目录

简介

先决条件

规则

要求

使用的组件

配置

网络图

为802.1q中继配置Catalyst 3500 PWR XL

在 3500 PWR XL 上配置 VTP 设置

在 3500 PWR XL 上配置 IP 默认网关

为 802.1q 中继配置 ICS 7750 SSP

在 ICS 7750 SSP 上配置 VTP 设置

在 ICS 7750 MRP 上配置 802.1q VLAN

在 ICS 7750 MRP 上配置默认 IP 路由

使用 SM SPE 上的 ICSConfig 为机箱中的卡配置默认网关

验证

故障排除

相关信息

简介

本文档说明如何设置运行软件版本2.5或2.6的Cisco ICS 7750，该软件至少包含一个多服务路由处理器(MRP)300，以便它能够连接到使用802.1q VLAN的本地网络。Cisco ICS软件版本2.5和2.6具有有限的VLAN功能。机箱中的所有卡必须位于使用无标记帧的本征VLAN（通常为VLAN1）上。MRP可以为网络中的其他802.1q VLAN定义其他子接口，以允许VLAN间流量。

先决条件

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

要求

在您尝试此配置前，请保证您满足这些前提条件：

- Cisco ICS 7750 ICSConfig实用程序可以运行，且无任何错误。

- 思科ICS管理工具可识别机箱中的所有卡。

- 您有一个外部交换机设置，其中802.1q VLAN具有中继端口，该端口将连接到思科ICS 7750上的系统交换机处理器(SSP)。

- 系统处理引擎(SPE)卡必须位于本征VLAN上。

- SSP的管理VLAN必须位于本征VLAN上。

- MRP FastEthernet接口0/0必须是本征VLAN接口。

本征VLAN通常是VLAN 1，不使用802.1q标记来标记帧。

Cisco ICS 7750软件版本2.5和2.6要求7750机箱中的所有卡都配置为与本征VLAN（通常为VLAN 1）连接，以便它们发送无标记802.1q帧。MRP和SSP可以根据将ICS 7750连接到本地网络的需要，与使用标记802.1q帧的其他VLAN建立额外连接。

本文档假设您已经熟悉以下主题：

- 在Catalyst交换机和基于Cisco IOS®的路由器上使用802.1q VLAN。如果您想复习802.1q中继概念和实施，可在“虚拟LAN/VLAN中继协议(VLAN/VTP)支持”页上找到几个文档。

- 管理VLAN。有关详细信息，请参阅在Catalyst 4500/4000、5500/5000、6500/6000和Catalyst固定配置交换机上配置管理IP地址。

- 使用VLAN中继协议(VTP)。 有关详细信息，请参阅了解和配置VLAN中继协议(VTP)。

使用的组件

本文档中的信息基于以下软件和硬件版本。

- 已通过Cisco ICS软件版本2.5和2.6验证

- 带SAP和SSP的思科ICS 7750

- 1 x MRP 300

- 5个SPE

本文档中的信息都是基于特定实验室环境中的设备创建的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您处于实时网络中，请确保在使用任何命令之前了解其潜在影响。

配置

网络图

本文档使用下图所示的网络设置。

在此图中，您可以看到所有卡都连接到VLAN 1。此外，MRP和SSP也连接到VLAN 2到VLAN 4。完成本文档中的任务后，网络会显示这种情况。

为802.1q中继配置Catalyst 3500 PWR XL

在此配置中，Catalyst交换机连接到端口0/1上的SSP端口。使用此处显示的命令设置此设置。

3500 PWR XL 802.1q中继配置

3500XL>enable

3500XL#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

3500XL(config)#interface FastEthernet0/1

3500XL(config-if)#switchport trunk encapsulation dot1q

3500XL(config-if)#switchport mode trunk

3500XL(config-if)#switchport trunk allowed vlan all

3500XL(config-if)#exit

3500XL(config)#exit

3500XL#copy running-config startup-config

Destination filename [startup-config]?

Building configuration...

[OK]

3500XL#

检查配置

本部分提供的信息可帮助您确认您的配置是否可正常运行。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

在下面的输出中，您可以看到：

- 交换机端口已启用。

- “管理”和“操作”模式均设置为“中继”。

- 中继封装设置为802.1q。

- 操作中继封装设置为dot1q。

- 本征VLAN是VLAN 1。

- 活动VLAN为1到4。

此命令输出来自show interface fastEthernet 0/1 switchport命令。

cat2924#show interface fastEthernet 0/1 switchport

Name: Fa2/1

Switchport: Enabled

Administrative mode: trunk

Operational Mode: trunk

Administrative Trunking Encapsulation: dot1q

Operational Trunking Encapsulation: dot1q

Negotiation of Trunking: Disabled

Access Mode VLAN: 0 ((Inactive))

Trunking Native Mode VLAN: 1 (default)

Trunking VLANs Enabled: ALL

Trunking VLANs Active: 1-4

Pruning VLANs Enabled: 2-1001

cat2924#

Priority for untagged frames: 0

Override vlan tag priority: FALSE

Voice VLAN: none

Appliance trust: none

3500XL#

排除配置故障

没有排除此部分配置故障的步骤。

在 3500 PWR XL 上配置 VTP 设置

3500 PWR XL是此网络中的服务器。使用此处所示的命令设置VTP设置。

3500 PWR XL VTP

3500XL#vlan database

3500XL(vlan)#vtp server

Device mode already VTP SERVER.

3500XL(vlan)#vtp domain tacweb

Changing VTP domain name from tt to tacweb

3500XL(vlan)#vtp password 1P6c3J9z

Setting device VLAN database password to 1P6c3J9z

3500XL(vlan)#exit

APPLY completed.

Exiting....

3500XL#

检查配置

本部分提供可用于确认配置是否正常运行的信息。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

在下面的输出中，您可以看到：

- 有八个已知VLAN。

- VTP模式为Server。

- VTP域是tacweb。

以下是show vtp status命令的命令输出示例。

3500XL#show vtp status

VTP Version                     : 2

Configuration Revision          : 2

Maximum VLANs supported locally : 254

Number of existing VLANs        : 8

VTP Operating Mode              : Server

VTP Domain Name                 : tacweb

VTP Pruning Mode                : Disabled

VTP V2 Mode                     : Disabled

VTP Traps Generation            : Disabled

MD5 digest                      : 0x25 0x8F 0xFF 0x30 0xEF 0xB1 0xA2 0x57

Configuration last modified by 10.21.9.1 at 4-9-93 18:53:07

3500XL#

排除配置故障

没有提供用于排除此部分配置故障的步骤。

在 3500 PWR XL 上配置 IP 默认网关

3500 PWR XL是此网络中的服务器。使用此处显示的命令设置IP默认网关。

3500 PWR XL IP默认网关

3500XL>en

Password:3500XL#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

3500XL(config)#ip default-gateway 10.21.9.61

3500XL(config)#exit

3500XL#copy running-config startup-config

Destination filename [startup-config]?

Building configuration...

[OK]

3500XL#

检查配置

没有提供用于验证此部分配置的步骤。

排除配置故障

没有提供用于排除此部分配置故障的步骤。

为 802.1q 中继配置 ICS 7750 SSP

本任务在ICS 7750 SSP上建立两个端口作为802.1q中继端口。您配置的端口是将SSP连接到外部Catalyst交换机和SSP连接到内部MRP以太网接口的端口。MRP位于ICS 7750机箱的插槽1中。插槽1是SSP上的端口0/3。使用此处显示的命令设置此设置。

ICS 7750 SSP 802.1q中继配置

SSP>enable

SSP#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

SSP(config)#interface FastEthernet0/1

SSP(config-if)#switchport trunk encapsulation dot1q

SSP(config-if)#switchport mode trunk

SSP(config-if)#switchport trunk allowed vlan all

SSP(config-if)#interface FastEthernet0/3

SSP(config-if)# switchport trunk encapsulation dot1q

SSP(config-if)# switchport mode trunk

SSP(config-if)#switchport trunk allowed vlan all

SSP(config-if)#exit

SSP(config)#exit

SSP#copy running-config startup-config

Destination filename [startup-config]?

Building configuration...

[OK]

SSP#

注：此配置中的MRP是最左侧的插槽，与ICS 7750机箱正面相对。卡插槽编号从左到右为3到8。这就是此配置中使用的接口为FastEthernet 0/1和0/3的原因。

检查配置

本部分提供可用于确认配置是否正常运行的信息。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

在此输出中，您可以看到：

- 交换机端口已启用。

- “管理”和“操作”模式均设置为“中继”。

- 中继封装设置为802.1q。

- 操作中继封装设置为dot1q。

- 本征VLAN是VLAN:1.

- 活动VLAN为1-4。

这是show interface fastEthernet mod_num/port_num switchport命令的命令输出示例。

SSP#show interface fastEthernet 0/1 switchport

Name: Fa0/1

Switchport: Enabled

Administrative mode: trunk

Operational Mode: trunk

Administrative Trunking Encapsulation: dot1q

Operational Trunking Encapsulation: dot1q

Negotiation of Trunking: Disabled

Access Mode VLAN: 0 ((Inactive))

Trunking Native Mode VLAN: 1 (default)

Trunking VLANs Enabled: ALL

Trunking VLANs Active: 1-4

Pruning VLANs Enabled: 2-1001

SSP#

Priority for untagged frames: 0

Override vlan tag priority: FALSE

Voice VLAN: none

Appliance trust: none

SSP#

这是show interface fastEthernet mod_num/port_num switchport命令的另一个示例。

SSP#show interface fastEthernet 0/3 switchport

Name: Fa0/3

Switchport: Enabled

Administrative mode: trunk

Operational Mode: trunk

Administrative Trunking Encapsulation: dot1q

Operational Trunking Encapsulation: dot1q

Negotiation of Trunking: Disabled

Access Mode VLAN: 0 ((Inactive))

Trunking Native Mode VLAN: 1 (default)

Trunking VLANs Enabled: ALL

Trunking VLANs Active: 1-4

Pruning VLANs Enabled: 2-1001

Priority for untagged frames: 0

Override vlan tag priority: FALSE

Voice VLAN: none

Appliance trust: none

SSP#

排除配置故障

没有提供用于排除此部分配置故障的步骤。

在 ICS 7750 SSP 上配置 VTP 设置

SSP是此网络中的VTP客户端。使用此处显示的命令设置此设置。

注意：SSP只能支持256个VLAN。如果您的网络有256个以上的VLAN，则需要启用VLAN修剪，以减少SSP在VTP通告中看到的VLAN数量。有关详细信息，请参阅了解和配置VLAN中继协议(VTP)。

ICS 7750 SSP VTP

SSP>enable

SSP#vlan database

SSP(vlan)#vtp client

Setting device to VTP CLIENT mode.

SSP(vlan)#vtp domain tacweb

Changing VTP domain name from hhgttg to tacweb

SSP(vlan)#vtp password 1P6c3J9z

Setting device VLAN database password to 1P6c3J9z

SSP(vlan)#exit

!--- This message appears. Although the message is normal, it is not !--- completely accurate. It is possible to change some VTP parameters on a VTP Client. !--- In this case the VTP domain name and password were changed. If this switch !--- never had a domain name configured, it would have learned it from its upstream VTP !--- partner. There is no harm in entering the domain name manually.

In CLIENT state, no apply attempted.Exiting....

SSP#

检查配置

本部分提供可用于确认配置是否正常运行的信息。

输出解释程序工具(仅注册客户)支持某些show命令，它允许您查看对show命令输出的分析。

在此输出中，您可以看到：

- 有八个已知VLAN。

- VTP模式为Client。

- VTP域是tacweb。

这是show vtp status命令的命令输出示例。

SSP#show vtp status

VTP Version                     : 2

Configuration Revision          : 2

Maximum VLANs supported locally : 254

Number of existing VLANs        : 8

VTP Operating Mode              : Client

VTP Domain Name                 : tacweb

VTP Pruning Mode                : Disabled

VTP V2 Mode                     : Disabled

VTP Traps Generation            : Enabled

MD5 digest                      : 0x25 0x8F 0xFF 0x30 0xEF 0xB1 0xA2 0x57

Configuration last modified by 10.21.9.1 at 4-9-93 18:53:07

SSP#

在此输出中，您可以看到：

- 端口2、4、5、6、7和8位于VLAN 1中（端口1和3为中继端口）。

- 所有VLAN都处于活动。

注意：VLAN 1002、1003、1004和1005是默认VLAN。这就是为什么show vtp status命令显示八个VLAN:VLAN 1（默认）；.添加的VLAN 2-4，这四个VLAN仍为默认VLAN。

这是show vlan brief命令的命令输出示例。

SSP#show vlan brief

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/2, Fa0/4, Fa0/5, Fa0/6,

Fa0/7, Fa0/8

2    vlan2                            active

3    vlan3                            active

4    vlan4                            active

1002 fddi-default                     active

1003 token-ring-default               active

1004 fddinet-default                  active

1005 trnet-default                    active

SSP#

在此输出中，您可以看到SSP知道VLAN 2到4。

还有其它方法可检验VTP是否运行正常。一种方法是更改VTP服务器上VLAN的名称，并检验VLAN名称更改是否已传播到VTP客户端。VTP配置修订版号也应增加1。

排除配置故障

没有提供用于排除此部分配置故障的步骤。

在 ICS 7750 MRP 上配置 802.1q VLAN

MRP是此网络的VLAN间路由器。使用此处显示的命令设置此设置。

ICS 7750 MRP 802.1q

MRP>enable

Password:

MRP#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

MRP(config)#interface FastEthernet0/0

MRP(config-if)#ip address 10.21.9.61 255.255.255.0

!--- Interface 0/0 is the Native VLAN interface that uses untagged frames. !--- Do not configure 802.1q encapsulation on it.

MRP(config-if)#interface FastEthernet0/0.1

MRP(config-if)#encapsulation dot1Q 2

MRP(config-if)#ip address 10.21.8.61 255.255.255.0

MRP(config-if)#no cdp enable

MRP(config-if)#interface FastEthernet0/0.2

MRP(config-if)#encapsulation dot1Q 3

MRP(config-if)#ip address 10.21.7.61 255.255.255.0

MRP(config-if)#no cdp enable

MRP(config-if)#interface FastEthernet0/0.3

MRP(config-if)#encapsulation dot1Q 4

MRP(config-if)#ip address 10.25.14.196 255.255.255.248

MRP(config-if)#no cdp enable

MRP(config-if)#exit

MRP(config)#exit

MRP#

检查配置

本部分提供可用于确认配置是否正常运行的信息。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

这是show vlans命令的命令输出示例。

MRP#show vlans

Virtual LAN ID: 1 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface: FastEthernet0/0

This is configured as Native VLAN for the following interface(s) :

FastEthernet0/0

Protocols Configured: Address:   Received: Transmitted:

IP              10.21.9.61 3664824   3660021

Virtual LAN ID: 2 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface: FastEthernet0/0.1

Protocols Configured: Address:   Received: Transmitted:

IP              10.21.8.61 3020581   3116540

Virtual LAN ID: 3 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface: FastEthernet0/0.2

Protocols Configured: Address:   Received: Transmitted:

IP              10.21.7.61 100073    82743

Virtual LAN ID: 4 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface: FastEthernet0/0.3

Protocols Configured: Address:     Received: Transmitted:

IP              10.25.14.196 157686    34398

MRP#

排除配置故障

没有提供用于排除此部分配置故障的步骤。

在 ICS 7750 MRP 上配置默认 IP 路由

配置IP路由参数，将MRP设置为本地网络终端系统可以使用的远程IP网络的可行默认网关。

对IP路由、默认网关和最后选用网关的全面说明不在本文档的讨论范围之内。本文档中提供的选项只是确保IP路由连接充分的可能解决方案之一。有关此主题的详细信息，请参阅使用IP命令配置最后选用网关。

在此网络设计中，本地网络上的终端系统使用其所连接的VLAN的MRP的IP地址作为其默认网关。例如，VLAN 3上的设备将10.21.7.61配置为其默认网关。如果IP流量发往远程IP网络，MRP会通过VLAN 4将流量转发到网络图中的另一台路由器。

使用此处显示的命令设置此设置。

ICS 7750 MRP默认网络；前次 经过 的 网关

MRP>enable

Password:

MRP#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

MRP(config)#

MRP(config)#ip classless

MRP(config)#ip default-network 0.0.0.0

MRP(config)#ip route 0.0.0.0 0.0.0.0 10.25.14.193

MRP(config-if)#exit

MRP(config)#exit

MRP#

检查配置

本部分提供可用于确认配置是否正常运行的信息。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

这是show ip route命令的命令输出。

MRP#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.25.14.193 to network 0.0.0.0

10.0.0.0/8 is variably subnetted, 4 subnets, 2 masks

C       10.21.9.0/24 is directly connected, FastEthernet0/0

C       10.21.8.0/24 is directly connected, FastEthernet0/0.1

C       10.21.7.0/24 is directly connected, FastEthernet0/0.3

C       10.25.14.192/29 is directly connected, FastEthernet0/0.2

S*   0.0.0.0/0 [1/0] via 10.25.14.193

MRP#

在上面的输出中，您可以看到最后选用网关是10.25.14.193到网络0.0.0.0，并且MRP有通过IP地址10.25.14.193到0.0.0的路由。是网络图中另一台路由器的IP地址。

这是ping ip_address命令的命令输出示例。

3500XL#ping 10.21.9.61

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.21.9.61, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/2/5 ms

3500XL#ping 10.21.8.61

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.21.8.61, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/2/5 ms

3500XL#ping 10.21.7.61

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.21.7.61, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 5/5/6 ms

3500XL#ping 10.25.14.196

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.25.14.196, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/3/5 ms

3500XL#

3500XL#ping 10.25.14.193

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.25.14.196, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/3/5 ms

3500XL#

在上面的输出中，您可以看到3500交换机能够ping通分配给MRP上VLAN的每个子网地址。10.21.9.61是使用无标记帧的本征VLAN(VLAN 1)。

排除配置故障

没有提供用于排除此部分配置故障的步骤。

使用 SM SPE 上的 ICSConfig 为机箱中的卡配置默认网关

在本任务中，您必须验证，如果需要，更改机箱中卡的默认网关。

1. 访问SM SPE上的Internet Explorer或连接到SM SPE的另一台设备。

2. 启动ICSConfig并输入url http://ip_address/icsconfig。

CheckDiscovery过程开始。

3. 当CheckDiscovery过程完成时，系统会提示您单击“继续使用ICSConfig”。

4. 出现“ICS 7700 System Configuration（ICS 7700系统配置）”菜单时，单击“ICS 7700 System Setup（ICS 7700系统设置）”。

5. 系统将显示Summary屏幕并显示当前设置。向下滚动到名为Network Configuration-DNS and Gateway（网络配置 — DNS和网关）的部分。

在这种情况下，默认网关已正确设置。本任务的剩余部分将向您展示如何根据需要更改此设置。

如果系统已正确设置，则无需完成此任务。单击取消并关闭所有打开的窗口。

如果需要更改此设置，请继续执行此任务。单击Network Configuration-DNS and Gateway（网络配置 — DNS和网关）链接。

6. 当出现用于更改默认网关的菜单时，输入正确的IP地址并单击Continue。

7. 再次出现“摘要”屏幕时，单击“下一步”。

8. 出现“准备提交”屏幕时，单击“提交”。

9. 等到“Setup In Progress（正在设置）”屏幕完成。

10. 出现提示时，单击关闭窗口。

检查配置

此任务没有特定的验证步骤。继续执行下面的验证部分。

排除配置故障

没有针对此任务的故障排除步骤的特定内容。继续执行下面的验证部分。

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

在DOS提示符下，通过ping命令，可以验证SPE卡是否可以访问VLAN 2到4上的终端系统，以便对MRP上的IP地址执行ping操作，以获取其他VLAN。

1. 在任何SPE的控制台上选择开始 > 运行 > cmd [Enter]。

2. 对MRP上的IP地址执行ping操作。

注意：由于SPE位于VLAN 1（子网10.21.9.0）上，因此您无需对此VLAN的MRP接口执行ping操作。下面包括此步骤，以显示SPE可以访问此配置中的所有子网。

C:\>ping 10.21.9.61

Pinging 10.21.9.61 with 32 bytes of data:

Reply from 10.21.9.61: bytes=32 time<10ms TTL=255

Reply from 10.21.9.61: bytes=32 time=10ms TTL=255

Reply from 10.21.9.61: bytes=32 time=10ms TTL=255

Reply from 10.21.9.61: bytes=32 time=10ms TTL=255

Ping statistics for 10.21.9.61:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum = 10ms, Average = 7ms

C:\>ping 10.21.8.61

Pinging 10.21.8.61 with 32 bytes of data:

Reply from 10.21.8.61: bytes=32 time<10ms TTL=255

Reply from 10.21.8.61: bytes=32 time<10ms TTL=255

Reply from 10.21.8.61: bytes=32 time<10ms TTL=255

Reply from 10.21.8.61: bytes=32 time<10ms TTL=255

Ping statistics for 10.21.8.61:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum = 0ms, Average = 0ms

C:\>ping 10.21.7.61

Pinging 10.21.7.61 with 32 bytes of data:

Reply from 10.21.7.61: bytes=32 time<10ms TTL=255

Reply from 10.21.7.61: bytes=32 time<10ms TTL=255

Reply from 10.21.7.61: bytes=32 time<10ms TTL=255

Reply from 10.21.7.61: bytes=32 time<10ms TTL=255

Ping statistics for 10.21.7.61:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum = 0ms, Average = 0ms

C:\>ping 10.25.14.196

Pinging 10.25.14.196 with 32 bytes of data:

Reply from 10.25.14.196: bytes=32 time=10ms TTL=255

Reply from 10.25.14.196: bytes=32 time=10ms TTL=255

Reply from 10.25.14.196: bytes=32 time=10ms TTL=255

Reply from 10.25.14.196: bytes=32 time=10ms TTL=255

Ping statistics for 10.25.14.196:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 10ms, Maximum = 10ms, Average = 10ms

C:\>ping 10.25.14.193

Pinging 10.25.14.193 with 32 bytes of data:

Reply from 10.25.14.193: bytes=32 time<10ms TTL=128

Reply from 10.25.14.193: bytes=32 time<10ms TTL=128

Reply from 10.25.14.193: bytes=32 time<10ms TTL=128

Reply from 10.25.14.193: bytes=32 time<10ms TTL=128

Ping statistics for 10.25.14.193:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 0ms, Maximum = 0ms, Average = 0ms

C:\>

故障排除

VLAN间路由问题最常见的原因是配置错误。

SPE上也可能有静态IP路由覆盖默认网关设置。在SPE的DOS提示符下，使用c:\> netstat -rn命令验证当前路由表。删除所有冲突路由，然后重试测试。如果路由发生冲突，则您必须确定其创建方式并防止其再次发生。

相关信息

- 思科ICS 7750系统软件版本2.5.0版本说明

- 思科ICS 7750系统软件版本2.6.0版本说明

- 虚拟LAN/VLAN中继协议(VLAN/VTP)支持页

- 语音技术支持

- 语音和统一通信产品支持

- Cisco IP 电话故障排除

- 技术支持和文档 - Cisco Systems