目录

简介

先决条件

要求

使用的组件

规则

背景信息

配置

网络图

配置

验证

故障排除

相关信息

简介

本文档提供了一个在路由器之间创建多链路捆绑的配置示例。为了在两个路由器之间设置多个多链路，您需要为每个捆绑配置不同的经过身份验证的用户名。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于 Cisco IOS® 软件版本 12.0(7)T。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

背景信息

我们在此处创建的配置示例具有以下特点：

- 它使用多链路接口，该接口下有一个物理成员接口。

- 它使用一个 BRI 接口作为多链路接口的备份。此 BRI 接口具有多链路功能，以及主要的多链路接口的所有其他特性。

- 从备份接口切换到主接口时，我们使用两个互相独立的多链路捆绑。其中一个捆绑来自多链路接口，另一个来自 BRI。默认情况下，多链路捆绑是通过经身份验证的用户名标识的。但是，从备份 (BRI) 接口切换到主（多链路）接口时，这就会产生问题。此配置示例向您显示了如何解决这个问题。

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本文档使用以下网络设置：

配置

本文档使用以下配置：

- 路由器3

- 路由器2

路由器3

Router3#show running-config

!

version 12.0

!

hostname Router3

!

!

username MultilinkRouter2 password 0 cisco

username Router2BRI password 0 cisco

!--- The username must match the one in the ppp chap hostname command on the remote router

!

!

isdn switch-type basic-net3

!

multilink bundle-name authenticated

!--- to differentiate bundles based on authenticated usernames

!

interface Multilink1

ip address 192.168.19.6 255.255.255.0

no cdp enable

ppp authentication chap

ppp chap hostname MultilinkRouter3

!--- alternate CHAP hostname

ppp chap password 7 121A0C041104

ppp multilink

multilink-group 1

!

interface Serial1

no ip address

no ip directed-broadcast

encapsulation ppp

no fair-queue

ppp multilink

multilink-group 1

!

interface BRI0

no ip address

no ip directed-broadcast

encapsulation ppp

no ip route-cache

no ip mroute-cache

dialer rotary-group 1

isdn switch-type basic-net3

ppp authentication chap

ppp multilink

!

interface Dialer1

ip address 192.168.20.1 255.255.255.0

no ip directed-broadcast

encapsulation ppp

dialer in-band

dialer idle-timeout 30

dialer map ip 10.0.0.0 name Router2 broadcast 6084

dialer map ip 192.168.20.2 name Router2 broadcast 6084

dialer load-threshold 1 either

dialer watch-group 1

dialer-group 1

ppp authentication chap

ppp chap hostname Router3BRI

!--- alternate CHAP hostname

ppp chap password 7 094F471A1A0A

ppp multilink

!

router eigrp 1

network 10.0.0.0

network 192.168.19.0

network 192.168.20.0

no auto-summary

eigrp log-neighbor-changes

!

ip classless

no ip http server

!

access-list 150 deny eigrp any any

access-list 150 deny udp any any

access-list 150 permit ip any any

dialer watch-list 1 ip 10.0.0.0 255.0.0.0

dialer-list 1 protocol ip list 150

!

line con 0

exec-timeout 0 0

transport input none

line aux 0

line vty 0 4

login

!

end

路由器2

Router2#show running-config

!

version 12.0

!

hostname Router2

!

!

username MultilinkRouter3 password 0 cisco

username Router3BRI password 0 cisco

!--- The username must match the one in the ppp chap hostname command on the remote router

!

isdn switch-type basic-net3

!

multilink bundle-name authenticated

!

interface Multilink1

ip address 192.168.19.5 255.255.255.0

no cdp enable

ppp authentication chap

ppp chap hostname MultilinkRouter2

ppp chap password 7 104D000A0618

!--- alternate CHAP hostname

ppp multilink

multilink-group 1

!

interface Serial1

no ip address

no ip directed-broadcast

encapsulation ppp

no fair-queue

clockrate 2000000

ppp multilink

multilink-group 1

!

interface BRI0

no ip address

no ip directed-broadcast

encapsulation ppp

no ip route-cache

no ip mroute-cache

dialer pool-member 1

isdn switch-type basic-net3

ppp authentication chap

ppp multilink

!

interface Dialer1

ip address 192.168.20.2 255.255.255.0

no ip directed-broadcast

encapsulation ppp

dialer remote-name Router3

dialer pool 1

dialer string 6082

dialer-group 1

ppp authentication chap

ppp chap hostname Router2BRI

!--- alternate CHAP hostname

ppp chap password 7 00071A150754

ppp multilink

!

router eigrp 1

network 10.0.0.0

network 192.168.19.0

network 192.168.20.0

no auto-summary

eigrp log-neighbor-changes

!

access-list 150 deny eigrp any any

access-list 150 deny udp any any

access-list 150 permit ip any any

dialer-list 1 protocol ip list 150

!

!

line con 0

exec-timeout 0 0

transport input none

line aux 0

line vty 0 4

!

end

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

- show ppp multilink — 测试您的网络是否在正常运行。

下述输出是在以上网络图中所示设备上输入此命令后获得的结果。

Router3#show ppp multilink

Multilink1, bundle name is MultilinkRouter2

0 lost fragments, 0 reordered, 0 unassigned, sequence 0x0/0x0 rcvd/sent

0 discarded, 0 lost received, 1/255 load

Member links: 1 active, 0 inactive (max not set, min not set)

Serial1

Virtual-Access1, bundle name is Router2BRI

Dialer interface is Dialer1

0 lost fragments, 0 reordered, 0 unassigned, sequence 0x18/0x3F rcvd/sent

0 discarded, 0 lost received, 1/255 load

Member links: 2 (max not set, min not set)

BRI0:1

BRI0:2

Router2#show ppp multilink

Multilink1, bundle name is MultilinkRouter3

0 lost fragments, 0 reordered, 0 unassigned, sequence 0x0/0x0 rcvd/sent

0 discarded, 0 lost received, 1/255 load

Member links: 1 active, 0 inactive (max not set, min not set)

Serial1

Virtual-Access1, bundle name is Router3BRI

Dialer interface is Dialer1

0 lost fragments, 0 reordered, 0 unassigned, sequence 0x18/0x3F rcvd/sent

0 discarded, 0 lost received, 1/255 load

Member links: 2 (max not set, min not set)

BRI0:1

BRI0:2

故障排除

目前没有针对此配置的故障排除信息。

相关信息

- 多链路 PPP 捆绑的命名标准

- 更多 PPP 技术提示

- 更多接入拨号技术提示

- 技术支持 - Cisco Systems