目錄

簡介

開始之前

慣例

必要條件

採用元件

組態

網路圖表

組態

驗證

相關資訊

簡介

通常，網橋在開放系統互聯(OSI)參考模型的資料鏈路層（第2層）上運行。網橋將根據傳入幀的媒體訪問控制(MAC)地址對其進行過濾、轉發或泛洪。

橋接是纜線資料機聯機時獲得的預設設定。

在橋接應用中，當運行Cisco IOS®軟體版本12.0.5T1及更高版本時，Cisco uBR900系列電纜接入路由器充當乙太網埠上最多254個裝置的透明網橋。早期版本的Cisco IOS軟體最多支援Cisco uBR900系列路由器的乙太網埠上的三台裝置。

此配置已在運行Cisco IOS軟體版本12.0(7)T的uBR904和運行Cisco IOS軟體版本12.1(2)T的Cisco uBR7223上測試。

開始之前

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

必要條件

本文件沒有特定先決條件。

採用元件

本檔案中的資訊是根據以下軟體和硬體版本。

- 執行Cisco IOS軟體版本12.0(7)T的uBR904

- 執行Cisco IOS軟體版本12.1(2)T的Cisco uBR7223

組態

網路圖表

組態

注意：要查詢有關本文檔中使用的命令的其他資訊，請使用命令查詢工具(僅限註冊客戶)。

uBR900

Current configuration:

!

! No configuration change since last restart

!version 12.0

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Router

!

!

!

!

!

!

clock timezone - 0

ip subnet-zero

no ip routing

!--- Router is operating in bridging mode.

!

!

!

!

!

interface Ethernet0

ip address 10.1.1.26 255.255.255.0

no ip directed-broadcast

no ip route-cache

bridge-group 59

bridge-group 59 spanning-disabled

!

interface cable-modem0

ip address negotiated

no ip directed-broadcast

no ip route-cache

cable-modem downstream saved channel 453000000 28 1

cable-modem mac-timer t2 60000

bridge-group 59

bridge-group 59 spanning-disabled

!

ip default-gateway 10.1.1.10

ip classless

no ip http server

!

!

line con 0

transport input none

line vty 0 4

!

end

Router#

註：上述配置是在開啟電纜數據機電源並進入聯機狀態後獲得的。自出廠預設設定以來沒有配置更改。另請注意，在舊版Cisco IOS中，纜線介面會顯示實際的IP位址，而不是「交涉的IP位址」。

uBR7200

Current configuration:

!

! Last configuration change at 16:55:41 UTC Mon Nov 20 2000

! NVRAM config last updated at 16:55:12 UTC Mon Nov 20 2000

!

version 12.1

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname sniper

!

boot system flash ubr7200-ik1s-mz_121-2_T.bin

no logging buffered

enable password cisco

!

no cable qos permission create

no cable qos permission update

cable qos permission modems

!

!

!

ip subnet-zero

no ip domain-lookup

!

no lane client flush

!

!

!

!

interface FastEthernet0/0

no ip address

shutdown

half-duplex

!

interface Ethernet1/0

ip address 172.17.110.139 255.255.255.224

!

interface Ethernet1/1

no ip address

shutdown

!

interface Ethernet1/2

no ip address

shutdown

!

interface Ethernet1/3

no ip address

shutdown

!

interface Ethernet1/4

no ip address

shutdown

!

interface Ethernet1/5

no ip address

shutdown

!

interface Ethernet1/6

no ip address

shutdown

!

interface Ethernet1/7

no ip address

shutdown

!

interface Cable2/0

ip address 10.10.1.1 255.255.255.0 secondary

ip address 10.1.1.10 255.255.255.0

no keepalive

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable downstream frequency 451250000

cable upstream 0 frequency 28000000

cable upstream 0 power-level 0

no cable upstream 0 shutdown

cable upstream 1 shutdown

cable upstream 2 shutdown

cable upstream 3 shutdown

cable upstream 4 shutdown

cable upstream 5 shutdown

cable dhcp-giaddr policy

cable helper-address 172.17.110.136

!

interface Cable3/0

no ip address

no keepalive

shutdown

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable upstream 0 shutdown

cable upstream 1 shutdown

cable upstream 2 shutdown

cable upstream 3 shutdown

cable upstream 4 shutdown

cable upstream 5 shutdown

!

ip classless

ip route 0.0.0.0 0.0.0.0 172.17.110.129

no ip http server

!

!

line con 0

exec-timeout 0 0

transport input none

line aux 0

line vty 0

exec-timeout 0 0

password cisco

login

line vty 1 4

password cisco

login

!

end

驗證

注意： Output Interpreter Tool(僅供註冊客戶使用)支援某些show命令，這允許您檢視show命令輸出的分析。

要確保工作正常，請在Cisco uBR7200上輸入show cable modem命令。這將列出連線到此Cisco uBR7200的電纜數據機的狀態。下面是從上述uBR7200路由器獲得的輸出顯示：

sniper#sh cable modem

Interface   Prim Online     Timing Rec    QoS CPE IP address      MAC address

Sid  State      Offset Power

Cable2/0/U0 11   online     2287    0.25  5   0   10.1.1.25       0050.7366.2223

Cable2/0/U0 12   online     2812    0.25  5   0   10.1.1.28       0001.9659.4415

Cable2/0/U0 13   online     2810   -0.50  5   0   10.1.1.20       0030.96f9.65d9

Cable2/0/U0 14   online     2290    0.50  5   0   10.1.1.26       0050.7366.2221

Cable2/0/U0 15   online     2292    0.25  5   0   10.1.1.30       0050.7366.1fb9

Cable2/0/U0 16   online     2815    0.00  5   0   10.1.1.27       0001.9659.4461

如果狀態未顯示「online」，我們需要對此進行故障排除。在Cisco uBR900上，您可以輸入debug cable-modem mac log verbose。有關故障排除的詳細資訊，請參閱uBR電纜數據機未聯機故障排除。

相關資訊

- 纜線支援頁面

- 思科uBR904電纜數據機的橋接和路由功能

- 排除uBR纜線資料機無法聯機故障

- 技術支援 - Cisco Systems