目录

简介

先决条件

要求

使用的组件

相关产品

规则

背景信息

配置

网络图

Cisco IOS 配置

CatOS 配置

验证

故障排除

由于 Polycom IP 电话造成的生成树环路

相关信息

简介

本文档提供Catalyst交换机上的配置示例，以连接到Polycom IP会议站7935/7936和Polycom SoundPoint IP 430。本文档不包括电源内联和服务质量(QoS)配置。

先决条件

要求

尝试进行此配置之前，请确保满足以下要求：

- IP 电话配置

有关详细信息，请参阅 Cisco IP Conference Station 7935 快速入门指南或 Cisco Unified IP Conference Station 7936 电话指南。

- 虚拟 LAN 配置

有关更多信息，请参阅VLAN 中继协议 (VLANs/VTP) - 简介。

使用的组件

本文档中的信息基于以下配置：Cisco Catalyst 6500 系列交换机，带 Supervisor 引擎 720，运行 Cisco IOS® 软件版本 12.2(18)SXD6；Cisco Catalyst 6500 系列交换机，带 Supervisor 引擎 2，运行 Cisco CatOS 软件版本 8.4(4)。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

相关产品

此配置也可用于运行 Cisco IOS 软件的 Cisco Catalyst 交换机，但不包括 Cisco 2900XL 和 3500XL 系列。CatOS 配置可用于任何运行 Catalyst OS 软件的 Cisco Catalyst 交换机。

规则

有关文档约定的更多信息，请参考 Cisco 技术提示约定。

背景信息

本文说明在交换机端口上连接 PC 和 IP 电话 Polycom SoundPoint IP 430 的交换机配置。本文还说明了连接到 Polycom IP Conference Station 7935/7936 交换机端口的交换机配置。

Polycom IP Conference Station 7935/7936 具有通过 RJ-45 电缆接口连接到网络的单路 10/100BaseTx 以太网 LAN 连接，与其他 Cisco Unified IP 电话 7900 系列不同，它没有用于连接到 PC 的 10/100BaseTx 以太网 LAN 连接。

由于 Cisco 7935/7936 IP 会议电话没有提供连接到 PC 的 10/100BaseTx 以太网 LAN 连接，所以无法直接应用语音或辅助 VLAN，这可能会导致问题。Cisco IP Conference Station 7935/7936 提供的单路 10/100BaseTx 以太网 LAN 连接用于将此设备连接到交换机端口。由于此连接只传输语音通信，所以交换机端口应属于单个 VLAN。

Polycom SoundPoint IP 430 具有双路 10/100 Mbps 以太网端口。一个端口连接到交换机，另一个端口连接到 PC。在此连接中，端口传输这两个 VLAN 的通信：

- 数据 (PC) 通信

- 语音（IP 电话）通信

在此方案中，您需要中继端口以传输多个 VLAN 的通信。

注：Polycom IP Conference Station 7935/7936没有外部电源，因此交换机必须通过其PoE端口供电，或者需要使用单独的馈电器。

配置

本部分提供有关如何配置本文档所述功能的信息。

注意：要获取有关本部分中所使用命令的更多信息，可使用命令查找工具（仅限已注册客户）。

网络图

本文档使用以下网络设置：

Cisco IOS 配置

本文档使用以下配置：

- Catalyst 6500

使用本地 Cisco IOS 模式的 Catalyst 6500

Cat6500#show running-config

Building configuration...

Current configuration : 5869 bytes

!

version 12.1

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname cat6500

!

boot system sup-bootflash:s72033-psv-mz.122-18.SXD6.bin

main-cpu

auto-sync standard

ip subnet-zero

!

!

no ip finger

!

!

!

!

vlan 1

name DataVlan

!

vlan 2

name VoiceVlan

!

interface FastEthernet4/1

no ip address

switchport

switchport trunk encapsulation dot1q

switchport trunk native vlan 1

switchport trunk allowed vlan 1,2

switchport mode trunk

spanning-tree portfast

!--- Use PortFast only when you connect a single end station to a !--- Layer 2 access port. Otherwise, you create a network loop. !--- Refer to Using Portfast and Other Commands to Fix Workstation Startup !--- Connectivity Delays for more information on how to enable portfast.

!

interface FastEthernet4/2

no ip address

switchport

switchport access vlan 2

switchport mode access

spanning-tree portfast

!--- Use PortFast only when you connect a single end station to a Layer 2 access port. Otherwise, you create a network loop.

!

interface FastEthernet4/3

no ip address

shutdown

!

!--- Output suppressed.

!

ip classless

no ip http server

!

!

!

line con 0

transport input none

line vty 0 4

!

end

CatOS 配置

本例说明在交换机端口上以混合模式连接 PC 和 IP 电话 Polycom SoundPoint IP 430 的交换机配置。本文还说明了连接到 Polycom IP Conference Station 7935/7936 交换机端口的交换机配置。此配置使用与前例相同的图表。

使用混合模式的 Catalyst 6500

!--- Set the VLAN Trunk Protocol (VTP) mode. !--- In this example, the mode is set to transparent. !--- Dependent upon your network, set the VTP mode accordingly. !--- Refer to Understanding and Configuring VLAN Trunk Protocol (VTP) !--- for more information on VTP.

Catalyst6500> (enable) set vtp mode transparent

VTP domain modified

!--- Add VLAN 2. VLAN 1 already exists by default.

Catalyst6500> (enable) set vlan 2

VLAN 2 configuration successful

!--- Add port 4/2 to VLAN 2.

Catalyst6500> (enable) set vlan 2 4/2

VLAN 2 modified.

VLAN 1 modified.

VLAN  Mod/Ports

---- -----------------------

2     4/2

!--- Enable trunking on port 4/1.

Catalyst6500> (enable) set trunk 4/1 1,2 dot1q on

Vlan(s) 1,2 already allowed on the trunk

Please use the 'clear trunk' command to remove vlans from allowed list.

Port(s)  4/1 trunk mode set to on.

Port(s)  4/1 trunk type set to dot1q.

Catalyst6500> (enable)

!--- Enable spanning tree portfast on the ports. Refer to !--- Using Portfast and Other Commands to Fix Workstation Startup Connectivity Delays !--- for more information on how to enable portfast.

Catalyst6500> (enable) set spantree portfast 4/1 enable

Warning: Connecting Layer 2 devices to a fast start port can cause

temporary spanning tree loops. Use with caution.

Spantree port  4/1 fast start enabled.

Catalyst6500> (enable) set spantree portfast 4/2 enable

Warning: Connecting Layer 2 devices to a fast start port can cause

temporary spanning tree loops. Use with caution.

Spantree port  4/2 fast start enabled.

Catalyst6500> (enable)

!--- If you want to ONLY allow VLAN 1 and VLAN 2 on trunk port 4/1, do this. !--- A trunk port allows all VLANs by default.

Catalyst6500> (enable) show trunk 4/1

* - indicates vtp domain mismatch

# - indicates dot1q-all-tagged enabled on the port

$ - indicates non-default dot1q-ethertype value

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

4/1      on           dot1q          not-trunking  1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

4/1      1-4094

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

4/1      1

Port      Vlans in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

4/1

Catalyst6500> (enable) clear trunk 4/1 1-4094

Removing Vlan(s) 1-4094 from allowed list.

Port  4/1 allowed vlans modified to none.

!--- Allow only VLAN 1 and VLAN 2 on trunk port 4/1.

Catalyst6500> (enable) set trunk 4/1 1,2 dot1q on

Adding vlans 1,2 to allowed list.

Port(s)  4/1 allowed vlans modified to 1,2.

Port(s)  4/1 trunk mode set to on.

Port(s)  4/1 trunk type set to dot1q.

Catalyst6500> (enable) show trunk 4/1

* - indicates vtp domain mismatch

# - indicates dot1q-all-tagged enabled on the port

$ - indicates non-default dot1q-ethertype value

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

4/1      on           dot1q          not-trunking  1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

4/1      1,2

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

4/1      1

Port      Vlans in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

4/1

!--- Refer to Configuring Ethernet VLAN Trunks for more !--- information on how to configure trunk ports.

!--- Issue the show config

command !--- in order to check the configuration.

Catalyst6500> (enable) show config 4

This command shows non-default configurations only.

Use 'show config <mod> all' to show both default and non-default configurations.

.................................

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Thu Jun 21 2007, 23:37:51

!

# default port status is enable

!

!

#module 4 : 16-port 1000BaseX Ethernet

set vlan 2    4/2

clear trunk 4/1  1-9,11-39,41-4094

set trunk 4/1  on dot1q 1,2

set spantree portfast    4/1-2 enable

end

Catalyst6500> (enable)

验证

当前没有可用于此配置的验证过程。

故障排除

本部分提供了可用于对配置进行故障排除的信息。

由于 Polycom IP 电话造成的生成树环路

将 IP 电话连接到交换机时，将出现 STP 环路，这会造成交换机 CPU 的满负荷使用。即使在连接 IP 电话的交换机端口上启用了 portfast 也会出现 STP 环路。

1. 检查交换机端口配置。如果连接 IP 电话的端口进入了 err-disabled 状态，并且不存在物理环路，则可以尝试将端口从 err-disabled 状态中恢复。有关详细信息，请参阅 Cisco IOS 平台上的 Errdisable 端口状态恢复。

2. 存在终端用户可能会错误造成物理环路的风险时，为避免端口进入 err-disabled 状态，您可以启用 err-disable 恢复，因而无需手动重置禁用的端口。有关 STP 环路防护的详细信息，请参阅使用环路防护和 BPDU 迟滞检测功能的生成树协议增强功能。

相关信息

- 配置 IOS Catalyst 交换机连接 Cisco IP 电话配置示例

- 了解 Cisco IP 电话 10/100 以太网内联电源检测算法

- 了解 Catalyst 6500/6000 交换机上的 IP 电话内置电源供应

- LAN 产品支持

- LAN 交换技术支持

- 技术支持和文档 - Cisco Systems