目录

简介

先决条件

要求

使用的组件

规则

恢复程序

验证

相关信息

简介

本页说明如何恢复滞留在 ROMmon（rommon # 或 > prompt）中的 AS5300、AS5350 和 AS5400 路由器。

先决条件

要求

要将路由器从 ROMmon 模式恢复，此路由器必须可以物理访问，并且有一台终端连接至控制台端口。

使用的组件

本文档中的信息基于运行 Cisco IOS® 软件版本 12.2(10)b 的 Cisco AS5300。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文件规则的更多信息请参见“ Cisco技术提示规则”。

恢复程序

请完成以下步骤：

1. 您需要做的第一件事是在闪存中查找有效镜像。为此，请发出 dev 命令以查看路由器中有哪些设备和闪存文件可用：

rommon 1 > dev

Devices in device table:

id  name

flash:1:  flash partion 1

File size           Checksum   File name

5827628 bytes (0x58ec2c)   0xcc46    c5300-i-mz.122-10b.bin

bootflash:  boot flash

rommon 2 >

2. 尝试从这些镜像之一启动。

3. 确定文件是否有效。

- 如果文件有效，其将带您回到正常运行模式。

rommon 2 > boot flash: c5300-i-mz.122-10b.bin

program load complete, entry point: 0x80008000, size: 0x6dab38

Self decompressing the image : ####################################

###################################################################

#########################################... [OK]

Restricted Rights Legend

Use, duplication, or disclosure by the Government is subject to

restrictions as set forth in subparagraph (c) of the Commercial

Computer Software - Restricted Rights clause at FAR sec. 52.227-19

and subparagraph (c) (1) (ii) of the Rights in Technical Data and

Computer Software clause at DFARS sec. 252.227-7013.

cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

.

.

.

!--- Output suppressed

.

.

.

Press RETURN to get started !

!--- Press Enter

AS5300>

- 如果文件均无效，则需使用下述步骤之一下载新的 Cisco IOS 软件镜像：

- 使用引导镜像和简单文件传输协议 (TFTP) 服务器下载

有关详细说明，请参阅如何使用 TFTP 和启动映像从 ROMmon 升级。

- 使用 Xmodem 从 ROMMON 下载

有关分步过程，请参阅使用 ROMmon 的 Xmodem 控制台下载过程。

验证

要验证是否已载入正确的镜像，请使用 show version 命令：

AS5300#show version

Cisco Internetwork Operating System Software

IOS (tm) 5300 Software (C5300-I-M), Version 12.2(10b), RELEASE SOFTWARE (fc1)

Copyright (c) 1986-2002 by cisco Systems, Inc.

Compiled Thu 11-Jul-02 15:43 by pwade

Image text-base: 0x60008938, data-base: 0x608FE000

ROM: System Bootstrap, Version 12.0(2)XD1, EARLY DEPLOYMENT RELEASE SOFTWARE (fc1)

AS5300 uptime is 0 minutes

System returned to ROM by reload at 00:12:33 UTC Sat Jan 1 2000

System image file is "flash:c5300-i-mz.122-10b.bin"

!--- Output suppressed

AS5300#

上面的 show version 命令输出显示路由器已载入 Cisco IOS 软件镜像 c5300-i-mz.122-10b.bin。

相关信息

- 接入服务器/通用网关支持页

- 技术支持 - Cisco Systems