目录

简介

先决条件

要求

使用的组件

规则

配置

网络图

配置

验证

故障排除

相关信息

简介

本文档提供X.25背对背连接的示例配置。您可以用它来验证您的连接和硬件是否适当运行。

先决条件

要求

本文档的读者应对以下内容有基本了解：

- X.25

- TCP/IP

使用的组件

本文档中的信息基于以下软件和硬件版本。

- 此配置适用于所有Cisco IOS®软件版本。本文档中的所有路由器（Cisco 2500路由器）都使用Cisco IOS软件版本12.2(10b)。

- X.25连接的DCE端与WAN DCE电缆连接。

- X.25连接的DTE端与WAN DTE电缆连接。

有关WAN DCE和DTE电缆的详细信息，请参阅串行电缆。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

配置

在本节中，您将获得配置本文档中所述场景的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本文档使用下图所示的网络设置。

默认串行封装是思科高级数据链路控制(HDLC)。 必须使用encapsulation x25命令显式配置X.25封装方法。dce选项将操作指定为逻辑X.25 DCE设备。

在背对背串行连接上，电缆DCE端的路由器充当物理层DCE，并为线路提供时钟信号。在接口配置模式下使用clock rate命令，使位于电缆DCE端的路由器（本例中为Prasit）能够向线路提供时钟信号。

注意：上述两台路由器中的任意一台都可以充当逻辑X.25 DCE设备，而不管电缆的哪一端连接到路由器。换句话说，encapsulation x25 dce命令可以放置在上述两台路由器中的任一台中。

配置

本文使用如下所示的配置。在此配置中，Prasit既充当物理层，也充当X.25 DCE，Spicey是物理层，X.25 DTE。

- 普拉西

- 斯派西

普拉西

interface Serial0

ip address 5.0.2.1 255.255.255.0

encapsulation x25 dce

!--- Specifies a serial interface's !--- operation as an X.25 DCE device.

x25 address 7890

!--- Sets the X.121 address.

x25 map ip 5.0.2.2 1234

!--- Sets up the LAN protocols-to-remote !--- host mapping.

clockrate 64000

!--- Specifies a serial interface's operation !--- as a physical layer DCE device.

no cdp enable

斯派西

interface Serial1

ip address 5.0.2.2 255.255.255.0

encapsulation x25

!--- Specifies a serial interface's operation !--- as an X.25 device. Default X.25 !--- encapsulation mode is "dte".

x25 address 1234

x25 map ip 5.0.2.1 7890

no cdp enable

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

- show controllers serial — 显示有关接口硬件和连接电缆的信息。有关详细信息，请参阅命令参考。

- ping — 检查主机连通性和网络连接。有关详细信息，请参阅命令参考。

- show x25 vc — 显示有关X.25 SVC和PVC的信息。有关详细信息，请参阅命令参考。

- show interfaces serial — 显示有关接口特性的信息，如封装、带宽和其他详细信息。有关详细信息，请参阅命令参考。

以下输出是在此示例配置中在设备上输入这些命令的结果。

使用show controllers命令检查Prasit是物理层DCE，Spicey是物理层DTE。此命令可提供有关物理层是否工作以及连接哪种类型的电缆的信息。

prasit# show controllers serial 0

HD unit 0, idb = 0x1D3A2C, driver structure at 0x1DAFE8

buffer size 1524 HD unit 0, V.35 DCE cable, clockrate 64000

!---Output suppressed.

spicey# show controllers serial 1

HD unit 1, idb = 0x153E94, driver structure at 0x15A1F8

buffer size 1524 HD unit 1, V.35 DTE cable

!---Output suppressed.

要检验X.25背对背配置，请执行以下步骤。

1. 从X.25 DCE（本例中为Prasit）Ping X.25 DTE(Spicey)。

在这种情况下，使用SVC1，默认配置的最低SVC1。

prasit# ping 5.0.2.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 5.0.2.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 36/38/48 ms

prasit# show x25 vc

SVC 1,  State: D1,  Interface: Serial0

Started 00:00:07, last input 00:00:07, output 00:00:07

Connects 1234 <-> ip 5.0.2.2

Call PID cisco, Data PID none

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 5  PR: 5  ACK: 4  Remote PR: 5  RCNT: 1  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 500/500 packets 5/5 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

prasit# show interfaces serial 0

Serial0 is up, line protocol is up

Hardware is HD64570

Internet address is 5.0.2.1/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation X25, loopback not set

X.25 DCE, address 7890, state R1, modulo 8, timer 0

Defaults: idle VC timeout 0

cisco encapsulation

input/output window sizes 2/2, packet sizes 128/128

Timers: T10 60, T11 180, T12 60, T13 60

Channels: Incoming-only none, Two-way 1-1024, Outgoing-only none

RESTARTs 1/0 CALLs 2+0/0+0/0+0 DIAGs 0/0

LAPB DCE, state CONNECT, modulo 8, k 7, N1 12056, N2 20

T1 3000, T2 0, interface outage (partial T3) 0, T4 0

VS 5, VR 5, tx NR 5, Remote VR 5, Retransmissions 0

Queues: U/S frames 0, I frames 0, unack. 0, reTx 0

IFRAMEs 29/29 RNRs 0/0 REJs 0/0 SABM/Es 0/1 FRMRs 0/0 DISCs 0/0

Last input 00:00:13, output 00:00:13, output hang never

Last clearing of "show interface" counters 00:22:38

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

33 packets input, 2679 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

42 packets output, 2693 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

DCD=up  DSR=up  DTR=up  RTS=up  CTS=up

prasit#

2. 然后从X.25 DTE(Spicey)ping X.25 DCE(Prasit)。

spicey# ping 5.0.2.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 5.0.2.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 32/32/36 ms

spicey#

spicey# show x25 vc

SVC 1,  State: D1,  Interface: Serial1

Started 00:01:03, last input 00:01:03, output 00:01:03

Connects 7890 <-> ip 5.0.2.1

Call PID ietf, Data PID none

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 5  PR: 5  ACK: 5  Remote PR: 4  RCNT: 0  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 500/500 packets 5/5 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

spicey# show interfaces serial 1

Serial1 is up, line protocol is up

Hardware is HD64570

Internet address is 5.0.2.2/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation X25, loopback not set

X.25 DTE, address 1234, state R1, modulo 8, timer 0

Defaults: idle VC timeout 0

cisco encapsulation

input/output window sizes 2/2, packet sizes 128/128

Timers: T20 180, T21 200, T22 180, T23 180

Channels: Incoming-only none, Two-way 1-1024, Outgoing-only none

RESTARTs 1/1 CALLs 0+0/2+0/0+0 DIAGs 0/0

LAPB DTE, state CONNECT, modulo 8, k 7, N1 12056, N2 20

T1 3000, T2 0, interface outage (partial T3) 0, T4 0

VS 5, VR 5, tx NR 5, Remote VR 5, Retransmissions 0

Queues: U/S frames 0, I frames 0, unack. 0, reTx 0

IFRAMEs 29/29 RNRs 0/0 REJs 0/0 SABM/Es 1/0 FRMRs 0/0 DISCs 0/0

Last input 00:01:10, output 00:01:10, output hang never

Last clearing of "show interface" counters 00:23:59

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

42 packets input, 2693 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

32 packets output, 2657 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

2 carrier transitions

DCD=up  DSR=up  DTR=up  RTS=up  CTS=up

3. 使用以下命令清除Spicey的Serial1上的X.25连接：

spicey# clear x25 serial 1

Force Restart [confirm]

4. 清除X.25连接后，尝试从DTE（本例中为Spicey）ping DCE(Prasit)。

在本例中，使用SVC1024（配置的最高）。

spicey# ping 5.0.2.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 5.0.2.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 32/36/44 ms

spicey# show x25 vc

SVC 1024,  State: D1,  Interface: Serial1

Started 00:00:04, last input 00:00:04, output 00:00:04

Connects 7890 <-> ip 5.0.2.1

Call PID cisco, Data PID none

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 5  PR: 5  ACK: 4  Remote PR: 5  RCNT: 1  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 500/500 packets 5/5 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

5. 在Prasit上再次使用相同的命令。

prasit# ping 5.0.2.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 5.0.2.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 32/34/36 ms

prasit# show x25 vc

SVC 1024,  State: D1,  Interface: Serial0

Started 00:01:34, last input 00:01:34, output 00:01:34

Connects 1234 <-> ip 5.0.2.2

Call PID ietf, Data PID none

Window size input: 2, output: 2

Packet size input: 128, output: 128

PS: 5  PR: 5  ACK: 5  Remote PR: 4  RCNT: 0  RNR: no

P/D state timeouts: 0  timer (secs): 0

data bytes 500/500 packets 5/5 Resets 0/0 RNRs 0/0 REJs 0/0 INTs 0/0

故障排除

目前没有针对此配置的故障排除信息。

相关信息

- X.25背景

- 配置X.25和LAPB

- X.25技术支持页

- 技术支持 - Cisco Systems