目錄

簡介

必要條件

需求

採用元件

慣例

設定

網路圖表

組態

驗證

疑難排解

調試輸出示例

使用V.110的GSM回撥

使用V.110的數據機回撥

使用V.110的ISDN回撥

相關資訊

簡介

本文檔為使用下列方法之一進行呼叫的遠端使用者提供了一個配置示例。在每種情況下，使用V.110呼叫執行回撥。

- 使用者通過GSM連線3640並請求回撥。

- 使用者通過數據機連線3640並請求回撥。

- 通過ISDN（資料）連線3640並請求回叫的使用者。

注意：預設情況下在路由器上配置身份驗證、授權和記帳(AAA)。您還應建立要登入的使用者。

在本例中，我們還為呼入和撥出設定了點對點協定(PPP)身份驗證。我們一直都更改了指令碼來為V.110配置數據機，並允許使用者選擇其方法（數據機或GSM）。 根據選擇的方法，使用者應該：

- 在回叫號碼中使用ZDTxxx（對於數據機）。

- 在回撥號碼中使用DIxxxx（用於GSM）。

必要條件

需求

本文件沒有特定需求。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- Rosa IOS提供V.110回撥功能??軟體版本12.2(5.2)T及更高版本。

- 資料機軟體版本2.7.3.0。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

設定

本節提供用於設定本文件中所述功能的資訊。

注意：要查詢有關本文檔中使用的命令的其他資訊，請使用命令查詢工具(僅限註冊客戶)。

網路圖表

本檔案會使用下圖中所示的網路設定。

組態

本檔案會使用以下設定：

- 蘇珊娜

蘇珊娜

suzanne#show running-config

!

version 12.2

service internal

!

hostname suzanne

!

aaa new-model

!

aaa authentication login default local

aaa authentication ppp default local

aaa authorization network default local

aaa session-id common

!

username ww password 0

username alainisdn password 0

username alaingsm callback-dialstring "" password 0

username alainmod callback-dialstring "" password 0

!

modem country mica belgium

!

isdn switch-type primary-net5

isdn voice-call-failure 0

chat-script offhook "" "ATH1" OK

chat-script callback ABORT ERROR ABORT BUSY "" "AT&F"

OK "ATX3DT \T" TIMEOUT 90 \c

chat-script callback1analog ABORT ERROR ABORT BUSY "" "AT&F"

OK "ATDT \T" TIMEOUT 90 CONNECT \c

chat-script callback2gsm ABORT ERROR ABORT BUSY "" "AT&F"

OK "ATS29=8" OK "AT \T" TIMEOUT 90 CONNECT \c

!

controller E1 1/0

pri-group timeslots 1-31

!

interface Ethernet0/0

ip address 172.17.243.105 255.255.255.0

!

interface Serial1/0:15

description E1 0451/39920

no ip address

encapsulation ppp

dialer rotary-group 1

isdn switch-type primary-net5

isdn incoming-voice modem

isdn outgoing-voice info-transfer-capability 3.1kHz-audio

no cdp enable

ppp authentication chap callin

!

interface BRI3/1

description belgacom 027202094

no ip address

encapsulation ppp

isdn switch-type basic-net3

isdn incoming-voice modem

no cdp enable

!

interface Group-Async1

ip unnumbered Dialer1

encapsulation ppp

dialer in-band

dialer callback-secure

dialer-group 1

async dynamic routing

async mode interactive

peer default ip address pool pool

ppp callback accept

ppp authentication pap

group-range 65 94

!

interface Dialer1

description Dial-In User

ip address 172.31.1.1 255.255.0.0

ip helper-address 90.100.48.38

ip helper-address 90.100.60.202

encapsulation ppp

dialer in-band

dialer callback-secure

dialer map ip 172.31.1.2 name alainisdn class callback 6136

peer default ip address pool pool

no cdp enable

ppp callback accept

ppp authentication chap callin

!

map-class dialer callback

dialer callback-server username

dialer-list 1 protocol ip permit

!

line con 0

exec-timeout 0 0

password

line 65 94

script dialer callback2gsm

script callback callback2gsm

modem InOut

transport input telnet

transport output pad v120 lapb-ta telnet rlogin udptn

autoselect during-login

autoselect ppp

stopbits 1

flowcontrol hardware

line aux 0

password

line vty 0 4

exec-timeout 0 0

password

!

end

驗證

本節提供的資訊可用於確認您的組態是否正常運作。

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

- show ip route???顯示IP路由表的內容

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

註：發出debug命令之前，請參閱有關Debug命令的重要資訊。

- debug modem — 觀察接入伺服器上的數據機線路活動。

- debug dialer events — 顯示有關撥號器介面上接收的資料包的調試資訊。

- debug ppp authentication — 顯示身份驗證協定消息，包括質詢身份驗證協定(CHAP)資料包交換和口令身份驗證協定(PAP)交換。

- debug ppp cbcp — 顯示協定錯誤和使用Microsoft回撥控制協定(MSCB)與PPP連線協商相關的統計資訊。

- debug ISDN Q931 — 顯示有關本地路由器（使用者端）與網路之間的ISDN網路連線（第3層）的呼叫建立和拆除的資訊。

- debug chat — 驗證聊天指令碼是否正常運行。

- debug callback — 當路由器使用數據機和聊天指令碼在終端線路上回叫時顯示回叫事件。

調試輸出示例

使用V.110的GSM回撥

suzanne#

01:03:00: ISDN BR3/1: RX <- SETUP pd = 8 callref = 0x2F

01:03:00: Sending Complete

01:03:00: Bearer Capability i = 0x9090A3

01:03:00: Channel ID i = 0x89

01:03:00: Calling Party Number i = 0x21, 0x83, '478681006', Plan:ISDN,

Type:National

01:03:00: Called Party Number i = 0xA1, '27202094', Plan:ISDN, Type:National

01:03:00: ISDN BR3/1: Event: Received a VOICE call from 478681006 on B1 at 64 Kb/s

01:03:00: ISDN BR3/1: Event: Accepting the call id 0x19

01:03:00: %ISDN-6-LAYER2UP: Layer 2 for Interface BR3/1, TEI 70 changed to up

01:03:00: ISDN BR3/1: TX -> CALL_PROC pd = 8 callref = 0xAF

01:03:00: Channel ID i = 0x89

01:03:00: ISDN BR3/1: TX -> ALERTING pd = 8 callref = 0xAF

01:03:00: ISDN BR3/1: TX -> CONNECT pd = 8 callref = 0xAF

01:03:01: ISDN BR3/1: RX <- CONNECT_ACK pd = 8 callref = 0x2F

01:03:01: Modem 2/12 Mica: configured for Answer mode,

with Null signaling,0x0 tone detection.

01:03:01: Modem 2/12 Mica: in modem state CALL_SETUP

01:03:02: Modem 2/12 Mica: in modem state CONNECT

01:03:06: Modem 2/12 Mica: in modem state LINK

01:03:07: %ISDN-6-CONNECT: Interface BRI3/1:1 is now connected to 478681006

01:03:15: Modem 2/12 Mica: in modem state TRAINUP

01:03:17: Modem 2/12 Mica: in modem state EC_NEGOTIATING

01:03:18: Modem 2/12 Mica: in modem state STEADY

01:03:18: Modem 2/12 Mica: CONNECT at 31200/31200 (Tx/Rx), V34+, LAPM, None

01:03:19: TTY77: DSR came up

01:03:19: tty77: Modem: IDLE->(unknown)

01:03:19: TTY77: EXEC creation

01:03:19: TTY77: set timer type 10, 30 seconds

01:03:19: TTY77: Autoselect(2) sample 7E

01:03:19: TTY77: Autoselect(2) sample 7EFF

01:03:19: TTY77: Autoselect(2) sample 7EFF7D

01:03:19: TTY77: Autoselect(2) sample 7EFF7D23

01:03:19: TTY77 Autoselect cmd: ppp negotiate

01:03:19: TTY77: EXEC creation

01:03:19: TTY77: create timer type 1, 600 seconds

01:03:19: TTY77: destroy timer type 1

01:03:19: TTY77: no timer type 0 to destroy

01:03:19: As77 DDR: Dialer received incoming call from <unknown>

01:03:21: %LINK-3-UPDOWN: Interface Async77, changed state to up

01:03:21: As77 DDR: Dialer statechange to up

01:03:21: As77 DDR: Dialer received incoming call from <unknown>

01:03:21: As77 PPP: Treating connection as a callin

01:03:21: As77 PPP: Authorization required

01:03:22: Modem 2/12 Mica: PPP escape_map: Tx map = FFFFFFFF, Rx map = 0

01:03:22: As77 PPP: Authorization required

01:03:27: Modem 2/12 Mica: PPP escape_map: Tx map = A0000, Rx map = 0

01:03:27: As77 MCB: Initialize

01:03:27: MCB: Flush

01:03:27: Modem 2/12 Mica: Bad RX Frame: control = 0xE007, length = 0xD,

buffer = 0x3BC6E54

01:03:30: As77 PAP: I AUTH-REQ id 2 len 16 from "alaingsm"

01:03:30: As77 PAP: Authenticating peer alaingsm

01:03:30: As77 PPP: Sent PAP LOGIN Request to AAA

01:03:30: As77 PPP: Received LOGIN Response from AAA = PASS

01:03:30: As77 DDR: Remote name for alaingsm

01:03:30: As77 DDR: Authenticated host alaingsm with no matching dialer map

01:03:30: As77 PAP: O AUTH-ACK id 2 len 5

01:03:30: As77 MCB: Start

01:03:30: As77 MCB: User alaingsm Callback Number - Client ANY

01:03:30: As77 MCB: Newstate 0-INIT -> 2-WAIT_RESPONSE

01:03:30: As77 MCB: O Request Id 1 Callback Type Client-Num delay 0

01:03:32: As77 MCB: Timeout in state WAIT_RESPONSE sending new Request 2

01:03:32: As77 MCB: O Request Id 2 Callback Type Client-Num delay 0

01:03:34: As77 MCB: Timeout in state WAIT_RESPONSE sending new Request 3

01:03:34: As77 MCB: O Request Id 3 Callback Type Client-Num delay 0

01:03:35: Async77 PPP: I MCB Response(2) id 1 len 22

01:03:35: Async77 MCB:

I 2 1 0 16 2 12 F 1 44 49 30 30 34 37 38 36 38 31 30 30 36 0

01:03:35: As77 MCB: Received response

01:03:35: As77 MCB: Resp ignored. ID Expected 3, got id 1

01:03:36: As77 MCB: Timeout in state WAIT_RESPONSE sending new Request 4

01:03:36: As77 MCB: O Request Id 4 Callback Type Client-Num delay 0

01:03:36: Async77 PPP: I MCB Response(2) id 4 len 22

01:03:36: Async77 MCB:

I 2 4 0 16 2 12 F 1 44 49 30 30 34 37 38 36 38 31 30 30 36 0

01:03:36: As77 MCB: Received response

!--- You can see here that "DI00478681006" was entered at the user PC.

01:03:36: As77 MCB: Response CBK-Client-Num 2 18 15, addr 1-DI00478681006

01:03:36: As77 MCB: O Ack Id 5 Callback Type Client-Num delay 15

01:03:36: As77 MCB: Negotiated MCB with peer

01:03:36: As77 MCB: Newstate 2-WAIT_RESPONSE -> 3-WAIT_TERMINATE

01:03:37: As77 MCB: Peer terminating the link

01:03:37: As77 MCB: Newstate 3-WAIT_TERMINATE -> 5-WAIT_LINKDOWN

01:03:37: As77 MCB: Link terminated by peer, Callback Needed

01:03:37: As77 MCB: Newstate 5-WAIT_LINKDOWN -> 6-CALLING

01:03:37: As77 MCB: Initiate Callback for ^->o`iB@ at DI00478681006

using Async DDR

01:03:37: As77 DDR: PPP callback Callback server starting to alaingsm

DI00478681006

01:03:37: As77 MCB: Dialer callback started

!--- Call is disconnected.

01:03:38: Modem 2/12 Mica: in modem state SS_RETRAINING

01:03:38: ISDN BR3/1: RX <- DISCONNECT pd = 8 callref = 0x2F

01:03:38: Cause i = 0x8090 - Normal call clearing

01:03:38: Progress Ind i = 0x8088 - In-band info or appropriate now available

01:03:38: %ISDN-6-DISCONNECT: Interface BRI3/1:1 disconnected from 478681006,

call lasted 37 seconds

01:03:38: ISDN BR3/1: TX -> RELEASE pd = 8 callref = 0xAF

01:03:38: Cause i = 0x8090 - Normal call clearing

01:03:38: Modem 2/12 Mica: in modem state TERMINATING

01:03:38: ISDN BR3/1: RX <- RELEASE_COMP pd = 8 callref = 0x2F

01:03:39: TTY77: Async Int reset: Dropping DTR

01:03:39: Modem 2/12 Mica: PPP escape_map: Tx map = FFFFFFFF, Rx map = 0

01:03:39: As77 PPP: Authorization required

01:03:40: Modem 2/12 Mica: in modem state IDLE

01:03:40: Modem 2/12 Mica: DISCONNECT after 00:00:38, due to reason (0xDF00)

Host Disconnect.

01:03:40: TTY77: DSR was dropped

01:03:40: tty77: Modem: READY->(unknown)

01:03:41: TTY77: dropping DTR, hanging up

01:03:41: tty77: Modem: HANGUP->(unknown)

01:03:41: %LINK-5-CHANGED: Interface Async77, changed state to reset

01:03:42: TTY77: cleanup pending. Delaying DTR

01:03:43: TTY77: cleanup pending. Delaying DTR

01:03:44: TTY77: cleanup pending. Delaying DTR

01:03:44: TTY77: no timer type 0 to destroy

01:03:44: TTY77: no timer type 1 to destroy

01:03:44: TTY77: no timer type 3 to destroy

01:03:44: TTY77: no timer type 4 to destroy

01:03:44: TTY77: no timer type 2 to destroy

01:03:44: Async77: allowing modem_process to continue hangup

01:03:45: TTY77: restoring DTR

01:03:46: %LINK-3-UPDOWN: Interface Async77, changed state to down

01:03:53: %ISDN-6-LAYER2DOWN: Layer 2 for Interface BR3/1, TEI 70

changed to down

!--- Callback is started.

01:03:56: As77 DDR: re-enable timeout

01:03:56: DDR: callback triggered by dialer_timers

01:03:56: As77 DDR: beginning callback to alaingsm DI00478681006

01:03:56: As77 DDR: Attempting to dial DI00478681006

01:03:56: CHAT77: Attempting async line dialer script

01:03:56: CHAT77: Dialing using Modem script: callback2gsm & System script:

none

01:03:56: CHAT77: process started

01:03:56: CHAT77: Asserting DTR

01:03:56: CHAT77: Chat script callback2gsm started

01:03:56: CHAT77: Sending string: AT&F

01:03:56: CHAT77: Expecting string: OK

01:03:56: CHAT77: Completed match for expect: OK

01:03:56: CHAT77: Sending string: ATS29=8

01:03:56: CHAT77: Expecting string: OK

01:03:56: CHAT77: Completed match for expect: OK

!--- We send DI00478681006

01:03:56: CHAT77: Sending string: AT \T<DI00478681006>

01:03:56: CHAT77: Expecting string: CONNECT

01:03:56: Modem 2/12 Mica: configured for Originate mode, with Null signaling,

0x1 tone detection.

01:03:56: Modem 2/12 Mica: received dialstring 00478681006

01:03:56: ISDN Se1/0:15: TX -> SETUP pd = 8 callref = 0x000E

01:03:56: Bearer Capability i = 0x8890214846BB

01:03:56: Channel ID i = 0xA9839F

01:03:56: Called Party Number i = 0x81, '00478681006', Plan:ISDN, Type:Unknown

01:03:56: Low Layer Compat i = 0x8890214846BB

01:03:56: ISDN Se1/0:15: RX <- CALL_PROC pd = 8 callref = 0x800E

01:03:56: Channel ID i = 0xA9839F

01:03:56: Modem 2/12 Mica: in modem state CALL_SETUP

01:04:02: ISDN Se1/0:15: RX <- ALERTING pd = 8 callref = 0x800E

01:04:03: ISDN Se1/0:15: RX <- CONNECT pd = 8 callref = 0x800E

01:04:03: ISDN Se1/0:15: TX -> CONNECT_ACK pd = 8 callref = 0x000E

01:04:03: Modem 2/12 Mica: in modem state CONNECT

01:04:03: Modem 2/12 Mica: in modem state LINK

01:04:03: Modem 2/12 Mica: in modem state TRAINUP

01:04:03: Modem 2/12 Mica: in modem state EC_NEGOTIATING

01:04:03: Modem 2/12 Mica: in modem state STEADY

01:04:03: CHAT77: Completed match for expect: CONNECT

01:04:03: CHAT77: Sending string: \c

01:04:03: CHAT77: Chat script callback2gsm finished, status = Success

01:04:03: TTY77: no timer type 1 to destroy

01:04:03: TTY77: no timer type 0 to destroy

01:04:03: Modem 2/12 Mica: CONNECT at 9600/9600 (Tx/Rx), V110, V.110, None

01:04:04: As77 PPP: Treating connection as a callout

01:04:04: Modem 2/12 Mica: PPP escape_map: Tx map = FFFFFFFF, Rx map = 0

01:04:04: As77 PPP: Authorization required

01:04:04: %LINK-3-UPDOWN: Interface Async77, changed state to up

01:04:04: As77 DDR: Dialer statechange to up

01:04:04: As77 DDR: Copying MS callback dialstring DI00478681006 to ddb

01:04:04: DDR: Freeing callback to alaingsm DI00478681006

01:04:04: As77 DDR: Dialer call has been placed

01:04:08: Modem 2/12 Mica: PPP escape_map: Tx map = A0000, Rx map = 0

01:04:08: As77 MCB: Initialize

01:04:08: Modem 2/12 Mica: Bad RX Frame: control = 0xE007, length = 0xD,

buffer = 0x3BC6E54

01:04:09: %ISDN-6-CONNECT: Interface Serial1/0:30 is now connected to 00478681006

01:04:11: As77 PAP: I AUTH-REQ id 2 len 16 from "alaingsm"

01:04:11: As77 PAP: Authenticating peer alaingsm

01:04:11: As77 PPP: Sent PAP LOGIN Request to AAA

01:04:11: As77 PPP: Received LOGIN Response from AAA = PASS

01:04:11: As77 DDR: Remote name for alaingsm

01:04:11: As77 DDR: Authenticated host alaingsm with no matching dialer map

01:04:11: As77 PAP: O AUTH-ACK id 2 len 5

01:04:13: As77 DDR: dialer protocol up

suzanne#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2 E1 - OSPF external type 1,

E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 172.17.243.1 to network 0.0.0.0

172.17.0.0/24 is subnetted, 1 subnets

C 172.17.243.0 is directly connected, Ethernet0/0

172.31.0.0/16 is variably subnetted, 2 subnets, 2 masks

C 172.31.1.28/32 is directly connected, Async77

C 172.31.0.0/16 is directly connected, Dialer1

S* 0.0.0.0/0 [1/0] via 172.17.243.1

suzanne#ping 172.31.1.28

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 172.31.1.28, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 784/858/880 ms

suzanne#

01:04:49: ISDN Se1/0:15: RX <- DISCONNECT pd = 8 callref = 0x800E

01:04:49: Cause i = 0x8090 - Normal call clearing

01:04:49: %ISDN-6-DISCONNECT: Interface Serial1/0:30 disconnected from

00478681006, call lasted 46 seconds

01:04:49: ISDN Se1/0:15: TX -> RELEASE pd = 8 callref = 0x000E

01:04:49: Modem 2/12 Mica: in modem state TERMINATING

01:04:49: ISDN Se1/0:15: RX <- RELEASE_COMP pd = 8 callref = 0x800E

01:04:49: Modem 2/12 Mica: in modem state IDLE

01:04:49: Modem 2/12 Mica: DISCONNECT after 00:00:46,

due to reason (0xDF00) Host Disconnect.

01:04:50: TTY77: DSR was dropped

01:04:50: tty77: Modem: READY->(unknown)

01:04:51: TTY77: Async Int reset: Dropping DTR

01:04:51: Modem 2/12 Mica: PPP escape_map: Tx map = FFFFFFFF, Rx map = 0

01:04:51: As77 PPP: Authorization required

01:04:51: TTY77: dropping DTR, hanging up

01:04:51: tty77: Modem: HANGUP->(unknown)

01:04:52: TTY77: cleanup pending. Delaying DTR

01:04:53: %LINK-5-CHANGED: Interface Async77, changed state to reset

01:04:53: TTY77: cleanup pending. Delaying DTR

01:04:54: TTY77: cleanup pending. Delaying DTR

01:04:55: TTY77: cleanup pending. Delaying DTR

01:04:56: TTY77: no timer type 0 to destroy

01:04:56: TTY77: no timer type 1 to destroy

01:04:56: TTY77: no timer type 3 to destroy

01:04:56: TTY77: no timer type 4 to destroy

01:04:56: TTY77: no timer type 2 to destroy

01:04:56: Async77: allowing modem_process to continue hangup

01:04:56: TTY77: restoring DTR

01:04:58: %LINK-3-UPDOWN: Interface Async77, changed state to down

01:05:08: As77 DDR: re-enable timeout

使用V.110的數據機回撥

!--- Modem callback using default of MICA (modem dialing US robotics).

suzanne#

01:06:21: ISDN Se1/0:15: RX <- SETUP pd = 8 callref = 0x6D73

01:06:21: Sending Complete

01:06:21: Bearer Capability i = 0x9090A3

01:06:21: Channel ID i = 0xA18387

01:06:21: Progress Ind i = 0x8183 - Origination address is non-ISDN

01:06:21: Calling Party Number i = 0xA1, '6020', Plan:ISDN, Type:National

01:06:21: Called Party Number i = 0x81, '214', Plan:ISDN, Type:Unknown

01:06:21: ISDN Se1/0:15: TX -> CALL_PROC pd = 8 callref = 0xED73

01:06:21: Channel ID i = 0xA98387

01:06:21: ISDN Se1/0:15: TX -> ALERTING pd = 8 callref = 0xED73

01:06:21: ISDN Se1/0:15: TX -> CONNECT pd = 8 callref = 0xED73

01:06:21: ISDN Se1/0:15: RX <- CONNECT_ACK pd = 8 callref = 0x6D73

01:06:21: ISDN Se1/0:15: CALL_PROGRESS: CALL_CONNECTED call id 0x1A, bchan 6, dsl 0

01:06:21: Modem 2/13 Mica: configured for Answer mode, with Null signaling,

0x0 tone detection.

01:06:21: Modem 2/13 Mica: in modem state CALL_SETUP

01:06:22: Modem 2/13 Mica: in modem state CONNECT

01:06:26: Modem 2/13 Mica: in modem state LINK

01:06:27: %ISDN-6-CONNECT: Interface Serial1/0:6 is now connected to 6020

01:06:34: Modem 2/13 Mica: in modem state TRAINUP

01:06:36: Modem 2/13 Mica: in modem state EC_NEGOTIATING

01:06:36: Modem 2/13 Mica: in modem state STEADY

01:06:36: Modem 2/13 Mica: CONNECT at 9600/9600 (Tx/Rx), V34+, LAPM, None

01:06:37: TTY78: DSR came up

01:06:37: tty78: Modem: IDLE->(unknown)

01:06:37: TTY78: EXEC creation

01:06:37: TTY78: set timer type 10, 30 seconds

01:06:40: TTY78: Autoselect(2) sample 7E

01:06:40: TTY78: Autoselect(2) sample 7EFF

01:06:40: TTY78: Autoselect(2) sample 7EFF7D

01:06:40: TTY78: Autoselect(2) sample 7EFF7D23

01:06:40: TTY78 Autoselect cmd: ppp negotiate

01:06:40: TTY78: EXEC creation

01:06:40: TTY78: create timer type 1, 600 seconds

01:06:40: TTY78: destroy timer type 1

01:06:40: TTY78: no timer type 0 to destroy

01:06:40: As78 DDR: Dialer received incoming call from <unknown>

01:06:42: %LINK-3-UPDOWN: Interface Async78, changed state to up

01:06:42: As78 DDR: Dialer statechange to up

01:06:42: As78 DDR: Dialer received incoming call from <unknown>

01:06:42: As78 PPP: Treating connection as a callin

01:06:42: As78 PPP: Authorization required

01:06:43: Modem 2/13 Mica: PPP escape_map: Tx map = FFFFFFFF, Rx map = 0

01:06:43: As78 PPP: Authorization required

01:06:47: Modem 2/13 Mica: PPP escape_map: Tx map = A0000, Rx map = 0

01:06:47: As78 MCB: Initialize   01:06:47: MCB: Flush

01:06:47: Modem 2/13 Mica: Bad RX Frame: control = 0xE007, length = 0xE, buffer = 0x3BC9014

01:06:50: As78 PAP: I AUTH-REQ id 2 len 16 from "alainmod"

01:06:50: As78 PAP: Authenticating peer alainmod

01:06:50: As78 PPP: Sent PAP LOGIN Request to AAA

01:06:50: As78 PPP: Received LOGIN Response from AAA = PASS

01:06:50: As78 DDR: Remote name for alainmod

01:06:50: As78 DDR: Authenticated host alainmod with no matching dialer map

01:06:50: As78 PAP: O AUTH-ACK id 2 len 5

01:06:50: As78 MCB: Start

01:06:50: As78 MCB: User alainmod Callback Number - Client ANY

01:06:50: As78 MCB: Newstate 0-INIT -> 2-WAIT_RESPONSE

01:06:50: As78 MCB: O Request Id 1 Callback Type Client-Num delay 0

01:06:52: As78 MCB: Timeout in state WAIT_RESPONSE sending new Request 2

01:06:52: As78 MCB: O Request Id 2 Callback Type Client-Num delay 0

01:06:54: As78 MCB: Timeout in state WAIT_RESPONSE sending new Request 3

01:06:54: As78 MCB: O Request Id 3 Callback Type Client-Num delay 0

01:06:54: Async78 PPP: I MCB Response(2) id 1 len 17

01:06:54: Async78 MCB: I 2 1 0 11 2 D F 1 5A 44 54 20 36 30 32 30 0

01:06:54: As78 MCB: Received response

01:06:54: As78 MCB: Resp ignored. ID Expected 3, got id 1

01:06:56: As78 MCB: Timeout in state WAIT_RESPONSE sending new Request 4

01:06:56: As78 MCB: O Request Id 4 Callback Type Client-Num delay 0

01:06:56: Async78 PPP: I MCB Response(2) id 4 len 17

01:06:56: Async78 MCB: I 2 4 0 11 2 D F 1 5A 44 54 20 36 30 32 30 0

01:06:56: As78 MCB: Received response

01:06:56: As78 MCB: Response CBK-Client-Num 2 13 15, addr 1-ZDT 6020

01:06:56: As78 MCB: O Ack Id 5 Callback Type Client-Num delay 15

01:06:56: As78 MCB: Negotiated MCB with peer

01:06:56: As78 MCB: Newstate 2-WAIT_RESPONSE -> 3-WAIT_TERMINATE

01:06:56: As78 MCB: Peer terminating the link

01:06:56: As78 MCB: Newstate 3-WAIT_TERMINATE -> 5-WAIT_LINKDOWN

01:06:56: As78 MCB: Link terminated by peer, Callback Needed

01:06:56: As78 MCB: Newstate 5-WAIT_LINKDOWN -> 6-CALLING

01:06:56: As78 MCB: Initiate Callback for ^->o`iB@ at ZDT 6020 using Async DDR

01:06:56: As78 DDR: PPP callback Callback server starting to alainmod ZDT 6020

01:06:56: As78 MCB: Dialer callback started

01:06:57: Modem 2/13 Mica: in modem state TERMINATING

01:06:57: Modem 2/13 Mica: in modem state IDLE

01:06:57: %ISDN-6-DISCONNECT: Interface Serial1/0:6 disconnected from 6020,

call lasted 36 seconds

01:06:57: ISDN Se1/0:15: TX -> DISCONNECT pd = 8 callref = 0xED73

01:06:57: Cause i = 0x8090 - Normal call clearing

01:06:57: Modem 2/13 Mica: DISCONNECT after 00:00:35, due to reason (0x8220)

EC rcvd DISC frame.

01:06:57: TTY78: DSR was dropped

01:06:57: tty78: Modem: READY->(unknown)

01:06:57: ISDN Se1/0:15: RX <- RELEASE pd = 8 callref = 0x6D73

01:06:57: ISDN Se1/0:15: TX -> RELEASE_COMP pd = 8 callref = 0xED73

01:06:58: TTY78: dropping DTR, hanging up

01:06:58: TTY78: Async Int reset: Dropping DTR

01:06:58: tty78: Modem: HANGUP->(unknown)

01:06:59: TTY78: cleanup pending. Delaying DTR

01:06:59: Modem 2/13 Mica: PPP escape_map: Tx map = FFFFFFFF, Rx map = 0

01:06:59: As78 PPP: Authorization required

01:07:00: %LINK-5-CHANGED: Interface Async78, changed state to reset

01:07:00: TTY78: cleanup pending. Delaying DTR

01:07:01: TTY78: cleanup pending. Delaying DTR

01:07:02: TTY78: cleanup pending. Delaying DTR

01:07:03: TTY78: no timer type 0 to destroy

01:07:03: TTY78: no timer type 1 to destroy

01:07:03: TTY78: no timer type 3 to destroy

01:07:03: TTY78: no timer type 4 to destroy

01:07:03: TTY78: no timer type 2 to destroy

01:07:03: Async78: allowing modem_process to continue hangup

01:07:03: TTY78: restoring DTR

01:07:05: %LINK-3-UPDOWN: Interface Async78, changed state to down

01:07:15: As78 DDR: re-enable timeout

!--- Callback start.

01:07:15: DDR: callback triggered by dialer_timers

01:07:15: As78 DDR: beginning callback to alainmod ZDT 6020

01:07:15: As78 DDR: Attempting to dial ZDT 6020

01:07:15: CHAT78: Attempting async line dialer script

01:07:15: CHAT78: Dialing using Modem script: callback2gsm

& System script: none

01:07:15: CHAT78: process started

01:07:15: CHAT78: Asserting DTR

01:07:15: CHAT78: Chat script callback2gsm started

01:07:15: CHAT78: Sending string: AT&F

01:07:15: CHAT78: Expecting string: OK

01:07:15: CHAT78: Completed match for expect: OK

01:07:15: CHAT78: Sending string: ATS29=8

01:07:15: CHAT78: Expecting string: OK

01:07:15: CHAT78: Completed match for expect: OK

!--- The user entered "ZDT 6020". This is what we send:

01:07:15: CHAT78: Sending string: AT \T<ZDT 6020>

01:07:15: CHAT78: Expecting string: CONNECT

01:07:15: Modem 2/13 Mica: configured for Originate mode, with Null signaling,

0x1 tone detection.

01:07:15: Modem 2/13 Mica: received dialstring 6020

01:07:15: ISDN Se1/0:15: TX -> SETUP pd = 8 callref = 0x000F

01:07:15: Bearer Capability i = 0x9090A3

01:07:15: Channel ID i = 0xA9839F

01:07:15: Called Party Number i = 0x81, '6020', Plan:ISDN, Type:Unknown

01:07:15: ISDN Se1/0:15: RX <- CALL_PROC pd = 8 callref = 0x800F

01:07:15: Channel ID i = 0xA9839F

01:07:15: ISDN Se1/0:15: RX <- ALERTING pd = 8 callref = 0x800F

01:07:15: Modem 2/13 Mica: in modem state CALL_SETUP

01:07:16: Modem 2/13 Mica: Detected Dial tone

01:07:17: ISDN Se1/0:15: RX <- CONNECT pd = 8 callref = 0x800F

01:07:17: Progress Ind i = 0x8182 - Destination address is non-ISDN

01:07:17: Connected Number i = 0xA136303230

01:07:17: ISDN Se1/0:15: TX -> CONNECT_ACK pd = 8 callref = 0x000F

01:07:17: Modem 2/13 Mica: in modem state CONNECT

01:07:19: Modem 2/13 Mica: in modem state LINK

01:07:23: %ISDN-6-CONNECT: Interface Serial1/0:30 is now connected to 6020

01:07:26: Modem 2/13 Mica: in modem state TRAINUP

01:07:28: Modem 2/13 Mica: in modem state EC_NEGOTIATING

01:07:28: Modem 2/13 Mica: in modem state STEADY

01:07:28: CHAT78: Completed match for expect: CONNECT

01:07:28: CHAT78: Sending string: \c

01:07:28: CHAT78: Chat script callback2gsm finished, status = Success

01:07:28: TTY78: no timer type 1 to destroy

01:07:28: TTY78: no timer type 0 to destroy

01:07:28: Modem 2/13 Mica: CONNECT at 33600/31200 (Tx/Rx), V34+, LAPM, None

01:07:28: As78 PPP: Treating connection as a callout

01:07:28: Modem 2/13 Mica: PPP escape_map: Tx map = FFFFFFFF, Rx map = 0

01:07:28: As78 PPP: Authorization required

01:07:28: %LINK-3-UPDOWN: Interface Async78, changed state to up

01:07:28: As78 DDR: Dialer statechange to up

01:07:28: As78 DDR: Copying MS callback dialstring ZDT 6020 to ddb

01:07:28: DDR: Freeing callback to alainmod ZDT 6020

01:07:28: As78 DDR: Dialer call has been placed

01:07:29: Modem 2/13 Mica: PPP escape_map: Tx map = A0000, Rx map = 0

01:07:29: As78 MCB: Initialize

01:07:29: As78 PAP: I AUTH-REQ id 1 len 16 from "alainmod"

01:07:29: As78 PAP: Authenticating peer alainmod

01:07:29: As78 PPP: Sent PAP LOGIN Request to AAA

01:07:29: As78 PPP: Received LOGIN Response from AAA = PASS

01:07:29: As78 DDR: Remote name for alainmod

01:07:29: As78 DDR: Authenticated host alainmod with no matching dialer map

01:07:29: As78 PAP: O AUTH-ACK id 1 len 5

01:07:29: As78 DDR: dialer protocol up

01:07:29: %LINEPROTO-5-UPDOWN: Line protocol on Interface Async78,

changed state to up

suzanne#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 172.17.243.1 to network 0.0.0.0

172.17.0.0/24 is subnetted, 1 subnets

C 172.17.243.0 is directly connected, Ethernet0/0

172.31.0.0/16 is variably subnetted, 2 subnets, 2 masks

C 172.31.1.19/32 is directly connected, Async78

C 172.31.0.0/16 is directly connected, Dialer1

S* 0.0.0.0/0 [1/0] via 172.17.243.1

suzanne#ping 172.31.1.19

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 172.31.1.19, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 356/372/396 ms

suzanne#

01:08:08: Modem 2/13 Mica: in modem state TERMINATING

01:08:08: Modem 2/13 Mica: in modem state IDLE

01:08:08: Modem 2/13 Mica: DISCONNECT after 00:00:51, due to reason (0x8220)

EC rcvd DISC frame.

01:08:08: %ISDN-6-DISCONNECT: Interface Serial1/0:30 disconnected from 6020,

call lasted 51 seconds

01:08:08: ISDN Se1/0:15: TX -> DISCONNECT pd = 8 callref = 0x000F

01:08:08: Cause i = 0x8090 - Normal call clearing

01:08:08: ISDN Se1/0:15: RX <- RELEASE pd = 8 callref = 0x800F

01:08:08: ISDN Se1/0:15: TX -> RELEASE_COMP pd = 8 callref = 0x000F

01:08:09: TTY78: DSR was dropped

01:08:09: tty78: Modem: READY->(unknown)

01:08:09: %LINEPROTO-5-UPDOWN: Line protocol on Interface Async78,

changed state to down

01:08:10: TTY78: dropping DTR, hanging up

01:08:10: TTY78: Async Int reset: Dropping DTR

01:08:10: tty78: Modem: HANGUP->(unknown)

01:08:10: Modem 2/13 Mica: PPP escape_map: Tx map = FFFFFFFF, Rx map = 0

01:08:10: As78 PPP: Authorization required

01:08:11: TTY78: cleanup pending. Delaying DTR

01:08:12: %LINK-5-CHANGED: Interface Async78, changed state to reset

01:08:12: TTY78: cleanup pending. Delaying DTR

01:08:13: TTY78: cleanup pending. Delaying DTR

01:08:14: TTY78: cleanup pending. Delaying DTR

01:08:15: TTY78: no timer type 0 to destroy

01:08:15: TTY78: no timer type 1 to destroy

01:08:15: TTY78: no timer type 3 to destroy

01:08:15: TTY78: no timer type 4 to destroy

01:08:15: TTY78: no timer type 2 to destroy

01:08:15: Async78: allowing modem_process to continue hangup

01:08:15: TTY78: restoring DTR

01:08:17: %LINK-3-UPDOWN: Interface Async78, changed state to down

01:08:27: As78 DDR: re-enable timeout

使用V.110的ISDN回撥

!--- Receive call.

suzanne#

01:09:00: ISDN Se1/0:15: RX <- SETUP pd = 8 callref = 0x6F28

01:09:00: Sending Complete

01:09:00: Bearer Capability i = 0x8890

01:09:00: Channel ID i = 0xA18388

01:09:00: Calling Party Number i = 0xA1, '6136', Plan:ISDN, Type:National

01:09:00: Called Party Number i = 0x81, '214', Plan:ISDN, Type:Unknown

01:09:00: %LINK-3-UPDOWN: Interface Serial1/0:7, changed state to up

01:09:00: ISDN Se1/0:15: TX -> CALL_PROC pd = 8 callref = 0xEF28

01:09:00: Channel ID i = 0xA98388

01:09:00: ISDN Se1/0:15: TX -> CONNECT pd = 8 callref = 0xEF28

01:09:00: Channel ID i = 0xA98388

01:09:00: Se1/0:7 PPP: Treating connection as a callin

01:09:00: Se1/0:7 PPP: Authorization required

01:09:00: ISDN Se1/0:15: RX <- CONNECT_ACK pd = 8 callref = 0x6F28

01:09:00: ISDN Se1/0:15: CALL_PROGRESS: CALL_CONNECTED call id 0x1B,

bchan 7, dsl 0

01:09:01: Se1/0:7 PPP: Authorization required

01:09:01: Se1/0:7 MCB: Initialize

01:09:01: Se1/0:7 CHAP: O CHALLENGE id 1 len 28 from "suzanne"

01:09:01: Se1/0:7 CHAP: I RESPONSE id 1 len 30 from "alainisdn"

01:09:01: Se1/0:7 PPP: Sent CHAP LOGIN Request to AAA

01:09:01: Se1/0:7 PPP: Received LOGIN Response from AAA = PASS

01:09:01: Se1/0:7 DDR: Remote name for alainisdn

01:09:01: Se1/0:7 CHAP: O SUCCESS id 1 len 4

01:09:01: Se1/0:7 DDR: PPP callback Callback server starting to

alainisdn 6136

01:09:01: Se1/0:7 DDR: disconnecting call

01:09:01: %ISDN-6-CONNECT: Interface Serial1/0:7 is now connected to

6136 alainisdn

01:09:01: ISDN Se1/0:15: TX -> DISCONNECT pd = 8 callref = 0xEF28

01:09:01: Cause i = 0x8090 - Normal call clearing

01:09:01: ISDN Se1/0:15: RX <- RELEASE pd = 8 callref = 0x6F28

01:09:01: %LINK-3-UPDOWN: Interface Serial1/0:7, changed state to down

01:09:01: ISDN Se1/0:15: TX -> RELEASE_COMP pd = 8 callref = 0xEF28

01:09:01: Se1/0:7 DDR: disconnecting call

01:09:02: ISDN Se1/0:15: RX <- SETUP pd = 8 callref = 0x70DF

01:09:02: Sending Complete

01:09:02: Bearer Capability i = 0x8890

01:09:02: Channel ID i = 0xA18389

01:09:02: Calling Party Number i = 0xA1, '6136', Plan:ISDN, Type:National

01:09:02: Called Party Number i = 0x81, '214', Plan:ISDN, Type:Unknown

01:09:02: %LINK-3-UPDOWN: Interface Serial1/0:8, changed state to up

01:09:02: ISDN Se1/0:15: TX -> CALL_PROC pd = 8 callref = 0xF0DF

01:09:02: Channel ID i = 0xA98389

01:09:02: ISDN Se1/0:15: TX -> CONNECT pd = 8 callref = 0xF0DF

01:09:02: Channel ID i = 0xA98389

01:09:02: Se1/0:8 PPP: Treating connection as a callin

01:09:02: Se1/0:8 PPP: Authorization required

01:09:02: ISDN Se1/0:15: RX <- CONNECT_ACK pd = 8 callref = 0x70DF

01:09:02: ISDN Se1/0:15: CALL_PROGRESS: CALL_CONNECTED call id 0x1C,

bchan 8, dsl 0

01:09:02: Se1/0:8 PPP: Authorization required

01:09:03: Se1/0:8 MCB: Initialize

01:09:03: Se1/0:8 CHAP: O CHALLENGE id 1 len 28 from "suzanne"

01:09:03: Se1/0:8 CHAP: I RESPONSE id 1 len 30 from "alainisdn"

01:09:03: Se1/0:8 PPP: Sent CHAP LOGIN Request to AAA

01:09:03: Se1/0:8 PPP: Received LOGIN Response from AAA = PASS

01:09:03: Se1/0:8 DDR: Remote name for alainisdn

01:09:03: Se1/0:8 CHAP: O SUCCESS id 1 len 4

01:09:03: Se1/0:8 DDR: callback to alainisdn already started

01:09:03: Se1/0:8 DDR: disconnecting call

01:09:03: %ISDN-6-CONNECT: Interface Serial1/0:8 is now connected

to 6136 alainisdn

01:09:03: ISDN Se1/0:15: TX -> DISCONNECT pd = 8 callref = 0xF0DF

01:09:03: Cause i = 0x8090 - Normal call clearing

01:09:03: ISDN Se1/0:15: RX <- RELEASE pd = 8 callref = 0x70DF

01:09:03: %LINK-3-UPDOWN: Interface Serial1/0:8, changed state to down

01:09:03: ISDN Se1/0:15: TX -> RELEASE_COMP pd = 8 callref = 0xF0DF

01:09:03: Se1/0:8 DDR: disconnecting call

!--- Callback Start

01:09:16: DDR: Callback timer expired

01:09:16: Di1 DDR: beginning callback to alainisdn 6136

01:09:16: Se1/0:15 DDR: rotor dialout [priority]

01:09:16: Se1/0:15 DDR: Attempting to dial 6136

01:09:16: ISDN Se1/0:15: TX -> SETUP pd = 8 callref = 0x0010

01:09:16: Bearer Capability i = 0x8890

01:09:16: Channel ID i = 0xA9839F

01:09:16: Called Party Number i = 0x81, '6136', Plan:ISDN, Type:Unknown

01:09:16: ISDN Se1/0:15: RX <- CALL_PROC pd = 8 callref = 0x8010

01:09:16: Channel ID i = 0xA9839F

01:09:16: ISDN Se1/0:15: RX <- ALERTING pd = 8 callref = 0x8010

01:09:16: ISDN Se1/0:15: RX <- CONNECT pd = 8 callref = 0x8010

01:09:16: Connected Number i = 0xA136313336

01:09:16: %LINK-3-UPDOWN: Interface Serial1/0:30, changed state to up

01:09:16: DDR: Freeing callback to alainisdn 6136

01:09:16: ISDN Se1/0:15: TX -> CONNECT_ACK pd = 8 callref = 0x0010

01:09:16: Se1/0:30 PPP: Treating connection as a callout

01:09:16: Se1/0:30 PPP: Authorization required

01:09:16: Se1/0:30 MCB: Initialize

01:09:16: Se1/0:30 CHAP: I CHALLENGE id 7 len 30 from "alainisdn"

01:09:16: Se1/0:30 PPP: Sent CHAP SENDAUTH Request to AAA

01:09:16: Se1/0:30 PPP: Received SENDAUTH Response from AAA = PASS

01:09:16: Se1/0:30 CHAP: O RESPONSE id 7 len 28 from "suzanne"

01:09:16: Se1/0:30 CHAP: I SUCCESS id 7 len 4

01:09:16: Se1/0:30 PPP: Sent LCP AUTHOR Request to AAA

01:09:16: Se1/0:30 PPP: Sent IPCP AUTHOR Request to AAA

01:09:16: Se1/0:30 LCP: Received AAA AUTHOR Response = PASS

01:09:16: Se1/0:30 IPCP: Received AAA AUTHOR Response = PASS

01:09:16: Se1/0:30 DDR: dialer protocol up

01:09:17: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial1/0:30,

changed state to up

01:09:22: %ISDN-6-CONNECT: Interface Serial1/0:30 is now connected to

6136 alainisdn

suzanne#

suzanne#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 172.17.243.1 to network 0.0.0.0

172.17.0.0/24 is subnetted, 1 subnets

C 172.17.243.0 is directly connected, Ethernet0/0

172.31.0.0/16 is variably subnetted, 2 subnets, 2 masks

C 172.31.1.2/32 is directly connected, Dialer1

C 172.31.0.0/16 is directly connected, Dialer1

S* 0.0.0.0/0 [1/0] via 172.17.243.1

suzanne#ping 172.31.1.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 172.31.1.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 32/34/36 ms

suzanne#

相關資訊

- 撥號和存取技術支援頁面

- 技術支援與文件 - Cisco Systems