目录

简介

先决条件

要求

使用的组件

规则

背景信息

配置

网络图

配置

验证

Catalyst 2948G-L3 show 命令

Catalyst 6500 show 命令

故障排除

命令汇总

相关信息

简介

本文档提供在运行 Catalyst OS (CatOS) 的 Catalyst 6500 系列交换机与 Catalyst 2948G-L3 交换机之间配置 IEEE 802.1Q 中继的示例。本文档包含 Catalyst 2948G-L3 作为核心交换机以及 Catalyst 6500 作为接入层交换机的示例网络。简要描述 802.1q 中继机制之后，接着描述了如何在 Catalyst 6500 交换机和 Catalyst 2948G-L3 交换机上进行配置。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 运行Cisco IOS®软件版本12.0(18)W5(22b)的Catalyst 2948G-L3交换机路由器

- 运行 CatOS 8.5 软件的 Catalyst 6500 系列交换机

规则

有关文档约定的更多信息，请参考 Cisco 技术提示约定。

背景信息

中继是指在二个设备之间的点到点链路上传输来自多个 VLAN 的数据流。两种中继方法分别为：交换机间链路 (ISL) 协议（Cisco 专有协议）和 802.1Q（IEEE 标准）。 本文档专门讨论 802.1q 中继。在本示例中，Catalyst 6500 中的 VLAN 通过 802.1Q 中继链路扩展成 Catalyst 2948G-L3。

Catalyst 2948G-L3 是运行 Cisco IOS 的路由器，并且默认情况下所有接口都是路由接口。您必须使用网桥组才能在Catalyst 2948G-L3上使用VLAN的概念。每个网桥组都被视为一个单独的VLAN。这些网桥组对应于所连接交换机的 VLAN 编号。为了支持 Catalyst 2948G-L3 上的 VLAN 间路由，请对集成的路由和桥接 (IRB) 及网桥虚拟接口 (BVI) 进行配置，以在不同的 VLAN 之间路由 IP。

Catalyst 2948G-L3 不支持几种面向第 2 层的协议，例如虚拟终端协议 (VTP)、分布式诊断和服务网络 (DDSN) 传输协议 (DTP) 以及端口聚合协议 (PAgP)。 Catalyst 2948G-L3 Cisco IOS 软件版本 12.0(7)W5(15d) 和早期版本不支持 802.1Q 子接口上的桥接。

Catalyst 2948G-L3 已停产 (EoL)。 有关信息及推荐的替代产品，请参阅 Cisco Catalyst 2948G-L3 和 4908G-L3 交换机的 EoL/EoS。

配置

在本示例中，Catalyst 2948G-L3 作为 VLAN 间路由器部署。Catalyst 6500 运行 CatOS 并且使用 802.1Q 中继链路连接到 Catalyst 2948G-L3 交换机。Catalyst 6500配置为具有两个VLAN（20和30）的接入层交换机。这两个VLAN之间的路由由Catalyst 2948G-L3提供。Catalyst 6500和Catalyst 2948G之间的802.1Q中继配置本文档介绍Catalyst 2948G-L3交换机上的L3和VLAN间路由配置。

本部分提供有关如何配置本文档所述功能的信息。

注意：使用命令查找工具(仅限注册客户)可获取有关本节中使用的命令的详细信息。

网络图

本文档使用以下网络设置：

配置

本文档使用以下配置：

- Catalyst 6500

- Catalyst 2948G-L3

Catalyst 6500

Current configuration:

!

version 8.1

!

hostname 6500

!

Catalyst 6500(enable)#

set vtp mode transparent

!--- In this example, the VTP mode is set to be transparent. !--- Set the VTP mode accordingly. This depends on your network.

!

#module 3 : 48-port 10/100BaseTX Ethernet

set vlan 20 3/20

set vlan 30 3/40

!--- The ports are assigned to the single VLAN and are !--- used as access ports.

set trunk 3/30 nonegotiate dot1q

!--- Port 3/30 is configured as dot1q trunk port and !--- the trunk mode is set to nonegotiate. !--- Trunk mode should be nonegotiate because 2948G-L3 does not support DTP.

set port enable 3/20,3/30,3/40

!--- Use the set port enable command !--- to enable a port or a range of ports.

!--- Output is suppressed.

Catalyst 2948G-L3

Current configuration:

!

version 12.0

hostname 2948G-L3

!

interface FastEthernet 20

no ip address

no ip directed-broadcast

bridge-group 20

!--- The bridge-group 20 command adds the !--- Fast Ethernet 20 interface to bridge group 20.

interface FastEthernet 40

no ip address

no ip directed-broadcast

bridge-group 30

!--- The bridge-group 30 command adds the !--- Fast Ethernet 40 interface to bridge group 30.

!

interface Fast Ethernet 30

no ip address

no ip redirects

no ip directed-broadcast

int fast ethernet 30.1

encapsulation dot1q 30

bride-group 30

exit

int fast ethernet 30.2

encapsulation dot1q 20

bridge-group 20

exit

int fast ethernet 30.3

encapsultion dot1q 1 native

bridge-group 1

exit

!--- Fast Ethernet 30 acts as a trunk port that carries VLANs 30 and 20. !--- Subinterfaces that belong to the same VLAN (network or subnet) must !--- be configured to belong to the same bridge group.

!--- VLAN 1 is the native VLAN by default.

bridge irb

!--- The bridge irb command enables IRB on !--- the router, which allows you to route traffic within the bridge groups.

bridge 30 protocol ieee

bridge 20 protocol ieee

!--- Choose IEEE as the Spanning Tree Protocol (STP).

bridge 30 route ip

bridge 20 route ip

!--- The bridge number route ip command allows you !--- to route IP traffic between the BVI interface !--- and the other IP interfaces on the router.

interface bvi 20

ip address 192.168.20.1 255.255.255.0

exit

interface bvi 30

ip address 192.168.30.1 255.255.255.0

exit

!--- Creates BVI interfaces for bridges 20 and 30. These interfaces act !--- as the gateway for VLANs 20 and 30.

!--- Output is suppressed.

注意：Catalyst 2948G-L3上10/100接口上的四个相邻端口（如f1到f4或f45到f48）都必须使用相同的VLAN封装。VLAN 封装为 ISL 或 802.1Q。

验证

使用本部分可确认配置能否正常运行。

命令输出解释程序（仅限注册用户）(OIT) 支持某些 show 命令。使用 OIT 可查看对 show 命令输出的分析。

Catalyst 2948G-L3 show 命令

- 2948G-L3#show vlan

virtual LAN ID:  30 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface:   FastEthernet30.1

This is configured as native Vlan for the following interface(s) :

FastEthernet30

Protocols Configured:   Address:              Received:        Transmitted:

Bridging        Bridge Group 20                 1                   0

Virtual LAN ID:  20 (IEEE 802.1Q Encapsulation)

vLAN Trunk Interface:   FastEthernet30.2

Protocols Configured:   Address:              Received:        Transmitted:

Bridging        Bridge Group 30               921                   0

- 2948G-L3#show bridge 20

Total of 300 station blocks, 298 free

Codes: P - permanent, S - self

Bridge Group 20:

Address       Action    Interface

0009.11b9.1a75    forward   Fa30.2

Catalyst 6500 show 命令

- show trunk - 此命令验证中继配置，如以下输出所显示：

Console> (enable) show trunk 3/30

* - indicates vtp domain mismatch

# - indicates dot1q-all-tagged enabled on the port

$ - indicates non-default dot1q-ethertype value

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

3/30     nonegotiate  dot1q          trunking      1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

3/30     1-1005,1025-4094

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

3/30     1,20,30

- show VLAN - 此命令显示匹配相应 VLAN 的端口：

VLAN Name                             Status    IfIndex Mod/Ports, Vlans

---- -------------------------------- --------- ------- ------------------------

1    default                          active    6       1/1-2

3/1-19,3/21-39,3/41-48

20   VLAN0020                         active    71      3/20

30   VLAN0030                         active    69      3/40

1002 fddi-default                     active    7

1003 token-ring-default               active    10

1004 fddinet-default                  active    8

1005 trnet-default                    active    9

故障排除

本部分提供的信息可用于对配置进行故障排除。

命令输出解释程序（仅限注册用户）(OIT) 支持某些 show 命令。使用 OIT 可查看对 show 命令输出的分析。

注意：在使用debug命令之前，请参阅有关Debug命令的重要信息。

PC2#ping 192.168.20.3

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.20.3, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/4 ms

PC1#ping 192.168.30.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.30.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/4 ms

PC1#ping 192.168.20.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.20.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/4 ms

命令汇总

- set interface

- set trunk

- set vlan

- show interface

- show port

- show port capabilities

- show trunk

- show vtp domain

相关信息

- 在 Catalyst 2948G-L3 与基于 CatOS 的交换机之间配置 EtherChannel 和 802.1Q 中继

- 在运行CatOS和Cisco IOS系统软件的Catalyst交换机之间的802.1q中继

- Catalyst 2948G-L3 示例配置

- 交换机产品支持

- LAN 交换技术支持

- 技术支持和文档 - Cisco Systems