目录

简介

先决条件

要求

使用的组件

规则

PRE启动顺序

RF线卡启动顺序

LAN或WAN卡引导顺序

TCC+卡启动顺序

相关信息

简介

本文档介绍从性能路由引擎(PRE)到射频(RF)、LAN、WAN以及Timing、Communications和Control Plus(TCC+)卡的Cisco uBR10000系列通用宽带路由器的启动顺序。

先决条件

要求

本文档的读者应掌握以下这些主题的相关知识：

- 基本的思科路由器架构

- Cisco IOS®软件命令行界面

使用的组件

本文档中的信息基于以下软件和硬件版本：

- Cisco ucBr10012 通用宽带路由器

- 用于uBR10000系列(UBR10K-P6-M)的思科IOS软件

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文件规则的更多信息请参见“ Cisco技术提示规则”。

PRE启动顺序

PRE的启动顺序有以下不同步骤：

1. 加载引导助手。

c10k-eboot-mz.120-16.6.ST1

这不支持任何线卡；只有PRE上的快速以太网(FE)接口可用。

2. 加载主映像。

ubr10k-p6-mz.122-1.XF

ubr10k-k8p6-mz.122-1.XF

每种类型的线卡轮询PRE以获取固件：

- 电缆线卡

- TCC+

- 烤面包机

- 千兆以太网

- 光载波12(OC-12)加电服务(POS)

此输出显示实际实时启动序列及其日志消息：

System Bootstrap, Version 12.0(9r)SL2, RELEASE SOFTWARE (fc1)

!--- Bootstrap version.

Copyright (c) 2000 by cisco Systems, Inc.

Reset Reason Register = RESET_REASON_RESET_REG (0x76)

!--- Reason for reload: RESET.

C10000 platform with 524288 Kbytes of main memory

Self decompressing the image :

#################################################

################################################

Self decompressing the image :

#################################################

################################################

Self decompressing the image :

#################################################

################################################

Self decompressing the image :

#################################################

################################################

Self decompressing the image :

#################################################

################################################

Self decompressing the image :

#################################################

#####

[OK]

Restricted Rights Legend

Use, duplication, or disclosure by the Government is

subject to restrictions as set forth in subparagraph

(c) of the Commercial Computer Software - Restricted

Rights clause at FAR sec. 52.227-19 and subparagraph

(c) (1) (ii) of the Rights in Technical Data and Computer

Software clause at DFARS sec. 252.227-7013.

cisco Systems, Inc.

170 West Tasman Drive

San Jose, California 95134-1706

Cisco Internetwork Operating System Software

IOS (tm) 10000 Software (UBR10K-P6-M), Version 12.2(1)XF, EARLY

DEPLOYMENT RELEASE SOFTWARE (fc1)

!--- Main image.

TAC Support: http://www.cisco.com/cgi-bin/ibld/view.pl?i=support

Copyright (c) 1986-2001 by cisco Systems, Inc.

Compiled Fri 18-May-01 16:15 by ccai

Image text-base: 0x60008960, data-base: 0x612E0000

cisco uBR10000 (PRE-RP) processor with 393215K/131072K bytes of memory.

!--- Processor type.

Processor board ID TBA05100542

R7000 CPU at 262Mhz, Implementation 39, Rev 2.1, 256KB L2, 2048KB L3 Cache

Backplane version 1.0, 8 slot

Last reset from register reset

Toaster processor tmc0 is running.

Toaster processor tmc1 is running.

1 Ethernet/IEEE 802.3 interface(s)

1 FastEthernet/IEEE 802.3 interface(s)

509K bytes of non-volatile configuration memory.

46976K bytes of ATA PCMCIA card at slot 0 (Sector size 512 bytes).

32768K bytes of Flash internal SIMM (Sector size 256KB).

00:00:15: Downloading Microcode: file=system:pxf/c10k102-3.ucode,

version=102.3(40.4),

description=Experimental Software created Wed 31-Jan-01 16:22 by clauer

in view clauer-omega_dev

!--- Microcode for Parallel eXpress Forwarding (PXF) engine.

00:00:16: %SYS-7-NV_BLOCK_INIT: Initalized the geometry of nvram

00:00:22: %LINK-3-UPDOWN: Interface Ethernet0/0/0, changed state to up

!--- 10Base2 interface.

00:00:22: %LINK-5-CHANGED: Interface FastEthernet0/0/0, changed state to reset

!--- Management FE interface. !--- Each of these lines of output appear on one line:

00:00:23: %UBR10000-5-USFREQCHG: Interface Cable6/1/0 Port U0,

frequency changed to 34.992 MHz

00:00:23: %UBR10000-5-UPDOWN: Interface Cable6/1/0 Port U0,

changed state to down

00:00:23: %UBR10000-5-UPDOWN: Interface Cable6/1/0 Port U1,

changed state to down

00:00:23: %UBR10000-5-UPDOWN: Interface Cable6/1/0 Port U2,

changed state to down

00:00:23: %UBR10000-5-UPDOWN: Interface Cable6/1/0 Port U3,

changed state to down

00:00:24: %LINEPROTO-5-UPDOWN: Line protocol on Interface Ethernet0/0/0,

changed state to up

00:00:24: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet0/0/0,

changed state to down

00:00:25: %LINK-5-CHANGED: Interface POS2/0/0,

changed state to administratively down

00:00:25: %LINK-5-CHANGED: Interface GigabitEthernet4/0/0,

changed state to administratively down

00:00:26: %LINEPROTO-5-UPDOWN: Line protocol on Interface POS2/0/0,

changed state to down

00:00:26: %LINEPROTO-5-UPDOWN: Line protocol on Interface GigabitEthernet4/0/0,

changed state to down

00:00:29: !!pxf clients started, forwarding code operational!!

!--- The PFX engine microcode is decompressed and executed.

00:00:30: %SYS-5-RESTART: System restarted --

Cisco Internetwork Operating System Software

IOS (tm) 10000 Software (UBR10K-P6-M), Version 12.2(1)XF, EARLY

DEPLOYMENT RELEASE SOFTWARE (fc1)

TAC Support: http://www.cisco.com/cgi-bin/ibld/view.pl?i=support

Copyright (c) 1986-2001 by cisco Systems, Inc.

Compiled Fri 18-May-01 16:15 by ccai

00:00:30: %SYS-6-BOOTTIME: Time taken to reboot after reload = 349 seconds

!--- The time taken to boot after the reload initiated.

00:00:31: %LINK-3-UPDOWN: Interface FastEthernet0/0/0,

changed state to up

00:00:32: %LINEPROTO-5-UPDOWN: Line protocol on Interface FastEthernet0/0/0,

changed state to up

00:00:34: %IPCOIR-5-CARD_DETECTED: Card type 2cable-mc28 (0x254)

in slot 6/1

!--- RF card registration request received.

00:00:34: %IPCOIR-5-CARD_DETECTED: Card type 2cable-mc28 (0x254)

in slot 7/0

!--- RF card registration request received.

00:00:34: %IPCOIR-5-CARD_LOADING: Loading card in slot 6/1

!--- TFTP is used to transfer the RF card microcode.

00:00:34: %IPCOIR-5-CARD_LOADING: Loading card in slot 7/0

!--- TFTP is used to transfer the RF card microcode.

00:00:34: %IPCOIR-5-CARD_DETECTED: Card type 2cable-tccplus (0x2AF)

in slot 1/1

!--- TCC+ registration request received.

00:00:34: %IPCOIR-5-CARD_DETECTED: Card type 1oc12pos-1 (0x164)

in slot 2/0

!--- LAN to WAN registration received.

00:00:34: %IPCOIR-5-CARD_DETECTED: Card type 1gigethernet-1 (0x166)

in slot 4/0

!--- LAN to WAN registration received.

00:00:34: %IPCOIR-2-CARD_UP_DOWN: Card in slot 1/1 is up.

Notifying 2cable-tccplus driver.

00:00:34: %IPCOIR-2-CARD_UP_DOWN: Card in slot 2/0 is up.

Notifying 1oc12pos-1 driver.

00:00:34: %UBR10KTCC-2-ACTIVE_TCC: TCCplus card 1/1 is active

with Local oscillator as clock reference

00:00:35: %IPCOIR-2-CARD_UP_DOWN: Card in slot 4/0 is up.

Notifying 1gigethernet-1 driver.

00:00:35: %C10KGE-6-GBIC_OK: Interface GigabitEthernet4/0/0,

1000BASE-SX Gigabit Interface Converter (GBIC) inserted

RF线卡启动顺序

RF线卡的启动顺序有以下不同步骤：

1. ROM Monitor(ROMmon)在线卡中加载引导助手。

2. 引导助手发送软件版本号和卡类型。

3. PRE下载与卡类型对应的映像。

4. Cisco IOS软件映像将解压并执行。

5. 设置Ba接口，以便数据可以传送到PRE。

brubeck# debug ipc events

Special Events debugging is on

*Aug  1 05:12:10.596: IPC: Registration request for seat 'clc_6_1'

!--- The RF line card requests registration with the software version !--- number and the line card type.

*Aug  1 05:12:10.604: IPC: Got an open port request for port 0x10008

*Aug  1 05:12:10.604: IPC: Got an open port request for port 0x10009

1w1d: %IPCOIR-5-CARD_DETECTED: Card type 2cable-mc28 (0x254) in slot 6/1

!--- The card type is detected.

1w1d: %IPCOIR-2-CARD_UP_DOWN: Card in slot 6/1 is up.

Notifying 2cable-mc28 driver.

!--- Microcode for the RF line card.

SLOT 6/1: 00:00:16: %IPCGRP-6-UCODEVER: Reported microcode version, 990227862.

SLOT 6/1: 00:00:16: %IPCGRP-6-INTENBDISAB: Interface disabled

<REMOVED>

!--- The main image is downloaded, decompressed, and executed.

SLOT 6/1: 00:00:19: %IPCGRP-6-BARENBDISAB: Barium interface enabled

!--- Enable Barium interface.

1w1d: %LINK-3-UPDOWN: Interface Cable6/1/1, changed state to up

SLOT 6/1: 00:00:20: %LINK-3-UPDOWN: Interface Cable6/1/1, changed state to up

SLOT 6/1: 00:00:20: %LINK-3-UPDOWN: Interface Barium3/0, changed state to up

!--- The Barium interface is set to up.

1w1d: %LINEPROTO-5-UPDOWN: Line protocol on Interface Cable6/1/1,

changed state to up

1w1d: %LINEPROTO-5-UPDOWN: Line protocol on Interface Cable6/1/0,

changed state to up

SLOT 6/1: 00:00:21: %LINEPROTO-5-UPDOWN: Line protocol on Interface Barium3/0,

changed state to up

!--- The Barium line protocol is up and can now pass data to the PRE.

引导帮助程序继续将软件版本号和卡类型作为keepalive发送。如果在PRE上升级微码，则会下载新的微码并自动进行升级。

LAN或WAN卡引导顺序

LAN或WAN卡的启动顺序有以下不同步骤：

1. 线路卡使用软件版本号和卡类型请求注册。

2. PRE下载与卡类型对应的映像。

3. Cisco IOS软件映像将解压并执行。

brubeck# debug ipc events

Special Events debugging is on

*Aug  1 05:08:01.496: IPC: Registration request for seat

'C10K Line Card slot 2/0'

!--- The LAN or WAN card requests registration with the software !--- version and the card type.

*Aug  1 05:08:01.500: IPC: Got an open port request for port 0x10008

1w1d: %IPCOIR-5-CARD_DETECTED: Card type 1oc12pos-1 (0x164) in slot 2/0

!--- The card type is detected.

1w1d: %IPCOIR-5-CARD_LOADING: Loading card in slot 2/0

!--- TFTP is used to transfer the microcode to the line card.

1w1d: %C10K-5-LC_NOTICE: Slot[2/0] 1oc12pos-1 Image

Downloaded...Booting...

!--- The image is decompressed and the code is executed.

TCC+卡启动顺序

TCC+卡的启动顺序有以下不同步骤：

1. TCC+卡使用软件版本号和卡类型请求注册。

2. PRE下载与卡类型对应的映像。

3. Cisco IOS软件映像解压并执行

brubeck# debug ipc events

Special Events debugging is on

*Aug  1 07:00:40.751: IPC: Registration request for seat

'C10K Line Card slot 1/1'

!--- The TCC+ card requests registration.

*Aug  1 07:00:40.755: IPC: Got an open port request for port 0x10008

1w1d: %IPCOIR-5-CARD_DETECTED: Card type 2cable-tccplus (0x2AF) in slot 1/1

!--- The card type is detected.

1w1d: %IPCOIR-5-CARD_LOADING: Loading card in slot 1/1

!--- TFTP is used to transfer the microcode to the TCC+ card.

1w1d: %C10K-5-LC_NOTICE: Slot[1/1] utility-card Image

Downloaded...Booting...

!--- The image is decompressed and the code is executed.

1w1d: %IPCOIR-5-CARD_DETECTED: Card type 2cable-tccplus (0x2AF) in slot 1/1

1w1d: %IPCOIR-2-CARD_UP_DOWN: Card in slot 1/1 is up.

Notifying 2cable-tccplus driver.

1w1d: %UBR10KTCC-2-ACTIVE_TCC: TCCplus card 1/1 is active

with Local oscillator as clock reference

!--- The card is active and reports its clock source.

相关信息

- 宽带有线支持

- Cisco ucBr10012 通用宽带路由器

- 思科uBR10000系列通用宽带路由器版本说明

- 技术支持 - Cisco Systems