目录

简介

开始使用前

规则

先决条件

使用的组件

配置

网络图

配置

验证

故障排除

相关信息

简介

本文档提供了高级数据链路控制 (HDLC) 背对背连接的示例配置。您可以用它来验证您的连接和硬件是否适当运行。

开始使用前

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

先决条件

本文档没有任何特定的前提条件。

使用的组件

本文档中的信息基于以下软件和硬件版本。

- 所有 Cisco IOS® 软件版本

- WAN DCE电缆

- WAN DTE电缆

本文档中的信息都是基于特定实验室环境中的设备创建的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您是在真实网络上操作，请确保您在使用任何命令前已经了解其潜在影响。

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本文档使用下图所示的网络设置。

在Cisco路由器上的默认串行封装是Cisco HDLC，因此不需要明确配置在路由器上。因此，配置中不显示封装类型。

在背对背串行连接中，连接到电缆DCE 末端的路由器可为串行链路提供时钟信号。接口配置模式的clockrate命令支持位于电缆ECD末端(本例中指Prasit)的路由器，以便为串行链路提供时钟信号。发出show controllers命令，确定电缆的哪一端连接到串行接口。

在该配置中，电缆的DCE末端与Prasit (发出clockrate命令)连接，DTE末端与Spicey连接。

配置

本文档使用如下所示的配置。

普拉西

interface Serial0

ip address 5.0.2.1 255.255.255.0

clockrate 64000

no cdp enable

斯派西

interface Serial1

ip address 5.0.2.2 255.255.255.0

no cdp enable

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

某些show命令受输出解释器工具的支持(只用于注册的用户)，允许您查看对show命令输出的分析。

- show controllers

- ping

- show interfaces

当这些命令由用于此示例配置的设备发出时,将产生以下显示的输出。

show controllers命令显示物理层工作正常，连接的电缆类型。在下面的输出中，Prasit连接在DCE末端,而Spicey连接在DTE末端。

prasit#

show controllers serial 0

HD unit 1, idb = 0xF22E4, driver structure at 0xF7778

buffer size 1524 HD unit 0 1, V.35 DCE cable, clockrate 64000

!--- Output suppressed.

spicey#

show controllers serial 1

HD unit 1, idb = 0x24824C, driver structure at 0x24F828

buffer size 1524 HD unit 1, V.35 DTE cable

!--- Output suppressed.

普拉西

在Prasit上，发出以下命令：

prasit#ping 5.0.2.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 5.0.2.2, timeout is 2 seconds:!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 28/31/32 ms

prasit#show interfaces serial 0

Serial1 is up, line protocol is up

Hardware is HD64570

Internet address is 5.0.2.1/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec, rely 255/255, load 1/255

Encapsulation HDLC, loopback not set, keepalive set (10 sec)

Last input 00:00:01, output 00:00:04, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0 (size/max/drops); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

205 packets input, 4920 bytes, 0 no buffer

Received 33 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

590 packets output, 4570 bytes, 0 underruns

0 output errors, 0 collisions, 87 interface resets

0 output buffer failures, 0 output buffers swapped out

116 carrier transitions

DCD=up  DSR=up  DTR=up  RTS=up  CTS=up

prasit#

斯派西

在Spicey上，发出以下命令：

spicey#ping 5.0.2.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 5.0.2.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 32/32/32 ms

spicey#show interfaces serial 1

Serial1 is up, line protocol is up

Hardware is HD64570

Internet address is 5.0.2.2/24

MTU 1500 bytes, BW 1544 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation HDLC, loopback not set

Keepalive set (10 sec)

Last input 00:00:08, output 00:00:05, output hang never

Last clearing of "show interface" counters never

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/1/256 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 1158 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

591 packets input, 4592 bytes, 0 no buffer

Received 43 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

210 packets output, 5030 bytes, 0 underruns

0 output errors, 0 collisions, 61 interface resets

0 output buffer failures, 0 output buffers swapped out

180 carrier transitions

DCD=up  DSR=up  DTR=up  RTS=up  CTS=up spicey#

故障排除

目前没有针对此配置的故障排除信息。

相关信息

- T1/E1和T3/E3技术支持

- 技术支持 — IP电话

- 技术支持 - Cisco Systems