目录

简介

先决条件

要求

使用的组件

规则

背景信息

配置

网络图

配置

验证

故障排除

故障排除命令

相关信息

简介

本文档提供一个配置示例，其中远程主机通过公共交换电话网(PSTN)拨号线路上的传输控制协议(TCP)网络连接到X.25。主机不发送或接收任何X.25数据包。但是，它连接的远程路由器充当X.25数据包汇编/拆解器(PAD)，并封装和解封主机的X.25数据包。

注意：这称为“反向填充”，因为X25呼叫只能从X25设备（服务器）建立到异步主机，反之亦然。转发板需要不同的配置。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

Cisco IOS®软件版本11.2引入了PAD相关功能的增强功能，我们可在协议转换服务中使用这些功能。

以下平台支持PAD增强功能：

- Cisco 2500 系列路由器

- 思科26xx系列路由器

- 思科36xx系列路由器

- Cisco 4000 路由器

- Cisco 4500 路由器

- Cisco 4700 路由器

- 思科AS5200系列路由器

- Cisco 7000 系列路由器

- Cisco 7200 系列路由器

- Cisco 7500 系列路由器

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

背景信息

基于X.25 over TCP(XOT)的PAD支持通过物理X.25接口但通过TCP隧道无法到达的目的地的PAD呼叫。此功能使IP链路上路由器发出的PAD呼叫能够到达X.25设备。PAD over XOT还使来自IP链路的传入XOT连接能够被接受为本地路由器上的PAD或协议转换连接。

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本文档使用以下网络设置：

配置

本文档使用以下配置：

远程路由器

Current configuration:

!

version 12.0

service pad from-xot

!---used for allowing incoming xot to pad connection

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

!OPTIONAL

x29 profile default 2:0, 4:1, 15:0, 7:21

!---apply customized x29 profile as default to all incoming connections

!

hostname Remote

!

memory-size iomem 25

ip subnet-zero

no ip domain-lookup

!

x25 routing

!

interface Serial0

ip address 10.10.100.2 255.255.255.0

no ip directed-broadcast

!

interface Serial1

ip address 10.10.175.1 255.255.255.0

no ip directed-broadcast

!

interface FastEthernet0

ip address 10.10.10.42 255.255.255.0

no ip directed-broadcast

half-duplex

!

ip classless

no ip http server

!

x25 route ^100 xot 10.10.100.1

x25 host remote 250

!---map the x25 address of 25099 to the router's

hostname

!

line con 0

no exec

exec-timeout 0 0

transport input none

line aux 0

!---to async host

no exec

modem InOut

rotary 99

!---enable reverse PAD

transport input pad

flowcontrol hardware

line vty 0 4

login local

!

主路由器

Current configuration:

!

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Main

!

!

memory-size iomem 25

ip subnet-zero

no ip domain-lookup

!

x25 routing

!

!

!

interface Serial0

ip address 10.10.100.1 255.255.255.0

no ip directed-broadcast

clockrate 800000

!

interface Serial1

no ip directed-broadcast

encapsulation x25 dce

x25 address 150

clockrate 56000

!

interface FastEthernet0

no ip address

no ip directed-broadcast

half-duplex

!

ip classless

no ip http server

!

x25 route ^250 xot 10.10.100.2

x25 route ^100 interface Serial1

!

line con 0

transport input none

line aux 0

line vty 0 4

login local

!

no scheduler allocate

end

验证

当前没有可用于此配置的验证过程。

故障排除

本部分提供的信息可用于对配置进行故障排除。

故障排除命令

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

注意：在发出debug命令之前，请参阅有关Debug命令的重要信息。

- debug x25 events — 显示有关所有X.25流量或特定X.25服务类的信息。

- debug pad — 显示所有PAD连接的调试消息。

从服务器到主机成功进行X.25调用时，将显示以下调试输出。我们在远程路由器上执行了这些debug命令。

Remote#debug x25 events

Remote#debug pad

WORKING CALL

2d01h: pad_ctxt_up: id 808D6F18, reason 80742B9C (event 0, impetus 10)

2d01h: [10.10.100.1,11042/10.10.100.2,1998]: XOT I P/Inactive Call (20) 8

lci 1

2d01h:   From (5): 10006 To (5): 25099

2d01h:   Facilities: (6)

2d01h:     Packet sizes: 128 128

2d01h:     Window sizes: 2 2

2d01h:   Call User Data (4): 0x01000000 (pad)

2d01h: PAD: incoming call to 25099 on line 5 CUD length 4

2d01h: PAD: Creating TTY daemon on tty5 for vc 1

2d01h: [10.10.100.1,11042/10.10.100.2,1998]: XOT O P3 Call Confirm (5) 8

lci 1

2d01h:   From (0):  To (0):

2d01h:   Facilities: (0)

2d01h: PAD5: Call completed

2d01h: PAD5: Output X29 packet type 4 (Read X.3 param) len 1

2d01h: PAD5: Control packet received.

2d01h: PAD5: Input X29 packet type 0 (Parameter indication) len 45

1:1, 2:1, 3:2, 4:0, 5:0, 6:5, 7:2,

8:0, 9:0, 10:0, 11:14, 12:1, 13:4, 14:0, 15:1,

16:8, 17:24, 18:18, 19:2, 20:255, 21:7, 22:0,

2d01h: PAD5: Setting ParamsIn, length 44

2d01h: PAD5: Output X29 packet type 6 (Set and Read) len 9 2:0, 4:1,

15:0,7:21,

2d01h: PAD5: Control packet received.

2d01h: PAD5: Input X29 packet type 0 (Parameter indication) len 9 2:0,

4:1, 15:0, 7:21,

相关信息

- X.25技术提示

- 技术支持 - Cisco Systems