目錄

簡介

必要條件

需求

採用元件

慣例

設定

網路圖表

組態

驗證

疑難排解

疑難排解步驟

不使用管理距離時

使用管理距離時

疑難排解指令

相關資訊

簡介

此配置示例說明如何使用ISDN BRI電路備份租用線路、WAN或串列連線。

本檔案使用撥號程式設定檔和備份介面功能。backup interface命令將配置的物理或邏輯介面置於備用模式，直到主介面關閉為止。

必要條件

需求

本文件沒有特定需求。

採用元件

此配置使用BRI電路備份串列鏈路。由於該路由器上配置了撥號器字串，因此路由器衝壓正在執行撥出。在此組態中：

- 使用Cisco 2500路由器(RAMSES)，連線到Cisco 2520路由器(sphinx)。 兩台路由器都配備了用於備份鏈路的BRI介面。

- 兩台路由器都運行Cisco IOS軟體版本12.0.7T。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

設定

本節提供用於設定本文件中所述功能的資訊。以下三個步驟完成了此配置：

1. 使用傳統DDR或撥號程式配置檔案配置按需撥號路由(DDR)。本文檔中顯示的配置示例使用撥號程式配置檔案。

2. 在主鏈路發生故障時，使用backup interface命令觸發撥出呼叫。

3. 定義相關流量。

注意：建議在配置備份介面和備份延遲命令之前，配置DDR連線（使用BRI0的撥號程式1）並驗證其是否正常工作。這允許您在配置備份之前有效地管理和排除撥號程式配置檔案、ISDN、PPP和身份驗證問題。

注意：要查詢有關本文檔中使用的命令的其他資訊，請使用命令查詢工具(僅限註冊客戶)。

網路圖表

本檔案會使用以下網路設定：

組態

本檔案會使用以下設定：

- ramses（Cisco 2500路由器）

- sphinx（思科2520路由器）

ramses（Cisco 2500路由器）

ramses#show running-config

Building configuration...

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname ramses

!

username sphinx password <password>

!-- password is case sensitive and should be the same on both sides

!

isdn switch-type basic-net3

!

!

interface Loopback1

ip address 1.1.1.1 255.255.255.255

!

interface Ethernet0

ip address 10.48.74.45 255.255.254.0

!

interface Serial0

backup delay 10 30

backup interface Dialer1

ip address 3.3.3.1 255.255.255.0

no ip directed-broadcast

clockrate 125000

!

interface BRI0

no ip address

no ip directed-broadcast

encapsulation ppp

dialer pool-member 2

isdn switch-type basic-net3

no cdp enable

ppp authentication chap callin

!

interface Dialer1

ip unnumbered Loopback1

no ip directed-broadcast

encapsulation ppp

dialer remote-name sphinx

dialer pool 2

dialer string 5551000

dialer-group 1

ppp authentication chap callin

!

ip classless

ip route 2.2.2.1 255.255.255.255 Dialer1

ip route 2.2.2.1 255.255.255.255 Serial0

no ip http server

!

dialer-list 1 protocol ip permit

!

line con 0

exec-timeout 0 0

transport input none

line aux 0

line vty 0 4

exec-timeout 0 0

password <password>

login

!

ntp server 10.200.20.134

end

sphinx（思科2520路由器）

sphinx#show running-config

Building configuration...

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname sphinx

!

!

username ramses password <password>

!-- password is case sensitive and should be the same on both sides

!

isdn switch-type basic-net3

interface Loopback1

ip address 2.2.2.1 255.255.255.255

!

interface Serial0

ip address 3.3.3.2 255.255.255.0

!

interface BRI0

no ip address

no ip directed-broadcast

encapsulation ppp

dialer pool-member 2

isdn switch-type basic-net3

no cdp enable

ppp authentication chap callin

!

interface Dialer1

ip unnumbered Loopback1

no ip directed-broadcast

encapsulation ppp

dialer remote-name ramses

dialer pool 2

dialer-group 1

ppp authentication chap

!

ip classless

ip route 1.1.1.1 255.255.255.255 Serial0

ip route 1.1.1.1 255.255.255.255 Dialer1 2

dialer-list 1 protocol ip permit

!

line con 0

exec-timeout 0 0

transport input none

line aux 0

line vty 0 4

!

end

驗證

本節提供的資訊可用於確認您的組態是否正常運作。

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

- show isdn status???顯示所有ISDN介面或特定ISDN介面的狀態。

- show interface serial -???示有關串列介面的資訊。

- show interface dialer -???示有關撥號器介面的資訊。

- debug dialer -???示有關撥號器介面上接收的資料包的DDR資訊。

- debug isdn q931???顯示路由器和ISDN交換機之間的ISDN網路連線（第3層）的呼叫建立和斷開。

- debug ppp negotiation???在協商PPP元件(包括鏈路控制協定(LCP)、身份驗證和NCP時，顯示有關PPP流量和交換的資訊。成功的PPP協商將首先開啟LCP狀態，然後進行身份驗證，最後協商NCP。

- debug ppp authentication???顯示PPP身份驗證協定消息，包括質詢身份驗證協定(CHAP)資料包交換和口令身份驗證協定(PAP)交換。如果發現故障，請驗證CHAP使用者名稱和密碼是否配置正確。

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

疑難排解步驟

請按照以下說明對配置進行故障排除：

使用show isdn status命令確保路由器與ISDN交換機正確通訊。在輸出中，確認：

- 第1層狀態為ACTIVE

- 第2層狀態狀態= MULTIPLE_FRAME_ESTABLISHED

此命令還顯示活動呼叫的數量。我們來看一個例子：

ramses#show isdn status

Global ISDN Switchtype = basic-net3

ISDN BRI0 interface

dsl 0, interface ISDN Switchtype = basic-net3

Layer 1 Status:

ACTIVE

Layer 2 Status:

TEI = 97, Ces = 1, SAPI = 0, State = MULTIPLE_FRAME_ESTABLISHED

Layer 3 Status:

0 Active Layer 3 Call(s)

Activated dsl 0 CCBs = 0

The Free Channel Mask: 0x80000003

Total Allocated ISDN CCBs = 0

ramses#show interface serial 0

Serial0 is up, line protocol is up

Hardware is HD64570

Internet address is 3.3.3.1/24

Backup interface Dialer1, failure delay 10 sec, secondary disable

delay 30 sec

ramses#show interface dialer 1

Dialer1 is standby mode, line protocol is down

! --- In standby mode.

Hardware is Unknown

由於備份介面處於備用模式，因此在show ip route命令的輸出中看不到此資訊。

使用管理距離(AD)和不使用管理距離時，讓我們看一下輸出中顯示的差異。

不使用管理距離時

如果不使用AD，您將看到以下輸出：

sphinx#show interface dialer 1

Dialer1 is up (spoofing), line protocol is up (spoofing)

Hardware is Unknown

如果沒有在路由器sphinx上使用AD作為撥號程式，則會看到show ip route命令的以下輸出：

sphinx(config)#ip route 1.1.1.1 255.255.255.255 dialer1

! --- No AD used here.

sphinx#show ip route 1.1.1.1

Routing entry for 1.1.1.1/32

Known via "static", distance 1, metric 0 (connected)

Routing Descriptor Blocks:

* directly connected, via Dialer1

Route metric is 0, traffic share count is 1

directly connected, via Serial0

Route metric is 0, traffic share count is 1

ping命令顯示的輸出看起來與以下類似，因為它缺少其中一個ping:

sphinx#ping 1.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 1.1.1.1, timeout is 2 seconds:

.!.!.

使用管理距離時

使用AD時，您將看到以下輸出：

sphinx(config)#ip route 1.1.1.1 255.255.255.255 dialer1 2

! --- The AD used here is two.

sphinx#show ip route 1.1.1.1

Routing entry for 1.1.1.1/32

Known via "static", distance 1, metric 0 (connected)

Routing Descriptor Blocks:

* directly connected, via Serial0

Route metric is 0, traffic share count is 1

sphinx#ping 1.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 1.1.1.1, timeout is 2 seconds:

!!!!!

配置並驗證DDR連線（撥號器1和BRI0之間）是否工作正常，然後再配置備份接口和備份延遲命令。這樣，您就可以在配置備份之前驗證撥號器配置檔案、ISDN、PPP和身份驗證是否正常工作。

驗證DDR連線正常工作後，可以繼續執行以下備份故障排除步驟：

1. 關閉主鏈路。

注意：請勿在配置了backup interface命令的路由器上使用shutdown命令。這不會導致Cisco IOS撥打備份鏈路。您可以在沒有backup interface命令的路由器上關閉主介面，以啟用備份。

註：在我們的方案中，backup interface命令是在ramses（Cisco 2500路由器）上配置的。 因此，對sphinx（思科2520路由器）的主介面執行shutdown命令會啟用備用鏈路。

注意：您可以通過拔下電纜或使用某種等效的方法來物理關閉主連線，以便啟動備用介面。

2. 您應該會看到一條控制檯消息，指示備用介面(interface dialer 1)已啟動。此消息僅在由backup delay命令指定的時間間隔過期後顯示。在此配置中，備份啟用延遲為10秒。

如果未看到此控制檯消息，請檢查備份延遲計時器。

*Mar 1 03:54:00.451: %LINEPROTO-5-UPDOWN: Line protocol on Interface

Serial0, changed state to down

*Mar 1 03:54:11.467: %LINK-3-UPDOWN: Interface Dialer1, changed state to up

3. 使用show ip route命令檢視主鏈路關閉的路由表。您應該觀察到Dialer 1的直連路由。

4. Ping遠端路由器環回介面的IP地址。如果連結沒有撥號，請確認您的相關流量定義允許ICMP流量(ping)。

注意：在我們的示例中，路由器斯芬克斯中的路由使用2的AD（這可以是除1之外的任何數字）。

ip route 1.1.1.1 255.255.255.255 Dialer1 2

注意：出現這種情況的原因是，如果主鏈路處於開啟狀態，則ping操作會有一半丟失。由於dialer 1和serial 0介面均已啟用，因此該路由已同時安裝用於這兩個介面。但是，由於BRI介面未啟動，撥號器介面無法傳送資料包。

疑難排解指令

使用本節顯示的命令對配置進行故障排除。

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

注意：發出debug命令之前，請參閱有關Debug命令的重要資訊。

嘗試ping 2.2.2.1以建立相關流量：

ramses#ping 2.2.2.1

*Mar 1 04:53:26.574: %LINK-3-UPDOWN: Interface Serial0, changed state

to down

*Mar 1 04:53:27.574: %LINEPROTO-5-UPDOWN: Line protocol on Interface

Serial0, changed state to down

*Mar 1 04:53:38.590: %LINK-3-UPDOWN: Interface Dialer1, changed state

to up

*Mar 1 04:53:38.606: Di1 LCP: Not allowed on a Dialer Profile.

*Mar 1 04:53:40.058: BRI0 DDR: rotor dialout [priority]

*Mar 1 04:53:40.062: BRI0 DDR: Dialing cause ip (s=1.1.1.1, d=2.2.2.1)

*Mar 1 04:53:40.066: BRI0 DDR: Attempting to dial 5551000

*Mar 1 04:53:40.078: ISDN BR0: TX -> SETUP pd = 8 callref = 0x0A

*Mar 1 04:53:40.078: Bearer Capability i = 0x8890

*Mar 1 04:53:40.082: Channel ID i = 0x83

*Mar 1 04:53:40.086: Called Party Number i = 0x80, '5551000'

*Mar 1 04:53:40.342: ISDN BR0: RX <- CALL_PROC pd = 8 callref = 0x8A

*Mar 1 04:53:40.346: Channel ID i = 0x89

*Mar 1 04:53:40.834: ISDN BR0: RX <- CONNECT pd = 8 callref = 0x8A

*Mar 1 04:53:40.846: ISDN BR0: TX -> CONNECT_ACK pd = 8 callref =

0x0A

*Mar 1 04:53:40.854: %LINK-3-UPDOWN: Interface BRI0:1, changed state to

up

*Mar 1 04:53:40.870: BRI0:1: interface must be fifo queue, force fifo

*Mar 1 04:53:40.874: %DIALER-6-BIND: Interface BRI0:1 bound to profile

Dialer1

*Mar 1 04:53:40.882: %ISDN-6-CONNECT: Interface BRI0:1 is now connected

to 5551000

*Mar 1 04:53:40.890: BR0:1 PPP: Treating connection as a callout

*Mar 1 04:53:40.890: BR0:1 PPP: Phase is ESTABLISHING, Active Open

*Mar 1 04:53:40.894: BR0:1 PPP: No remote authentication for call-out

*Mar 1 04:53:40.898: BR0:1 LCP: O CONFREQ [Closed] id 18 len 10

*Mar 1 04:53:40.902: BR0:1 LCP: MagicNumber 0xE1BD38B8

(0x0506E1BD38B8)

*Mar 1 04:53:40.930: BR0:1 LCP: I CONFREQ [REQsent] id 22 len 15

*Mar 1 04:53:40.934: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 04:53:40.938: BR0:1 LCP: MagicNumber 0xEEBCFA2D

(0x0506EEBCFA2D)

*Mar 1 04:53:40.942: BR0:1 LCP: O CONFACK [REQsent] id 22 len 15

*Mar 1 04:53:40.946: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 04:53:40.950: BR0:1 LCP: MagicNumber 0xEEBCFA2D

(0x0506EEBCFA2D)

*Mar 1 04:53:40.954: BR0:1 LCP: I CONFACK [ACKsent] id 18 len 10

*Mar 1 04:53:40.954: BR0:1 LCP: MagicNumber 0xE1BD38B8

(0x0506E1BD38B8)

*Mar 1 04:53:40.958: BR0:1 LCP: State is Open

*Mar 1 04:53:40.962: BR0:1 PPP: Phase is AUTHENTICATING, by the peer

*Mar 1 04:53:40.982: BR0:1 CHAP: I CHALLENGE id 9 len 27 from "sphinx"

*Mar 1 04:53:40.986: BR0:1 CHAP: O RESPONSE id 9 len 27 from "ramses"

*Mar 1 04:53:41.046: BR0:1 CHAP: I SUCCESS id 9 len 4

*Mar 1 04:53:41.050: BR0:1 PPP: Phase is UP

*Mar 1 04:53:41.054: BR0:1 IPCP: O CONFREQ [Not negotiated] id 9 len 10

*Mar 1 04:53:41.058: BR0:1 IPCP: Address 1.1.1.1 (0x030601010101)

*Mar 1 04:53:41.062: BR0:1 CDPCP: O CONFREQ [Not negotiated] id 9 len 4

*Mar 1 04:53:41.066: BR0:1 IPCP: I CONFREQ [REQsent] id 6 len 10

*Mar 1 04:53:41.070: BR0:1 IPCP: Address 2.2.2.1 (0x030602020201)

*Mar 1 04:53:41.074: BR0:1 IPCP: O CONFACK [REQsent] id 6 len 10

*Mar 1 04:53:41.078: BR0:1 IPCP: Address 2.2.2.1 (0x030602020201)

*Mar 1 04:53:41.082: BR0:1 CDPCP: I CONFREQ [REQsent] id 9 len 4

*Mar 1 04:53:41.086: BR0:1 CDPCP: O CONFACK [REQsent] id 9 len 4

*Mar 1 04:53:41.110: BR0:1 IPCP: I CONFACK [ACKsent] id 9 len 10

*Mar 1 04:53:41.110: BR0:1 IPCP: Address 1.1.1.1 (0x030601010101)

*Mar 1 04:53:41.114: BR0:1 IPCP: State is Open

*Mar 1 04:53:41.122: BR0:1 CDPCP: I CONFACK [ACKsent] id 9 len 4

*Mar 1 04:53:41.126: BR0:1 CDPCP: State is Open

*Mar 1 04:53:41.126: BRI0:1 DDR: dialer protocol up

*Mar 1 04:53:41.134: Di1 IPCP: Install route to 2.2.2.1

*Mar 1 04:53:42.086: %LINEPROTO-5-UPDOWN: Line protocol on Interface

BRI0:1, changed state to up

*Mar 1 04:53:46.886: %ISDN-6-CONNECT: Interface BRI0:1 is now connected

to 5551000 5551000

ramses#show dialer

BRI0 - dialer type = ISDN

Dial String Successes Failures Last DNIS Last status

0 incoming call(s) have been screened.

0 incoming call(s) rejected for callback.

BRI0:1 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up

Dial reason: ip (s=1.1.1.1, d=2.2.2.1)

! --- we see dial reason, this is the calling router

Interface bound to profile Dialer1

Time until disconnect 105 secs

Current call connected 00:00:16

Connected to 5551000 (5551000)

BRI0:2 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is idle

Dialer1 - dialer type = DIALER PROFILE

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up

Number of active calls = 1

Number of active circuit switched calls = 0

Dial String Successes Failures Last DNIS Last status

5551000 5 0 00:00:19 successful

Default

Dialer2 - dialer type = NONE

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Number of active calls = 0

Dial String Successes Failures Last DNIS Last status

ramses#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS

inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is not set

1.0.0.0/32 is subnetted, 1 subnets

C 1.1.1.1 is directly connected, Loopback1

2.0.0.0/32 is subnetted, 1 subnets

C 2.2.2.1 is directly connected, Dialer1

10.0.0.0/23 is subnetted, 1 subnets

C 10.48.74.0 is directly connected, Ethernet0

sphinx(config)#interface serial 0

sphinx(config-if)#shutdown

sphinx(config-if)#

*Mar 3 20:07:40.603: %LINK-5-CHANGED: Interface Serial0, changed state

to administratively down

*Mar 3 20:07:41.603: %LINEPROTO-5-UPDOWN: Line protocol on Interface

Serial0, changed state to down

*Mar 3 20:07:54.331: ISDN BR0: RX <- SETUP pd = 8 callref = 0x14

*Mar 3 20:07:54.335: Bearer Capability i = 0x8890

*Mar 3 20:07:54.339: Channel ID i = 0x89

*Mar 3 20:07:54.343: Called Party Number i = 0xC1, '5551000'

*Mar 3 20:07:54.355: ISDN BR0: Event: Received a DATA call from

<unknown> on B1 at 64 Kb/s

*Mar 3 20:07:54.355: BRI0:1: interface must be fifo queue, force fifo

*Mar 3 20:07:54.363: %DIALER-6-BIND: Interface BRI0:1 bound to profile

Dialer1

*Mar 3 20:07:54.383: %LINK-3-UPDOWN: Interface BRI0:1, changed state to

up

*Mar 3 20:07:54.403: %ISDN-6-CONNECT: Interface BRI0:1 is now connected

to <unknown phone number>

*Mar 3 20:07:54.411: BR0:1 PPP: Treating connection as a callin

*Mar 3 20:07:54.415: BR0:1 PPP: Phase is ESTABLISHING, Passive Open

*Mar 3 20:07:54.415: BR0:1 LCP: State is Listen

*Mar 3 20:07:54.471: %ISDN-6-LAYER2UP: Layer 2 for Interface BR0, TEI

99 changed to up

*Mar 3 20:07:54.479: ISDN BR0: TX -> CALL_PROC pd = 8 callref = 0x94

*Mar 3 20:07:54.687: ISDN BR0: TX -> CONNECT pd = 8 callref = 0x94

*Mar 3 20:07:54.851: ISDN BR0: RX <- CONNECT_ACK pd = 8 callref =

0x14

*Mar 3 20:07:54.939: BR0:1 LCP: I CONFREQ [Listen] id 18 len 10

*Mar 3 20:07:54.939: BR0:1 LCP: MagicNumber 0xE1BD38B8

(0x0506E1BD38B8)

*Mar 3 20:07:54.943: BR0:1 LCP: O CONFREQ [Listen] id 22 len 15

*Mar 3 20:07:54.947: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 3 20:07:54.951: BR0:1 LCP: MagicNumber 0xEEBCFA2D

(0x0506EEBCFA2D)

*Mar 3 20:07:54.955: BR0:1 LCP: O CONFACK [Listen] id 18 len 10

*Mar 3 20:07:54.959: BR0:1 LCP: MagicNumber 0xE1BD38B8

(0x0506E1BD38B8)

*Mar 3 20:07:54.987: BR0:1 LCP: I CONFACK [ACKsent] id 22 len 15

*Mar 3 20:07:54.987: BR0:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 3 20:07:54.991: BR0:1 LCP: MagicNumber 0xEEBCFA2D

(0x0506EEBCFA2D)

*Mar 3 20:07:54.995: BR0:1 LCP: State is Open

*Mar 3 20:07:54.995: BR0:1 PPP: Phase is AUTHENTICATING, by this end

*Mar 3 20:07:54.999: BR0:1 CHAP: O CHALLENGE id 9 len 27 from "sphinx"

*Mar 3 20:07:55.027: BR0:1 CHAP: I RESPONSE id 9 len 27 from "ramses"

*Mar 3 20:07:55.035: BR0:1 CHAP: O SUCCESS id 9 len 4

*Mar 3 20:07:55.039: BR0:1 PPP: Phase is UP

*Mar 3 20:07:55.043: BR0:1 IPCP: O CONFREQ [Not negotiated] id 6 len 10

*Mar 3 20:07:55.047: BR0:1 IPCP: Address 2.2.2.1 (0x030602020201)

*Mar 3 20:07:55.051: BR0:1 CDPCP: O CONFREQ [Not negotiated] id 9 len 4

*Mar 3 20:07:55.115: BR0:1 IPCP: I CONFREQ [REQsent] id 9 len 10

*Mar 3 20:07:55.119: BR0:1 IPCP: Address 1.1.1.1 (0x030601010101)

*Mar 3 20:07:55.123: BR0:1 IPCP: O CONFACK [REQsent] id 9 len 10

*Mar 3 20:07:55.127: BR0:1 IPCP: Address 1.1.1.1 (0x030601010101)

*Mar 3 20:07:55.131: BR0:1 CDPCP: I CONFREQ [REQsent] id 9 len 4

*Mar 3 20:07:55.135: BR0:1 CDPCP: O CONFACK [REQsent] id 9 len 4

*Mar 3 20:07:55.139: BR0:1 IPCP: I CONFACK [ACKsent] id 6 len 10

*Mar 3 20:07:55.143: BR0:1 IPCP: Address 2.2.2.1 (0x030602020201)

*Mar 3 20:07:55.147: BR0:1 IPCP: State is Open

*Mar 3 20:07:55.151: BR0:1 CDPCP: I CONFACK [ACKsent] id 9 len 4

*Mar 3 20:07:55.155: BR0:1 CDPCP: State is Open

*Mar 3 20:07:55.159: BRI0:1 DDR: dialer protocol up

*Mar 3 20:07:55.167: Di1 IPCP: Install route to 1.1.1.1

*Mar 3 20:07:56.039: %LINEPROTO-5-UPDOWN: Line protocol on Interface

BRI0:1, changed state to up

*Mar 3 20:08:00.411: %ISDN-6-CONNECT: Interface BRI0:1 is now connected

to <unknown phone number> ramses

sphinx#show dialer

BRI0 - dialer type = ISDN

Dial String Successes Failures Last DNIS Last status

0 incoming call(s) have been screened.

0 incoming call(s) rejected for callback.

BRI0:1 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up

Interface bound to profile Dialer1

Time until disconnect 95 secs

Connected to <unknown phone number> (ramses)

! --- We see ramses.

BRI0:2 - dialer type = ISDN

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is idle

Dialer1 - dialer type = DIALER PROFILE

Idle timer (120 secs), Fast idle timer (20 secs)

Wait for carrier (30 secs), Re-enable (15 secs)

Dialer state is data link layer up

Number of active calls = 1

Number of active circuit switched calls = 0

Dial String Successes Failures Last DNIS Last status

sphinx#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS

inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is not set

1.0.0.0/32 is subnetted, 1 subnets

C 1.1.1.1 is directly connected, Dialer1

2.0.0.0/32 is subnetted, 1 subnets

C 2.2.2.1 is directly connected, Loopback1

sphinx#

相關資訊

- 存取技術支援頁面

- 技術支援 - Cisco Systems