目录

简介

先决条件

要求

使用的组件

规则

配置

网络图

配置

调整和可选命令

验证

显示命令

show 命令输出

故障排除

故障排除命令

debug 命令的输出

相关信息

简介

本文档提供具有多个BRI接口的路由器的配置示例，该路由器通过多个BRI接口拨打另一台路由器，并建立多链路PPP(MPPP)连接。拨号的路由器必须确定远程BRI上没有更多可用的信道，然后拨打下一个远程BRI电话号码以建立其他信道。

两台路由器都使用拨号程序配置文件绑定物理BRI接口。您还可以使用拨号器循环组配置此设置，如使用循环组为多个BRI配置MPPP中所示。

有关拨号程序配置文件的详细信息，请参阅配置和故障排除拨号程序配置文件。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- Cisco 3640，带有运行Cisco IOS的四端口BRI模块？软件版本12.1(4)。

- Cisco 4000，带有四个运行Cisco IOS软件版本12.1(4)的BRI接口。

- 每端有两条BRI电路。这些BRI未在寻线组中配置。

本文档中的信息都是基于特定实验室环境中的设备创建的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您是在真实网络上操作，请确保您在使用任何命令前已经了解其潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅限注册客户)

网络图

本文档使用以下网络设置：

配置

本文档使用以下配置：

- 梅兰妮（思科3640）

- 托里托(Cisco 4000)

梅兰妮（思科3640）

Current configuration:

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname melanie

!

enable password ww

!

username torito password 0 ww

!--- Username for remote router (torito) and shared secret (used for !--- Challenge Handshake Authentication Protocol (CHAP) authentication). !--- Shared secret must be the same on both sides.

isdn switch-type basic-net3

!

interface Loopback0

ip address 10.10.10.1 255.255.255.0

!

interface BRI0/0

no ip address

shutdown

!

interface BRI2/0

no ip address

shutdown

!

interface BRI2/1

!--- First BRI interface.

description ISDN number 6104

!--- Phone number of this BRI.

no ip address

encapsulation ppp

dialer pool-member 1

!--- Member of dialer pool 1.

isdn switch-type basic-net3

no cdp enable

ppp authentication chap

!--- Use CHAP authentication.

ppp multilink

!--- Enable multilink on the physical interface.

!

interface BRI2/2

!--- Second BRI interface.

description ISDN number 6103

!--- Phone number of this BRI.

no ip address

encapsulation ppp

dialer pool-member 1

!--- Member of dialer pool 1.

isdn switch-type basic-net3

no cdp enable

ppp authentication chap

!--- Use CHAP authentication.

ppp multilink

!--- Enable multilink on the physical interface.

!

interface BRI2/3

no ip address

shutdown

!

interface Dialer2

!--- Dialer interface used for dialout.

ip unnumbered Loopback0

!--- Use the loopback0 address. !--- Static route on remote router points to this Loopback0 address.

encapsulation ppp

dialer pool 1

!--- Defines dialer pool 1. !--- BRI 2/1 and BRI 2/2 are members of this pool.

dialer string 6113

!--- Dial 6113 first

.

dialer string 6114

!--- If 6113 fails, dial 6114 . !--- Both numbers are required. Otherwise, the third call encounters a busy signal.

dialer load-threshold 1 either

!--- Load level (in either direction) for traffic at which additional !--- connections will be added to the MPPP bundle. !--- Load level values range from 1 (unloaded) to 255 (fully loaded).

dialer-group 1

!--- Apply interesting traffic definition from dialer-list 1.

no cdp enable

ppp authentication chap

!--- Use CHAP authentication.

ppp multilink

!--- Allow MPPP for the four BRI channels.

!

ip route 10.10.12.1 255.255.255.255 Dialer2

!--- Static route to remote router. !--- All traffic destined for the remote router must use int Dialer2

!

dialer-list 1 protocol ip permit

!--- All IP traffic is designated as interesting. !--- This is applied to interface dialer2 with the help of dialer-group 1.

line con 0

transport input none

line 97 114

modem InOut

transport input all

line aux 0

line vty 0 4

login

!

end

请注意Cisco 3640(melanie)配置中的以下要点：

- 配置使用拨号程序配置文件。BRI接口是拨号程序池的成员。特定于目标的所有配置设置都在接口拨号器2配置中配置。

- 拨号器接口有两个拨号器字符串。请记住，远程路由器(torito)上有两个BRI接口。 由于这些BRI未由Telco在寻线组中配置，因此路由器melanie必须单独拨打每个BRI。使用多个拨号程序字符串时，始终拨打第一个电话号码。仅当该呼叫失败时，拨号程序接口才会尝试第二个拨号程序字符串。我们可以根据需要按顺序定义尽可能多的拨号程序字符串。

- MPPP的拨号器负载阈值设置为1，这是最小值。此值可以根据流量模式和要求进行更改。但是，如果定义了较高的负载阈值，则只有在负载超过该定义时才会添加附加链路。有关如何控制向多链路捆绑添加信道的详细信息，请参阅调整和可选命令部分。

- 远程路由器的静态主机路由指向接口拨号器2。然后流量从池的物理成员（BRI 2/1和BRI 2/2）转发出去。 为应使用多链路连接的目标流量创建静态路由（或使用路由协议）。

托里托(Cisco 4000)

Current configuration:

!

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname torito

!

username melanie password 0 ww

!--- Username for remote router (melanie) and shared secret !--- (used for CHAP authentication). !--- Shared secret must be the same on both sides.

!

isdn switch-type basic-net3

interface Loopback0

ip address 10.10.12.1 255.255.255.0

!

interface BRI0

no ip address

shutdown

!

interface BRI1

!--- Phone number is 6113.

no ip address

encapsulation ppp

dialer pool-member 1

!--- Member of dialer pool 1.

isdn switch-type basic-net3

ppp authentication chap

!--- Use CHAP authentication.

ppp multilink

!--- Enable multilink on the physical interface. !--- Unless you use CLID/DNIS based binding, this command is required. !--- See Configuring and Troubleshooting Dialer Profiles for more information.

!

interface BRI2

!--- Phone number is 6114.

no ip address

encapsulation ppp

dialer pool-member 1

!--- Member of dialer pool 1.

isdn switch-type basic-net3

ppp authentication chap

!--- Use CHAP authentication.

ppp multilink

!--- Enable multilink on the physical interface. !--- Unless you use CLID/DNIS based binding, this command is required. !--- See Configuring and Troubleshooting Dialer Profiles for more information.

!

interface BRI3

no ip address

shutdown

!

interface Dialer1

ip unnumbered Loopback0

!--- Use the Loopback0 address. !--- The static route on remote router points to this Loopback0 address.

encapsulation ppp

dialer pool 1

!--- Defines Dialer pool 1. !--- BRI 1 and BRI 2 are members of this pool.

dialer remote-name melanie

!--- Specifies the name of the remote router. !--- This name matches the name used by the remote router to authenticate itself.

dialer-group 1

!--- Apply interesting traffic definition from dialer-list 1.

ppp authentication chap

!--- Use CHAP authentication.

ppp multilink

!--- Allow MPPP for the 4 BRI channels.

!

ip route 10.10.10.1 255.255.255.255 Dialer1

!--- Static route to remote router. !--- All traffic destined for the remote router must use int Dialer1.

dialer-list 1 protocol ip permit

!--- All IP traffic is designated as interesting. !--- This is applied to interface dialer2 using dialer-group 1.

line con 0

exec-timeout 0 0

transport input none

line aux 0

exec-timeout 0 0

transport input all

line vty 0 4

password ww

login

!

end

调整和可选命令

您可以使用本节中的命令调整MPPP连接的行为。您可以通过仔细调整这些参数来控制成本，这有助于避免数据链路的浪费和不必要的使用。这些命令必须在发起拨号的端实施。

- dialer load-threshold load[outbound |入站 |或]???？您可以配置MPPP，以便在主信道建立后立即出现其他信道。在这种情况下，将dialer load-threshold load命令中的load threshold值设置为1。因此，将启动附加信道，并且它们继续保持工作状态（即它们不摆动）。 如果负载阈值被设置为较高值，则多个信道可能会根据链路上的负载摆动。如果要根据需要添加附加信道，请根据流量将负载阈值设置为介于1和255之间的适当值。例如，如果附加信道要达到总容量的50%，则阈值应设置为128(0.50*255)。

- ppp timeout multilink link remove seconds????？使用此命令可防止负载变化时多链路连接抖动。例如，如果负载阈值设置为15 (15/255 = 6%)，并且数据流超出阈值时，这时会出现其他线路。当流量低于阈值时，附加线路取消。在数据速率变化剧烈的情况中，多信道停留一段特定的时间则比较有益，即使负载阈值低于指定值。指定多链路超时低于控制所有链路超时的拨号程序空闲超时。

- ppp timeout multilink link add seconds???？使用此命令可防止向MP捆绑添加多个链路，直到在指定间隔内收到高流量。这样可以防止突发 数据流引发额外的线路。

- 要为拨号程序配置文件指定到远程目标（可以在任何时候启用）的最大链路数，请在接口配置模式下使用dialer max-link命令。在本例中，melanie上配置了两个BRI（或四个B信道），用于拨出。因此，默认情况下，所有四个信道都在MPPP连接中启动。但是，如果只希望启动三个B信道，则可以使用dialer max-link命令来限制链路数。

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

显示命令

使用以下命令检验连接：

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

- show isdn status??？表示路由器是否与ISDN交换机正确通信。在输出中，您需要验证第1层状态为ACTIVE，并且显示第2层状态= MULTIPLE_FRAME_ESTABLISHED。此指令也显示活动的呼叫的数量。有关详细信息，请参阅使用show isdn status命令进行BRI故障排除。

- show ppp multilink??？显示有关处于活动状态的多链路捆绑的信息。使用此指令验证多链路连接。

- show dialer [interface type number]???？显示为DDR配置的接口的常规诊断信息。如果拨号器正常启动，则必须显示“拨号器状态为数据链路层启动”消息。如果物理层显示为up，则表示线路协议已启用，但网络控制协议(NCP)未启用。启动拨号的数据包的源地址和目标地址显示在 Dial reason line 中。此show命令也显示计时器的配置和连接超时前的时间。

- show caller user username detail??？显示特定用户的参数，如分配的IP地址、PPP和PPP捆绑参数等。如果您的Cisco IOS版本不支持此命令，请使用show user命令。

show 命令输出

show ppp multilink命令显示链路连接后每台路由器上多链路捆绑的成员。请注意，在路由器melanie上，捆绑名称为torito，而在路由器上，捆绑名称为melanie。还指示属于捆绑的BRI接口和B信道。

melanie#show ppp multilink

Dialer2, bundle name is torito

0 lost fragments, 0 reordered, 0 unassigned

0 discarded, 0 lost received, 1/255 load

0x8 received sequence, 0x8 sent sequence

Member links: 4 (max not set, min not set)

BRI2/1:1

BRI2/1:2

BRI2/2:1

BRI2/2:2

torito#show ppp multilink

Dialer1, bundle name is melanie

0 lost fragments, 0 reordered, 0 unassigned

0 discarded, 0 lost received, 1/255 load

0x8 received sequence, 0x8 sent sequence

Member links: 4 (max not set, min not set)

BRI1:1

BRI1:2

BRI2:1

BRI2:2

故障排除

本部分提供的信息可用于对配置进行故障排除。

故障排除命令

注意：在发出debug命令之前，请参阅有关Debug命令的重要信息。

- debug dialer???？显示有关拨号器接口上收到的数据包的DDR调试信息。此信息有助于确保存在可以使用拨号器接口的相关流量。

- debug isdn q931??？显示ISDN网络连接（第3层）的呼叫建立和断开。

- debug ppp negotiation??？显示PPP流量的信息，并在PPP流量协商链路控制协议(LCP)、身份验证和网络控制协议(NCP)时进行交换。成功的PPP协商将首先开放LCP状态，然后进行验证，最后进行NCP协商。当LCP协商进行时，会建立多链路参数，如最大接收重建单元(MRRU)。

- debug ppp authentication??显示PPP身份验证协议消息，包括CHAP数据包交换和密码身份验证协议(PAP)交换。

- debug ppp error???显示与PPP连接协商和操作相关的协议错误和错误统计信息。

debug 命令的输出

有关如何按BRI排除多链路故障的信息，请参阅排除ISDN BRI链路上的第二个B信道呼叫故障。当您在1个BRI（2个b信道）上获得多链路功能时，可以将BRI添加到捆绑包。

启用故障排除命令部分中描述的调试，然后ping远程路由器的地址。ping必须启动拨号并连接到远程路由器。当每个附加链路启动时，会将其添加到MPPP捆绑包。

melanie#show debug

Dial on demand:

Dial on demand events debugging is on

PPP:

PPP authentication debugging is on

PPP protocol negotiation debugging is on

ISDN:

ISDN Q931 packets debugging is on

ISDN Q931 packets debug DSLs. (On/Off/No DSL:1/0/-)

melanie#ping 10.10.12.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.10.12.1, timeout is 2 seconds:

*Mar 1 05:30:45.502: BR2/1 DDR: rotor dialout [priority]

!--- Use BRI 2/1 to dial out.

*Mar 1 05:30:45.502: BR2/1 DDR: Dialing cause ip (s=10.10.10.1, d=10.10.12.1)

!--- DDR dialing cause is a ping to the remote router.

*Mar 1 05:30:45.502: BR2/1 DDR: Attempting to dial 6113

!--- Dial the first number (6113) configured with dialer string command. !--- This number corresponds to the first BRI on torito.

*Mar 1 05:30:45.506: ISDN BR2/1: TX -> SETUP pd = 8 callref = 0x77

*Mar 1 05:30:45.506: Bearer Capability i = 0x8890

*Mar 1 05:30:45.506: Channel ID i = 0x83

*Mar 1 05:30:45.506: Called Party Number i = 0x80, '6113', Plan:Unknown,

Type:Unknown

*Mar 1 05:30:45.574: ISDN BR2/1: RX <- CALL_PROC pd = 8 callref = 0xF7

*Mar 1 05:30:45.574: Channel ID i = 0x89

*Mar 1 05:30:46.026: ISDN BR2/1: RX <- CONNECT pd = 8 callref = 0xF7

*Mar 1 05:30:46.030: ISDN BR2/1: TX -> CONNECT_ACK pd = 8 callref = 0x77

!--- Call connects.

*Mar 1 05:30:46.030: %LINK-3-UPDOWN: Interface BRI2/1:1, changed state to up

*Mar 1 05:30:46.034: BR2/1:1: interface must be fifo queue, force fifo

*Mar 1 05:30:46.034: %DIALER-6-BIND: Interface BR2/1:1 bound to profile Di2

!--- Call is bound to interface Dialer 2.

*Mar 1 05:30:46.034: BR2/1:1 PPP: Treating connection as a callout

*Mar 1 05:30:46.034: BR2/1:1 PPP: Phase is ESTABLISHING, Active Open

!--- LCP negotiation begins.

*Mar 1 05:30:46.034: BR2/1:1 LCP: O CONFREQ [Closed] id 116 len 29

*Mar 1 05:30:46.034: BR2/1:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:30:46.034: BR2/1:1 LCP: MagicNumber 0x513DE606 (0x0506513DE606)

*Mar 1 05:30:46.034: BR2/1:1 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:30:46.034: BR2/1:1 LCP: EndpointDisc 1 Local (0x130A016D656C616E6965)

*Mar 1 05:30:46.074: BR2/1:1 LCP: I CONFREQ [REQsent] id 11 len 28

*Mar 1 05:30:46.074: BR2/1:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:30:46.074: BR2/1:1 LCP: MagicNumber 0x00B3729B (0x050600B3729B)

*Mar 1 05:30:46.074: BR2/1:1 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:30:46.074: BR2/1:1 LCP: EndpointDisc 1 Local (0x130901746F7269746F)

*Mar 1 05:30:46.074: BR2/1:1 LCP: O CONFACK [REQsent] id 11 len 28

*Mar 1 05:30:46.074: BR2/1:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:30:46.074: BR2/1:1 LCP: MagicNumber 0x00B3729B (0x050600B3729B)

*Mar 1 05:30:46.074: BR2/1:1 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:30:46.074: BR2/1:1 LCP: EndpointDisc 1 Local (0x130901746F7269746F)

*Mar 1 05:30:46.086: BR2/1:1 LCP: I CONFACK [ACKsent] id 116 len 29

*Mar 1 05:30:46.086: BR2/1:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:30:46.086: BR2/1:1 LCP: MagicNumber 0x513DE606 (0x0506513DE606)

*Mar 1 05:30:46.086: BR2/1:1 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:30:46.086: BR2/1:1 LCP: EndpointDisc 1 Local (0x130A016D656C616E6965)

*Mar 1 05:30:46.086: BR2/1:1 LCP: State is Open

!--- LCP negotiation is complete.

*Mar 1 05:30:46.090: BR2/1:1 PPP: Phase is AUTHENTICATING, by both

!--- PPP authentication by both sides begins.

*Mar 1 05:30:46.090: BR2/1:1 CHAP: O CHALLENGE id 39 len 28 from "melanie"

*Mar 1 05:30:46.110: BR2/1:1 CHAP: I CHALLENGE id 7 len 27 from "torito"

*Mar 1 05:30:46.110: BR2/1:1 CHAP: O RESPONSE id 7 len 28 from "melanie"

*Mar 1 05:30:46.126: BR2/1:1 CHAP: I SUCCESS id 7 len 4

*Mar 1 05:30:46.134: BR2/1:1 CHAP: I RESPONSE id 39 len 27 from "torito"

*Mar 1 05:30:46.138: BR2/1:1 CHAP: O SUCCESS id 39 len 4

!--- CHAP authentication is successful

*Mar 1 05:30:46.138: BR2/1:1 PPP: Phase is VIRTUALIZED

*Mar 1 05:30:46.138: Di2 PPP: Phase is UP

*Mar 1 05:30:46.138: Di2 IPCP: O CONFREQ [Closed] id 14 len 10

*Mar 1 05:30:46.138: Di2 IPCP: Address 10.10.10.1 (0x03060A0A0A01)

*Mar 1 05:30:46.142: BR2/1:1 MLP: torito, multilink up, first link

*Mar 1 05:30:46.162: Di2 IPCP: I CONFREQ [REQsent] id 7 len 10

*Mar 1 05:30:46.162: Di2 IPCP: Address 10.10.12.1 (0x03060A0A0C01)

*Mar 1 05:30:46.162: Di2 IPCP: O CONFACK [REQsent] id 7 len 10

*Mar 1 05:30:46.162: Di2 IPCP: Address 10.10.12.1 (0x03060A0A0C01)

*Mar 1 05:30:46.166: Di2 CDPCP: I CONFREQ [Not negotiated] id 7 len 4

*Mar 1 05:30:46.166: Di2 LCP: O PROTREJ [Open] id 14 len 10 protocol CDPCP

(0x820701070004)

*Mar 1 05:30:46.182: Di2 IPCP: I CONFACK [ACKsent] id 14 len 10

*Mar 1 05:30:46.182: Di2 IPCP: Address 10.10.10.1 (0x03060A0A0A01)

*Mar 1 05:30:46.182: Di2 IPCP: State is Open

*Mar 1 05:30:46.182: Di2 DDR: dialer protocol up

*Mar 1 05:30:46.182: Di2 IPCP: Install route to 10.10.12.1

*Mar 1 05:30:46.186: BR2/1 DDR: rotor dialout [priority]

*Mar 1 05:30:46.186: BR2/1 DDR: Attempting to dial 6113

!--- Dial the first number (6113) configured with dialer string command. !--- This number corresponds to the first BRI on torito. !--- Remember there is one B-channel available on the remote BRI.

*Mar 1 05:30:46.186: ISDN BR2/1: TX -> SETUP pd = 8 callref = 0x78

*Mar 1 05:30:46.186: Bearer Capability i = 0x8890

*Mar 1 05:30:46.190: Channel ID i = 0x83

*Mar 1 05:30:46.190: Called Party Number i = 0x80, '6113', Plan:Unknown,

Type:Unknown

*Mar 1 05:30:46.274: ISDN BR2/1: RX <- CALL_PROC pd = 8 callref = 0xF8

*Mar 1 05:30:46.274: Channel ID i = 0x8A

*Mar 1 05:30:46.726: ISDN BR2/1: RX <- CONNECT pd = 8 callref = 0xF8

*Mar 1 05:30:46.730: ISDN BR2/1: TX -> CONNECT_ACK pd = 8 callref = 0x78

*Mar 1 05:30:46.730: %LINK-3-UPDOWN: Interface BRI2/1:2, changed state to up

!--- Second B-channel is connected.

*Mar 1 05:30:46.730: BR2/1:2: interface must be fifo queue, force fifo

*Mar 1 05:30:46.734: %DIALER-6-BIND: Interface BR2/1:2 bound to profile Di2

*Mar 1 05:30:46.734: %ISDN-6-CONNECT: Interface BRI2/1:1 is now connected to

6113 torito

*Mar 1 05:30:46.734: BR2/1:2 PPP: Treating connection as a callout

*Mar 1 05:30:46.734: BR2/1:2 PPP: Phase is ESTABLISHING, Active Open

*Mar 1 05:30:46.734: BR2/1:2 LCP: O CONFREQ [Closed] id 31 len 29

*Mar 1 05:30:46.734: BR2/1:2 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:30:46.734: BR2/1:2 LCP: MagicNumber 0x513DE8C4 (0x0506513DE8C4)

*Mar 1 05:30:46.734: BR2/1:2 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:30:46.734: BR2/1:2 LCP: EndpointDisc 1 Local (0x130A016D656C616E6965)

*Mar 1 05:30:46.774: BR2/1:2 LCP: I CONFREQ [REQsent] id 12 len 28

*Mar 1 05:30:46.774: BR2/1:2 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:30:46.774: BR2/1:2 LCP: MagicNumber 0x00B37556 (0x050600B37556)

*Mar 1 05:30:46.774: BR2/1:2 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:30:46.774: BR2/1:2 LCP: EndpointDisc 1 Local (0x130901746F7269746F)

*Mar 1 05:30:46.774: BR2/1:2 LCP: O CONFACK [REQsent] id 12 len 28

*Mar 1 05:30:46.774: BR2/1:2 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:30:46.774: BR2/1:2 LCP: MagicNumber 0x00B37556 (0x050600B37556)

*Mar 1 05:30:46.774: BR2/1:2 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:30:46.774: BR2/1:2 LCP: EndpointDisc 1 Local (0x130901746F7269746F)

*Mar 1 05:30:46.786: BR2/1:2 LCP: I CONFACK [ACKsent] id 31 len 29

*Mar 1 05:30:46.786: BR2/1:2 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:30:46.786: BR2/1:2 LCP: MagicNumber 0x513DE8C4 (0x0506513DE8C4)

*Mar 1 05:30:46.786: BR2/1:2 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:30:46.786: BR2/1:2 LCP: EndpointDisc 1 Local (0x130A016D656C616E6965)

*Mar 1 05:30:46.786: BR2/1:2 LCP: State is Open

*Mar 1 05:30:46.786: BR2/1:2 PPP: Phase is AUTHENTICATING, by both

*Mar 1 05:30:46.786: BR2/1:2 CHAP: O CHALLENGE id 14 len 28 from "melanie"

*Mar 1 05:30:46.806: BR2/1:2 CHAP: I CHALLENGE id 7 len 27 from "torito"

*Mar 1 05:30:46.806: BR2/1:2 CHAP: O RESPONSE id 7 len 28 from "melanie"

*Mar 1 05:30:46.822: BR2/1:2 CHAP: I SUCCESS id 7 len 4

*Mar 1 05:30:46.834: BR2/1:2 CHAP: I RESPONSE id 14 len 27 from "torito"

*Mar 1 05:30:46.834: BR2/1:2 CHAP: O SUCCESS id 14 len 4

!--- PPP authentication is complete.

*Mar 1 05:30:46.834: BR2/1:2 PPP: Phase is VIRTUALIZED

*Mar 1 05:30:46.834: BR2/1:2 MLP: torito, multilink up

*Mar 1 05:30:47.138: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI2/1:1,

changed state to up

*Mar 1 05:30:47.834: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI2/1:2,

changed state to up

*Mar 1 05:30:52.734: %ISDN-6-CONNECT: Interface BRI2/1:2 is now connected to

6113 torito

!--- Both B-channels are up.

melanie#

*Mar 1 05:31:16.186: BR2/2 DDR: rotor dialout [priority]

!--- Dialout using BRI 2/2.

*Mar 1 05:31:16.186: BR2/2 DDR: Attempting to dial 6113

!--- Dial the first number (6113) configured with dialer string command. !--- This number corresponds to the first BRI on torito. !--- Remember there are no B-channels available on the remote BRI.

*Mar 1 05:31:16.186: ISDN BR2/2: TX -> SETUP pd = 8 callref = 0x79

*Mar 1 05:31:16.186: Bearer Capability i = 0x8890

*Mar 1 05:31:16.186: Channel ID i = 0x83

*Mar 1 05:31:16.190: Called Party Number i = 0x80, '6113', Plan:Unknown,

Type:Unknown

*Mar 1 05:31:16.274: ISDN BR2/2: RX <- CALL_PROC pd = 8 callref = 0xF9

*Mar 1 05:31:16.274: Channel ID i = 0x89

*Mar 1 05:31:16.298: ISDN BR2/2: RX <- PROGRESS pd = 8 callref = 0xF9

*Mar 1 05:31:16.302: Progress Ind i = 0x8188 - In-band info or appropriate

now available

*Mar 1 05:31:16.318: ISDN BR2/2: RX <- DISCONNECT pd = 8 callref = 0xF9

*Mar 1 05:31:16.318: Cause i = 0x8191 - User busy

!--- We receive a user busy signal, because there are no available !--- B-channels on that BRI, and melanie must dial the next BRI on torito.

*Mar 1 05:31:16.322: BRI2/2: wait for isdn carrier timeout, call id=0x8079

*Mar 1 05:31:16.322: BR2/2 DDR: Attempting to dial 6114

!--- Dial the second number (6114) configured with dialer string command. !--- This number corresponds to the second BRI on torito. !--- Remember both B-channels are available on that remote BRI.

*Mar 1 05:31:16.326: ISDN BR2/2: TX -> RELEASE pd = 8 callref = 0x79

*Mar 1 05:31:16.326: Cause i = 0x8091 - User busy

!--- Release message from the previous failed call.

*Mar 1 05:31:16.346: ISDN BR2/2: TX -> SETUP pd = 8 callref = 0x7A

!--- Setup message for next call.

*Mar 1 05:31:16.346: Bearer Capability i = 0x8890

*Mar 1 05:31:16.346: Channel ID i = 0x83

*Mar 1 05:31:16.346: Called Party Number i = 0x80, '6114', Plan:Unknown,

Type:Unknown

*Mar 1 05:31:16.362: ISDN BR2/2: RX <- RELEASE_COMP pd = 8 callref = 0xF9

!--- Release acknowledgement for previous failed call.

*Mar 1 05:31:16.422: ISDN BR2/2: RX <- CALL_PROC pd = 8 callref = 0xFA

!--- ISDN call progress message.

*Mar 1 05:31:16.426: Channel ID i = 0x89

*Mar 1 05:31:16.878: ISDN BR2/2: RX <- CONNECT pd = 8 callref = 0xFA

*Mar 1 05:31:16.882: ISDN BR2/2: TX -> CONNECT_ACK pd = 8 callref = 0x7A

*Mar 1 05:31:16.882: %LINK-3-UPDOWN: Interface BRI2/2:1, changed state to up

!--- Call is connected on BRI 2/2 B-channel 1.

*Mar 1 05:31:16.882: BR2/2:1: interface must be fifo queue, force fifo

*Mar 1 05:31:16.882: %DIALER-6-BIND: Interface BR2/2:1 bound to profile Di2

!--- Call is bound to interface Dialer 2.

*Mar 1 05:31:16.886: BR2/2:1 PPP: Treating connection as a callout

*Mar 1 05:31:16.886: BR2/2:1 PPP: Phase is ESTABLISHING, Active Open

*Mar 1 05:31:16.886: BR2/2:1 LCP: O CONFREQ [Closed] id 31 len 29

*Mar 1 05:31:16.886: BR2/2:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:31:16.886: BR2/2:1 LCP: MagicNumber 0x513E5E8D (0x0506513E5E8D)

*Mar 1 05:31:16.886: BR2/2:1 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:31:16.886: BR2/2:1 LCP: EndpointDisc 1 Local (0x130A016D656C616E6965)

*Mar 1 05:31:16.926: BR2/2:1 LCP: I CONFREQ [REQsent] id 11 len 28

*Mar 1 05:31:16.926: BR2/2:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:31:16.926: BR2/2:1 LCP: MagicNumber 0x00B3EB20 (0x050600B3EB20)

*Mar 1 05:31:16.926: BR2/2:1 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:31:16.926: BR2/2:1 LCP: EndpointDisc 1 Local (0x130901746F7269746F)

*Mar 1 05:31:16.926: BR2/2:1 LCP: O CONFACK [REQsent] id 11 len 28

*Mar 1 05:31:16.926: BR2/2:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:31:16.926: BR2/2:1 LCP: MagicNumber 0x00B3EB20 (0x050600B3EB20)

*Mar 1 05:31:16.926: BR2/2:1 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:31:16.926: BR2/2:1 LCP: EndpointDisc 1 Local (0x130901746F7269746F)

*Mar 1 05:31:16.938: BR2/2:1 LCP: I CONFACK [ACKsent] id 31 len 29

*Mar 1 05:31:16.938: BR2/2:1 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:31:16.938: BR2/2:1 LCP: MagicNumber 0x513E5E8D (0x0506513E5E8D)

*Mar 1 05:31:16.938: BR2/2:1 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:31:16.938: BR2/2:1 LCP: EndpointDisc 1 Local (0x130A016D656C616E6965)

*Mar 1 05:31:16.938: BR2/2:1 LCP: State is Open

*Mar 1 05:31:16.938: BR2/2:1 PPP: Phase is AUTHENTICATING, by both

*Mar 1 05:31:16.938: BR2/2:1 CHAP: O CHALLENGE id 14 len 28 from "melanie"

*Mar 1 05:31:16.958: BR2/2:1 CHAP: I CHALLENGE id 6 len 27 from "torito"

*Mar 1 05:31:16.958: BR2/2:1 CHAP: O RESPONSE id 6 len 28 from "melanie"

*Mar 1 05:31:16.974: BR2/2:1 CHAP: I SUCCESS id 6 len 4

*Mar 1 05:31:16.986: BR2/2:1 CHAP: I RESPONSE id 14 len 27 from "torito"

*Mar 1 05:31:16.986: BR2/2:1 CHAP: O SUCCESS id 14 len 4

!--- CHAP authentication is successful.

*Mar 1 05:31:16.986: BR2/2:1 PPP: Phase is VIRTUALIZED

*Mar 1 05:31:16.990: BR2/2:1 MLP: torito, multilink up

*Mar 1 05:31:17.986: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI2/2:1,

changed state to up

*Mar 1 05:31:22.886: %ISDN-6-CONNECT: Interface BRI2/2:1 is now connected to

6114 torito

!--- Call connection is complete.

melanie#

*Mar 1 05:31:46.186: BR2/2 DDR: rotor dialout [priority]

*Mar 1 05:31:46.186: BR2/2 DDR: Attempting to dial 6113

!--- Dial the first number (6113) configured with dialer string command. !--- This number corresponds to the first BRI on torito. !--- Remember there are no B-channels available on the remote BRI.

*Mar 1 05:31:46.186: ISDN BR2/2: TX -> SETUP pd = 8 callref = 0x7B

*Mar 1 05:31:46.186: Bearer Capability i = 0x8890

*Mar 1 05:31:46.186: Channel ID i = 0x83

*Mar 1 05:31:46.190: Called Party Number i = 0x80, '6113', Plan:Unknown,

Type:Unknown

*Mar 1 05:31:46.274: Channel ID i = 0x8A

*Mar 1 05:31:46.302: ISDN BR2/2: RX <- PROGRESS pd = 8 callref = 0xFB

*Mar 1 05:31:46.302: Progress Ind i = 0x8188 - In-band info or appropriate

now available

*Mar 1 05:31:46.318: ISDN BR2/2: RX <- DISCONNECT pd = 8 callref = 0xFB

*Mar 1 05:31:46.322: Cause i = 0x8191 - User busy

!--- We receive a user busy signal, since there are no available B-channels. !--- on that BRI melanie must dial the next BRI on torito.

*Mar 1 05:31:46.322: BRI2/2: wait for isdn carrier timeout, call id=0x807B

*Mar 1 05:31:46.326: BR2/2 DDR: Attempting to dial 6114

!--- Dial the second number (6114) configured with dialer string command. !--- This number corresponds to the second BRI on torito. !--- Remember there is one B-channels available on that remote BRI.

*Mar 1 05:31:46.326: ISDN BR2/2: TX -> RELEASE pd = 8 callref = 0x7B

*Mar 1 05:31:46.326: Cause i = 0x8091 - User busy

!--- Release message from the previous failed call.

*Mar 1 05:31:46.346: ISDN BR2/2: TX -> SETUP pd = 8 callref = 0x7C

!--- Setup message for next call.

*Mar 1 05:31:46.346: Bearer Capability i = 0x8890

*Mar 1 05:31:46.346: Channel ID i = 0x83

*Mar 1 05:31:46.346: Called Party Number i = 0x80, '6114', Plan:Unknown,

Type:Unknown

*Mar 1 05:31:46.362: ISDN BR2/2: RX <- RELEASE_COMP pd = 8 callref = 0xFB

!--- Release acknowledgement for previous failed call.

*Mar 1 05:31:46.422: ISDN BR2/2: RX <- CALL_PROC pd = 8 callref = 0xFC

*Mar 1 05:31:46.426: Channel ID i = 0x8A

*Mar 1 05:31:46.878: ISDN BR2/2: RX <- CONNECT pd = 8 callref = 0xFC

*Mar 1 05:31:46.882: ISDN BR2/2: TX -> CONNECT_ACK pd = 8 callref = 0x7C

*Mar 1 05:31:46.882: %LINK-3-UPDOWN: Interface BRI2/2:2, changed state to up

!--- Call is connected on BRI 2/2 B-channel 2.

*Mar 1 05:31:46.882: BR2/2:2: interface must be fifo queue, force fifo

*Mar 1 05:31:46.882: %DIALER-6-BIND: Interface BR2/2:2 bound to profile Di2

!--- Call is bound to interface Dialer 2.

*Mar 1 05:31:46.886: BR2/2:2 PPP: Treating connection as a callout

*Mar 1 05:31:46.886: BR2/2:2 PPP: Phase is ESTABLISHING, Active Open

*Mar 1 05:31:46.886: BR2/2:2 LCP: O CONFREQ [Closed] id 24 len 29

*Mar 1 05:31:46.886: BR2/2:2 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:31:46.886: BR2/2:2 LCP: MagicNumber 0x513ED3BF (0x0506513ED3BF)

*Mar 1 05:31:46.886: BR2/2:2 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:31:46.886: BR2/2:2 LCP: EndpointDisc 1 Local (0x130A016D656C616E6965)

*Mar 1 05:31:46.922: BR2/2:2 LCP: I CONFREQ [REQsent] id 10 len 28

*Mar 1 05:31:46.922: BR2/2:2 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:31:46.926: BR2/2:2 LCP: MagicNumber 0x00B46053 (0x050600B46053)

*Mar 1 05:31:46.926: BR2/2:2 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:31:46.926: BR2/2:2 LCP: EndpointDisc 1 Local (0x130901746F7269746F)

*Mar 1 05:31:46.926: BR2/2:2 LCP: O CONFACK [REQsent] id 10 len 28

*Mar 1 05:31:46.926: BR2/2:2 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:31:46.926: BR2/2:2 LCP: MagicNumber 0x00B46053 (0x050600B46053)

*Mar 1 05:31:46.926: BR2/2:2 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:31:46.926: BR2/2:2 LCP: EndpointDisc 1 Local (0x130901746F7269746F)

*Mar 1 05:31:46.938: BR2/2:2 LCP: I CONFACK [ACKsent] id 24 len 29

*Mar 1 05:31:46.938: BR2/2:2 LCP: AuthProto CHAP (0x0305C22305)

*Mar 1 05:31:46.938: BR2/2:2 LCP: MagicNumber 0x513ED3BF (0x0506513ED3BF)

*Mar 1 05:31:46.938: BR2/2:2 LCP: MRRU 1524 (0x110405F4)

*Mar 1 05:31:46.938: BR2/2:2 LCP: EndpointDisc 1 Local (0x130A016D656C616E6965)

*Mar 1 05:31:46.938: BR2/2:2 LCP: State is Open

*Mar 1 05:31:46.938: BR2/2:2 PPP: Phase is AUTHENTICATING, by both

*Mar 1 05:31:46.938: BR2/2:2 CHAP: O CHALLENGE id 11 len 28 from "melanie"

*Mar 1 05:31:46.958: BR2/2:2 CHAP: I CHALLENGE id 6 len 27 from "torito"

*Mar 1 05:31:46.958: BR2/2:2 CHAP: O RESPONSE id 6 len 28 from "melanie"

*Mar 1 05:31:46.974: BR2/2:2 CHAP: I SUCCESS id 6 len 4

*Mar 1 05:31:46.982: BR2/2:2 CHAP: I RESPONSE id 11 len 27 from "torito"

*Mar 1 05:31:46.986: BR2/2:2 CHAP: O SUCCESS id 11 len 4

!--- CHAP authentication is successful.

*Mar 1 05:31:46.986: BR2/2:2 PPP: Phase is VIRTUALIZED

*Mar 1 05:31:46.986: BR2/2:2 MLP: torito, multilink up

*Mar 1 05:31:47.986: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI2/2:2,

changed state to up

*Mar 1 05:31:52.886: %ISDN-6-CONNECT: Interface BRI2/2:2 is now connected to

6114 torito

!--- Call connection is complete.

melanie#ping 10.10.12.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.10.12.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 24/24/24 ms

!--- Successful ping.

melanie#

相关信息

- DDR 多链路 PPP - 基本配置和验证

- 用循环组为多个 BRI 配置 MPPP

- 拨号程序配置文件的配置与故障排除

- ISDN BRI 链路上第二个 B 通道呼叫失败故障排除

- 接入产品支持页面

- 接入技术支持页

- 技术支持 - Cisco Systems