDLC, loopback not set

Keepalive set (10 sec)

Last input 00:00:22, output 00:00:32, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 1158 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

108 packets input, 8526 bytes, 0 no buffer

Received 78 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

114 packets output, 9895 bytes, 0 underruns

0 output errors, 0 collisions, 12 interface resets

0 output buffer failures, 0 output buffers swapped out

5 carrier transitions

DCD=down DSR=down DTR=up RTS=up CTS=down

krimson#

路由表詳細資訊現在顯示浮動靜態路由已安裝在路由表中：

krimson#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter

area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.48.74.1 to network 0.0.0.0

10.0.0.0/8 is variably subnetted, 4 subnets, 2 masks

S 10.8.8.0/24 [180/0] via 10.9.9.2

C 10.9.9.0/24 is directly connected, Dialer0

C 10.7.7.0/24 is directly connected, Loopback0

C 10.48.74.0/23 is directly connected, Ethernet0

S* 0.0.0.0/0 [254/0] via 10.48.74.1

krimson#

在被叫路由器上，我們可以使用shutdown命令模擬本地串列0介面上的主鏈路故障：

kevin#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

kevin(config)#interface serial 0

kevin(config-if)#shutdown

*Mar 4 15:32:00.250: %LINK-5-CHANGED: Interface Serial0, changed state to

administratively down

*Mar 4 15:32:01.250: %LINEPROTO-5-UPDOWN: Line protocol on Interface

Serial0, changed state to down

*Mar 4 15:32:03.742: %SYS-5-CONFIG_I: Configured from console by console

現在我們可以看到主鏈路斷開：

kevin#show interface serial 0

Serial0 is administratively down, line protocol is down

Hardware is HD64570

Internet address is 10.1.2.2/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation HDLC, loopback not set

Keepalive set (10 sec)

Last input 00:01:28, output 00:01:18, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 1158 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

114 packets input, 9895 bytes, 0 no buffer

Received 79 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

108 packets output, 8526 bytes, 0 underruns

0 output errors, 0 collisions, 4 interface resets

0 output buffer failures, 0 output buffers swapped out

1 carrier transitions

DCD=down DSR=down DTR=up RTS=up CTS=down

定義為關注流量的ping流量通過備用撥號器0介面發起傳出呼叫。

krimson#ping 10.8.8.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.8.8.1, timeout is 2 seconds:

*Mar 4 15:27:39.618: BR0 DDR: rotor dialout [priority]

*Mar 4 15:27:39.622: BR0 DDR: Dialing cause ip (s=10.9.9.1, d=10.8.8.1)

*Mar 4 15:27:39.626: BR0 DDR: Attempting to dial 8114

*Mar 4 15:27:39.642: ISDN BR0: TX -> SETUP pd = 8 callref = 0x09

*Mar 4 15:27:39.646: Bearer Capability i = 0x8890

*Mar 4 15:27:39.654: Channel ID i = 0x83

*Mar 4 15:27:39.658: Called Party Number i = 0x80, '8114',

Plan:Unknown, Type:Unknown

*Mar 4 15:27:39.718: ISDN BR0: RX <- CALL_PROC pd = 8 callref = 0x89

*Mar 4 15:27:39.722: Channel ID i = 0x89

*Mar 4 15:27:39.974: ISDN BR0: RX <- CONNECT pd = 8 callref = 0x89

*Mar 4 15:27:39.990: %LINK-3-UPDOWN: Interface BRI0:1, changed state to up

*Mar 4 15:27:39.998: %DIALER-6-BIND: Interface BR0:1 bound to profile Di0

*Mar 4 15:27:40.010: BR0:1 PPP: Treating connection as a callout

*Mar 4 15:27:40.010: BR0:1 PPP: Phase is ESTABLISHING, Active Open [0 sess, 0 load]

*Mar 4 15:27:40.014: BR0:1 LCP: O .!!!CONFREQ [Closed] id 19 len 15

*Mar 4 15:27:40.018: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:27:40.022: BR0:1 LCP: MagicNumber 0x12D0A490 (0x050612D0A490)

*Mar 4 15:27:40.030: ISDN BR0: TX -> CONNECT_ACK pd = 8 callref = 0x09

*Mar 4 15:27:40.054: BR0:1 LCP: I CONFREQ [REQsent] id 9 len 15

*Mar 4 15:27:40.058: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:27:40.062: BR0:1 LCP: MagicNumber 0x12D6B638 (0x050612D6B638)

*Mar 4 15:27:40.066: BR0:1 LCP: O CONFACK [REQsent] id 9 len 15

*Mar 4 15:27:40.066: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:27:40.070: BR0:1 LCP: MagicNumber 0x12D6B638 (0x050612D6B638)

*Mar 4 15:27:40.074: BR0:1 LCP: I CONFACK [ACKsent] id 19 len 15

*Mar 4 15:27:40.078: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:27:40.082: BR0:1 LCP: MagicNumber 0x12D0A490 (0x050612D0A490)

*Mar 4 15:27:40.082: BR0:1 LCP: State is Open

*Mar 4 15:27:40.086: BR0:1 PPP: Phase is AUTHENTICATING, by both [0 sess, 0 load]

*Mar 4 !

Suc15:27:40.090: BR0:1 CHAP: O CHALLENGE id 7 len 28 from "krimson"

*Mar 4 15:27:40.106: BR0:1 CHAP: I CHALLENGE id 7 len 26 from "kevin"

*Mar 4 15:27:40.110: BR0:1 CHAP: O RESPONSE id 7 len 28 from "krimson"

*Mar 4 15:27:40.138: BR0:1 CHAP: I SUCCESS id 7 len 4

*Mar 4 15:27:40.150: BR0:1 CHAP: I RESPONSE id 7 len 26 from "kevin"

*Mar 4 15:27:40.158: BR0:1 CHAP: O SUCCESS id 7 len 4

*Mar 4 15:27:40.162: BR0:1 PPP: Phase is UP [0 sess, 0 load]

*Mar 4 15:27:40.166: BR0:1 IPCP: O CONFREQ [Not negotiated] id 2 len 10

*Mar 4 15:27:40.170: BR0:1 IPCP: Address 10.9.9.1 (0x03060A090901)

*Mar 4 15:27:40.186: BR0:1 IPCP: I CONFREQ [REQsent] id 2 len 10

*Mar 4 15:27:40.190: BR0:1 IPCP: Address 10.9.9.2 (0x03060A090902)

*Mar 4 15:27:40.190: BR0:1 IPCP: O CONFACK [REQsent] id 2 len 10

*Mar 4 15:27:40.194: BR0:1 IPCP: Address 10.9.9.2 (0x03060A090902)

*Mar 4 15:27:40.202: BR0:1 IPCP: I CONFACK [ACKsent] id 2 len 10

*Mar 4 15:27:40.206: BR0:1 IPCP: Address 10.9.9.1 (0x03060A090901)

*Mar 4 15:27:40.206: BR0:1 IPCP: State is Open

*Mar 4 15:27:40.214: BR0:1 DDR: dialer protocol up

*Mar 4 15:27:40.218: Di0 IPCP: Install route to 10.9.9.2

*Mar 4 15:27:41.162: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0:1,

changed state to upcess rate is 80 percent (4/5), round-trip min/avg/max =

36/47/76 ms

krimson#

同時，在被呼叫端運行的debug會顯示同一呼叫的以下輸出：

kevin#

*Mar 4 15:34:21.698: ISDN BR0: RX <- SETUP pd = 8 callref = 0x07

*Mar 4 15:34:21.706: Bearer Capability i = 0x8890

*Mar 4 15:34:21.714: Channel ID i = 0x89

*Mar 4 15:34:21.718: Calling Party Number i = 0xA1, '8113',

Plan:ISDN, Type:National

*Mar 4 15:34:21.734: Called Party Number i = 0xC1, '8114',

Plan:ISDN, Type:Subscriber(local)

*Mar 4 15:34:21.762: ISDN BR0: Event: Received a DATA call from 8113 on B1

at 64 Kb/s

*Mar 4 15:34:21.762: ISDN BR0: Event: Accepting the call id 0xC

*Mar 4 15:34:21.766: BR0:1: interface must be fifo queue, force fifo

*Mar 4 15:34:21.774: %DIALER-6-BIND: Interface BR0:1 bound to profile Di0

*Mar 4 15:34:21.786: %LINK-3-UPDOWN: Interface BRI0:1, changed state to up

*Mar 4 15:34:21.798: BR0:1 PPP: Treating connection as a callin

*Mar 4 15:34:21.802: BR0:1 PPP: Phase is ESTABLISHING, Passive Open [0 sess,

0 load]

*Mar 4 15:34:21.806: BR0:1 LCP: State is Listen

*Mar 4 15:34:21.818: ISDN BR0: TX -> CALL_PROC pd = 8 callref = 0x87

*Mar 4 15:34:21.826: Channel ID i = 0x89

*Mar 4 15:34:21.854: ISDN BR0: TX -> CONNECT pd = 8 callref = 0x87

*Mar 4 15:34:21.918: ISDN BR0: RX <- CONNECT_ACK pd = 8 callref = 0x07

*Mar 4 15:34:21.926: Channel ID i = 0x89

*Mar 4 15:34:21.978: BR0:1 LCP: I CONFREQ [Listen] id 19 len 15

*Mar 4 15:34:21.982: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:34:21.986: BR0:1 LCP: MagicNumber 0x12D0A490 (0x050612D0A490)

*Mar 4 15:34:21.990: BR0:1 LCP: O CONFREQ [Listen] id 9 len 15

*Mar 4 15:34:21.994: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:34:21.994: BR0:1 LCP: MagicNumber 0x12D6B638 (0x050612D6B638)

*Mar 4 15:34:21.998: BR0:1 LCP: O CONFACK [Listen] id 19 len 15

*Mar 4 15:34:22.002: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:34:22.006: BR0:1 LCP: MagicNumber 0x12D0A490 (0x050612D0A490)

*Mar 4 15:34:22.030: BR0:1 LCP: I CONFACK [ACKsent] id 9 len 15

*Mar 4 15:34:22.034: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 4 15:34:22.034: BR0:1 LCP: MagicNumber 0x12D6B638 (0x050612D6B638)

*Mar 4 15:34:22.038: BR0:1 LCP: State is Open

*Mar 4 15:34:22.042: BR0:1 PPP: Phase is AUTHENTICATING, by both [0 sess, 0

load]

*Mar 4 15:34:22.046: BR0:1 CHAP: O CHALLENGE id 7 len 26 from "kevin"

*Mar 4 15:34:22.050: BR0:1 CHAP: I CHALLENGE id 7 len 28 from "krimson"

*Mar 4 15:34:22.054: BR0:1 CHAP: Waiting for peer to authenticate first

*Mar 4 15:34:22.070: BR0:1 CHAP: I RESPONSE id 7 len 28 from "krimson"

*Mar 4 15:34:22.078: BR0:1 CHAP: O SUCCESS id 7 len 4

*Mar 4 15:34:22.082: BR0:1 CHAP: Processing saved Challenge, id 7

*Mar 4 15:34:22.090: BR0:1 CHAP: O RESPONSE id 7 len 26 from "kevin"

*Mar 4 15:34:22.114: BR0:1 CHAP: I SUCCESS id 7 len 4

*Mar 4 15:34:22.118: BR0:1 PPP: Phase is UP [0 sess, 0 load]

*Mar 4 15:34:22.122: BR0:1 IPCP: O CONFREQ [Not negotiated] id 2 len 10

*Mar 4 15:34:22.126: BR0:1 IPCP: Address 10.9.9.2 (0x03060A090902)

*Mar 4 15:34:22.130: BR0:1 IPCP: I CONFREQ [REQsent] id 2 len 10

*Mar 4 15:34:22.134: BR0:1 IPCP: Address 10.9.9.1 (0x03060A090901)

*Mar 4 15:34:22.138: BR0:1 IPCP: O CONFACK [REQsent] id 2 len 10

*Mar 4 15:34:22.142: BR0:1 IPCP: Address 10.9.9.1 (0x03060A090901)

*Mar 4 15:34:22.226: BR0:1 IPCP: I CONFACK [ACKsent] id 2 len 10

*Mar 4 15:34:22.230: BR0:1 IPCP: Address 10.9.9.2 (0x03060A090902)

*Mar 4 15:34:22.230: BR0:1 IPCP: State is Open

*Mar 4 15:34:22.242: BR0:1 DDR: dialer protocol up

*Mar 4 15:34:22.250: Di0 IPCP: Install route to 10.9.9.1

*Mar 4 15:34:23.114: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0:1,

changed state to up

*Mar 4 15:34:27.794: %ISDN-6-CONNECT: Interface BRI0:1 is now connected to

8113 krimson

備份後的狀態為「up」：

krimson#show interface dialer 0

Dialer0 is up, line protocol is up (spoofing)

Hardware is Unknown

Internet address is 10.9.9.1/24

MTU 1500 bytes, BW 56 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

DTR is pulsed for 1 seconds on reset

Interface is bound to BR0:1

Last input never, output never, output hang never

Last clearing of "show interface" counters 00:13:26

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/16 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 42 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

36 packets input, 2160 bytes

36 packets output, 2160 bytes

Bound to:

BRI0:1 is up, line protocol is up

Hardware is BRI

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

Time to interface disconnect: idle 00:01:33

Interface is bound to Di0 (Encapsulation PPP)

LCP Open

Open: IPCP

Last input 00:00:26, output 00:00:01, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

30 second input rate 0 bits/sec, 0 packets/sec

30 second output rate 0 bits/sec, 0 packets/sec

126 packets input, 3664 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

131 packets output, 3777 bytes, 0 underruns

0 output errors, 0 collisions, 15 interface resets

0 output buffer failures, 0 output buffers swapped out

28 carrier transitions

krimson#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter

area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.48.74.1 to network 0.0.0.0

10.0.0.0/8 is variably subnetted, 5 subnets, 3 masks

C 10.9.9.2/32 is directly connected, Dialer0

S 10.8.8.0/24 [180/0] via 10.9.9.2

C 10.9.9.0/24 is directly connected, Dialer0

C 10.7.7.0/24 is directly connected, Loopback0

C 10.48.74.0/23 is directly connected, Ethernet0

S* 0.0.0.0/0 [254/0] via 10.48.74.1

在被叫端：

備份後的狀態為「up」。

kevin#show interface dialer 0

Dialer0 is up, line protocol is up (spoofing)

Hardware is Unknown

Internet address is 10.9.9.2/24

MTU 1500 bytes, BW 56 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

DTR is pulsed for 1 seconds on reset

Interface is bound to BR0:1

Last input never, output never, output hang never

Last clearing of "show interface" counters 00:16:18

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations 0/1/16 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 42 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

40 packets input, 2224 bytes

40 packets output, 2224 bytes

Bound to:

BRI0:1 is up, line protocol is up

Hardware is BRI

MTU 1500 bytes, BW 64 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

Time to interface disconnect: idle 00:01:11

Interface is bound to Di0 (Encapsulation PPP)

LCP Open

Open: IPCP

Last input 00:00:48, output 00:00:00, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

136 packets input, 3857 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

131 packets output, 3744 bytes, 0 underruns

0 output errors, 0 collisions, 12 interface resets

0 output buffer failures, 0 output buffers swapped out

35 carrier transitions

kevin#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter

area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.48.74.1 to network 0.0.0.0

10.0.0.0/8 is variably subnetted, 4 subnets, 3 masks

C 10.9.9.0/24 is directly connected, Dialer0

C 10.8.8.0/24 is directly connected, Loopback0

C 10.9.9.1/32 is directly connected, Dialer0

C 10.48.74.0/23 is directly connected, Ethernet0

S* 0.0.0.0/0 [254/0] via 10.48.74.1

在這裡，我們通過在遠端串列介面上使用no shutdown命令來模擬主鏈路的恢復：

krimson#

*Mar 4 15:28:58.726: %LINK-3-UPDOWN: Interface Serial0, changed state to up

*Mar 4 15:28:59.730: %LINEPROTO-5-UPDOWN: Line protocol on Interface

Serial0, changed state to up

備份在空閒超時後斷開。

krimson#show isdn active

--------------------------------------------------------------------------------

ISDN ACTIVE CALLS

--------------------------------------------------------------------------------

Call Calling Called Remote Seconds Seconds Seconds Charges

Type Number Number Name Used Left Idle

Units/Currency

--------------------------------------------------------------------------------

Out 8114 kevin 120 1 118 0

--------------------------------------------------------------------------------

krimson#

*Mar 4 15:29:41.738: BR0:1 DDR: idle timeout

*Mar 4 15:29:41.742: BR0 DDR: has total 0 call(s), dial_out 0, dial_in 0

*Mar 4 15:29:41.746: BR0:1 PPP: Treating connection as a callout

*Mar 4 15:29:41.750: %DIALER-6-UNBIND: Interface BR0:1 unbound from profile

Di0

*Mar 4 15:29:41.754: BR0:1 DDR: disconnecting call

*Mar 4 15:29:41.758: %ISDN-6-DISCONNECT: Interface BRI0:1 disconnected from

8114 kevin, call lasted 121 seconds

*Mar 4 15:29:41.774: ISDN BR0: TX -> DISCONNECT pd = 8 callref = 0x09

*Mar 4 15:29:41.782: Cause i = 0x8090 - Normal call clearing

*Mar 4 15:29:41.790: Di0 IPCP: Remove route to 10.9.9.2

*Mar 4 15:29:41.862: ISDN BR0: RX <- RELEASE pd = 8 callref = 0x89

*Mar 4 15:29:41.886: %LINK-3-UPDOWN: Interface BRI0:1, changed state to down

*Mar 4 15:29:41.894: BR0:1 IPCP: State is Closed

*Mar 4 15:29:41.894: BR0:1 PPP: Phase is TERMINATING [0 sess, 0 load]

*Mar 4 15:29:41.898: BR0:1 LCP: State is Closed

*Mar 4 15:29:41.898: BR0:1 PPP: Phase is DOWN [0 sess, 0 load]

*Mar 4 15:29:41.902: BR0:1 DDR: disconnecting call

*Mar 4 15:29:41.910: ISDN BR0: TX -> RELEASE_COMP pd = 8 callref = 0x09

*Mar 4 15:29:42.886: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0:1,

changed state to down

初始狀態現在已恢復。

krimson#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter

area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.48.74.1 to network 0.0.0.0

10.0.0.0/8 is variably subnetted, 5 subnets, 2 masks

C 10.1.2.0/24 is directly connected, Serial0

S 10.8.8.0/24 [1/0] via 10.1.2.2

C 10.9.9.0/24 is directly connected, Dialer0

C 10.7.7.0/24 is directly connected, Loopback0

C 10.48.74.0/23 is directly connected, Ethernet0

S* 0.0.0.0/0 [254/0] via 10.48.74.1

相關資訊

- 撥號技術支援頁

- 技術支援 - Cisco Systems