目錄

簡介

開始之前

慣例

必要條件

採用元件

Bpdu格式

相關資訊

簡介

本檔案介紹DEC和IEEE 802.1d橋接通訊協定資料單元(Bpdu)格式。

開始之前

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

必要條件

本文件沒有特定先決條件。

採用元件

本文件所述內容不限於特定軟體和硬體版本。

Bpdu格式

DEC Bpdu的格式如下：

DEC code:     E1

bpdu type:    19 hello, 02 topology change notice

version:      01

bit field:    1 byte

1 : topology change notice

2 : topology change notice ack

3 : unused    0

4 : unused    0

5 : unused    0

6 : unused    0

7 : unused    0

8 : use short timers

root priority:   2 bytes

root id:         6 bytes

root path cost:  2 bytes

bridge priority: 2 bytes

bridge id:       6 bytes

port id:         1 byte

message age:     1 byte

hello time:      1 byte

max age:         1 byte

forward delay:   1 byte

IEEE 802.1d Bpdu的格式如下：

protocol id:   0000 IEEE 802.1d

version id:    00

bpdu type:     00 config bpdu, 80 tcn bpdu

bit field:     1 byte

1 : topology change flag

2 : unused    0

3 : unused    0

4 : unused    0

5 : unused    0

6 : unused    0

7 : unused    0

8 : topology change ack

root priority    2 bytes

root id:         6 bytes

root path cost:  4 bytes

bridge priority: 2 bytes

bridge id:       6 bytes

port id:         2 bytes

message age:     2 bytes in 1/256 secs

max age:         2 bytes in 1/256 secs

hello time:      2 bytes in 1/256 secs

forward delay:   2 bytes in 1/256 secs

相關資訊

- 技術支援 - Cisco Systems