目录

简介

先决条件

要求

使用的组件

规则

配置

配置汇总

网络图

配置

验证

故障排除

相关信息

简介

本文档提供PPP背对背连接的示例配置。通过这种配置，您可以检验连接和硬件是否工作正常，甚至可以使用IP路由进行一些测试。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 此配置适用于所有Cisco IOS®软件版本。

- DCE端连接有WAN DCE电缆。

- DTE端连接有WAN DTE电缆。

有关WAN DCE或DTE电缆的详细信息，请参阅串行电缆文档。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

配置

本部分提供有关如何配置本文档所述功能的信息。

配置汇总

在此配置中，Router1使用V35-MT电缆（思科参考为CAB-V35MT），而Router2使用V35-FC电缆（思科参考为CAB-V35FC）。 这表示时钟由Router2提供。时钟频率为64000 bps，在serial 0接口下发出clock rate 64000命令。

注意：配置此命令后，该命令在配置中显示为时钟频率64000。这两根电缆现在互相连接。

通过发出no keepalive命令来配置以太网接口。这样，就无需将它们连接到LAN网络即可启动并运行。在每台路由器上使用静态路由，可以使用Router1以太网接口的IP地址（或以反方式）ping Router2以太网接口的IP地址。 当然，这在测试环境中非常有用。

网络图

本文档基于以下配置：

配置

本文档使用以下配置：

- 路由器 1

- 路由器 2

路由器1

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Router1

!

enable password cisco

!

ip subnet-zero

!

!

!

!

interface Ethernet0

ip address 10.1.0.1 255.255.255.0

no keepalive

!

interface Serial0

ip address 10.0.0.1 255.255.255.0

encapsulation ppp

!

ip classless

ip route 10.2.0.0 255.255.255.0 10.0.0.2

ip http server

!

!

line con 0

line aux 0

line vty 0 4

no login

!

end

路由器2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Router2

!

enable password cisco

!

ip subnet-zero

!

!

!

!

interface Ethernet0

ip address 10.2.0.1 255.255.255.0

no keepalive

!

interface Serial0

ip address 10.0.0.2 255.255.255.0

encapsulation ppp

no fair-queue

clock rate 64000

!

ip classless

ip route 10.1.0.0 255.255.255.0 10.0.0.1

ip http server

!

!

line con 0

line aux 0

line vty 0 4

no login

!

end

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

- 发出show controllers命令以检查电缆和时钟频率：

以下是show controllers命令的输出：

Router1#show controllers serial 0 | i V.35

buffer size 1524  HD unit 0, V.35 DTE cable

Router1#

- 发出show interfaces serial 0命令以检查是否发送和接收了数据包(请参阅数据包输入、数据包输出、5分钟输入速率和5分钟输出速率。有关所使用封装的信息，请参阅封装PPP。

以下是show interfaces serial 0命令的输出：

Router1#show interfaces serial 0

Serial0 is up, line protocol is up

Hardware is HD64570

Internet address is 10.0.0.1/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

LCP Open

Open: IPCP, CDPCP

Last input 00:00:00, output 00:00:00, output hang never

Last clearing of "show interface" counters 00:07:53

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/5/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 1158 kilobits/sec

5 minute input rate 2000 bits/sec, 2 packets/sec

5 minute output rate 2000 bits/sec, 2 packets/sec

155 packets input, 55066 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

168 packets output, 60037 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

DCD=up  DSR=up  DTR=up  RTS=up  CTS=up

Router1#

- 要使用IP地址10.2.0.1生成对10.2.0.2的ping，可以发出ping命令：

以下是ping命令的输出：

Router1#ping

Protocol [ip]:

Target IP address: 10.2.0.1

Repeat count [5]:

Datagram size [100]:

Timeout in seconds [2]:

Extended commands [n]: y

Source address or interface: 10.1.0.1

Type of service [0]:

Set DF bit in IP header? [no]:

Validate reply data? [no]:

Data pattern [0xABCD]:

Loose, Strict, Record, Timestamp, Verbose[none]:

Sweep range of sizes [n]:

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.2.0.1, timeout is 2 seconds: Packet sent with a source address of 10.1.0.1 !!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 32/32/32 ms Router1#

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

- show controllers — 显示电缆和时钟频率。

- show interfaces serial 0 — 验证是否发送和接收了数据包。

- ping — 用于测试设备的连接。

故障排除

目前没有针对此配置的故障排除信息。

相关信息

- 更多WAN技术提示

- 技术支持 - Cisco Systems