目录

简介

先决条件

要求

使用的组件

规则

背景理论

配置

网络图

配置

验证

Catalyst 2948G show命令

Catalyst 2948G-L3 show 命令

故障排除

相关信息

简介

本文档讨论并提供运行Cisco IOS®软件的Catalyst 2948G-L3交换机与运行CatalystOS的交换机（所有型号，包括Catalyst 4000、5000和600）之间快速以太网通道(FEC)和802.1Q中继的示例配置0系列交换机)。

先决条件

要求

有关支持802.1Q和ISL中继封装的Catalyst交换机的列表，请参阅实施中继的系统要求。

EtherChannel和中继的配置有某些指导原则。请参阅交换机软件的文档。例如，如果您在Catalyst 6500/6000上运行CatalystOS(CatOS)软件版本8.2.x，请参阅Catalyst 6500系列软件配置指南8.2，并仔细检查“配置以太网VLAN”中的任何配置指南和限制和配置EtherChannel部分。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 安装了CatOS 7.1.2的Catalyst 2948G（仅802.1Q）

- 安装了Cisco IOS软件版本12.0(14)W5(20)的Catalyst 2948G-L3

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文件规则的更多信息请参见“ Cisco技术提示规则”。

背景理论

使用EtherChannel可以增加带宽和冗余。EtherChannel非常方便，因为它可以扩展带宽，而不会增加设计的复杂性。生成树将EtherChannel包视为单个链路，因此不会引入环路。路由协议还将EtherChannel视为具有公共IP地址的单个路由接口。EtherChannel捆绑提供高达1600 Mbps的FEC（快速EtherChannel）、全双工或16 Gbps千兆EtherChannel(GEC)。 中继是指在二个设备之间的点到点链路上传输来自多个 VLAN 的数据流。两种中继方法是交换机间链路协议（ISL，Cisco专有协议）或802.1Q（IEEE标准）。 本文档专门讨论 802.1q 中继。

配置

在本节中，提供的配置将包括2948G-L3和CatOS交换机之间的四端口FEC和802.1Q中继。

注：要查找有关本文档中命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本文档使用以下网络设置：

配置

本文档使用以下配置：

- Catalyst 2948G

- Catalyst 2948G-L3

Catalyst 2948G

CatOS (enable) show config

This command shows non-default configurations only.

Use 'show config all' to show both default and non-default

configurations.

............

.......................

..

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Thu Nov 21 2002, 15:24:27

!

#version 7.1(2)

!

!

#system web interface version(s)

set prompt CatOS

!

#test

!

#frame distribution method

set port channel all distribution mac both

!

#ip

set interface sc0 1 10.10.10.1/255.255.255.0 10.10.10.255

set interface sl0 down

set interface me1 down

set ip alias default         0.0.0.0

set ip alias cat             10.10.10.2

!

#spantree

#vlan                         <VlanID>

!

#set boot command

set boot config-register 0x2102

clear boot system all

!

!--- Ports 2/1 to 2/4 are assigned to a port channel.

#port channel

set port channel 2/1-4 29

!

#multicast filter

set igmp filter disable

!

#module 1 : 0-port Switching Supervisor

!

!--- The trunking mode is specified as 802.1Q, because it !--- is the only encapsulation that is supported on the !--- 2948G. The mode is set to nonegotiate, because the !--- 2948G-L3 does not support Dynamic Trunking Protocol (DTP).

#module 2 : 50-port 10/100/1000 Ethernet

set trunk 2/1  nonegotiate 802.1Q 1-1005

set trunk 2/2  nonegotiate 802.1Q 1-1005

set trunk 2/3  nonegotiate 802.1Q 1-1005

set trunk 2/4  nonegotiate 802.1Q 1-1005

!--- The channel mode is set to on, because 2948G-L3 !--- does not support Port Aggregation Protocol (PAgP).

set port channel 2/1-4 mode on

end

Catalyst 2948G-L3

2948G-L3# show run

Building configuration...

Current configuration:

!

version 12.0

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 2948G-L3

!

enable secret 5 $1$bNvR$33puy1WCyrdKMvlnj61Js.

!

ip subnet-zero

!

!

!--- The logical port-channel interface must be created !--- before you put the physical interfaces into the !--- channel group.interface port-channel1.

no ip address

no ip directed-broadcast

hold-queue 300 in

!

!--- Specify the native VLAN: VLAN 1 in this example, !--- which is the default. For performance and security !--- reasons, it is recommended that you keep the user !--- traffic off of the native or management VLAN.

interface Port-channel1.1

encapsulation 802.1Q 1 native

ip address 10.10.10.2 255.255.255.0

no ip redirects

no ip directed-broadcast

!

interface Port-channel1.2

encapsulation 802.1Q 2

ip address 10.10.11.2 255.255.255.0

no ip directed-broadcast

!

!--- Specify all of the physical ports that are part !--- of the logical port channel interface.

interface FastEthernet1

no ip address

no ip directed-broadcast

channel-group 1

!

interface FastEthernet2

no ip address

no ip directed-broadcast

channel-group 1

!

interface FastEthernet3

no ip address

no ip directed-broadcast

channel-group 1

!

interface FastEthernet4

no ip address

no ip directed-broadcast

channel-group 1

!

!--- Output suppressed.

!

ip classless

!

!

line con 0

transport input none

line aux 0

line vty 0 4

password cisco

login

!

end

验证

此部分提供信息确认您的配置适当地工作。

Catalyst 2948G show命令

- show port channel — 显示EtherChannel信息。它还显示负载均衡或帧分配方案、端口和端口通道信息。

!--- Verify that the port channel is UP (connected, on) and that !--- all the physical ports are members (channel ID).

CatOS (enable) show port channel

Port  Status     Channel              Admin Ch

Mode                 Group Id

----- ---------- -------------------- ----- -----

2/1  connected  on                      29   801

2/2  connected  on                      29   801

2/3  connected  on                      29   801

2/4  connected  on                      29   801

Port  Device-ID                       Port-ID                Platform

----- ------------------------------- ---------------------- --------------

2/1  2948G-L3                        FastEthernet1          cisco Cat2948G

2/2   Not directly connected to switch

2/3  2948G-L3                        FastEthernet3          cisco Cat2948G

2/4  2948G-L3                        FastEthernet4          cisco Cat2948G

注意：端口2/2不直接连接到交换机是很正常的。在连接到路由器的交换机上show port channel命令的输出通常类似于本例。由于路由器不参与PAgP（用于协商信道），并且信道处于打开状态，因此端口使用Cisco发现协议(CDP)数据显示FEC邻居信息。Cisco IOS软件在通道接口和物理接口上发送CDP数据包。其中一个Catalyst端口可以看到多个CDP邻居，并报告未直接连接到交换机。这是表面问题，有关详细信息，请参阅Cisco Bug ID CSCdp04017(仅限注册客户)中的详细信息。

- show port channel statistics — 显示端口通道的管理组，并显示PAgP是否正在端口通道上使用。

验证链路上未使用PAgP。

CatOS (enable) show port channel status

Port  Admin   PAgP Pkts   PAgP Pkts PAgP Pkts PAgP Pkts PAgP Pkts PAgP Pkts

Group   Transmitted Received  InFlush   RetnFlush OutFlush  InError

----- ------- ----------- --------- --------- --------- --------- ---------

2/1       29           0         0         0         0         0         0

2/2       29           0         0         0         0         0         0

2/3       29           0         0         0         0         0         0

2/4       29           0         0         0         0         0         0

- show trunk — 显示中继模式、封装和本征VLAN。

检验物理接口和端口通道接口上是否启用了中继。此外，验证中继模式是否已正确设置为nonegotiate。

注意：在802.1Q中继上，本征VLAN必须在两端匹配。

CatOS (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

2/1      nonegotiate  802.1Q          trunking      1

2/2      nonegotiate  802.1Q          trunking      1

2/3      nonegotiate  802.1Q          trunking      1

2/4      nonegotiate  802.1Q          trunking      1

Port      Vlans allowed on trunk

--------  -----------------------------------------------------------------

2/1      1-1005

2/2      1-1005

2/3      1-1005

2/4      1-1005

Port      Vlans allowed and active in management domain

--------  -----------------------------------------------------------------

2/1      1

2/2      1

2/3      1

2/4      1

Port      Vlans in spanning tree forwarding state and not pruned

--------  -----------------------------------------------------------------

2/1      1

2/2      1

2/3      1

2/4      1

Catalyst 2948G-L3 show 命令

- show interfaces port-channel 1 — 提供端口通道的状态和端口通道组的成员端口。

检验属于EtherChannel的所有物理接口是否都可视为成员。

2948G-L3# show interfaces port-channel 1

Port-channel1 is up, line protocol is up

Hardware is FEChannel, address is 0008.a308.1c07 (bia 0000.0000.0000)

MTU 1500 bytes, BW 400000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation ARPA, loopback not set, keepalive set (10 sec)

Half-duplex, Unknown Speed, Media type unknown

ARP type: ARPA, ARP Timeout 04:00:00

No. of active members in this channel: 4

Member 0 : FastEthernet2

Member 1 : FastEthernet1

Member 2 : FastEthernet4

Member 3 : FastEthernet3

Last input 00:00:00, output 00:00:55, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/300, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

596128 packets input, 50714549 bytes, 0 no buffer

Received 7 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

0 watchdog, 0 multicast

0 input packets with dribble condition detected

44294 packets output, 17498215 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

- show cdp neighbor — 列出通过CDP发现的所有直连Cisco设备。

检验另一端的交换机是否通过所有物理端口可见。

2948G-L3# show cdp neighbor

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater

Device ID        Local Intrfce     Holdtme    Capability  Platform  Port ID

JAB032400H2      Port-channel1.1    126         T S       WS-C2948  2/3

JAB032400H2      Port-channel1.1    124         T S       WS-C2948  2/4

JAB032400H2      Port-channel1.1    123         T S       WS-C2948  2/1

JAB032400H2      Port-channel1.1    123         T S       WS-C2948  2/2

故障排除

目前没有针对此配置的故障排除信息。

相关信息

- 在 CatOS 交换机与外部路由器之间配置 ISL 与 802.1q Trunking（VLAN 间路由）

- Catalyst 2948G-L3 配置示例 - 单 VLAN，多个VLAN和连接到网络核心的多个VLAN的分配层

- Catalyst 2948g-L3/4908g-L3 系列交换机硬件故障排除

- LAN 产品支持

- LAN 交换技术支持

- 技术支持和文档 - Cisco Systems