目录

简介

先决条件

要求

使用的组件

配置

网络图

配置

WLC 配置

WGB 配置

交换机配置

验证

WGB 配置

验证WLC上WGB的状态

故障排除

简介

本文档介绍如何将接入点9105AXW配置为WGB，以连接由WLC 9800系列管理的无线网络。

先决条件

要求

Cisco建议您具备Cisco IOS®-XE WLC 9800系列和Wave 2接入点(AP)的基本知识。

使用的组件

在本示例中，使用了以下组件：

- WLC 9800-CL，版本17.6.3;

- 无线接入点(CAPWAP)AP型号2802I的控制和调配；

- AP 9105AXW作为WGB，版本17.8.1;

- 支持交换机802.1q;

- 有线客户端笔记本电脑，带Windows 10。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

配置

WGB是AP模式，用于为连接到WGB AP以太网端口的有线客户端提供无线连接。

WGB通过单个无线网段连接有线网络。它在以太网接口上获取有线客户端的MAC地址，并通过互联网接入点协议(IAPP)消息通过基础设施AP向WLC报告这些地址。

WGB建立到根AP的单个无线连接，根AP反过来将WGB视为无线客户端。

请查看Cisco Catalyst 9800系列无线控制器软件配置指南，Cisco IOS XE Cupertino 17.8.x，了解有关功能矩阵和WGB模式的AP支持的详细信息：

章节：工作组桥。

网络图

在本文档中，所有配置和验证均通过此处显示的拓扑完成：

本示例说明如何将AP 9105AXW配置为WGB，同时支持与CAPWAP AP关联的多个VLAN。

接入点可以处于本地模式、FlexConnect或网桥模式（网状）。

本文档显示根AP的本地模式和FlexConnect模式的配置。

此场景要求WGB连接到支持802.1q的交换机，否则WGB无法支持多个VLAN。在本示例中，WGB连接到思科交换机C1000系列。

如果交换机不支持802.1q，则所有客户端都将被分配给本征VLAN。

在本示例中，WGB通过WPA2-PSK安全性连接到WLAN，并被分配给VLAN 100。如拓扑所示，连接到WGB后面交换机的客户端被分配给VLAN 101和102。

WGB AP 9105AXW具有额外的3个LAN端口，因此我们也可以使用这些端口连接有线客户端。在本示例中，有一个客户端连接到端口LAN1。

配置

WLC 配置

在WLC中，配置遵循常规的WLAN配置，同时要求启用CCX Aironet IE支持。

GUI:

步骤1.创建WLAN并确保Aironet IE已启用：

步骤2.创建策略配置文件并启用Broadcast Tagging和WGB VLAN:

步骤3.创建策略标记并将WLAN映射到策略配置文件：

步骤4.将策略标记应用到根AP。

CLI：

WLC9800# configure terminal

WLC9800(config)# wlan WGBTest

WLC9800(config-wlan)# security wpa akm psk

WLC9800(config-wlan)# security wpa psk set-key ascii 0 cisco123

WLC9800(config-wlan)# ccx aironet-iesupport

WLC9800(config-wlan)# exit

WLC9800(config)# wireless profile policy Policy4VLAN100

WLC9800(config-wireless-policy)# description "test-wgb"

WLC9800(config-wireless-policy)# vlan 100

WLC9800(config-wireless-policy)# wgb vlan <-- Configures WGB VLAN client support.

WLC9800(config-wireless-policy)# wgb broadcast-tagging <-- Configures WGB broadcast tagging on a WLAN.

WLC9800(config-wireless-policy)# no shutdown

WLC9800(config-wireless-policy)# exit

WLC9800(config)# wireless tag policy WGBtestTag

WLC9800(config-policy-tag)# wlan WGBTest policy Policy4VLAN100

WLC9800(config-policy-tag)# end

WLC9800# configure terminal

WLC9800(config)# ap 7070.8b53.76fc

WLC9800(config-ap-tag)# policy-tag WGBtestTag

WLC9800(config)# ap 70db.9897.f946

WLC9800(config-ap-tag)# policy-tag WGBtestTag

WGB 配置

步骤1.连接到AP并将AP移入工作组桥模式：

WGB# ap-type workgroup-bridge

步骤2.然后可以配置WGB主机名、管理凭证和ip地址模式dhcp或static。在本示例中，它使用的DHCP:

WGB# configure ap address ipv4 dhcp

WGB# configure ap management add username Cisco password Cisco secret Cisco

WGB# configure ap hostname WGB

步骤3.使用SSID名称和安全设置配置SSID配置文件。在本示例中，WLAN使用WPA2-PSK:

WGB# configure ssid-profile WGB_profile ssid WGBTest authentication psk cisco!123 key-management wpa2

有几种可能的组合。命令sintax如下所示：

配置ssid-profilessid-profile-namessidSSID名称身份验证{open（未解决）| psk预共享密钥密钥管理{dot11r| wpa2| dot11w|{可选| 必需}}| eap配置文件eap-profile-name密钥管理{dot11r| wpa2| dot11w|{可选| 必需}}

步骤4.将SSID配置文件连接到无线电接口。此处它使用无线电0(2.4Ghz):

WGB# configure dot11radio r0 mode wgb ssid-profile WGB_profile

要从无线电删除配置文件，请使用命令：

WGB# configure ssid-profile WGB_profile delete

步骤5.Cisco Wave 2和11 AXAPs as Workgroup Bridge仅在流量具有桥接标记时识别以太网客户端。使用命令启用桥接标记：

WGB# configure wgb broadcast tagging enable

交换机配置

这是连接到WGB的交换机的配置。

步骤1.创建VLAN:

switch#conf t

Enter configuration commands, one per line. End with CNTL/Z.

switch(config)#vlan 101,102,103

switch(config-vlan)#end

步骤2.配置导致配置的接口：

!

interface GigabitEthernet1/0/1

description WGB trunk link

switchport trunk allowed vlan 1,100-102

switchport trunk native vlan 100

switchport mode trunk

!

interface GigabitEthernet1/0/2

description Wired Client 1

switchport access vlan 101

switchport mode access

!

interface GigabitEthernet1/0/3

description Wired Client 2

switchport access vlan 102

switchport mode access

!

验证

WGB 配置

检查WGB配置：

WGB#show run

AP Name : WGB

AP Mode : WorkGroupBridge

CDP State : Enabled

Watchdog monitoring : Enabled

SSH State : Disabled

AP Username : Cisco

Session Timeout : 300

Radio and WLAN-Profile mapping:-

====================================

Radio ID Radio Mode SSID-Profile SSID Authentication

----------------------------------------------------------------------------------------------------------

0 WGB WGB_profile WGBTest PSK

Radio configurations:-

===============================

Radio Id : 0

Admin state : ENABLED

Mode : WGB

Dot11 type : 11ax

Radio Id : NA

Admin state : NA

Mode : NA

WGB specific configuration:-

====================================

WGB Radio Id : 0

Mode State : Enable

SSID Profile : WGB_profile

UWGB Radio Id : NA

Mode Enable : NA

SSID Profile : NA

MAC Address : NA

Rx Beacon Missing Count : 30

Packet retries Value : 64

Packet retries Action : Drop

RSSI Threshold Value : -70 dBm

Threshold timeout : 20 sec

HSR-Scan status : Disable

Auth response timeout : 5000 Msec

Assoc response timeout : 5000 Msec

WGB channel scan timeout : 40 Msec

Dhcp response timeout : 60 Sec

EAP timeout : 3000 Msec

Bridge table aging-time : 1000000 Sec

Probe pak data rate type : NA

Probe pak data rate : 0

Antenna Band Mode : Dual

Broadcast tagging : Enable

Total configurations size on different structure:-

=====================================================

Total channels : 0

Total SSID-Profiles : 1

Total Root-AP SSID-Profile : 0

Total EAP Profiles : 0

Total QOS Profiles : 0

Total dot1x credentials : 0

Total PKI truspoints : 0

Total bridge groups : 0

Total SSID profiles configured are:

===========================================

SSID-Profile : WGB_profile

SSID Name : WGBTest

SSID Profile path : /data/platform/wbridge/WGB_profile

Auth type : PSK

Key management : WPA2

DTIM Period : 1

QOS profile :

[...]

*** End of WBridge configurations ***

WGB#show wgb ssid

Configured SSIDs details:

SSID-Profile SSID Authentication DTIM

=======================================================================================

WGB_profile WGBTest PSK 1

Connected SSIDs details:

Radio ID : 0

Radio Mode : RootAP

BSSID : 70:7D:B9:E3:2A:E0

SSID : WGBTest

Authentication : PSK

验证WLC上WGB的状态

使用这些命令检验WGB的状态。

要显示活动客户端的无线特定配置，请使用命令：

WLC9800# show wireless client summary

要显示网络上的WGB，请使用命令：

WLC9800# show wireless wgb summary

要显示连接到特定WGB的有线客户端的详细信息，请使用命令：

WLC9800# show wireless wgb mac-address xx:xx:xx:xx:xx:xx detail

故障排除

验证WGB是否已连接到根AP:

WGB#show wgb dot11 associations

Uplink Radio ID : 0

Uplink Radio MAC : F0:1D:2D:52:CB:60

SSID Name : WGBTest

Parent AP Name : AP500F.80F6.016

Parent AP MAC : 70:7D:B9:E3:2A:E0

Uplink State : CONNECTED

Auth Type : PSK

Key management Type : WPA2

Dot11 type : 11n

Channel : 1

Bandwidth : 20 MHz

Current Datarate : 144 Mbps

Max Datarate : 286 Mbps

RSSI : 18

IP : 192.168.100.21/24

Default Gateway : 192.168.100.1

DNS Server1 : 192.168.1.254

IPV6 : ::/128

Assoc timeout : 5000 Msec

Auth timeout : 5000 Msec

Dhcp timeout : 60 Sec

检查与管理、控制、数据包和漫游统计信息相关的WGB统计信息：

WGB#show wgb statistic ?

packet Management, Control, Data packets

roaming roaming

WGB#show wgb statistic packet

Multicast/Unicast Packet statistics

Multicast Tx : 3345

Unicast Tx : 460

Multicast Rx : 2417

Unicast Rx : 3838

Multicast Bridge : 0

Unicast Flood : 3377

Interface Packet Statistics

Wbridge0 Tx : 2515

Wired0 Tx : 14196

Wbridge1 Tx : 0

Wired1 Tx : 488

AppHostIntf1 Tx : 435

Wbridge0 Rx : 5495

Wired0 Rx : 2519

Wbridge1 Rx : 0

Wired1 Rx : 127

AppHostIntf1 Rx : 315

Management Packet Statistics

Mgmt tx : 16

Mgmt scan tx : 0

Mgmt assoc req tx : 8

Mgmt reassoc req tx : 0

Mgmt deauth tx : 0

Mgmt disassoc tx : 0

Mgmt action tx : 0

Mgmt auth tx : 8

Mgmt rx : 52

Mgmt scan rx : 0

Mgmt beacon rx : 0

Mgmt assoc resp rx : 7

Mgmt reassoc resp rx : 0

Mgmt deauth rx : 3

Mgmt disassoc rx : 0

Mgmt action rx : 34

Mgmt auth rx : 8

Mgmt discard tx : 0

Mgmt discard rx : 0

Mgmt drop rx : 0

Eapol rx : 14

Eapol tx : 14

Eapol drop rx : 0

Rx Broadcast from multiple vlans

port VLAN_ID rx_bc2mc_cnt

0 101 43

0 102 17

要调试WGB，您有多种可能性：

WGB#debug wgb ?

client Debug WGB and wired clients

configuration Enable configuration debugs

dot11 IEEE 802.11 debug command

dot11v 802.11v Processing

iapp Debug WGB IAPP

uplink Enable uplink debugs

要从WLC端调试WGB，请使用客户端故障排除过程，就像任何无线客户端一样，同时收集WGB mac地址的RA跟踪。

有关如何对无线客户端连接进行故障排除的详细信息，请查看以下文档：

Catalyst 9800无线控制器常见的无线客户端连接问题

了解Catalyst 9800无线LAN控制器上的无线调试和日志收集

检查从WGB端连接到WGB的客户端。示例：

WGB#show wgb bridge

***Client ip table entries***

mac vap port vlan_id seen_ip confirm_ago fast_brg

F8:E4:3B:EE:53:AF 0 wired1 0 192.168.100.23 6.844000 true

3C:18:A0:1C:B0:E2 0 wired0 101 192.168.101.22 22.182000 true

F8:E4:3B:EE:4F:7A 0 wired0 102 192.168.102.21 65.144000 true

WGB#

连接到LAN端口1(wired1)的客户端显示为vlan_id = 0，这意味着来自此客户端的流量进入WGB本地VLAN。在本示例中，它是VLAN 100。

连接到端口wired0的客户端是连接到交换机的客户端，而交换机又连接到WGB的背面端口（9105AXW端口中的PoE）。 此处接收带有VLAN标记的流量，然后WGB通过无线链路将该标记转发到RootAP。

在WLC GUI中，您可以查看客户端并区分WGB后面的WGB和有线客户端：