目录

简介

先决条件

要求

使用的组件

背景信息

根

__eemuser

svc-isan

admin

简介

本文档介绍在vPC设置中Nexus交换机的日志中出现未定义的用户名的原因。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- Nexus 7000

- vPC设置中的Nexus 5000。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

背景信息

在Nexus 5000和Nexus 7000平台上运行NX-OS时，即使用户未明确定义这些用户名，也可以在记帐日志中观察到用户名，如“root”、“_emuser”、“svc-isan”和“admin”。这些用户名在交换机中预定义，本文档说明在记帐日志中可以观察到上述用户名的条件。

用户名

解释和日志

根

此测试是在Nexus 5000交换机上执行的。

===================================================

在Nexus 5000上，当运行命令copy run start时，当对其执行配置保存(copy run start)时，用户根将显示在日志中。请参阅以下示例：

Tue May 6 05:25:28 2014:type=update:id=10.10.10.10@pts/0:user=admin:cmd=

Performing configuration copy.

Tue May 6 05:25:30 2014:type=start:id=vsh.20707:user=root:cmd=

Tue May 6 05:25:31 2014:type=stop:id=vsh.20707:user=root:cmd=

Tue May 6 05:25:35 2014:type=update:id=10.10.10.10@pts/0:user=admin:cmd=

copy running-config startup-config (SUCCESS)

__eemuser

此测试是在支持EEM（嵌入式事件管理器）功能的Nexus 5000交换机上执行。

========================================================

当在Nexus 5000交换机上配置EEM脚本，并检测到端口关闭事件时，EEM脚本将进入接口配置模式(在本例中，为了测试目的，特别针对交换矩阵扩展器(FEX)端口Ethernet 114/1/1)，并将其恢复。请参阅以下示例：

Nexus5K# sh run eem

!Command: show running-config eem

!Time: Sun Apr 27 04:56:04 2014

version 6.0(2)N2(4)

event manager applet test

event syslog pattern "ETHPORT-5-IF_DOWN_NONE"

action 1.0 cli enable

action 2.0 cli conf t

action 3.0 cli interface ether 114/1/1

action 4.0 cli no shut

action 5.0 cli end
使用用户名“admin1”登录Nexus 5000，该用户名在本地配置。请参阅此登录会话示例：

Nexus1# show users

NAME     LINE         TIME         IDLE          PID COMMENT

admin1    pts/2        Apr 27 04:31   .         31579 (10.137.76.223) *
手动关闭连接到Nexus 5000的其中一个FEX模块上的端口E114/1/1。端口在此日志中退回：

2014 Apr 27 04:56:26 N5K-C5548UP %ETHPORT-5-IF_DOWN_NONE:

Interface Ethernet114/1/32 is down (Transceiver Absent)

2014 Apr 27 04:56:27 N5K-C5548UP %ETHPORT-5-IF_ADMIN_UP:

Interface Ethernet114/1/32 is admin up.
在记帐日志中，用户“eem_user”帐户在“admin1”用户手动关闭端口后未执行关闭。请参阅以下示例：

Sun Apr 27 04:56:25 2014:type=update:id=10.10.10.10@pts/2:user=admin1:

cmd=configure terminal ; interface Ethernet114/1/1 (SUCCESS)

Sun Apr 27 04:56:25 2014:type=update:id=10.10.10.10@pts/2:user=admin1:

cmd=configure terminal ; interface Ethernet114/1/1 ; shutdown (REDIRECT)

Sun Apr 27 04:56:26 2014:type=update:id=10.10.10.10@pts/2:user=admin1:

cmd=configure terminal ; interface Ethernet114/1/1 ; shutdown (SUCCESS)

Sun Apr 27 04:56:26 2014:type=start:id=vsh.32539:user=__eemuser:cmd=

Sun Apr 27 04:56:27 2014:type=update:id=vsh.32539:user=__eemuser:cmd=configure

terminal ; interface Ethernet114/1/1 (SUCCESS)

Sun Apr 27 04:56:27 2014:type=update:id=vsh.32539:user=__eemuser:cmd=configure

terminal ; interface Ethernet114/1/1 ; no shutdown (REDIRECT)

Sun Apr 27 04:56:27 2014:type=update:id=vsh.32539:user=__eemuser:cmd=configure

terminal ; interface Ethernet114/1/1 ; no shutdown (SUCCESS)
从上述时间戳和触发EEM脚本时，用户“eem_user”会记录“no shut”的操作。

svc-isan

此测试是在Nexus 7000上执行的。

==================================================

当在Nexus 7000上配置EEM脚本并检测到端口管理关闭事件时，EEM脚本将进入接口配置模式(本例中为FEX接口Ethernet 101/1/10专用于测试目的)，并将其恢复。请参阅以下示例：

event manager applet TEST

event syslog pattern ".*ETHPORT-5-IF_DOWN_ADMIN_DOWN.*"

action 1.0 cli enable

action 2.0 cli conf t

action 3.0 cli int e101/1/10

action 4.0 cli no shut

action 5.0 cli end

action 6.0 syslog msg INTERFACE CHANGED TO ADMIN NO SHUT

\ action 7.0 syslog priority critical msg INTERFACE HAS BEEN CHANGED TO ADMIN UP
如果E101/1/10关闭，EEM脚本将触发且不关闭端口。在日志中，观察到以下消息：

2014 Mar 12 07:12:37 Nexus_7000 %ETHPORT-5-IF_DOWN_ADMIN_DOWN:

Interface Ethernet101/1/10 is down (Administratively down)

2014 Mar 12 07:12:38 Nexus_7000 %ETHPORT-5-IF_ADMIN_UP:

Interface Ethernet101/1/10 is admin up .

2014 Mar 12 07:12:38 Nexus_7000 %VSHD-5-VSHD_SYSLOG_CONFIG_I:

Configured from vty by admin on vsh.23673

2014 Mar 12 07:12:38 Nexus_7000 %EEM_ACTION-2-CRIT:

INTERFACE HAS BEEN CHANGED TO ADMIN UP
在记帐日志中，您会看到，关闭操作由admin执行，该帐户已用于登录Nexus 7000。您会看到EEM已触发，EEM的配置更改已记录为svc-isan。请参阅Nexus 7000的此记帐日志：

Wed Mar 12 07:12:37 2014:type=update:id=10.10.10.10@pts/0:user=admin:

cmd=switchto ; configure terminal ; interface Ethernet101/1/10 ;

shutdown (REDIRECT)

Wed Mar 12 07:12:37 2014:type=update:id=10.10.10.10@pts/0:user=admin:

cmd=switchto ; configure terminal ; interface Ethernet101/1/10 ;

shutdown (SUCCESS)

Wed Mar 12 07:12:38 2014:type=start:id=vsh.23673:user=svc-isan:cmd=

Wed Mar 12 07:12:38 2014:type=update:id=vsh.23673:user=svc-isan:

cmd=configure terminal ; interface Ethernet101/1/10 (SUCCESS)

Wed Mar 12 07:12:38 2014:type=update:id=vsh.23673:user=svc-isan:

cmd=configure terminal ; interface Ethernet101/1/10 ;

no shutdown (REDIRECT)

Wed Mar 12 07:12:38 2014:type=update:id=vsh.23673:user=svc-isan:

cmd=configure terminal ; interface Ethernet101/1/10 ;

no shutdown (SUCCESS)

Wed Mar 12 07:12:38 2014:type=update:id=vsh.23673:user=svc-isan:

cmd=syslog msg INTERFACE CHANGED TO ADMIN NO SHUT (SUCCESS)

Wed Mar 12 07:12:38 2014:type=update:id=vsh.23673:user=svc-isan:

cmd=syslog priority critical msg INTERFACE HAS BEEN CHANGED TO

ADMIN UP (SUCCESS)

admin

此测试是在一对Nexus 5000上使用config-sync执行的。

========================================================

在一对Nexus 5000上配置同步的预配置可在以下位置找到：配置同步操作。

此配置用于交换机配置文件：

N5K1(config-sync-sp-if)# sh switch-profile buffer

switch-profile : Test

----------------------------------------------------------

Seq-no  Command

----------------------------------------------------------

2       interface Ethernet1/8

2.1       switchport

2.2       switchport mode trunk

2.3       switchport trunk allowed vlan 1-100

2.4       shutdown
提交更改并将其推送到对等交换机。然后确认它已成功应用：

N5K1(config-sync-sp-if)# commit

Verification successful...

Proceeding to apply configuration. This might take a while depending on

amount of configuration in buffer.

Please avoid other configuration changes during this time.

Commit Successful
现在，检查N5K1上的记帐日志“test_user”，该日志是登录N5K1的用户名，其中记录了配置更改：

Thu Mar 6 08:19:22 2014:type=update:id=ppm.23742 (sp-commit):

user=test_user:cmd= configure terminal ; interface

Ethernet1/8 (SUCCESS)

Thu Mar 6 08:19:23 2014:type=update:id=ppm.23742 (sp-commit):

user=test_user:cmd= configure terminal ; interface

Ethernet1/8 (SUCCESS)

Thu Mar 6 08:19:23 2014:type=update:id=ppm.23742 (sp-commit):

user=test_user:cmd= configure terminal ; interface Ethernet1/8 ;

switchport (REDIRECT)

Thu Mar 6 08:19:23 2014:type=update:id=ppm.23742 (sp-commit):

user=test_user:cmd= configure terminal ; interface Ethernet1/8 ;

switchport (SUCCESS)

Thu Mar 6 08:19:23 2014:type=update:id=ppm.23742 (sp-commit):

user=test_user:cmd= configure terminal ; interface Ethernet1/8 ;

switchport (SUCCESS)

Thu Mar 6 08:19:23 2014:type=update:id=ppm.23742 (sp-commit):

user=test_user:cmd= configure terminal ; interface Ethernet1/8

(SUCCESS)

Thu Mar 6 08:19:23 2014:type=update:id=ppm.23742 (sp-commit):

user=test_user:cmd= configure terminal ; interface Ethernet1/8 ;

switchport mode trunk (REDIRECT)

Thu Mar 6 08:19:23 2014:type=update:id=ppm.23742 (sp-commit):

user=test_user:cmd= configure terminal ; interface Ethernet1/8 ;

switchport mode trunk (SUCCESS)

Thu Mar 6 08:19:23 2014:type=update:id=ppm.23742 (sp-commit):

user=test_user:cmd= configure terminal ; interface Ethernet1/8

(SUCCESS)

Thu Mar 6 08:19:23 2014:type=update:id=ppm.23742(sp-commit):

user=test_user:cmd= configure terminal ; interface Ethernet1/8 ;

switchport trunk allowed vlan 1-100  (REDIRECT)

Thu Mar 6 08:19:23 2014:type=update:id=ppm.23742 (sp-commit):

user=test_user:cmd= configure terminal ; interface Ethernet1/8 ;

switchport trunk allowed vlan 1-100 (SUCCESS)

Thu Mar 6 08:19:23 2014:type=update:id=ppm.23742 (sp-commit):

user=test_user:cmd= configure terminal ; interface Ethernet1/8

(SUCCESS)

Thu Mar 6 08:19:23 2014:type=update:id=ppm.23742 (sp-commit):

user=test_user:cmd= configure terminal ; interface Ethernet1/8 ;

shutdown (REDIRECT)

Thu Mar 6 08:19:23 2014:type=update:id=ppm.23742 (sp-commit):

user=test_user:cmd= configure terminal ; interface Ethernet1/8 ;

shutdown (SUCCESS)

Thu Mar 6 08:19:23 2014:type=stop:id=ppm.23742:user=test_user:

cmd=Thu Mar 6 08:19:23 2014:type=update:id=10.10.10.10@pts/1:

user=test_user:cmd= configure sync ; switch-profile Test ;

commit (SUCCESS)

Thu Mar 6 08:19:23 2014:type=update:id=10.10.10.10@pts/1:

user=test_user:cmd= configure sync ; commit (SUCCESS)
请参阅此对等Nexus 5000交换机，该交换机将配置更改从N5K1推送。记帐日志报告的时间戳与此相同，并表示“admin”已进行相同的配置更改：

Thu Mar  6 08:19:23 2014:type=update:id=ppm.21880 (sp-commit):

user=admin:cmd= configure terminal ; interface Ethernet1/8

(SUCCESS)

Thu Mar  6 08:19:23 2014:type=update:id=ppm.21880 (sp-commit):

user=admin:cmd= configure terminal ; interface Ethernet1/8

(SUCCESS)

Thu Mar  6 08:19:23 2014:type=update:id=ppm.21880 (sp-commit)

:user=admin:cmd= configure terminal ; interface Ethernet1/8 ;

switchport (REDIRECT)

Thu Mar  6 08:19:23 2014:type=update:id=ppm.21880 (sp-commit):

user=admin:cmd= configure terminal ; interface Ethernet1/8 ;

switchport (SUCCESS)

Thu Mar  6 08:19:23 2014:type=update:id=ppm.21880 (sp-commit):

user=admin:cmd= configure terminal ; interface Ethernet1/8 ;

switchport (SUCCESS)

Thu Mar  6 08:19:23 2014:type=update:id=ppm.21880 (sp-commit):

user=admin:cmd= configure terminal ; interface Ethernet1/8

(SUCCESS)

Thu Mar  6 08:19:23 2014:type=update:id=ppm.21880 (sp-commit):

user=admin:cmd= configure terminal ; interface Ethernet1/8 ;

switchport mode trunk (REDIRECT)

Thu Mar  6 08:19:23 2014:type=update:id=ppm.21880 (sp-commit):

user=admin:cmd= configure terminal ; interface Ethernet1/8 ;

switchport mode trunk (SUCCESS)

Thu Mar  6 08:19:23 2014:type=update:id=ppm.21880 (sp-commit):

user=admin:cmd= configure terminal ; interface Ethernet1/8

(SUCCESS)

Thu Mar  6 08:19:23 2014:type=update:id=ppm.21880 (sp-commit):

user=admin:cmd= configure terminal ; interface Ethernet1/8 ;

switchport trunk allowed vlan 1-100 (REDIRECT)

Thu Mar  6 08:19:23 2014:type=update:id=ppm.21880 (sp-commit):

user=admin:cmd= configure terminal ; interface Ethernet1/8 ;

switchport trunk allowed vlan 1-100 (SUCCESS)

Thu Mar  6 08:19:23 2014:type=update:id=ppm.21880 (sp-commit):

user=admin:cmd= configure terminal ; interface Ethernet1/8

(SUCCESS)

Thu Mar  6 08:19:23 2014:type=update:id=ppm.21880 (sp-commit):

user=admin:cmd= configure terminal ; interface Ethernet1/8 ;

shutdown (REDIRECT)

Thu Mar  6 08:19:23 2014:type=update:id=ppm.21880 (sp-commit):

user=admin:cmd= configure terminal ; interface Ethernet1/8 ;

shutdown (SUCCESS)