目录

简介

先决条件

要求

使用的组件

背景信息

配置

配置示例1:队列带宽

配置示例2:带宽和缓冲区

验证

故障排除

简介

本文档介绍如何在Cisco Catalyst 6800ia主机端口上配置、验证服务质量(QoS)并对其进行故障排除。Catalyst 6800父虚拟交换系统(VSS)上Cisco IOS®软件版本152.1.SY及更高版本的6800ia主机端口支持QoS。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- Cisco IOS®软件版本152.1.SY

- Cisco Catalyst 6800父VSS

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

背景信息

Catalyst 6800ia的配置模式已禁用，所有6800ia主机端口的QoS配置必须从父端完成。6800ia主机端口的QoS配置了策略映射。应用到接口时，此策略映射将相关配置内部推送到6800ia，然后对硬件队列进行编程。

6800ia主机端口在传输(TX)方向具有1p3q3t架构。本文档中的所有配置示例仅适用于6800ia上的TX队列。

当6800ia接口上没有默认状态的显式QoS配置时，6800ia主机接口的输出可能与以下示例输出类似：

6880-VSS#show run int gi101/1/0/1

interface GigabitEthernet101/1/0/1

switchport

switchport trunk allowed vlan 500

switchport mode access

switchport access vlan 500

load-interval 30

end

6880-VSS#show queueing interface gi101/1/0/1

Interface GigabitEthernet101/1/0/1 queueing strategy:  Weighted Round-Robin

Port QoS is disabled globally

Queueing on Gi101/1/0/1: Tx Enabled Rx Disabled

Trust boundary disabled

Trust state: trust DSCP

Trust state in queueing: trust DSCP

Default COS is 0

Queueing Mode In Tx direction: mode-dscp

Transmit queues [type = 1p3q3t]:

Queue Id    Scheduling  Num of thresholds

-----------------------------------------

1         Priority            3

2         WRR                 3

3         WRR                 3

4         WRR                 3

WRR bandwidth ratios:  100[queue 2] 100[queue 3] 100[queue 4]   0[queue 5]

queue-limit ratios:     15[Pri Queue]  25[queue 2]  40[queue 3]  20[queue 4]

queue thresh dscp-map

---------------------------------------

1     1      32 33 40 41 42 43 44 45 46 47

1     2

1     3

2     1      16 17 18 19 20 21 22 23 26 27 28 29 30 31 34 35 36 37 38 39

2     2      24

2     3      48 49 50 51 52 53 54 55 56 57 58 59 60 61 62 63

3     1      25

3     2

3     3      0 1 2 3 4 5 6 7

4     1      8 9 11 13 15

4     2      10 12 14

4     3

配置

配置示例1:队列带宽

此示例显示如何为6800ia TX队列配置带宽：

1. 配置类映射以对所关注的流量进行分类：
class-map type lan-queuing match-any ltest

match dscp 32

class-map type lan-queuing match-any ltest1

match dscp 24

class-map type lan-queuing match-any ltest2

match dscp default

2. 为已配置的类分配优先级和带宽：
policy-map type lan-queuing ltest

class type lan-queuing ltest

priority

class type lan-queuing ltest1

bandwidth remaining percent 30

class type lan-queuing ltest2

bandwidth remaining percent 20

class class-default

3. 将策略映射应用到有问题的6800ia接口：
注意：当您将lan排队策略映射应用到6800ia堆叠上的一个端口时，它会将更改传播到堆叠中的所有端口。

6880-VSS#conf t

6880-VSS(config)#int gi101/1/0/1

6880-VSS(config-if)#service-policy type lan-queuing output ltest

Propagating [attach] lan queueing policy "ltest" to Gi101/1/0/1 Gi101/1/0/2 Gi101/1/0/3

Gi101/1/0/4 Gi101/1/0/5 Gi101/1/0/6 Gi101/1/0/7 Gi101/1/0/8 Gi101/1/0/9 Gi101/1/0/10

Gi101/1/0/12 Gi101/1/0/13 Gi101/1/0/14 Gi101/1/0/15 Gi101/1/0/16 Gi101/1/0/17

Gi101/1/0/18 Gi101/1/0/19 Gi101/1/0/20 Gi101/1/0/21 Gi101/1/0/22 Gi101/1/0/23

Gi101/1/0/24 Gi101/1/0/25 Gi101/1/0/26 Gi101/1/0/27 Gi101/1/0/28 Gi101/1/0/29

Gi101/1/0/30 Gi101/1/0/31 Gi101/1/0/32 Gi101/1/0/33 Gi101/1/0/34 Gi101/1/0/35

Gi101/1/0/36 Gi101/1/0/37 Gi101/1/0/38 Gi101/1/0/39 Gi101/1/0/40 Gi101/1/0/41

Gi101/1/0/42 Gi101/1/0/43 Gi101/1/0/44 Gi101/1/0/45 Gi101/1/0/46 Gi101/1/0/47 Gi101/1/0/48

Propagating [attach] lan queueing policy "ltest" to Gi101/2/0/1 Gi101/2/0/2

Gi101/2/0/3 Gi101/2/0/4 Gi101/2/0/5 Gi101/2/0/6 Gi101/2/0/7 Gi101/2/0/8

Gi101/2/0/9 Gi101/2/0/10 Gi101/2/0/11 Gi101/2/0/12 Gi101/2/0/13 Gi101/2/0/14

Gi101/2/0/15 Gi101/2/0/16 Gi101/2/0/17 Gi101/2/0/18 Gi101/2/0/19 Gi101/2/0/20

Gi101/2/0/21 Gi101/2/0/22 Gi101/2/0/23 Gi101/2/0/24 Gi101/2/0/25 Gi101/2/0/26

Gi101/2/0/27 Gi101/2/0/28 Gi101/2/0/29 Gi101/2/0/30 Gi101/2/0/31 Gi101/2/0/32

Gi101/2/0/33 Gi101/2/0/34 Gi101/2/0/35 Gi101/2/0/36 Gi101/2/0/37 Gi101/2/0/38

Gi101/2/0/39 Gi101/2/0/40 Gi101/2/0/41 Gi101/2/0/42 Gi101/2/0/43 Gi101/2/0/44

Gi101/2/0/45 Gi101/2/0/46 Gi101/2/0/47 Gi101/2/0/48

Propagating [attach] lan queueing policy "ltest" to Gi101/3/0/1 Gi101/3/0/2

Gi101/3/0/3 Gi101/3/0/4 Gi101/3/0/5 Gi101/3/0/6 Gi101/3/0/7 Gi101/3/0/8

Gi101/3/0/9 Gi101/3/0/10 Gi101/3/0/11 Gi101/3/0/12 Gi101/3/0/13 Gi101/3/0/14

Gi101/3/0/15 Gi101/3/0/16 Gi101/3/0/17 Gi101/3/0/18 Gi101/3/0/19 Gi101/3/0/20

Gi101/3/0/21 Gi101/3/0/22 Gi101/3/0/23 Gi101/3/0/24 Gi101/3/0/25 Gi101/3/0/26

Gi101/3/0/27 Gi101/3/0/28 Gi101/3/0/29 Gi101/3/0/30 Gi101/3/0/31 Gi101/3/0/32

Gi101/3/0/33 Gi101/3/0/34 Gi101/3/0/35 Gi101/3/0/36 Gi101/3/0/37 Gi101/3/0/38

Gi101/3/0/39 Gi101/3/0/40 Gi101/3/0/41 Gi101/3/0/42 Gi101/3/0/43 Gi101/3/0/44

Gi101/3/0/45 Gi101/3/0/46 Gi101/3/0/47 Gi101/3/0/48

Propagating [attach] lan queueing policy "ltest" to Gi101/4/0/1 Gi101/4/0/2

Gi101/4/0/3 Gi101/4/0/4 Gi101/4/0/5 Gi101/4/0/6 Gi101/4/0/7 Gi101/4/0/8

Gi101/4/0/9 Gi101/4/0/10 Gi101/4/0/11 Gi101/4/0/12 Gi101/4/0/13 Gi101/4/0/14

Gi101/4/0/15 Gi101/4/0/16 Gi101/4/0/17 Gi101/4/0/18 Gi101/4/0/19 Gi101/4/0/20

Gi101/4/0/21 Gi101/4/0/22 Gi101/4/0/23 Gi101/4/0/24 Gi101/4/0/25 Gi101/4/0/26

Gi101/4/0/27 Gi101/4/0/28 Gi101/4/0/29 Gi101/4/0/30 Gi101/4/0/31 Gi101/4/0/32

Gi101/4/0/33 Gi101/4/0/34 Gi101/4/0/35 Gi101/4/0/36 Gi101/4/0/37 Gi101/4/0/38

Gi101/4/0/39 Gi101/4/0/40 Gi101/4/0/41 Gi101/4/0/42 Gi101/4/0/43 Gi101/4/0/44

Gi101/4/0/45 Gi101/4/0/46 Gi101/4/0/47 Gi101/4/0/48

6880-VSS(config-if)#

6880-VSS(config-if)#end

4. 验证是否应用了策略映射：
6880-VSS#show run int gi101/1/0/1

interface GigabitEthernet101/1/0/1

switchport

switchport trunk allowed vlan 500

switchport mode access

switchport access vlan 500

load-interval 30

service-policy type lan-queuing output ltest

end

5. 检查类映射到队列映射、带宽和缓冲区分配，以及队列到差分服务代码点(DSCP)映射：
6880-VSS#show queueing int gi101/1/0/1

Interface GigabitEthernet101/1/0/1 queueing strategy:  Weighted Round-Robin

Port QoS is disabled globally

Queueing on Gi101/1/0/1: Tx Enabled Rx Disabled

Trust boundary disabled

Trust state: trust DSCP

Trust state in queueing: trust DSCP

Default COS is 0

Class-map to Queue in Tx direction

Class-map           Queue Id

----------------------------

ltest                     1

ltest1                    4

ltest2                    3

class-default             2

Queueing Mode In Tx direction: mode-dscp

Transmit queues [type = 1p3q3t]:

Queue Id    Scheduling  Num of thresholds

-----------------------------------------

1         Priority            3

2         WRR                 3

3         WRR                 3

4         WRR                 3

WRR bandwidth ratios:   50[queue 2]  20[queue 3]  30[queue 4]

queue-limit ratios:     15[Pri Queue] 100[queue 2] 100[queue 3] 100[queue 4]

queue thresh dscp-map

---------------------------------------

1     1      32

1     2

1     3

2     1      1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22

23 25 26 27 28 29 30 31 33 34 35 36 37 38 39 40 41 42 43

44 45 46 47 48 49 50 51 52 53 54 55 56 57 58 59 60 61 62 63

2     2

2     3

3     1      0

3     2

3     3

4     1      24

4     2

4     3

6. 从6800ia对缓冲区和带宽分配进行双检查：
注意：如果不指定某个类的缓冲区权重，则默认为100%。

队列 1:15 / [15+100+100+100] = 4

队列 2:100 / [15+100+100+100] ~ 31

对于其他队列，也会得出权重。

6880-VSS#remote command fex 101 show mls qos int gi1/0/1 buffer

GigabitEthernet1/0/1

The port is mapped to qset : 1

The allocations between the queues are : 4 31 31 34

6880-VSS#remote command fex 101 show mls qos int gi1/0/1 queueing

GigabitEthernet1/0/1

Egress Priority Queue : enabled

Shaped queue weights (absolute) :  0 0 0 0

Shared queue weights  :  0 127 51 76

The port bandwidth limit : 100  (Operational Bandwidth:100.0)

The port is mapped to qset : 1

7. 验证相关流量是否在各自的队列中入队，以及是否存在丢弃：
6880-VSS#remote command fex 101 show mls qos int gi1/0/1 statistic

GigabitEthernet1/0/1 (All statistics are in packets)

dscp: incoming

-------------------------------

0 -  4 :           0            0            0            0            0

5 -  9 :           0            0            0            0            0

10 - 14 :           0            0            0            0            0

15 - 19 :           0            0            0            0            0

20 - 24 :           0            0            0            0            0

25 - 29 :           0            0            0            0            0

30 - 34 :           0            0            0            0            0

35 - 39 :           0            0            0            0            0

40 - 44 :           0            0            0            0            0

45 - 49 :           0            0            0           13            0

50 - 54 :           0            0            0            0            0

55 - 59 :           0            0            0            0            0

60 - 64 :           0            0            0            0

dscp: outgoing

-------------------------------

0 -  4 :           0            0            0            0            0

5 -  9 :           0            0            0            0            0

10 - 14 :           0            0            0            0            0

15 - 19 :           0            0            0            0            0

20 - 24 :           0            0            0            0      9118500

25 - 29 :           0            0            0            0            0

30 - 34 :           0            0       516236            0            0

35 - 39 :           0            0            0            0            0

40 - 44 :           0            0            0            0            0

45 - 49 :           0            0            0           20            0

50 - 54 :           0            0            0            0            0

55 - 59 :           0            0            0            0            0

60 - 64 :           0            0            0            0

cos: incoming

-------------------------------

0 -  4 :         106            0            0            0            0

5 -  7 :           0            0            0

cos: outgoing

-------------------------------

0 -  4 :          41            0            0      9118505       516236

5 -  7 :           0            0            0

output queues enqueued:

queue:    threshold1   threshold2   threshold3

-----------------------------------------------

queue 0:      516255          35           5

queue 1:          12           0           0

queue 2:           0           0           0

queue 3:     9118520           0           0

output queues dropped:

queue:    threshold1   threshold2   threshold3

-----------------------------------------------

queue 0:           0           0           0

queue 1:           0           0           0

queue 2:           0           0           0

queue 3:       49823            0           0

Policer: Inprofile:            0 OutofProfile:            0

配置示例2:带宽和缓冲区

此示例显示如何为6800ia TX队列配置带宽和缓冲区：

1. 在示例1中创建的策略映射中，可以指定队列缓冲区分配，如本示例所示：
注意：如果不指定某个类的缓冲区权重，则默认为100%。

policy-map type lan-queuing ltest

class type lan-queuing ltest

priority

queue-buffers ratio 15

class type lan-queuing ltest1

bandwidth remaining percent 30

queue-buffers ratio 30

class type lan-queuing ltest2

bandwidth remaining percent 20

queue-buffers ratio 40

class class-default

queue-buffer ratio 15

2. 检查类映射到队列映射、带宽和缓冲区分配以及队列到DSCP映射：
6880-VSS#sh queueing int gi101/1/0/1

Interface GigabitEthernet101/1/0/1 queueing strategy:  Weighted Round-Robin

Port QoS is disabled globally

Queueing on Gi101/1/0/1: Tx Enabled Rx Disabled

Trust boundary disabled

Trust state: trust DSCP

Trust state in queueing: trust DSCP

Default COS is 0

Class-map to Queue in Tx direction

Class-map           Queue Id

----------------------------

ltest                     1

ltest1                    4

ltest2                    3

class-default             2

Queueing Mode In Tx direction: mode-dscp

Transmit queues [type = 1p3q3t]:

Queue Id    Scheduling  Num of thresholds

-----------------------------------------

1         Priority            3

2         WRR                 3

3         WRR                 3

4         WRR                 3

WRR bandwidth ratios:   50[queue 2]  20[queue 3]  30[queue 4]

queue-limit ratios:     15[Pri Queue]  15[queue 2]  40[queue 3]  30[queue 4]

queue thresh dscp-map

---------------------------------------

1     1      32

1     2

1     3

2     1      1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21

22 23 25 26 27 28 29 30 31 33 34 35 36 37 38 39 40 41

42 43 44 45 46 47 48 49 50 51 52 53 54 55 56 57 58 59 60 61 62 63

2     2

2     3

3     1      0

3     2

3     3

4     1      24

4     2

4     3

3. 从6800ia对缓冲区和带宽分配进行双检查：
6880-VSS#remote command fex 101 sh mls qos int gi1/0/1 queueing

GigabitEthernet1/0/1

Egress Priority Queue : enabled

Shaped queue weights (absolute) :  0 0 0 0

Shared queue weights  :  0 127 51 76

The port bandwidth limit : 100  (Operational Bandwidth:100.0)

The port is mapped to qset : 1

6880-VSS#remote command fex 101 sh mls qos int gi1/0/1 buffers

GigabitEthernet1/0/1

The port is mapped to qset : 1

The allocations between the queues are : 15 15 40 30

4. 验证相关流量是否在各自的队列中入队，以及是否存在丢弃：
6880-VSS#remote command fex 101 sh mls qos int gi1/0/1 statistic

GigabitEthernet1/0/1 (All statistics are in packets)

dscp: incoming

-------------------------------

0 -  4 :           0            0            0            0            0

5 -  9 :           0            0            0            0            0

10 - 14 :           0            0            0            0            0

15 - 19 :           0            0            0            0            0

20 - 24 :           0            0            0            0            0

25 - 29 :           0            0            0            0            0

30 - 34 :           0            0            0            0            0

35 - 39 :           0            0            0            0            0

40 - 44 :           0            0            0            0            0

45 - 49 :           0            0            0          491            0

50 - 54 :           0            0            0            0            0

55 - 59 :           0            0            0            0            0

60 - 64 :           0            0            0            0

dscp: outgoing

-------------------------------

0 -  4 :           0            0            0            0            0

5 -  9 :           0            0            0            0            0

10 - 14 :           0            0            0            0            0

15 - 19 :           0            0            0            0            0

20 - 24 :           0            0            0            0     57864687

25 - 29 :           0            0            0            0            0

30 - 34 :           0            0     29364400            0            0

35 - 39 :           0            0            0            0            0

40 - 44 :           0            0            0            0            0

45 - 49 :           0            0            0          775            0

50 - 54 :           0            0            0            0            0

55 - 59 :           0            0            0            0            0

60 - 64 :           0            0            0            0

cos: incoming

-------------------------------

0 -  4 :        5323            0            0            0            0

5 -  7 :           0            0            0

cos: outgoing

-------------------------------

0 -  4 :        1718            0            0     57864691     29364400

5 -  7 :           0            0            0

output queues enqueued:

queue:    threshold1   threshold2   threshold3

-----------------------------------------------

queue 0:    29365402        1883           5

queue 1:         793          98           0

queue 2:           0           0           0

queue 3:   530554174           0           0

output queues dropped:

queue:    threshold1   threshold2   threshold3

-----------------------------------------------

queue 0:           0          10           0

queue 1:           1       24093           0

queue 2:           0           0           0

queue 3:     2309351           0           0

Policer: Inprofile:            0 OutofProfile:            0

验证

当前没有可用于此配置的验证过程。

故障排除

本部分提供的信息可用于对配置进行故障排除。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令。使用输出解释器工具来查看 show 命令输出的分析。

注意：使用 debug 命令之前，请参阅有关 Debug 命令的重要信息。

1. 从6800ia CLI为qos-manager启用debug。确保日志重定向到缓冲区，并且日志记录缓冲区设置为高数：
6880-VSS#attach fex 101

Attach FEX:101 ip:192.168.1.101

Trying 192.168.1.101 ... Open

????????FEX-101>en

Password: cisco

FEX-101#

FEX-101#debug platform qos-manager all

QM verbose debugging is on

QM cops debugging is on

QM events debugging is on

QM Statistics debugging is on

FEX-101#exit

[Connection to 192.168.1.101 closed by foreign host]

2. 配置policy-map以触发调试：
6880-VSS#conf t

6880-VSS(config)#int gi101/1/0/1

6880-VSS(config-if)# service-policy type lan-queuing output ltest

Propagating [attach] lan queueing policy "ltest" to Gi101/1/0/1

Gi101/1/0/2 Gi101/1/0/3 Gi101/1/0/4 Gi101/1/0/5 Gi101/1/0/6 Gi101/1/0/7 Gi101/1/0/8

Gi101/1/0/9 Gi101/1/0/10 Gi101/1/0/12 Gi101/1/0/13 Gi101/1/0/14 Gi101/1/0/15 Gi101/1/0/16

<snip>

6880-VSS(config-if)#end

3. 检查交换矩阵扩展器(FEX)上的日志以检查调试：
6880-VSS#remote command fex 101 show log

<snip>

May 20 06:43:18.208: HQM: hulc_fex_qos_priority_handler: hulc_fex_qos_priority_handler:

****Setting Priority Queue (FEX-101)

May 20 06:43:18.208: HQM: hulc_fex_qos_priority_handler: hulc_fex_qos_priority_handler:

subopcode=2 startport=0 endport=0 size=4 (FEX-101)

May 20 06:43:18.208: HQM: hulc_f

_fex_qos_priority_handler:QueueNum=1 PriorityQueue=1 queuetype=2 thresholdsnum=3 (FEX-101)

May 20 06:43:18.212: HQM: hulc_fex_qos_priority_handler: hulc_fex_qos_priority_handler:

idb=GigabitEthernet1/0/1 (FEX-101)

May 20 06:43:18.212: HQM: hulc_fex_qos_priority_handler: hulc_fex_qos_priority_handler:

idb=GigabitEthernet1/0/2 (FEX-101)

May 20 06:43:18.212: HQM: hulc_fex_qos_priority_handler: hulc_fex_qos_priority_handler:

idb=GigabitEthernet1/0/3 (FEX-101)

<snip>

hulc_fex_qos_srr_weight_setting:****Setting weight for queues**** (FEX-101)

May 20 06:43:18.232: HQM: hulc_fex_qos_srr_weight_setting: hulc_fex_qos_srr_weight_setting:

subopcode=2 startport=0 endport=0 size=4 (FEX-101)

May 20 06:43:18.232: HQM: hulc_fex_qos_srr_weight_setting: hulc_fex_qos_srr_weight_setting:

QueueNum=1 RRType=0 WeightRelative=0 WeightAbsolute=0 (FEX-101)

20 06:43:18.232: HQM: hulc_fex_qos_srr_weight_setting: hulc_fex_qos_srr_weight_setting:

ratio is 0 for queue 1 (FEX-101)

May 20 06:43:18.232: HQM: hulc_fex_qos_srr_weight_setting: hulc_fex_qos_srr_weight_setting:

QueueNum=2 RRType=0 WeightRelative=33 WeightAbsolute=0 (FEX-101)

<snip>

20 06:43:19.110: HQM: hulc_fex_qos_buffer_conf: **Setting buffer for output queues** (FEX-101)

May 20 06:43:19.110: HQM: hulc_fex_qos_buffer_conf: hulc_fex_qos_buffer_conf:

subopcode=2 startport=0 endport=0 size=4 (FEX-101)

May 20 06:43:19.110: HQM: hulc_fex_qos_buffer_conf: hulc_fex_qos_buffer_conf:

queuenum=1 size=15 (FEX-101)

May 20 06:43:19.110: HQM: hulc_fex_qos_buffer_conf:

hulc_fex_qos_buffer_conf: queuenum=2 size=25 (FEX-101)

May 20 06:43:19.110: HQM: hulc_fex_qos_buffer_conf:

hulc_fex_qos_buffer_conf: queuenum=3 size=40 (FEX-101)

May 20 06:43:19.110: HQM: hulc_fex_qos_buffer_conf:

hulc_fex_qos_buffer_conf: queuenum=4 size=20 (FEX-101)

May 20 06:43:19.110: HQM: hqm

20 06:43:19.113: HQM: s88g_qd_get_queue_threshold: s88g_qd_get_queue_threshold:

max_limit = 3200, set to 350. (FEX-101)

May 20 06:43:19.113: HQM: s88g_qd_get_queue_threshold: s88g_qd_get_queue_threshold:

max_limit = 3200, set to 350. (FEX-101)

<snip>

hulc_fex_qos_qthresh_map:****Setting dscp to output queue map**** (FEX-101)

May 20 06:43:19.169: HQM: hulc_fex_qos_qthresh_map: hulc_fex_qos_qthresh_map:

subopcode=2 startport=0 endport=0 size=1 (FEX-101)

May 20 06:43:19.169: HQM: hulc_fex_qos_qthresh_map: hulc_fex_qos_qthresh_map: DscpBma

20 06:43:19.169: HQM: hulc_fex_qos_qthresh_map: hulc_fex_qos_qthresh_map

dscp=32 iterator=0 (FEX-101)

May 20 06:43:19.169: HQM: hulc_fex_qos_qthresh_map: hulc_fex_qos_qthresh_map

dscp=33 iterator=1 (FEX-101)

May 20 06:43:19.169: HQM: hulc_fex_qos_qthresh_map: hulc_fex_qos_qthresh_map

dscp=40 iterator=2 (FEX-101)

<snip>