目录

简介

先决条件

要求

使用的组件

背景信息

问题：VLAN进入挂起状态，因为连接了Nexus 2000交换矩阵扩展器的Nexus 7000上的LDB分配失败。

解决方案

简介

本文档介绍在Nexus 7000系列交换机上将交换矩阵扩展器(FEX)与M1父卡配合使用时，如何对因光分布箱(LDB)分配失败而挂起的VLAN进行故障排除。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 思科NX-OS版本6.2(x)

- Cisco Nexus 7000系列交换机

- Cisco Nexus 2000系列交换矩阵扩展器

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

背景信息

LDB是一个硬件表，存储转发引擎接收的帧的属性，包括FEX端口通道的中继到VLAN映射。LDB分配失败表示此数据库已用尽。

当FEX模块连接到N7K-M132XP-12（非XL）时，LDB条目的最大数量约为228k。对于XL模块，限制约为512K。

LDB条目总数是每个FEX HIF上定义的VLAN范围之和（HIF上定义的最高VLAN和最低VLAN之间的差异）。

例如：

switchport trunk allowed vlan 1-4 = 4个LDB条目

switchport trunk allowed vlan 1-4、70-80、800 = 800 LDB条目

switchport trunk allowed vlan 200-800 = 600 LDB条目

switchport trunk allowed vlan 200, 800 = 600 LDB条目

如果端口101/1/1到101/1/10配置了switchport trunk allowed vlan 200和800，则使用的LDB条目总数为6000(10x600)。

接入端口使用1个LDB条目（在HIF上定义的接入VLAN）。

使用以下命令检查每个模块的LDB条目：

N7K-A# attach mod 1

Attaching to module 1 ...

To exit type 'exit', to abort type '$.'

module-1#

module-1# show system internal eltmc info ldb summary

LDB allocation summary:

Max dynamic ldb entries:      203776

Total number of entries:      199680

Number of free entries:       197

Number of free regions:       2

Number of allocated entries:  199483

Number of allocated regions:  280

Number of fail allocations:   21

在本示例中，有21个LDB分配失败。由于散列机制用于将特定条目散列到数据库的特定部分，因此不需要总条目数达到最大动态LDB条目数来查看失败的分配。

此输出显示每个端口通道或接口使用的LDB条目数（十六进制）：

module-1# show system internal eltmc info ldb all

LDB allocation maps :

base          size        allocation

0xd400        0x1000        Shared

0xe400        0x1000        Shared

0xf400        0x1000        Shared

0x10400        0x1000        Ethernet1/4

0x11400        0x1000        Ethernet1/7

0x12400        0x1        Ethernet179/1/30

0x12401        0x1        port-channel1093

0x12402        0x1        port-channel1564

0x12403        0x1        port-channel1550

0x12404        0x1        port-channel1527

0x12405        0x1        port-channel1546

0x12426        0x1        Ethernet169/1/47

0x12427        0x1        Ethernet169/1/48

0x12428        0x1        Ethernet181/1/33

0x12429        0x1        Ethernet181/1/34

0x1242a        0x1        Ethernet163/1/4

0x1242b        0x1        Ethernet163/1/5

0x1242c        0x506        Ethernet183/1/7

0x12932        0x1        port-channel1096

0x12933        0x1        port-channel1095

0x12934        0x1        port-channel1092

0x12935        0x2c8        port-channel1084

0x12bfd        0x506        Ethernet183/1/8

0x13103        0x2c8        port-channel1086

0x133cb        0x1        port-channel1589

0x133cc        0x1        port-channel1063

0x133cd        0x1        port-channel1654

0x133ce        0x1        port-channel1652

0x133d4        0x1        port-channel1520

0x133d5        0x1        port-channel1560

0x133d6        0x1        port-channel1561

0x133d7        0x506        Ethernet167/1/4

0x138dd        0x506        Ethernet167/1/2

0x13de3        0x403        Ethernet165/1/2

0x141e6        0x403        Ethernet151/1/1

<snip>

注意：以上两个命令为NX-OS 6.0.3和5.2.4中的N7K-M132XP-12（非XL）提供了不正确的LDB值。

NX-OS 5.2.5和6.1将更正此问题。

问题：VLAN进入挂起状态，因为连接了Nexus 2000交换矩阵扩展器的Nexus 7000上的LDB分配失败。

症状：

1.日志中的错误消息指示LDB分配失败

2015 Feb  3 00:01:27.260 N7k1 %ETHPORT-5-IF_SEQ_ERROR: Error ("LDB Allocation Failed") communicating with MTS_SAP_ELTM for opcode MTS_OPC_ETHPM_PORT_LOGICAL_BRINGUP (RID_PORT: port-channel1001)

2015 Feb  3 00:01:27.261 N7k1 %ETHPORT-3-IF_ERROR_VLANS_SUSPENDED: VLANs 268,1261-1262,1268 on Interface port-channel1001 are being suspended. (Reason: LDB Allocation Failed)

2.与连接到FEX的多台主机的连接丢失

3. show interface status err-vlans的输出显示VLAN因LDB分配失败而挂起

N7kA# show interface status err-vlans

--------------------------------------------------------------------------------

Port         Name               Err-Vlans                     Status

--------------------------------------------------------------------------------

Po1001       ***dcn2pclx01a**   268,1261-1262,1268            LDB Allocation

*LOG                                             Failed

解决方案

这是与线卡相关的硬件限制，因为软件升级无法解决此问题。

建议从HIF修剪VLAN或减少FEX HIF上的VLAN范围，以减少LDB条目的总数。

每个接口上的每个VLAN实例将消耗LDB条目（例如，如果端口通道1定义了100个VLAN，端口通道中定义了4个物理端口，则消耗的LDB条目总数将为400个，每个端口100个实例）。